
 GPS week: 1159   Day: 2   MJD: 52359                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2682      0     0.08    -0.02     4.17     0.00
 cod |   288     0  18293     22    -0.01     0.06     0.09    28.48
 esa |     0     0      0      0     5.32     0.00     0.00     0.00
 gfz |   288     0  15225      0     0.32    -0.11     0.06    43.67
 igu |    96     0   2302      0     0.12    -0.03     4.74     0.00
 jpl |   280     0   7997    251 26677.87  5415.61  2074.76     0.00
 ngs |    96     0   2682      0     0.10    -0.05     3.96     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15924    215   446.40   -10.53     0.09    27.84

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -3233   -28     -     6 -4245****** -2846     -    20 |
    2 |-12698    28     -    36     -******-10692     -   -81 |
    3 |  4741    48     -    67  7179******  5108     -  -154 |
    4 | -5927    19     -    46  1532****** -5413     -   -91 |
    5 | -1560   -12     -   102  8778****** -1743     -  -147 |
    6 | -4000    77     -    84 -5011****** -4176     -  -210 |
    7 | -5085    68     -    15-15221****** -5306     -   -93 |
    8 |  -198    53     -   -31 -5772******  -550     -    -5 |
    9 |  4475   169     -   -50 16404******  3563     -   -95 |
   10 | -1371   -34     -   148   141****** -1823     -  -198 |
   11 |  2750    89     -  -103  -181******  2712     -    71 |
   13 |  9391   -33     -   -38  -550******  8863     -    93 |
   14 |  4526    12     -   -17  -285******  4522     -    14 |
   15 | -4433   175     -    26     -****** -3939     -  -221 |
   17 |  6386   175     -   116     -******  4973     -  -361 |
   18 |  5705     3     -    12  3158******  5403     -   -23 |
   20 |  4476  -144     -     9  1369******  4225     -   133 |
   21 |  1610   163     -   -21     -******   672     -  -122 |
   22 | -4507    15     -    36   -73****** -4058     -   -71 |
   23 | -2720    41     -   161  9507****** -2393     -  -295 |
   24 |  6680   -77     -    50  4505******  6130     -     - |
   25 | -1082    75     -    23  6977******  -393     -  -112 |
   26 | -2387     5     -   126  -992****** -2224     -  -202 |
   27 |  -112    89     -   -20 -1023******  -115     -   -60 |
   28 | 11919     1     -   -41  6872****** 11205     -    64 |
   29 | -3601    90     -    -9 -1807****** -3533     -   -78 |
   30 | -4532    68     -   102-11218****** -4747     -  -228 |
   31 | -5870    77     -    28-20031****** -3990     -  -122 |
 -----+-------------------------------------------------------+
 ALGO |     -   -69     -  -102     -180545     -     -   231 |
 AREQ |     -  -133     -   -24     -117658     -     -   174 |
 ASC1 |     -   -99     -    64     -     -     -     -     X |
 AUCK |     -    -7     -     -     -     -     -     -     7 |
 BILI |     -    -7     -     5     -     -     -     -     - |
 BRMU |     -     4     -   -54     -     -     -     -    81 |
 CAS1 |     -    -4     -  -102     -     -     -     -   170 |
 CHAT |     -    93     -   -61     -156464     -     -     - |
 DAV1 |     -    66     -   -43     -325022     -     -     - |
 DRAO |     -   -47     -     -     -     -     -     -    48 |
 FAIR |     -     -     -   -26     -******     -     -    40 |
 FORT |     -     -     -  -103     -     -     -     -   161 |
 GALA |     -   -61     -   -32     --34453     -     -   110 |
 GUAM |     -  -139     -     -     -******     -     -   142 |
 HOB2 |     -    -4     -     -     -     -     -     -     4 |
 KARR |     -   -55     -    36     -     -     -     -     - |
 KERG |     -    49     -  -149     -911201     -     -   183 |
 KWJ1 |     -     -     -    66     -******     -     -  -104 |
 MAC1 |     -    27     -   -18     -     -     -     -     - |
 MALI |     -  -146     -     -     -     -     -     -   150 |
 MBAR |     -  -128     -  -107     -     -     -     -   292 |
 MCM4 |     -   167     -     -     -******     -     -  -171 |
 MKEA |     -    85     -   -97     -******     -     -    68 |
 MSKU |     -   -26     -    17     -     -     -     -     - |
 NKLG |     -   -23     -     -     -     -     -     -    23 |
 NTUS |     -  -133     -     -     -     -     -     -   136 |
 OHI2 |     -    74     -   -48     -     -     -     -     - |
 ONSA |     -    39     -   -77     -     -     -     -    82 |
 PERT |     -   -50     -     -     -     -     -     -    51 |
 PIE1 |     -   -39     -     -     -     -     -     -    40 |
 RIOG |     -   117     -  -202     -******     -     -   197 |
 SANT |     -   -80     -     -     -     -     -     -    82 |
 TIDB |     -    10     -    -6     -     X     -     -     - |
 TRO1 |     -   -24     -    15     -     -     -     -     - |
 URUM |     -    11     -  -112     -224409     -     -   164 |
 USUD |     -     4     -     -     -******     -     -    -4 |
 VILL |     -  -589     -   384     -     -     -     -     - |
 WSRT |     -   -69     -     -     -     -     -     -    70 |
 WTZR |     -   -62     -     -     -  2947     -     -    63 |
 ZWEN |     -     2     -   -61     -     -     -     -    93 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  5107    51     -    58  2100******  5282     -    70 |  288   3.10
    2 |  6024   104     -   103     -647181  5337     -   199 |  276   2.69
    3 |  4980    59     -    72  3986******  4505     -    84 |  288   1.29
    4 |  3525   108     -    23  1391******  2954     -   119 |  288   0.79
    5 |  3590    84     -    69  5986******  3572     -   138 |  286   2.93
    6 |  7705    66     -    33  4346******  7591     -    32 |  288   7.62
    7 |  4337    60     -    39  9989******  4326     -    41 |  288   0.55
    8 |  3329    55     -    23  3325731987  3580     -    68 |  288   2.89
    9 |  4392    79     -    51  8603******  4321     -    40 |  288   1.71
   10 |  3638   109     -    27  2076******  3364     -   112 |  288   1.42
   11 |  1254    47     -    58  1266******  1058     -    87 |  288   0.51
   13 |  1984    80     -    52   592******  1850     -    98 |  288   0.24
   14 |  1103    89     -    43   808******  1139     -   101 |  288   0.26
   15 |  4434    38     -    38     -******  3885     -    70 |  288   2.90
   17 |  6783    41     -    38     -******  5594     -    79 |  288   2.80
   18 |  1212    60     -    43   873******  1337     -    66 |  288   0.39
   20 |  1570    63     -    52   730891868  1599     -    91 |  288   0.26
   21 |  4199   180     -    58     -******  4588     -   110 |  288   3.45
   22 |  3195   192     -    76  1200******  3061     -    86 |  278   1.35
   23 |  6330    76     -    64  6122******  6776     -    80 |  288   6.00
   24 |  2983    49     -    32  3174******  2346     -     - |  288   2.26
   25 |  4841    73     -    59  5356******  3961     -    44 |  288   2.00
   26 |  1644    67     -    41  1652******  1546     -    69 |  288   0.43
   27 |  3201    76     -    23  3420******  2934     -    77 |  288   3.12
   28 |  1406   104     -    90  3609******  1684     -    90 |  288   0.72
   29 |  1281    73     -    53  1103******   888     -    53 |  288   0.79
   30 |  3601   186     -   106  8823******  3576     -    81 |  288   1.26
   31 |  7231    37     -    57  9447******  6718     -    73 |  288   4.27
 -----+-------------------------------------------------------+--------------
 ALGO |     -    87     -    39     -286263     -     -    41 |  288   0.04
 AREQ |     -    57     -    40     -348345     -     -    41 |  288  37.82
 ASC1 |     -   270     -   176     -     -     -     -     X |  214    >>>
 AUCK |     -    41     -     -     -     -     -     -    42 |  264  17.28
 BILI |     -    42     -    28     -     -     -     -     - |  287  10.84
 BRMU |     -    97     -    36     -     -     -     -    54 |  288  33.52
 CAS1 |     -   127     -   110     -     -     -     -   202 |  288   9.13
 CHAT |     -    95     -    62     -309649     -     -     - |  285  14.89
 DAV1 |     -   117     -    77     -147624     -     -     - |  288  28.25
 DRAO |     -    55     -     -     -     -     -     -    57 |  288   0.05
 FAIR |     -     -     -   113     -******     -     -   177 |  251   0.59
 FORT |     -     -     -    23     -     -     -     -    36 |  288   0.39
 GALA |     -    86     -    24     -499195     -     -    81 |  287  44.68
 GUAM |     -   215     -     -     -******     -     -   220 |  237  35.68
 HOB2 |     -   126     -     -     -     -     -     -   129 |  238 233.96
 KARR |     -    42     -    27     -     -     -     -     - |  288  15.82
 KERG |     -    99     -    51     -453490     -     -    46 |  287   1.38
 KWJ1 |     -     -     -    82     -******     -     -   129 |  217 208.66
 MAC1 |     -    57     -    37     -     -     -     -     - |  276  15.94
 MALI |     -   134     -     -     -     -     -     -   137 |  261    >>>
 MBAR |     -    62     -    34     -     -     -     -    81 |  279  42.23
 MCM4 |     -   231     -     -     -******     -     -   237 |  238  10.28
 MKEA |     -    25     -    32     -******     -     -    54 |  281  46.67
 MSKU |     -    50     -    32     -     -     -     -     - |  278  30.60
 NKLG |     -    37     -     -     -     -     -     -    38 |  279    >>>
 NTUS |     -    54     -     -     -     -     -     -    55 |  283   7.97
 OHI2 |     -    78     -    51     -     -     -     -     - |  287  10.49
 ONSA |     -    45     -    30     -     -     -     -    36 |  288   0.19
 PERT |     -    34     -     -     -     -     -     -    35 |  288  22.78
 PIE1 |     -    55     -     -     -     -     -     -    56 |  288   0.05
 RIOG |     -    89     -    42     -******     -     -    53 |  278  18.93
 SANT |     -    48     -     -     -     -     -     -    49 |  288  34.88
 TIDB |     -    57     -    37     -     X     -     -     - |  274   0.12
 TRO1 |     -    51     -    34     -     -     -     -     - |  288  11.65
 URUM |     -    34     -    22     -243910     -     -    29 |  288  24.32
 USUD |     -    19     -     -     -855109     -     -    20 |  288   0.43
 VILL |     -    44     -    28     -     -     -     -     - |  288  28.06
 WSRT |     -    44     -     -     -     -     -     -    45 |  288   0.04
 WTZR |     -    32     -     -     -462243     -     -    32 |  288   0.07
 ZWEN |     -    45     -    36     -     -     -     -    42 |  276  19.49
 -----+-------------------------------------------------------+--------------
 TOT  |  4170    91     -    57  4736******  3959     -    92 |


 BEST CLOCK FIT: WSRT   288   0.04 (ns) 

