
 GPS week: 1186   Day: 4   MJD: 52550                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2475      0     0.61     0.11     4.13     0.00
 cod |   288     0  22004     29     0.64     0.15     0.08    24.44
 emr |   288     0  11115      2   690.36    12.56     0.09    19.96
 gfz |   288     0  14615     49    -1.60     1.49     0.08    24.27
 igu |    96     0   2191      0     0.68    -0.08     4.69     0.00
 jpl |   288     0   9116     43    -0.48     0.82     0.36     0.00
 ngs |    96     0   2475      0     0.62     0.10     3.96     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  22942      9 -3406.75   -39.84     0.06    31.34

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  3555    87    25   -21 15167   490  3365     -   -67 |
    2 |  2862   -25  -148   163     -   486  2065     -    -3 |
    3 |  -583    15  -131   271  3130   740  -262     -  -138 |
    4 |  3095   145  -175    44  2506   908  3200     -   -36 |
    5 |  4057   -28  -120    89  4419   478  3372     -    29 |
    6 | -2119    23  -225   132 -1702   954 -1870     -    22 |
    7 |  -896    24  -113   -53 -3189    72  -773     -    94 |
    8 | -9207   -69     9    79 -3755    60 -8494     -   -14 |
    9 | -5255    47  -111   -68 -2988   858 -4627     -    86 |
   10 |   271   116    92   -41  1514   152   399     -  -117 |
   11 |  1511   -57   216   -59  1024   529  1648     -   -47 |
   13 |  1222    23   173    31  -763  1144  1281     -  -152 |
   14 |  4358    11   157  -115  1834   552  4642     -   -19 |
   15 | -4474   150  -170    -8     -   339 -5267     -    -2 |
   18 |  5649   -74   -12    80  3646   750  5562     -     6 |
   20 |  3392   -33   115    44  2268   427  3585     -   -80 |
   22 |  6911   -30  -201   206 20663   342  5809     -    -6 |
   23 | -6103   171    -3   -93-12080   855 -6095     -   -60 |
   24 |  -334   103   -70  -109  7901   652  -165     -    49 |
   25 |  -393    72  -199   212  1632   935  -376     -   -93 |
   26 | -1673   158  -119  -125  -700  1076 -1519     -    50 |
   27 |  2771   -53  -107   245-14266   459  2464     -   -81 |
   28 | -7432   -30   175  -109-10964   348 -5652     -    -6 |
   29 | -3001    87   -73   -66     -   851 -3284     -    30 |
   30 |  5166   -67  -141   181-11525  1170  4025     -     1 |
   31 | -2711    38   -31    46 -3295   478 -2554     -   -46 |
 -----+-------------------------------------------------------+
 ALBH |     -    18     -     -     -   499     -     -   -14 |
 ALGO |     -  -124    91     -     -     -     -     -    39 |
 AMC2 |     -    -6     -     -     -   268     -     -     5 |
 AOML |     -   -74     -     -     -     -     -     -    58 |
 ASC1 |     -   -69     -     -     -     -     -     -    54 |
 BAHR |     -    53    63   -74     -     -     -     -   -23 |
 BILI |     -    67     -   -68     -     -     -     -     - |
 BRMU |     -    32     -    20     -     -     -     -   -40 |
 CAS1 |     -    25     -    15     -   531     -     -   -31 |
 CEDU |     -   -88     -     -     -     -     -     -    69 |
 CHAT |     -    -6     -     -     -     -     -     -     5 |
 CHUR |     -   194     -     -     -     -     -     -  -151 |
 COCO |     -    33     -   -10     -   437     -     -   -18 |
 CRO1 |     -    44     -     -     -   695     -     -   -35 |
 DAVR |     -   -76     -    59     -     -     -     -    14 |
 DRAO |     -    30   -14     -     -     -     -     -   -10 |
 EISL |     -     -     -  -195     -   771     -     -   151 |
 FAIR |     -     -    97  -133     -   576     -     -    38 |
 GODE |     -   -62     -     -     -     -     -     -    48 |
 GOLD |     -   -30     -     -     -   367     -     -    23 |
 GUAT |     -     6     -    -6     -     -     -     -     - |
 HERS |     -  -375     -     -     -     -     -     -   292 |
 HOB2 |     -  -180   166     -     -   157     -     -    35 |
 HRAO |     -    41     -     -     -   550     -     -   -32 |
 IISC |     -   -96     -     -     -   712     -     -    75 |
 JPLM |     -     -     -  -121     -     -     -     -    93 |
 KARR |     -    38     -   -39     -     -     -     -     - |
 KERG |     -    73   158    12     -     -     -     -  -166 |
 KOSG |     -   -89     -     -     -     -     -     -    69 |
 LAE1 |     -   -45     -    45     -     -     -     -     - |
 MAC1 |     -   -80     -  -123     -     -     -     -   158 |
 MALI |     -   -73     -   104     -     -     -     -   -13 |
 MATE |     -   -19    44     -     -     -     -     -   -14 |
 MAW1 |     -   123     -     -     -   404     -     -   -96 |
 MCM4 |     -   288     -     -     - 20833     -     -  -225 |
 MKEA |     -     -     -  -122     -   625     -     -    94 |
 NKLG |     -     -     -    -1     -   657     -     -     1 |
 NRC2 |     -   -38    67   -81     -   460     -     -    51 |
 NRIL |     -     1     -    -1     -     -     -     -     - |
 OHI2 |     -    -5     -     5     -   591     -     -     - |
 PERT |     -   -83   102     -     -   466     -     -     - |
 PIE1 |     -     -   103     -     --33719     -     -   -65 |
 PRDS |     -   -37     -     -     -     -     -     -    29 |
 RIOG |     -   117     -  -107     -     -     -     -    -8 |
 SANT |     -   -35     -     -     -     -     -     -    28 |
 STJO |     -     -   117     -     -     -     -     -   -75 |
 SUTH |     -    43     -     -     -     -     -     -   -33 |
 SUWN |     -    63     -     -     -     -     -     -   -49 |
 THTI |     -     -     -    18     -     -     -     -   -14 |
 TLSE |     -  -163     -     -     -     -     -     -   127 |
 TRO1 |     -     -     -   -94     -     -     -     -    72 |
 TROM |     -     -   106     -     -     -     -     -   -67 |
 TWTF |     -   -71     -     -     -     -     -     -    56 |
 URUM |     -    24     -     -     -     -     -     -   -19 |
 USNO |     -  -130    73     -     -     -     -     -    55 |
 VILL |     -     2     -     -     -     -     -     -    -1 |
 WILL |     -     3     -     -     -     -     -     -    -3 |
 WSRT |     -    -3     -     -     -     -     -     -     2 |
 WTZR |     -   -45     -     -     -   568     -     -    35 |
 WUHN |     -    79     -   -46     -     -     -     -   -26 |
 YAR2 |     -  -126     -     -     -     -     -     -    99 |
 YELL |     -   -78     -    38     -     -     -     -    32 |
 ZWEN |     -    21     -   -28     -     -     -     -     5 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  4445    53    89    61  7535   245  4484     -    14 |  288   3.51
    2 |  8880   158   212    66     -   280  8108     -    51 |  278   4.36
    3 |  1692    58   189    50  1679   547  1707     -    67 |  288   1.66
    4 |  2354   129    48   120   998   308  2328     -    53 |  288   1.02
    5 |  7011   169   109   106  7413   313  6510     -   136 |  276   4.13
    6 |  8081    55    92    43  3498   290  8042     -    48 |  288   8.44
    7 |  1584    76    63    37  3137   272  1599     -    35 |  288   1.17
    8 |  3747    42    89    49  4800   321  3837     -    27 |  288   2.60
    9 |  4812    64    71    37  1725   227  4635     -    41 |  288   1.72
   10 |  3901   112   128    86  3289   260  3851     -    35 |  276   3.39
   11 |   616    52   117    61   796   320   691     -    56 |  288   0.47
   13 |   978    59    96    71   501   379  1090     -    32 |  288   0.19
   14 |   735    42    75    37   787   309   706     -    69 |  288   0.22
   15 |  3654    93   206   151     -   224  3045     -    47 |  288   1.86
   18 |  1135    69   120   109  1374   241   918     -    37 |  288   0.31
   20 |   648    57    59    57   851   379   725     -    37 |  288   0.25
   22 |  4571   136    61   126 11135   194  4257     -   161 |  277   1.71
   23 |  5840    70   151    87  2381   263  5822     -   144 |  278   6.13
   24 |  4596    79    52    29  5789   298  4477     -    35 |  288   1.77
   25 |  3318    60    57   101  2674   283  3395     -    24 |  288   1.45
   26 |  1025    85    98    96   956   320   918     -    50 |  288   0.64
   27 |  1823    32    64    59  9380   830  2094     -    23 |  288   1.06
   28 |  4982    68    56    51  5067   313  4285     -    45 |  288   0.74
   29 |  2374    99    98    82     -   285  1955     -    53 |  288   0.57
   30 |  5984   191   101   104  6852   304  5962     -    88 |  277   0.91
   31 |  1222    95   107    86  2513   264  1152     -    24 |  288   1.13
 -----+-------------------------------------------------------+--------------
 ALBH |     -    39     -     -     -   647     -     -    31 |  286   0.07
 ALGO |     -    55    20     -     -     -     -     -    36 |  288   0.08
 AMC2 |     -   282     -     -     -   370     -     -   220 |  142   0.04
 AOML |     -    55     -     -     -     -     -     -    43 |  281  46.24
 ASC1 |     -    37     -     -     -     -     -     -    29 |  265    >>>
 BAHR |     -    33    53    32     -     -     -     -    36 |  288   0.40
 BILI |     -    57     -    57     -     -     -     -     - |  281  13.38
 BRMU |     -   164     -    40     -     -     -     -   112 |  287  23.27
 CAS1 |     -    44     -    78     -   289     -     -    51 |  288   9.17
 CEDU |     -    28     -     -     -     -     -     -    22 |  288  16.16
 CHAT |     -    46     -     -     -     -     -     -    36 |  281  18.41
 CHUR |     -   125     -     -     -     -     -     -    98 |  259   0.54
 COCO |     -    54     -    35     -   340     -     -    39 |  288  11.09
 CRO1 |     -    66     -     -     -   291     -     -    52 |  274  33.61
 DAVR |     -    78     -   154     -     -     -     -   170 |  288  16.47
 DRAO |     -    46    43     -     -     -     -     -    27 |  288   0.07
 EISL |     -     -     -    21     -   207     -     -    16 |  245  46.68
 FAIR |     -     -    57    67     -   303     -     -    64 |  278   0.22
 GODE |     -    29     -     -     -     -     -     -    23 |  286   0.07
 GOLD |     -    45     -     -     -   662     -     -    35 |  282  21.17
 GUAT |     -    34     -    34     -     -     -     -     - |  251    >>>
 HERS |     -    39     -     -     -     -     -     -    31 |  262  24.14
 HOB2 |     -    34    69     -     -   321     -     -    38 |  288   0.11
 HRAO |     -    49     -     -     -   282     -     -    38 |  274  28.04
 IISC |     -    83     -     -     -   255     -     -    65 |  238  54.17
 JPLM |     -     -     -    93     -     -     -     -    72 |  286    >>>
 KARR |     -    27     -    27     -     -     -     -     - |  288  15.12
 KERG |     -    88    95    61     -     -     -     -    59 |  287   1.44
 KOSG |     -    41     -     -     -     -     -     -    32 |  283  38.69
 LAE1 |     -   205     -   206     -     -     -     -     - |  287  23.78
 MAC1 |     -   114     -   212     -     -     -     -   169 |  285  22.67
 MALI |     -    29     -    48     -     -     -     -    35 |  267  36.11
 MATE |     -    47    61     -     -     -     -     -    50 |  288   0.10
 MAW1 |     -   175     -     -     -   373     -     -   137 |  272  30.37
 MCM4 |     -    81     -     -     -   137     -     -    63 |  270  47.74
 MKEA |     -     -     -    31     -   253     -     -    24 |  287  42.47
 NKLG |     -     -     -    27     -   360     -     -    21 |  287 371.69
 NRC2 |     -    53    32    47     -   319     -     -    38 |  288   0.08
 NRIL |     -    55     -    56     -     -     -     -     - |  230  12.24
 OHI2 |     -    67     -    67     -   283     -     -     - |  288   9.58
 PERT |     -    26    32     -     -   344     -     -     - |  285  17.36
 PIE1 |     -     -    42     -     -   611     -     -    27 |  288   0.08
 PRDS |     -    26     -     -     -     -     -     -    20 |  285   2.56
 RIOG |     -    90     -    38     -     -     -     -    50 |  287  17.58
 SANT |     -    70     -     -     -     -     -     -    54 |  259  38.30
 STJO |     -     -    39     -     -     -     -     -    25 |  286  64.84
 SUTH |     -    24     -     -     -     -     -     -    19 |  286  26.86
 SUWN |     -    38     -     -     -     -     -     -    29 |  283   0.73
 THTI |     -     -     -    32     -     -     -     -    24 |  287   6.97
 TLSE |     -    27     -     -     -     -     -     -    21 |  286   0.84
 TRO1 |     -     -     -    37     -     -     -     -    29 |  276  10.14
 TROM |     -     -    58     -     -     -     -     -    37 |  270  13.19
 TWTF |     -    85     -     -     -     -     -     -    67 |  281   0.35
 URUM |     -    64     -     -     -     -     -     -    50 |  288  22.13
 USNO |     -    64    20     -     -     -     -     -    41 |  288   0.06
 VILL |     -    22     -     -     -     -     -     -    17 |  286  24.52
 WILL |     -    26     -     -     -     -     -     -    20 |  286   1.00
 WSRT |     -    46     -     -     -     -     -     -    36 |  282   0.07
 WTZR |     -    40     -     -     -   285     -     -    31 |  288   0.12
 WUHN |     -    74     -    45     -     -     -     -    70 |  287  25.62
 YAR2 |     -    30     -     -     -     -     -     -    23 |  286   3.90
 YELL |     -    50     -    52     -     -     -     -    76 |  288   0.07
 ZWEN |     -    72     -    77     -     -     -     -    26 |  269  27.24
 -----+-------------------------------------------------------+--------------
 TOT  |  4127    82    94    82  4689   362  3956     -    62 |


 BEST CLOCK FIT: USNO   288   0.06 (ns) 

