
 GPS week: 1150   Day: 3   MJD: 52297                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2650      0    -1.88     1.78     4.56     0.00
 cod |   288     0  24768    305    -3.48     2.17     0.07    21.79
 emr |   288     0  12126      2  2056.19    73.50     0.08    17.34
 esa |   288     0  17842   1758    -2.17     1.30     0.11    11.74
 gfz |   288     0  14808    240    -2.37     1.56     0.07    24.77
 igu |    96     0   2397      0    -1.75     1.58     4.21     0.00
 ngs |    96     0   2650      0    -1.87     1.79     4.17     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24804    536   685.94     2.03     0.06    24.37

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -7381    42    22   207   -99 -1153 -6056     -   -52 |
    2 |  3637   131  -102   295   -13 11494  2760     -  -174 |
    3 |  -622    30  -294   398   130  -519  -914     -  -141 |
    4 | -3277    20   -73  -182   305  -302 -3086     -  -193 |
    5 |  7084    16    -9  -250   185 14699  6432     -   -76 |
    6 |  1898   111  -277    58   266 -3106  1931     -  -201 |
    7 | -4113   107  -191   -75   215-16335 -5692     -  -125 |
    8 | -2204    86   -10   130   -39  3083 -2159     -   -93 |
    9 | -3464    64  -137   -73   159  9723 -2994     -   -86 |
   10 |   669    84   -10  -129   -15  -750   128     -     9 |
   11 |  6033   -71    31   326  -151  1914  5871     -    43 |
   13 |  4578    72    49     8   -88   510  4275     -   -14 |
   14 |  2227    39    88   139  -124  1837  2278     -   -39 |
   15 |-14219    10     6     -    54     --12613     -   -69 |
   17 | -2761     -    57   214     -     - -2487     -  -120 |
   18 |  5667   -53    10   145    47  1739  5833     -   -77 |
   20 |  6805   -70    36   326  -177  2029  6955     -    60 |
   21 |  4337   -12    58  -158    33     -  4321     -    13 |
   22 |   554    38   -88   166    41 -5434   306     -   -93 |
   23 | -4934    77    -9    29    49 -9671 -4764     -  -127 |
   24 | -1268    80   -42  -323   195  3549 -1687     -   -94 |
   25 | -3981    23  -233   291   136-10046 -3571     -  -133 |
   26 | -1254    65   -55  -111   133 -3464 -1564     -  -100 |
   27 |  3636   122   -28   333   -51 15316  2525     -  -197 |
   28 |  4735    76    76  -202    12  5108  4887     -   -36 |
   29 |  1496   103   -12   109   -50 -4476  1539     -   -85 |
   30 |  3654    49   -45    65   168 -4643  4178     -  -213 |
   31 | -9148    27  -146   195   145-11084 -8122     -  -161 |
 -----+-------------------------------------------------------+
 ALBH |     -   -90     -     -     -     -     -     -    80 |
 ALGO |     -    37   153   -64  -109     -     -     -     X |
 AMC2 |     -  -109     -     -     -     -     -     -    98 |
 AOML |     -   -85     -     -     -     -     -     -    76 |
 AUCK |     -   -59     -     X     -     -     -     -    53 |
 BAHR |     -   -98    86    84     -     -     -     -   -14 |
 BILI |     -   -56     -     -    49     -     -     -     - |
 BOR1 |     -    32     -     -     -     -     -     -   -29 |
 BRMU |     -     -     -    10   -54     -     -     -    50 |
 BRUS |     -   -33     -     -     -     -     -     -    30 |
 CAS1 |     -  -138     -    56   -87     -     -     -   185 |
 CHAT |     -  -138     -     X     -     -     -     -   123 |
 CRO1 |     -   -76     -     -     -     -     -     -    68 |
 DAV1 |     -   -61     -     -   -90     -     -     -   146 |
 DRAO |     -    81    28     -     -     -     -     -   -92 |
 EISL |     -  -102     -   190     -     -     -     -     - |
 FAIR |     -     -    48   -88     -     -     -     -     8 |
 FORT |     -  -325   254  -290     -     -     -     -   223 |
 GALA |     -     -     -  -251    15     -     -     -   103 |
 GODE |     -  -103     -     X     -     -     -     -    92 |
 GOLD |     -   -73     -     -     -     -     -     -    66 |
 GRAZ |     -   -97     -     -     -     -     -     -    86 |
 GUAM |     -   -24     -    39   -58     -     -     -    62 |
 HARB |     -    41     -     -   -36     -     -     -     - |
 HOB2 |     -   -57   139     X   -31     -     -     -   -17 |
 HRAO |     -  -117     -     -     -     -     -     -   105 |
 KERG |     -    38     -     -     -     -     -     -   -34 |
 KWJ1 |     -     -     -     -   -33     -     -     -    33 |
 LPGS |     -     -     -     -   -80     -     -     -    81 |
 MAC1 |     -     7     -   127  -212     -     -     -   151 |
 MALI |     -    43     -   -81     X     -     -     -     - |
 MAS1 |     -  -405   207    68    26     -     -     -   154 |
 MAW1 |     -    50     -     -     -     -     -     -   -45 |
 MCM4 |     -   174     -     -   -24     -     -     -  -131 |
 MDO1 |     -  -163   -62   -35     -     -     -     -   190 |
 MEDI |     -    10     -     -     -     -     -     -    -9 |
 METS |     -    49     -     -     -     -     -     -   -44 |
 MKEA |     -   416   243  -271  -307     -     -     -  -102 |
 MSKU |     -    64     -     -   -56     -     -     -     - |
 NKLG |     -   -60     -     -     -     -     -     -    54 |
 NLIB |     -   163     -  -400     -     -     -     -    84 |
 NRC2 |     -   -95    11    20     -     -     -     -    68 |
 NYA1 |     -    52     -     -  -167     -     -     -   130 |
 NYAL |     -     -     2    77     -     -     -     -   -39 |
 OHIG |     -     6     -  -396    13     -     -     -   172 |
 ONSA |     -   -74     -    -6     -     -     -     -    69 |
 PENC |     -   330     -     -     -     -     -     -  -295 |
 PERT |     -    25     -    -3     -     -     -     -   -21 |
 PIE1 |     -  -268     -  -243     -     -     -     -   334 |
 POTS |     -   -69     -    78     -     -     -     -    24 |
 REYK |     -   -55     -     -     -     -     -     -    49 |
 RIOG |     -   171     -     -  -150     -     -     -     - |
 SANT |     -  -140     -     -   123     -     -     -     X |
 SELE |     -   156     -  -289     -     -     -     -     - |
 STJO |     -   -46   111     -  -143     -     -     -   107 |
 SUTH |     -  -119     -   -38     -     -     -     -   112 |
 THTI |     -     -     -  -327     -     -     -     -   157 |
 TRO1 |     -  -161     -     -   142     -     -     -     - |
 TROM |     -     -     -    59     -     -     -     -   -28 |
 TSKB |     -   118   103  -325     -     -     -     -   -28 |
 USNO |     -   -63    17     -     -     -     -     -    45 |
 USUD |     -   -20     -   114     -     -     -     -   -37 |
 VILL |     -   -14     -     X     -     -     -     -    12 |
 WES2 |     -   -32     -     -     -     -     -     -    29 |
 WHIT |     -   106     -     -   -93     -     -     -     - |
 WSRT |     -   -51     -     -     -     -     -     -    45 |
 WTZR |     -   -83     -    28     -     -     -     -    61 |
 WUHN |     -   169     -     X    38     -     -     -  -190 |
 YELL |     -     X   106  -130     -     -     -     -   -16 |
 ZWEN |     -   -21     -   132  -123     -     -     -    80 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  8040    94    84    81    89  3716  6966     -    54 |  288   4.01
    2 |  6548    55    57    69    21  6286  5976     -    87 |  288   3.85
    3 |  5527    71    48    96   124  2642  5269     -   124 |  288   2.53
    4 |  1016   121    41   221   142  1128   942     -    70 |  283   0.88
    5 |  4680    44    81   105    54  8407  3863     -    57 |  288   2.17
    6 |  7649    62    49   127    28  2529  7670     -    88 |  288   6.50
    7 |  6915    76    46   163    28  8195  5443     -    93 |  288   0.81
    8 |  3662    59    57    46    29  2213  3687     -    27 |  288   3.55
    9 |  5315    38   114   114    27  6243  5154     -    48 |  288   2.09
   10 |  4416    55   148   205    66  2177  4112     -    70 |  288   3.06
   11 |  1225    89   111   138   109  1714  1269     -    60 |  288   0.27
   13 |  1803    78    50    54    52   774  1889     -    42 |  288   0.33
   14 |   682    72   155   211    56  1712   621     -    47 |  288   0.24
   15 |  5505   229   120     -   113     -  4136     -    76 |  278   3.74
   17 |  1917     -   140   205     -     -  1630     -    98 |  193   2.93
   18 |   960    81    94    62    52  1683   818     -    45 |  288   0.33
   20 |   738    67   111    81    61  1485   684     -    71 |  288   0.15
   21 |  3704    86    90   213    58     -  3647     -   141 |  288   2.93
   22 |  1808   110    38   126    59  3642  1892     -   101 |  288   0.86
   23 |  5384    68    80    55    90  5400  5390     -    55 |  288   5.62
   24 |  5907   108   106   261    78  1627  4642     -   123 |  282   1.82
   25 |  3634   103    80   134    48  5319  3213     -    65 |  288   2.28
   26 |  1712    74    89   111    43  1794  1789     -    47 |  288   0.56
   27 |  7118   109    78    38   101  6264  7013     -    69 |  288   5.55
   28 |  1081    54   151    53    78  1278  1082     -    42 |  288   0.55
   29 |  1968    96   115   116    72  1128  1808     -    63 |  288   0.47
   30 |  5789    53    84   161    35  4262  5219     -    37 |  288   2.02
   31 |  5212   108    58   164    67  6694  5000     -    72 |  288   3.03
 -----+-------------------------------------------------------+--------------
 ALBH |     -    26     -     -     -     -     -     -    23 |  286   0.05
 ALGO |     -    87    53    52    32     -     -     -     X |  288  11.90
 AMC2 |     -    26     -     -     -     -     -     -    23 |  286   0.04
 AOML |     -    18     -     -     -     -     -     -    16 |  284  34.33
 AUCK |     -    41     -     X     -     -     -     -    37 |  264  21.99
 BAHR |     -    62    34    33     -     -     -     -    33 |  288   0.90
 BILI |     -    26     -     -    23     -     -     -     - |  287  17.57
 BOR1 |     -    37     -     -     -     -     -     -    33 |  286   0.68
 BRMU |     -     -     -    57    27     -     -     -    30 |  288  57.38
 BRUS |     -    23     -     -     -     -     -     -    21 |  286   0.05
 CAS1 |     -    91     -    84    24     -     -     -    45 |  288   9.22
 CHAT |     -    54     -     X     -     -     -     -    49 |  262  19.71
 CRO1 |     -    36     -     -     -     -     -     -    32 |  286   0.28
 DAV1 |     -    54     -     -    19     -     -     -    47 |  288  21.24
 DRAO |     -    45    26     -     -     -     -     -    41 |  288   0.09
 EISL |     -    48     -    89     -     -     -     -     - |  256  36.70
 FAIR |     -     -   180   129     -     -     -     -   172 |  285   0.20
 FORT |     -   186    63   134     -     -     -     -   115 |  177   0.77
 GALA |     -     -     -    57    60     -     -     -    63 |  286  48.50
 GODE |     -    99     -     X     -     -     -     -    89 |  286   0.06
 GOLD |     -    28     -     -     -     -     -     -    25 |  286  36.24
 GRAZ |     -    72     -     -     -     -     -     -    64 |  284  35.00
 GUAM |     -    52     -    83    51     -     -     -    38 |  288  34.68
 HARB |     -    27     -     -    24     -     -     -     - |  287   4.19
 HOB2 |     -    58    32     X    44     -     -     -    59 |  288   0.13
 HRAO |     -    32     -     -     -     -     -     -    29 |  286  24.28
 KERG |     -    71     -     -     -     -     -     -    63 |  287   1.61
 KWJ1 |     -     -     -     -   155     -     -     -   158 |  215 147.83
 LPGS |     -     -     -     -   122     -     -     -   124 |  175  99.32
 MAC1 |     -    48     -    70    35     -     -     -    58 |  288  20.44
 MALI |     -    39     -    72     X     -     -     -     - |  241  17.36
 MAS1 |     -   198    43   161    50     -     -     -    56 |  288   1.84
 MAW1 |     -   103     -     -     -     -     -     -    92 |  275  23.92
 MCM4 |     -   130     -     -    72     -     -     -   169 |  288  17.22
 MDO1 |     -    42    20    96     -     -     -     -    33 |  288  14.73
 MEDI |     -    23     -     -     -     -     -     -    20 |  286   0.32
 METS |     -    29     -     -     -     -     -     -    26 |  202   0.93
 MKEA |     -    25    29   137    39     -     -     -    38 |  288  49.50
 MSKU |     -    37     -     -    33     -     -     -     - |  288  30.24
 NKLG |     -    32     -     -     -     -     -     -    29 |  286    >>>
 NLIB |     -    80     -   130     -     -     -     -    67 |  240    >>>
 NRC2 |     -    28    34    56     -     -     -     -    39 |  288   0.10
 NYA1 |     -    81     -     -    67     -     -     -   133 |  276   0.08
 NYAL |     -     -    80   112     -     -     -     -    23 |  281   0.06
 OHIG |     -    68     -    87    53     -     -     -    30 |  288  15.68
 ONSA |     -    32     -    34     -     -     -     -    27 |  288   0.11
 PENC |     -    45     -     -     -     -     -     -    40 |  285   9.51
 PERT |     -    40     -    78     -     -     -     -    41 |  288  17.52
 PIE1 |     -    25     -   148     -     -     -     -    59 |  271   0.05
 POTS |     -    20     -    31     -     -     -     -    25 |  288  14.41
 REYK |     -    30     -     -     -     -     -     -    26 |  280   8.41
 RIOG |     -    97     -     -    86     -     -     -     - |  276  11.07
 SANT |     -   188     -     -   166     -     -     -     X |  235  22.34
 SELE |     -    44     -    82     -     -     -     -     - |  280  30.78
 STJO |     -    28    32     -    21     -     -     -    26 |  287   6.99
 SUTH |     -    25     -    56     -     -     -     -    27 |  288  32.11
 THTI |     -     -     -    42     -     -     -     -    20 |  287   2.34
 TRO1 |     -    23     -     -    20     -     -     -     - |  219   8.93
 TROM |     -     -     -    64     -     -     -     -    31 |  261  12.24
 TSKB |     -    43    43    75     -     -     -     -    25 |  288   1.26
 USNO |     -    46    47     -     -     -     -     -    38 |  288   0.06
 USUD |     -    33     -    71     -     -     -     -    24 |  288   0.27
 VILL |     -    33     -     X     -     -     -     -    29 |  286  26.97
 WES2 |     -    23     -     -     -     -     -     -    20 |  284   0.07
 WHIT |     -    31     -     -    27     -     -     -     - |  286  39.31
 WSRT |     -    49     -     -     -     -     -     -    44 |  288   0.06
 WTZR |     -    38     -    46     -     -     -     -    30 |  288   0.04
 WUHN |     -    23     -     X    21     -     -     -    20 |  287  31.37
 YELL |     -     X    38   104     -     -     -     -    42 |  287   0.06
 ZWEN |     -    33     -    42    26     -     -     -    33 |  288  15.51
 -----+-------------------------------------------------------+--------------
 TOT  |  4559    73    84   114    68  4212  4169     -    65 |


 BEST CLOCK FIT: AMC2   286   0.04 (ns) 

