
 GPS week: 1089   Day: 5   MJD: 51872                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2483      0    -0.09     0.19     5.22     0.00
 cod |   287     0  17641     48     4.50     0.21     0.08    30.15
 esa |   288     0  16114    894  2009.55    15.92     0.11    20.75
 gfz |   288     0  13629    506     0.01    -0.20     0.09    25.32
 igp |    96     0   2204      0    -0.05     0.12     5.61     0.00
 igu |    96     0   2199      0     0.00     0.06     6.07     0.00
 ngs |    96     0   2483      0    -0.09     0.19     5.10     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14187    112  2026.53    15.87     0.09    23.78

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -2687   159    30   158-22400 10998 -1775     -  -387 |
    2 |  2061    21   207  -178 14160  5355  1692     -   -18 |
    3 |  3626  -264   553   106  4639  2983  3307     -  -266 |
    4 |  8239    -2   -69  -110 15717  9278  6890     -   180 |
    5 | -5520    84   -72  -142  7483  6301 -4723     -   109 |
    6 | -4349    63   -82    66 -5575  5327 -4222     -   -75 |
    7 |  1602   184    28   -71-37397  9702  1352     -  -179 |
    8 | -6000   115   261   -75-36149  -621 -5876     -  -286 |
    9 |  2217  -159    23    12  8639  5848  2025     -   165 |
   10 |  3848   121     X  -162  1089  -859  3509     -    33 |
   11 |  2700  -122   409   -74 12748  3486  2886     -  -124 |
   13 |  1819   -81   -23    92 17741 -6187  1743     -    20 |
   17 |   -40   285  -427   -55 -2890     -   -24     -    85 |
   19 | -3445    30   103   258-18787  8483 -3150     -  -403 |
   20 |  3669    65   114   -59  6196  1078  3941     -  -118 |
   21 |  -407   257     X   -61     -     -   290     -  -245 |
   22 | -8443    -6   408   -39 43497-24324 -6902     -  -308 |
   23 |  1994   119   -98   -64     --40681  2379     -     - |
   24 | -4130    47  -159  -117 26156-14804 -4768     -   205 |
   25 |  3449   -62   272    57 20009  9074  3075     -  -221 |
   26 | -2786  -374   135   139-23122 -3776 -2643     -   176 |
   27 |-10593   -59   292   219 -8997 -4817-10393     -  -378 |
   28 |  9613  -120   372   -42-12182   432  8914     -  -133 |
   29 | -2463   -84    33    32     -     - -2271     -    43 |
   30 | -2702   -12   -86    34 -5221 -5730 -2934     -    55 |
   31 |  8971  -199   647    74 -5301 21227  7957     -  -415 |
 -----+-------------------------------------------------------+
 ALGO |     -    -2     X  -127     -     -     -     -   138 |
 AREQ |     -   -20    29     -     -     -     -     -     - |
 ARTU |     -    44     -   -52     -     -     -     -     - |
 ASC1 |     -   387  -286  -428     -     -     -     -   360 |
 AUCK |     -  -376  -356   711     -     -     -     -    12 |
 BAHR |     -     5  -102     X     -     -     -     -    83 |
 BOR1 |     -    28   -40     -     -     -     -     -     - |
 BRMU |     -   -94   126     -     -     -     -     -     4 |
 CAS1 |     -   -82   254  -222     -     -     -     -   118 |
 DRAO |     -   -15   184  -214     -     -     -     -    86 |
 FAIR |     -     -  -213     -     -     -     -     -   186 |
 GALA |     -     0   107   -88     -     -     -     -     - |
 HOB2 |     -  -229   222     -     -     -     -     -    96 |
 KARR |     -    82     -   -97     -     -     -     -     - |
 KIRU |     -    63   -92     -     -     -     -     -     - |
 KOKB |     -     -    78   -75     -     -     -     -    11 |
 KOUR |     -  -145   146     -     -     -     -     -    45 |
 KWJ1 |     -     -   -11    -5     -     -     -     -    15 |
 LHAS |     -    -8    11     -     -     -     -     -     - |
 LPGS |     -   611  -887     X     -     -     -     -     - |
 MALI |     -     -  -430     -     -     -     -     -   376 |
 MATE |     -  -111     -     -     -     -     -     -   140 |
 MAW1 |     -   -21     -    25     -     -     -     -     - |
 MCM4 |     -     -  -141   115     -     -     -     -   -12 |
 NLIB |     -   -38     -     -     -     -     -     -    48 |
 NRC2 |     -   568  -825     -     -     -     -     -     - |
 NYA1 |     -    20     -   -24     -     -     -     -     - |
 ONSA |     -  -181   159     -     -     -     -     -    90 |
 PIE1 |     -    17  -314     -     -     -     -     -   255 |
 POTS |     -    -9    13     -     -     -     -     -     - |
 REYK |     -    -7    10     -     -     -     -     -     - |
 SANT |     -     -   -36    57     -     -     -     -   -14 |
 STJO |     -   -17     -    20     -     -     -     -     - |
 THU1 |     -  -103     -     -     -     -     -     -   131 |
 TIXI |     -     0     -     0     -     -     -     -     - |
 TRO1 |     -  -169     -   202     -     -     -     -     - |
 TSKB |     -   111  -265     -     -     -     -     -   100 |
 USNO |     -   -60   -17     -     -     -     -     -    91 |
 USUD |     -    52    30   -85     -     -     -     -     - |
 VILL |     -    35   -51     -     -     -     -     -     - |
 WHIT |     -    75     -   -90     -     -     -     -     - |
 WSRT |     -   -61     -     -     -     -     -     -    78 |
 WTZR |     -   -97   -40     -     -     -     -     -   157 |
 WUHN |     -   -38     -   243     -     -     -     -  -280 |
 ZWEN |     -     -  -765   181     -     -     -     -   424 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  5811    43    64    75  3373  4334  4830     -    46 |  288   3.01
    2 |  5318    71    74    85  8189  5548  5931     -    50 |  288   2.66
    3 |  3917   149   143   128  2394  1627  3494     -   121 |  288   2.32
    4 |  4132    74    65    65  4168  3821  4169     -    75 |  288   1.51
    5 |  5818    59    90    46  4144  3706  5591     -    81 |  288   2.67
    6 | 10041    77    71    62 10081  4456  9937     -    37 |  288   9.85
    7 |  2204   141    78    42 10174  4566  1962     -    82 |  288   1.50
    8 |  5560    50    80    58 12719  2597  5534     -   129 |  288   3.85
    9 |  3183   111    88    59  5224  3963  3100     -    30 |  288   1.33
   10 |  5873   218     X    95  4790  3268  5450     -   218 |  276   2.34
   11 |  1653    81   135   108  2280  2062  1878     -    51 |  288   0.49
   13 |  2267    63    76    44  2415  3792  1883     -    47 |  288   0.25
   17 |  5155    54    77   112  4048     -  5277     -   115 |  288   3.34
   19 |  8742   124   111    65  4798  4558  8637     -    89 |  288   3.52
   20 |  1112    90   212    67   987  1440  1196     -   147 |  288   0.31
   21 |  5524   146     X   122     -     -  5930     -    81 |  278   2.87
   22 |  6291    93    77    53  1414 14788  6179     -    62 |  288   0.64
   23 |  6527   146   330   307     - 11648  6490     -     - |  275   5.98
   24 |  9071    83   144    72  1138  8279  8945     -    91 |  288   1.34
   25 |  4382    54    65    46  6497  7030  3998     -    45 |  288   1.55
   26 |  1566    92   192    32  4787  2441  1598     -    91 |  288   0.38
   27 |  5111   104   120    60  5099  7282  5145     -   201 |  288   4.64
   28 |  3332    95    65   128  1514   820  3301     -    51 |  288   0.77
   29 |   697    59    60    58     -     -   658     -    86 |  288   0.87
   30 |  4161    94    44   104  1385  3452  4206     -    43 |  288   1.11
   31 |  4803    98    72    45  6751 11012  3668     -    37 |  288   2.49
 -----+-------------------------------------------------------+--------------
 ALGO |     -    40     X    64     -     -     -     -    28 |  288   0.02
 AREQ |     -    27    39     -     -     -     -     -     - |  279  21.95
 ARTU |     -    55     -    66     -     -     -     -     - |  285  23.75
 ASC1 |     -    52    34    41     -     -     -     -    34 |  270  45.91
 AUCK |     -    48    43    73     -     -     -     -    40 |  288  22.25
 BAHR |     -    59    48     X     -     -     -     -    53 |  286   0.59
 BOR1 |     -    21    30     -     -     -     -     -     - |  286   4.23
 BRMU |     -    31    63     -     -     -     -     -    35 |  288  17.17
 CAS1 |     -    61    69    93     -     -     -     -    36 |  288  12.14
 DRAO |     -    48    43    60     -     -     -     -    44 |  288   0.12
 FAIR |     -     -   191     -     -     -     -     -   167 |  236   0.12
 GALA |     -    73    43    56     -     -     -     -     - |  288  34.26
 HOB2 |     -    26    33     -     -     -     -     -    28 |  288   0.08
 KARR |     -    68     -    80     -     -     -     -     - |  286 135.25
 KIRU |     -    82   120     -     -     -     -     -     - |  262   1.32
 KOKB |     -     -   170   134     -     -     -     -   163 |  284   0.48
 KOUR |     -    35    33     -     -     -     -     -    43 |  288   7.11
 KWJ1 |     -     -   238   133     -     -     -     -   229 |  249  85.42
 LHAS |     -    28    40     -     -     -     -     -     - |  285  17.06
 LPGS |     -    51    73     X     -     -     -     -     - |  220 136.02
 MALI |     -     -    80     -     -     -     -     -    70 |  170  12.21
 MATE |     -    20     -     -     -     -     -     -    25 |  286   0.11
 MAW1 |     -    37     -    44     -     -     -     -     - |  287  28.01
 MCM4 |     -     -    88   108     -     -     -     -   118 |  288   1.52
 NLIB |     -    19     -     -     -     -     -     -    24 |  281   0.03
 NRC2 |     -    36    53     -     -     -     -     -     - |  286   0.04
 NYA1 |     -    24     -    28     -     -     -     -     - |  287   0.03
 ONSA |     -    22    34     -     -     -     -     -    24 |  288  16.07
 PIE1 |     -    34    49     -     -     -     -     -    22 |  288   0.03
 POTS |     -    17    25     -     -     -     -     -     - |  287  14.61
 REYK |     -   128   186     -     -     -     -     -     - |  271   8.59
 SANT |     -     -   143   136     -     -     -     -   179 |  233  16.33
 STJO |     -    39     -    46     -     -     -     -     - |  287   2.20
 THU1 |     -    35     -     -     -     -     -     -    45 |  205  14.79
 TIXI |     -    79     -    94     -     -     -     -     - |  263  14.37
 TRO1 |     -    19     -    23     -     -     -     -     - |  280  10.64
 TSKB |     -    97   123     -     -     -     -     -    67 |  286   1.30
 USNO |     -    34    56     -     -     -     -     -    30 |  288   0.03
 USUD |     -    39    64    63     -     -     -     -     - |  288   0.45
 VILL |     -    27    39     -     -     -     -     -     - |  287   5.81
 WHIT |     -    39     -    46     -     -     -     -     - |  287  13.83
 WSRT |     -    24     -     -     -     -     -     -    31 |  287   0.03
 WTZR |     -    20    35     -     -     -     -     -    25 |  288   0.21
 WUHN |     -    46     -    56     -     -     -     -    47 |  243  17.74
 ZWEN |     -     -   174   147     -     -     -     -   185 |  245    >>>
 -----+-------------------------------------------------------+--------------
 TOT  |  5217    75   107    90  5611  6072  5104     -    93 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

