
 GPS week: 1089   Day: 6   MJD: 51873                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2579      0    -0.05     0.09     5.36     0.00
 cod |   288     0  17795      0     5.23    -4.52     0.10    23.16
 esa |   288     0  16364    505  2025.22     9.66     0.12    19.61
 gfz |   288     0  14242    560     0.07    -0.72     0.07    32.04
 igp |    96     0   2487      0     0.04    -0.06     5.13     0.00
 igu |    96     0   2295      0    -0.12     0.22     5.82     0.00
 ngs |    96     0   2579      0    -0.05     0.10     5.14     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14362    493  2042.03     9.64     0.09    25.20

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -8415   150   164    96-26796 -5220 -8461     -  -382 |
    2 |  1715   131  -193    54 22064-11169   800     -   -42 |
    3 |   574  -217   413   -29  6616  -986   261     -   -99 |
    4 |  2740   138    16   -62 24229  3581  2476     -   -55 |
    5 |  4720   154  -264   135   811 11393  3261     -  -101 |
    6 | -6938    44     8    64-18929 -9246 -6110     -  -123 |
    7 |  -936    28   229    72-21000  3262 -1423     -  -294 |
    8 |  2487   -42   408   105-28567 22444  3384     -  -376 |
    9 | 17499  -112   123   -18 32454 10655 15581     -    25 |
   10 | -6458   145  -234    20-15720-15240 -5301     -   -19 |
   11 |  6282  -147   262   -23 10075 -5693  6107     -   -49 |
   13 |  1155   -14    93   -44 13876  -127  1350     -    -4 |
   15 | -8375   257     -  -210 15447     - -5979     -    39 |
   17 | -9775   241  -152   -56 13333-11258 -8926     -   -16 |
   19 |  2783   -78    99   226  7869  9670  1955     -  -300 |
   20 |  5455    34   109    68  2987 -2535  5646     -  -199 |
   21 | -6068   343  -256   -26-27167 27761 -5340     -   -87 |
   22 |  5192    -9   324   -82 -9323 11768  5137     -  -140 |
   23 | 10266   197  -457   124     -     -  8962     -     - |
   24 | -6143   149  -208   -26-14150 -5794 -5720     -    79 |
   25 |  3673    24     1   129 21409 -3568  3505     -  -186 |
   26 | -2349  -354   313   -41 -8414 -8210 -2406     -   113 |
   27 |  -827  -118   619    47-16126  5186  -985     -  -358 |
   28 |   577   -87   255  -104 21255 -5087     6     -     7 |
   29 | -1312   -33  -313   156-16918     - -1176     -    76 |
   30 | -5127    38  -386   293 -9307 -7593 -4078     -  -106 |
   31 | -2461  -305   499   193 18148-13434 -2576     -  -374 |
 -----+-------------------------------------------------------+
 ALGO |     -   -37     X   -71     -     -     -     -   124 |
 AREQ |     -   -22    26     -     -     -     -     -     - |
 ARTU |     -    62     -   -45     -     -     -     -     - |
 ASC1 |     -     -  -272    52     -     -     -     -   128 |
 AUCK |     -   454   218  -910     -     -     -     -   646 |
 BAHR |     -   -10   -39     X     -     -     -     -    39 |
 BRMU |     -   -89   -87     -     -     -     -     -   146 |
 CAS1 |     -    -6   114  -120     -     -     -     -    69 |
 DAEJ |     -  -458     -     -     -     -     -     -   421 |
 DRAO |     -     0   100  -123     -     -     -     -    79 |
 FAIR |     -     -  -117     -     -     -     -     -    91 |
 GALA |     -  -112   -26    92     -     -     -     -     - |
 GRAZ |     -  -336   397     -     -     -     -     -     - |
 GUAM |     -    20   -24     -     -     -     -     -     - |
 HOB2 |     -  -138    23     -     -     -     -     -   109 |
 KARR |     -    82     -   -59     -     -     -     -     - |
 KIRU |     -  -128   151     -     -     -     -     -     - |
 KOKB |     -     -   133   -81     -     -     -     -     X |
 KOUR |     -   -63  -113     -     -     -     -     -   145 |
 KWJ1 |     -     -    33   -75     -     -     -     -    67 |
 LHAS |     -    26    31   -38     -     -     -     -     - |
 LPGS |     -   814  -962     X     -     -     -     -     - |
 MALI |     -     -  -246     -     -     -     -     -   191 |
 MAW1 |     -    71     -   -52     -     -     -     -     - |
 MCM4 |     -   -11   -52    56     -     -     -     -   -21 |
 NLIB |     -  -327     -     -     -     -     -     -   300 |
 NRC2 |     -   334  -395     -     -     -     -     -     - |
 NYA1 |     -    69     -   -50     -     -     -     -     - |
 ONSA |     -  -144    36     -     -     -     -     -   104 |
 PIE1 |     -  -169  -125     -     -     -     -     -   245 |
 POTS |     -   -52   -67     -     -     -     -     -   100 |
 REYK |     -   -79    94     -     -     -     -     -     - |
 SANT |     -     -   -48    30     -     -     -     -     X |
 STJO |     -   -77     -    56     -     -     -     -     - |
 SUTH |     -  -606     -   439     -     -     -     -     - |
 THU1 |     -  -114     -     -     -     -     -     -   105 |
 TIXI |     -   -13     -    10     -     -     -     -     - |
 TRO1 |     -  -144     -   104     -     -     -     -     - |
 TSKB |     -   124   -54     -     -     -     -     -   -45 |
 USNO |     -   -89     4     -     -     -     -     -    78 |
 USUD |     -    83   -13   -52     -     -     -     -     - |
 VILL |     -    34   -40     -     -     -     -     -     - |
 WHIT |     -    27     -   -20     -     -     -     -     - |
 WSRT |     -   -59     -     -     -     -     -     -    54 |
 WTZR |     -   -65   -98     -     -     -     -     -   136 |
 ZWEN |     -     -  -111   -21     -     -     -     -   111 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  3448    77    72    48  3370  1983  3477     -    73 |  288   2.54
    2 |  7203   125    92   112  5506  5291  6520     -   100 |  287   3.82
    3 |  4423    91   142    38  1592  3884  4494     -    92 |  288   1.32
    4 |  1718    78    55    66  2337  4068  1864     -    61 |  288   0.54
    5 |  8793   151    70    36  5064  3927  7930     -   175 |  288   4.18
    6 |  9796    94    85    34  8918  2249  9681     -    31 |  288   8.84
    7 |  4155   135    51   106  9655  2346  3771     -    35 |  288   1.39
    8 |  7019    75    48    22  7555 12720  6548     -    52 |  288   4.21
    9 |  9153    56    47    31 13367  6734  7820     -    54 |  288   1.91
   10 |  6388   213   233    87  4135  8834  6334     -   184 |  277   3.16
   11 |   983   117   139    61  2556  3421  1082     -   111 |  288   0.55
   13 |   767    73    88    49  2309   676   752     -    82 |  288   0.20
   15 | 10072    99     -    56  2902     -  9315     -    67 |  288   2.66
   17 |  4415   124   107    38  5427  6743  4843     -   154 |  288   5.26
   19 |  4331   211    86   135  7111  6296  4161     -    56 |  287   2.39
   20 |  1239   152   179    81   610  1801  1282     -    92 |  288   0.24
   21 |  3908   158   340   182  3023  9290  3773     -    97 |  276   2.32
   22 |  3074   143   209    59  2273  7988  3182     -    45 |  288   1.39
   23 |  6189   187   198    93     -     -  7642     -     - |  278   5.09
   24 |  1996    86   125    53  2445  2023  2494     -   135 |  288   1.71
   25 |  3207    90    79    74  4456  4961  2977     -    69 |  288   3.53
   26 |  1031    90   136    34  2666  4884  1009     -    49 |  288   0.71
   27 |  3096   111    82    46  3163  3605  3094     -   121 |  288   2.83
   28 |  5824    88    98    48  1427  3128  5187     -   102 |  288   1.01
   29 |   892   123   117    51  3657     -   768     -    64 |  288   0.68
   30 |  6279   139    39    46  1589  1855  5929     -   130 |  288   1.55
   31 |  5440    88    66   123  3516 10976  5265     -    66 |  288   2.91
 -----+-------------------------------------------------------+--------------
 ALGO |     -    65     X    64     -     -     -     -    37 |  288   0.04
 AREQ |     -    45    53     -     -     -     -     -     - |  286  22.53
 ARTU |     -    50     -    36     -     -     -     -     - |  282  20.42
 ASC1 |     -     -    30    33     -     -     -     -    42 |  288  29.51
 AUCK |     -   108    77    54     -     -     -     -    45 |  288  28.42
 BAHR |     -   109   108     X     -     -     -     -   129 |  288   0.79
 BRMU |     -    76    31     -     -     -     -     -    58 |  287  16.91
 CAS1 |     -   112    80    49     -     -     -     -    58 |  288  12.08
 DAEJ |     -    31     -     -     -     -     -     -    28 |   77   1.09
 DRAO |     -    73   104   111     -     -     -     -    43 |  286  12.44
 FAIR |     -     -    62     -     -     -     -     -    48 |  286   0.13
 GALA |     -    63    31    53     -     -     -     -     - |  280  33.64
 GRAZ |     -    62    73     -     -     -     -     -     - |  216   9.68
 GUAM |     -    63    74     -     -     -     -     -     - |  285  35.49
 HOB2 |     -    63    66     -     -     -     -     -    40 |  288   0.09
 KARR |     -    84     -    61     -     -     -     -     - |  288 128.34
 KIRU |     -   189   224     -     -     -     -     -     - |  282   2.47
 KOKB |     -     -   232   142     -     -     -     -     X |  233   1.23
 KOUR |     -    91    43     -     -     -     -     -    62 |  288   5.19
 KWJ1 |     -     -   247   128     -     -     -     -   157 |  240 146.59
 LHAS |     -    45    36    42     -     -     -     -     - |  288  19.50
 LPGS |     -    83    98     X     -     -     -     -     - |  282  78.04
 MALI |     -     -   281     -     -     -     -     -   219 |  211  16.75
 MAW1 |     -    77     -    56     -     -     -     -     - |  288  22.53
 MCM4 |     -   140   101    88     -     -     -     -   191 |  288   1.55
 NLIB |     -    27     -     -     -     -     -     -    25 |  242   0.02
 NRC2 |     -    53    62     -     -     -     -     -     - |  288   0.05
 NYA1 |     -    93     -    68     -     -     -     -     - |  288   0.06
 ONSA |     -   104    38     -     -     -     -     -    70 |  288  14.96
 PIE1 |     -    93    76     -     -     -     -     -    37 |  288   0.03
 POTS |     -    96    33     -     -     -     -     -    72 |  288  14.92
 REYK |     -    65    77     -     -     -     -     -     - |  287   7.75
 SANT |     -     -   116    71     -     -     -     -     X |  259   5.89
 STJO |     -    50     -    36     -     -     -     -     - |  287   3.25
 SUTH |     -   184     -   133     -     -     -     -     - |  151  35.60
 THU1 |     -    57     -     -     -     -     -     -    52 |  253  12.31
 TIXI |     -    50     -    36     -     -     -     -     - |  287  15.92
 TRO1 |     -    42     -    31     -     -     -     -     - |  288  10.13
 TSKB |     -    86    76     -     -     -     -     -    56 |  288   0.78
 USNO |     -    62    54     -     -     -     -     -    27 |  288   0.04
 USUD |     -    73   105    45     -     -     -     -     - |  288   0.45
 VILL |     -    28    33     -     -     -     -     -     - |  288   6.28
 WHIT |     -    42     -    31     -     -     -     -     - |  287   3.61
 WSRT |     -    48     -     -     -     -     -     -    44 |  288   0.03
 WTZR |     -    27    45     -     -     -     -     -    21 |  288   0.17
 ZWEN |     -     -   151    53     -     -     -     -    80 |  209    >>>
 -----+-------------------------------------------------------+--------------
 TOT  |  5362   101   118    73  5126  5817  5142     -    91 |


 BEST CLOCK FIT: PIE1   288   0.03 (ns) 

