
 GPS week: 1159   Day: 1   MJD: 52358                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2681      0    -0.04     0.21     4.62     0.00
 cod |   288     0  22051    233    -0.33     0.38     0.10    30.13
 emr |   288     0  10280   1123   909.36    18.95     0.18    16.12
 esa |     0     0      0      0    -0.53     0.00     0.00     0.00
 gfz |   288     0  15507      0     0.01     0.63     0.16    18.74
 igu |    96     0   2301      0    -0.03     0.23     3.36     0.00
 jpl |   276     0  11115    936     1.28    -5.64     0.16    11.45
 ngs |    96     0   2681      0    -0.04     0.23     4.46     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  19786    577  1557.76     8.60     0.13    23.55

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  1590    32     X     -   -33  -793  -134  1150     -     X |
    2 |-12679   -57   -49     -    89     -   122-11538     -    -3 |
    3 |  3187   -69    89     -    56  6566  -157  3141     -     X |
    4 | -4663   200  -649     -   251 -3238   -92 -4328     -    -1 |
    5 |  -902    -2    97     -    61-10187   256  -222     -  -204 |
    6 | -1730   154  -281     -    90 -8157   149 -1252     -  -127 |
    7 |  2945    25  -258     -   139 13288   329  2943     -   -82 |
    8 | -4679    65  -245     -    28  6302    68 -4981     -    54 |
    9 | -9553   132    34     -    26 -6831  -189 -8441     -  -191 |
   10 |   398    45  -196     -   252  5756   125   -16     -  -137 |
   11 |  2959  -108    70     -     1  -114   -55  2892     -    95 |
   13 | 10990    12  -254     -   -53  1982  -162 10316     -   258 |
   14 |  6700   -80     X     -  -131   113   140  6167     -   157 |
   15 |  1659   169     3     -   -31     -   136  1035     -  -209 |
   17 |  4455     -     X     -   158     -   236  3761     -  -210 |
   18 |  6951     9   104     -   -53  1471    -4  6629     -   -41 |
   20 |  7031  -208  -147     -    89  1256   388  6655     -   159 |
   21 | -4454    85   -63     -     4     -   139 -4419     -  -118 |
   22 | -2738  -240   451     -   -83 -6024    82 -2575     -    62 |
   23 | -8331    65    43     -    37-10812   266 -6953     -  -238 |
   24 |  2596    24  -264     -   270  5212    33  2167     -   -69 |
   25 | -7582     5   392     -  -236 -6768  -352 -6567     -   -49 |
   26 | -3532    59     7     -   155   869  -115 -3860     -  -191 |
   27 | -1228    18    91     -   -83 -1745   110  -569     -   -57 |
   28 |  5433    21   -25     -  -210  6906   -17  5382     -   164 |
   29 | -2637    33   366     -   -99 -2734    -2 -2855     -  -213 |
   30 |  -624   103  -158     -   113 -3711  -236  -931     -   -87 |
   31 |  7788   -39   133     -   -38 11221   121  6679     -   -54 |
 -----+-------------------------------------------------------------+
 ALGO |     -   -17    63     -  -250     -   251     -     -    63 |
 ALIC |     -   -48     -     -     -     -   127     -     -     - |
 AMC2 |     -  -143     -     -     -     -     -     -     -   183 |
 AOML |     -    60     -     -     -     -    69     -     -  -109 |
 AREQ |     -  -177     -     -   -89     -     3     -     -   296 |
 ARTU |     -   -14     -     -   -62     -   145     -     -     - |
 ASC1 |     -    65     -     -  -138     -     -     -     -    45 |
 AUCK |     -    -9     -     -     -     -     -     -     -    11 |
 BILI |     -    61     -     -  -162     -   110     -     -     - |
 BRMU |     -    14     -     -  -170     -     -     -     -   118 |
 CAS1 |     -   -50     -     -   -54     -     -     -     -   108 |
 CHAT |     -     -     -     -  1722     - -1026     -     -  -911 |
 CHUR |     -  -164     -     -     -     -     -     -     -   210 |
 CRO1 |     -  -154     -     -     -     -   116     -     -   144 |
 DAV1 |     -   -82     -     -   -33     -    57     -     -   105 |
 FAIR |     -     -     X     -  -243     -     X     -     -   193 |
 FORT |     -  -195    35     -   -10     -  -114     -     -   235 |
 GALA |     -     1     -     -  -182     -    66     -     -   113 |
 GODE |     -   -41     -     -     -     -     -     -     -    52 |
 GOLD |     -   -60     -     -     -     -     X     -     -    77 |
 GUAT |     -     -     -     -  -272     -     -     -     -   216 |
 HOB2 |     -   -59     -     -     -     -     -     -     -    75 |
 HRAO |     -   -63     -     -     -     -  -191     -     -   171 |
 KARR |     -   -78     -     -   125     -     -     -     -     - |
 KERG |     -    63     -     -  -102     -     -     -     -     - |
 KUNM |     -   208     -     -     -     -     -     -     -  -267 |
 KWJ1 |     -   -42     -     -   -34     -     4     -     -    72 |
 MAC1 |     -   -59     -     -  -134     -   125     -     -   124 |
 MADR |     -     X     -     -     -     -  -778     -     -   378 |
 MAW1 |     -  -113     -     -     -     -     -     -     -   144 |
 MBAR |     -     -     -     -  -168     -     -     -     -   133 |
 MCM4 |     -    62     -     -     -     -     X     -     -   -79 |
 MDO1 |     -  -140   124     -     -     -     -     -     -    89 |
 MKEA |     -   -59   475     -  -338     -   -64     -     -    46 |
 MSKU |     -    -4     -     -     6     -     -     -     -     - |
 NLIB |     -   -53     -     -     -     -     -     -     -    68 |
 NPLD |     -   -97     -     -     -     -     -     -     -   124 |
 NRC2 |     -    48    62     -     -     -  -343     -     -    56 |
 NTUS |     -  -122     -     -     -     -     -     -     -   156 |
 OHI2 |     -    36     -     -   -59     -     -     -     -     - |
 PENC |     -   281     -     -     -     -     -     -     -  -359 |
 PETP |     -  -132     -     -     -     -   348     -     -     - |
 PIE1 |     -    30     -     -     -     -     -     -     -   -38 |
 PIMO |     -   917     -     -   853     -     X     -     - -1581 |
 POL2 |     -   -33     -     -     -     -    86     -     -     - |
 RIOG |     -    82     -     -  -133     -     -     -     -     - |
 SANT |     -   -89     -     -     -     -    44     -     -    93 |
 STJO |     -    -4  -127     -     -     -   -92     -     -   135 |
 SUTH |     -   -88     -     -     -     -     -     -     -   113 |
 TRO1 |     -    -6     -     -    10     -     -     -     -     - |
 URUM |     -   -65     -     -  -123     -     -     -     -   181 |
 USUD |     -   -72     -     -     -     -    68     -     -    62 |
 VILL |     -   436     -     -  -701     -     -     -     -     - |
 WES2 |     -     5     -     -     -     -     -     -     -    -6 |
 WSRT |     -   -87     -     -     -     -     -     -     -   112 |
 YAKT |     -   172     -     -     -     -  -452     -     -     - |
 YELL |     -    72   133     -     -     -  -286     -     -   -50 |
 ZWEN |     -   -47     -     -    75     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5010    72     X     -   113  2543   149  4858     -     X |  288   3.46
    2 |  6117   139    99     -   163     -   177  6590     -   274 |  277   2.77
    3 |  4918    82   290     -   157  3678   166  5009     -     X |  288   2.77
    4 |  3036    60    60     -   125  2730   174  2305     -    59 |  288   0.64
    5 |  6779    85   103     -    76  4583   207  6622     -   112 |  286   4.29
    6 | 10273    99   204     -   103  3239   189 10733     -    89 |  288   7.98
    7 |  5208   113    82     -   156  6526   142  4876     -    32 |  288   0.61
    8 |  2972    55   115     -    36  3285   165  2950     -    81 |  288   2.55
    9 |  3907    69   139     -    50  4408   164  3553     -    64 |  288   1.29
   10 |  1559    43   172     -    74  3744   178  1560     -    91 |  288   1.43
   11 |  1304    74    73     -    64   833   152  1070     -    98 |  288   0.37
   13 |  1430    73   234     -   115  1384   138  1525     -   120 |  288   0.32
   14 |  1903    37     X     -    50   634   155  1773     -    59 |  288   0.25
   15 |  7980   326   286     -   411     -   214  7532     -   237 |  288   4.06
   17 |  3047     -     X     -   370     -   284  3153     -   262 |  288   3.55
   18 |   852    85   165     -   186   651   207   850     -    98 |  288   0.41
   20 |  1048    81    78     -    92   534   155  1009     -    78 |  288   0.29
   21 |  6091    83   172     -   163     -   190  5378     -   111 |  288   3.82
   22 |  3579   494   281     -   530  3156   228  3443     -   330 |  277   1.61
   23 |  8815    85   187     -   106  4985   145  7467     -   133 |  288   5.83
   24 |  1535    81    76     -    59  2868   171  1244     -    84 |  288   1.35
   25 |  3326   108   447     -   233  3829   177  3579     -    91 |  288   1.59
   26 |  1590    94    79     -    41   499   143  1540     -    91 |  288   0.50
   27 |  4722    58   211     -   143  3372   139  4613     -    56 |  288   3.08
   28 |  3658    64   201     -    90  4016   141  3402     -   140 |  288   0.83
   29 |   880    71   133     -    90   987   172   760     -    90 |  288   0.54
   30 |  1432    60   229     -   233  1124   166  1454     -    44 |  288   0.88
   31 |  6307    68    88     -    57  6061   131  5987     -    62 |  288   4.52
 -----+-------------------------------------------------------------+--------------
 ALGO |     -    60    99     -    81     -   135     -     -    41 |  288   0.11
 ALIC |     -    44     -     -     -     -   116     -     -     - |  275  53.74
 AMC2 |     -    39     -     -     -     -     -     -     -    50 |  288   0.10
 AOML |     -    31     -     -     -     -   142     -     -    76 |  288  21.83
 AREQ |     -    64     -     -    81     -   154     -     -    48 |  288  33.94
 ARTU |     -    32     -     -    31     -   116     -     -     - |  287  25.11
 ASC1 |     -   343     -     -    84     -     -     -     -   394 |  268    >>>
 AUCK |     -    46     -     -     -     -     -     -     -    59 |  264  15.19
 BILI |     -    57     -     -    77     -   111     -     -     - |  287  11.01
 BRMU |     -   101     -     -   112     -     -     -     -   166 |  287  36.89
 CAS1 |     -   121     -     -   155     -     -     -     -   266 |  288   7.26
 CHAT |     -     -     -     -    58     -   145     -     -    37 |  287  13.31
 CHUR |     -    18     -     -     -     -     -     -     -    24 |  288   0.92
 CRO1 |     -    39     -     -     -     -   137     -     -    58 |  288   0.15
 DAV1 |     -    83     -     -    58     -   125     -     -    62 |  288  22.62
 FAIR |     -     -     X     -   333     -     X     -     -   265 |  249   0.17
 FORT |     -    66   174     -    72     -   179     -     -    43 |  288   0.14
 GALA |     -    37     -     -    37     -   151     -     -    53 |  288  40.55
 GODE |     -    58     -     -     -     -     -     -     -    74 |  173 480.64
 GOLD |     -    18     -     -     -     -     X     -     -    23 |  200  19.57
 GUAT |     -     -     -     -   382     -     -     -     -   304 |  283    >>>
 HOB2 |     -   183     -     -     -     -     -     -     -   234 |  266 327.71
 HRAO |     -    83     -     -     -     -   115     -     -    95 |  288  36.23
 KARR |     -    33     -     -    54     -     -     -     -     - |  287  17.67
 KERG |     -    28     -     -    45     -     -     -     -     - |  287   1.48
 KUNM |     -   167     -     -     -     -     -     -     -   213 |   97  33.45
 KWJ1 |     -   128     -     -   198     -   148     -     -   120 |  244 142.22
 MAC1 |     -    63     -     -    63     -   128     -     -    45 |  288  15.41
 MADR |     -     X     -     -     -     -   435     -     -   211 |  181   0.19
 MAW1 |     -    46     -     -     -     -     -     -     -    58 |  286  26.31
 MBAR |     -     -     -     -    72     -     -     -     -    57 |  288  39.63
 MCM4 |     -   221     -     -     -     -     X     -     -   283 |  276  54.18
 MDO1 |     -    43    59     -     -     -     -     -     -    48 |  288  43.91
 MKEA |     -    48   121     -    43     -   125     -     -    39 |  288  52.63
 MSKU |     -    20     -     -    32     -     -     -     -     - |  238  29.02
 NLIB |     -    24     -     -     -     -     -     -     -    31 |  288   0.12
 NPLD |     -    74     -     -     -     -     -     -     -    95 |  285   0.12
 NRC2 |     -    28    96     -     -     -   123     -     -    50 |  288   0.09
 NTUS |     -    24     -     -     -     -     -     -     -    31 |  265  10.45
 OHI2 |     -    46     -     -    74     -     -     -     -     - |  286   9.75
 PENC |     -    24     -     -     -     -     -     -     -    31 |  195   7.32
 PETP |     -    61     -     -     -     -   161     -     -     - |  215  13.24
 PIE1 |     -    18     -     -     -     -     -     -     -    23 |  286   0.08
 PIMO |     -   121     -     -   116     -     X     -     -   139 |  250  38.73
 POL2 |     -    49     -     -     -     -   130     -     -     - |  276  36.01
 RIOG |     -    46     -     -    73     -     -     -     -     - |  257  18.64
 SANT |     -    41     -     -     -     -   145     -     -    61 |  288  29.13
 STJO |     -    41   113     -     -     -   128     -     -    38 |  288   2.72
 SUTH |     -    81     -     -     -     -     -     -     -   104 |  288  35.63
 TRO1 |     -    25     -     -    41     -     -     -     -     - |  288  12.54
 URUM |     -    47     -     -    34     -     -     -     -    46 |  288  21.28
 USUD |     -    48     -     -     -     -   120     -     -    48 |  288   0.67
 VILL |     -    56     -     -    91     -     -     -     -     - |  288  17.62
 WES2 |     -    32     -     -     -     -     -     -     -    41 |  216   0.13
 WSRT |     -    50     -     -     -     -     -     -     -    64 |  287   0.09
 YAKT |     -    46     -     -     -     -   121     -     -     - |  270   0.91
 YELL |     -    25   100     -     -     -   112     -     -    62 |  288   0.12
 ZWEN |     -    27     -     -    43     -     -     -     -     - |  288  35.72
 -----+-------------------------------------------------------------+--------------
 TOT  |  4623   103   176     -   158  3361   160  4460     -   132 |


 BEST CLOCK FIT: PIE1   286   0.08 (ns) 

