
 GPS week: 1094   Day: 2   MJD: 51904                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2669      0     0.04    -0.03     4.79     0.00
 cod |   287     0  16633    275    -0.76     1.73     0.09    39.16
 gfz |   288     0  14494    259    -0.18     0.31     0.10    33.45
 igp |    96     0   2478      0    -0.01     0.13     4.62     0.00
 igu |    96     0   2287      0    -0.01     0.02     4.13     0.00
 jpl |     0     0      0      0     3.25     0.00     0.00     0.00
 usn |   288     0  14793    894  2376.92     9.94     0.13    27.39

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   gfz   igp   igu   jpl   usn |
 -----+-------------------------------------------+
    1 |-14333   191   172   457-22580     -  -479 |
    2 |   982   -24   176  7703  -580     -  -181 |
    3 |  5538   -51   187 18386  2404     -  -156 |
    4 | -2109    -2    -5-12217 -7331     -     9 |
    5 | -3594    42    -1-25709  -340     -   -57 |
    6 | -6733   110    -7   651  1666     -  -145 |
    7 |  -945    25   145-23498 -3069     -  -213 |
    8 |  7525   -76    89 -3964  6759     -     X |
    9 |  2416   -22    43  5381  5163     -   -21 |
   10 |  4010   180  -145 20886  2350     -   -78 |
   11 |  4796    22    87 19552  -916     -  -137 |
   13 |  5971   -31    17 23847   243     -    23 |
   14 |  1127   -80   -74 -9213 -2840     -   205 |
   15 | -7491    34   -20 10701 -7751     -   -23 |
   17 |  2344   141   -54     -     -     -  -135 |
   19 |  1298   -80    94 -6322  5427     -     - |
   20 |  7331   134    37 10527  1048     -  -232 |
   21 | -2438   151     5-15385 -3106     -  -221 |
   22 | -5538   132   -40-15559 13995     -  -139 |
   23 | -3411   -27   -12     -     -     -    58 |
   24 |   501     X  -136-18312  4170     -   166 |
   25 | -2290    -8    56 -3054 -6613     -   -57 |
   26 | -4136  -134    45 -5154  2480     -   132 |
   27 |  8172    64   274 17621     -     -  -426 |
   28 |  9297   -33   -35  4787 14407     -    90 |
   29 | -3772  -118   140-10634    42     -    -7 |
   30 | -1823   -42    49 -1881     -     -     X |
   31 | -3185    98   102 10079 -5233     -  -265 |
 -----+-------------------------------------------+
 ALGO |     -   -39  -155     -     -     -   245 |
 ARTU |     -    62   -72     -     -     -     - |
 AUCK |     -  -100     -     -     -     -   143 |
 BAHR |     -    13     -     -     -     -   -19 |
 BRMU |     -   -99     -     -     -     -   141 |
 CAS1 |     -    12   -20     -     -     -     7 |
 COCO |     -   252  -185     -     -     -  -133 |
 DRAO |     -   -24  -143     -     -     -   209 |
 GODE |     -  -173     -     -     -     -   247 |
 GUAM |     -   -26  -124     -     -     -   188 |
 HOB2 |     -   -67     -     -     -     -    96 |
 IISC |     -     -  -411     -     -     -   502 |
 KERG |     -    88     X     -     -     -  -126 |
 KIRU |     -   -90   105     -     -     -     - |
 KIT3 |     -     4    -4     -     -     -     - |
 KOKB |     -     -    78     -     -     -   -95 |
 KOUR |     -   -26     -     -     -     -    37 |
 KWJ1 |     -     -   -83     -     -     -   101 |
 MAC1 |     -     8   -10     -     -     -     - |
 MALI |     -     -  -161     -     -     -   196 |
 MATE |     -   -35     -     -     -     -    50 |
 MAW1 |     -    67   -79     -     -     -     - |
 MCM4 |     -    71   -16     -     -     -   -75 |
 NLIB |     -  -122     -     -     -     -   174 |
 PERT |     -    59     -     -     -     -   -85 |
 PIE1 |     -  -242     -     -     -     -   346 |
 RBAY |     -   -57    67     -     -     -     - |
 SANT |     -   -13    15     -     -     -     X |
 TIDB |     -   107  -125     -     -     -     - |
 TSKB |     -    90     -     -     -     -  -128 |
 URUM |     -   -86     -     -     -     -   123 |
 VILL |     -   -45    53     -     -     -     - |
 WHIT |     -   -34    40     -     -     -     - |
 YELL |     -  -162   -59     -     -     -   331 |
 YSSK |     -    33   -39     -     -     -     - |
 ZWEN |     -     -   -51     -     -     -    62 |
 -----+-------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   gfz   igp   igu   jpl   usn | NEPO RMS (ns)
 -----+-------------------------------------------+--------------
    1 |  3655   189   109  4216  7694     -   162 |  287   2.90
    2 |  5431   123    53  5256  4149     -   170 |  288   2.72
    3 |  3208   101    97  4560  2738     -    76 |  287   2.96
    4 |  3407    75    57  4829  3233     -    70 |  288   0.72
    5 |  6827    63   113  1760  1902     -   205 |  288   1.60
    6 |  9240   115   144  7679  5344     -    85 |  276   7.93
    7 |  4750   129   141  8758  1672     -    51 |  282   1.38
    8 |  6537    45    53  4057  2695     -     X |  279   3.73
    9 |  2526    53    68  3547  3391     -   133 |  288   1.66
   10 |  4330   130    43  3607  1160     -   144 |  288   1.94
   11 |   565    92    97  2010   969     -   158 |  288   0.38
   13 |  1016    58    76  4491   866     -   137 |  288   0.22
   14 |  2109    38    36  3339   981     -    46 |  288   0.40
   15 |  3026    73    41  2406  4834     -    98 |  287   2.36
   17 |  3742   176   110     -     -     -   235 |  288   2.82
   19 | 12050    91   106  4502  4365     -     - |  287   4.59
   20 |   917   105   106  1085   692     -   243 |  287   0.32
   21 |  4924   144    59  5260  5171     -   166 |  288   3.01
   22 |  3768    45    60  3067  8348     -   118 |  287   0.39
   23 |  5489    84   168     -     -     -   266 |  287   5.66
   24 |  4652     X   103  2641  3926     -   126 |  287   2.09
   25 |  3978    58    96  3186  3380     -   173 |  288   2.22
   26 |  1302    39   158  2504  2153     -   162 |  288   0.54
   27 |  7785    32    43 12183     -     -    58 |  288   2.58
   28 |  2044    52    63  1700  8290     -    70 |  288   0.62
   29 |  1335    51    92  2854   955     -    74 |  288   0.64
   30 |  1994    41    48  1320     -     -     X |  286   1.27
   31 |  3589   173   125  2877  4693     -   103 |  280   2.90
 -----+-------------------------------------------+--------------
 ALGO |     -    34    22     -     -     -    53 |  288   0.02
 ARTU |     -    59    69     -     -     -     - |  283  19.50
 AUCK |     -    57     -     -     -     -    82 |  287  17.88
 BAHR |     -   114     -     -     -     -   162 |  287   0.43
 BRMU |     -    29     -     -     -     -    41 |  283  20.10
 CAS1 |     -    41    29     -     -     -    46 |  288  11.98
 COCO |     -    96   110     -     -     -   104 |  277    >>>
 DRAO |     -    40    33     -     -     -    26 |  288   0.03
 GODE |     -    38     -     -     -     -    54 |  285   0.08
 GUAM |     -    32   115     -     -     -   117 |  288  30.22
 HOB2 |     -    32     -     -     -     -    46 |  287   0.07
 IISC |     -     -   117     -     -     -   143 |  177  24.41
 KERG |     -    37     X     -     -     -    52 |  259    >>>
 KIRU |     -    24    28     -     -     -     - |  283   1.66
 KIT3 |     -    41    48     -     -     -     - |  287  18.64
 KOKB |     -     -   272     -     -     -   332 |  240   0.29
 KOUR |     -    35     -     -     -     -    50 |  278   2.08
 KWJ1 |     -     -   146     -     -     -   178 |  241 164.60
 MAC1 |     -    51    60     -     -     -     - |  240  10.70
 MALI |     -     -    47     -     -     -    57 |  215   5.97
 MATE |     -    30     -     -     -     -    43 |  274   0.13
 MAW1 |     -    21    25     -     -     -     - |  287  17.56
 MCM4 |     -    69    62     -     -     -    77 |  288  16.97
 NLIB |     -    24     -     -     -     -    35 |  286   0.02
 PERT |     -    26     -     -     -     -    37 |  287   1.84
 PIE1 |     -    21     -     -     -     -    31 |  277   0.04
 RBAY |     -    61    71     -     -     -     - |  282  39.09
 SANT |     -   299   350     -     -     -     X |  273   4.69
 TIDB |     -    78    91     -     -     -     - |  287   0.26
 TSKB |     -    38     -     -     -     -    54 |  284   1.32
 URUM |     -   100     -     -     -     -   142 |  281  34.17
 VILL |     -    47    55     -     -     -     - |  287   3.64
 WHIT |     -    28    33     -     -     -     - |  287  52.13
 YELL |     -    38    20     -     -     -    38 |  287   0.02
 YSSK |     -    42    49     -     -     -     - |  287  17.56
 ZWEN |     -     -    40     -     -     -    48 |  277  24.75
 -----+-------------------------------------------+--------------
 TOT  |  4792    86   103  4622  4132     -   126 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

