
 GPS week: 1188   Day: 0   MJD: 52560                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  31361    138    -1.12     1.04     0.05    19.77
 emr |   288     0  19035    359   828.03    15.73     0.07    12.27
 esa |   288     0  18909   2528   827.75    15.72     0.07    12.16
 gfz |   288     0  26532    241    -0.14     0.53     0.03    31.33
 igr |   288     0  27240    212     0.19    -0.64     0.05     0.00
 jpl |   288     0  21282    478    -6.60     1.05     0.04    24.47
 ngs |    96     0   2586     10    -2.31     2.23     5.02     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio |
 -----+-------------------------------------------------+
    1 |   -24  -173   -46   204   -76  -135-12708     - |
    2 |   -47  -218    98   173   -23  -328 -1480     - |
    3 |  -136  -186   249   -62   -44   164 -4770     - |
    4 |   -40  -299  -268    14  -127   320  2682     - |
    5 |    30     9     9    61    67  -119 11684     - |
    6 |   -52  -242   -97   -45   -43   277 -4849     - |
    7 |   103    -3   117   209   -19  -425 -1109     - |
    8 |    62   -34    41   244    19  -386  4612     - |
    9 |    52  -154   -34   -38    20   105  3944     - |
   10 |    85   -66   205   240   -14  -420 -1328     - |
   11 |    56   -10   202   -29    80  -115  2313     - |
   13 |   -38  -159   -48  -132  -115   304  5761     - |
   14 |   125   112   152  -109   179   -96  6693     - |
   15 |   169   -37     -    68    28  -240  -280     - |
   17 |   225   -62     -   143   -63  -346-41372     - |
   18 |    20    52   176  -120    22    29  8556     - |
   20 |   -39   -62   194   149    30  -279  5300     - |
   22 |  -103  -164   429   247   -24  -395  8174     - |
   23 |    81     X   322  -232    23    13  2122     - |
   24 |    95  -179  -267    51   -69    89  2529     - |
   25 |  -131  -349   -59   -39   -59   377  4550     - |
   26 |    56  -301  -141  -112  -118   337   833     - |
   27 |    61  -231  -104   136   -78   -55 -2991     - |
   28 |   186   199   -91    -3    32  -205 -4370     - |
   29 |     0  -245   -53   -20  -107   180   745     - |
   30 |  -180  -276   100  -111  -125   407  3290     - |
   31 |   110    23     X    54    -9  -192 -2967     - |
 -----+-------------------------------------------------+
 ALBH |  -169  -131     -     -   163   201     -     - |
 ALGO |  -166    71   401   -77     5    -4     -     - |
 ALIC |   -31     -     -     -     -    25     -     - |
 AMC2 |   -91    69     -     -   -68    39     -     - |
 AOML |  -172     -     -    64     -    56     -     - |
 ARTU |    69     -     -    52    88  -122     -     - |
 ASC1 |    98     -  -139    82    45  -111     -     - |
 AUCK |    -6     -     X     -    47     5     -     - |
 BAHR |   116   120   -17   -92    80   -25     -     - |
 BILI |    67     -     -   -42     -     -     -     - |
 BJFS |     -   146     -   -57    23     -     -     - |
 BOR1 |   -27    44     -     -  -119     -     -     - |
 BRMU |   -14     -     -   -61   -51    89     -     - |
 BRUS |  -113   182     -     -  -130     -     -     - |
 CAS1 |  -115     -    28   -48    27   149     -     - |
 CHAT |    -6     -   135   -49   177     -     -     - |
 CHUR |   -47    76     -     -  -207     -     -     - |
 COCO |   189     -  -253     5  -167   -34     -     - |
 CRO1 |   -62   221     -     -   100   -49     -     - |
 DAVR |  -140     -     -    69   -16    25     -     - |
 DGAR |     -     -   -33   -68     -   103     -     - |
 DRAO |    28    82     X   -50   153     -     -     - |
 DUBO |  -130     -     -     -     -   105     -     - |
 EISL |   271     -  -708     -     -    91     -     - |
 FAIR |    43   -15   121   -49    85   -25     -     - |
 FORT |     -     -   -95  -106   -48   183     -     - |
 GODE |   -79   171   -40     -    15     -     -     - |
 GOLD |   236     -     -  -149  -157     -     -     - |
 GRAZ |   -38   115   -70     -     7     -     -     - |
 GUAT |    38     -     -     -   -45   -31     -     - |
 HARB |   168     -     -  -106     -     -     -     - |
 HOB2 |   -10   310   -76   -86    45     -     -     - |
 HRAO |   -22     -    35     -   -26     -     -     - |
 IISC |   -51     -  -116   -31    71   134     -     - |
 INVK |     5     -     -    -3     -     -     -     - |
 IRKT |   139   122   -66   101     -  -271     -     - |
 JPLM |     -   145     -   -57   -49     -     -     - |
 KERG |    38   108     -  -212     -   187     -     - |
 KGN0 |     -   -12     -     -     -     6     -     - |
 KIRU |    17   122  -143     -   207     -     -     - |
 KOSG |   -18     -     -    12    49     -     -     - |
 KOUR |   -22     -  -173    84    48    -4     -     - |
 KSTU |  -202     -     -   128  -100     -     -     - |
 LAE1 |   -87     -     -     -     -    71     -     - |
 LHAS |     -     -     -    78     -  -100     -     - |
 MAC1 |  -166     -     -     -   -59   134     -     - |
 MADR |    12   -34     -     5     -     X     -     - |
 MAG0 |    97     -     -     -     -   -79     -     - |
 MAS1 |   -19     -     X    12    33     -     -     - |
 MATE |   201     -     -  -127   -83     -     -     - |
 MCM4 |     -     -     X    56   -25   -72     -     - |
 MDO1 |    96    38  -272    32  -183     -     -     - |
 MIZU |     -    75     -   -29     -     -     -     - |
 MKEA |     4     -    -7     -   -16     -     -     - |
 NKLG |    49     -     -   100     -  -166     -     - |
 NLIB |   102     -     X   -64   386     -     -     - |
 NOUM |     -     -     -    57     -   -73     -     - |
 NPLD |  -116   186     -     -  -153     -     -     - |
 NRC2 |  -104   -36   428   -87    26     -     -     - |
 NRIL |   -19     -     -     0    56    15     -     - |
 NTUS |     -     -     -   -49  -142    63     -     - |
 NYA1 |   108     -     -   -68   107     -     -     - |
 NYAL |     -    27    82     -    55   -52     -     - |
 OHI2 |    -3     -     -   -78    16   102     -     - |
 OS0G |   -24    55   -72    21    12     1     -     - |
 PERT |     -    74   -75     -   -99     -     -     - |
 PETP |    -4     -     -     2     -     -     -     - |
 PIE1 |    14   303  -328     -   232     -     -     - |
 POTS |   -82     -   -84    85   -18     -     -     - |
 PRDS |  -164   264     -     -    45     -     -     - |
 QAQ1 |     8     -     -    -5     -     -     -     - |
 RBAY |    52     -     -     -    -9   -42     -     - |
 RESO |    62     -     -   -48     -    11     -     - |
 REYK |    55     -     -   -35   -16     -     -     - |
 RIOG |    64     -   155  -100    54     -     -     - |
 SANT |  -152     -     X   -73     3   194     -     - |
 SCH2 |     5    -8     -     -    35     -     -     - |
 SELE |  -122     -   229     -   -33   -17     -     - |
 STJO |    -8    -8     -     -     -    10     -     - |
 SUTH |    54     -    60   -57   116     -     -     - |
 THTI |     -     -    94   -45     -    12     -     - |
 THU3 |     1     -     -    -1    24     -     -     - |
 TIDB |   -34   154   -91     X     -     X     -     - |
 TIXI |    51     -     -    36     -   -88     -     - |
 TOW2 |    41     -     -   -53   -47    35     -     - |
 TRO1 |  -188     -     -   119    20     -     -     - |
 TSKB |    67    64   -62    43     -  -110     -     - |
 TWTF |    16    42     -   -26   -33     -     -     - |
 USNO |    26   -41     X     -    45     -     -     - |
 USUD |     -   -69     -    27   194     -     -     - |
 VILL |     -     -   687  -267     X     -     -     - |
 WES2 |     -    97  -171    29     -     -     -     - |
 WILL |    41   -66     -     -    79     -     -     - |
 WSRT |   -84   198   -78     6   -45     -     -     - |
 WTZR |  -106   133  -203   -40  -108   171     -     - |
 WUHN |   -80   -94     -   125   -59   -49     -     - |
 YAKT |    37   -60     -     -    28     -     -     - |
 YAR2 |  -106     -     -     -     -    85     -     - |
 YSSK |   -16     -     -    10     -     -     -     - |
 ZAMB |    43     -     -   -27     -     -     -     - |
 ZECK |   -45     -     -    28     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |    42    67    48    28    56    24  6154     - |  288   4.43
    2 |    74   103    41    32    61    75  5502     - |  278   3.02
    3 |    50    58    44    49    66    37  3033     - |  288   2.57
    4 |    54    49    34    20    84    43  1318     - |  288   1.14
    5 |   119    94   173    81    72    45  8062     - |  288   3.63
    6 |    46    35    35    27    44    31  9831     - |  288  10.10
    7 |    49    53    74    23    42    36  1289     - |  288   0.78
    8 |    37    87    93    25    64    47  6117     - |  288   4.44
    9 |    47    81    41    19    44    40  7183     - |  288   3.23
   10 |   151    71    49    40    54    66  4685     - |  287   2.15
   11 |    52    63    87    39    67    48   956     - |  288   0.37
   13 |    53    60   141    35    70    31   793     - |  288   0.17
   14 |    44    77    68    34    64    51  1139     - |  288   0.27
   15 |    68    62     -    44    66    31  5489     - |  288   3.34
   17 |    54    97     -    38   111    40 13655     - |  288   3.68
   18 |    64    35   139    50    41    39  1847     - |  288   0.38
   20 |    60    56    93    38    62    37   839     - |  288   0.24
   22 |   160    55    63    59    96    49  5387     - |  283   3.57
   23 |    80     X    70   104   103   108  5170     - |  286   5.47
   24 |    53    58    73    20    45    36  3178     - |  288   2.20
   25 |    40    58    95    32    56    31  4380     - |  288   2.00
   26 |    38    61    71    29    69    37  1089     - |  288   0.52
   27 |    40    69   140    30    50    57  2567     - |  288   1.11
   28 |    77    68    33    15    40    43  4704     - |  288   0.98
   29 |    48    57    74    32    55    40  1169     - |  288   0.66
   30 |   146    99   151    47    70    46  2102     - |  287   0.71
   31 |    44    64     X    31    90    28  2843     - |  288   1.36
 -----+-------------------------------------------------+--------------
 ALBH |    30    89     -     -    50    29     -     - |  288   0.39
 ALGO |    17    41    37    42    16    33     -     - |  288   0.05
 ALIC |    25     -     -     -     -    20     -     - |  288  66.55
 AMC2 |    26    68     -     -    36    19     -     - |  288   0.03
 AOML |    31     -     -    28     -    25     -     - |  288  20.40
 ARTU |    13     -     -    14    13    15     -     - |  288  17.76
 ASC1 |    22     -    45    19    19    26     -     - |  271    >>>
 AUCK |    21     -     X     -    25    17     -     - |  253  16.57
 BAHR |    33    73    54    15    49    33     -     - |  288   0.30
 BILI |    35     -     -    22     -     -     -     - |  287  16.81
 BJFS |     -    97     -    38    63     -     -     - |  282    >>>
 BOR1 |    59    95     -     -    49     -     -     - |  274   0.79
 BRMU |    58     -     -    35    25    57     -     - |  288  28.69
 BRUS |    38    61     -     -    49     -     -     - |  287   0.05
 CAS1 |    38     -   101    60    35   126     -     - |  287   9.47
 CHAT |    43     -    57    24    13     -     -     - |  276  17.46
 CHUR |    54    87     -     -    73     -     -     - |  243   0.68
 COCO |    30     -    27    24    38    27     -     - |  288  10.97
 CRO1 |    32   117     -     -    45    45     -     - |  287  39.05
 DAVR |    50     -     -    28    18    22     -     - |  288  18.13
 DGAR |     -     -    88    64     -   118     -     - |  286    >>>
 DRAO |    14    21     X    13    19     -     -     - |  286   0.08
 DUBO |    16     -     -     -     -    13     -     - |  288  14.19
 EISL |    29     -    70     -     -    27     -     - |  199  62.01
 FAIR |    25    28    75    23    11    19     -     - |  288   0.07
 FORT |     -     -    53    29    26    27     -     - |  288   0.09
 GODE |    47    94    29     -    33     -     -     - |  288   0.05
 GOLD |    39     -     -    25    17     -     -     - |  239  18.75
 GRAZ |    32    64    89     -    58     -     -     - |  285    >>>
 GUAT |    16     -     -     -    60    13     -     - |  288    >>>
 HARB |    48     -     -    30     -     -     -     - |  286   6.47
 HOB2 |    67    33    73    28    61     -     -     - |  288   0.08
 HRAO |    35     -    57     -    52     -     -     - |  288  32.42
 IISC |    29     -    70    26    27    26     -     - |  288  35.16
 INVK |    18     -     -    11     -     -     -     - |  288  13.30
 IRKT |    32    31    49    38     -    16     -     - |  288   0.08
 JPLM |     -    65     -    25    39     -     -     - |  280  19.81
 KERG |    54    44     -    33     -    26     -     - |  287   1.57
 KGN0 |     -    79     -     -     -    39     -     - |  286   0.41
 KIRU |    43    89    44     -    37     -     -     - |  288   2.40
 KOSG |    30     -     -    19    24     -     -     - |  288   7.42
 KOUR |    42     -    41    33    26    39     -     - |  288  42.36
 KSTU |    39     -     -    25    24     -     -     - |  274  16.44
 LAE1 |    24     -     -     -     -    19     -     - |  287  23.57
 LHAS |     -     -     -    35     -    45     -     - |  249  12.01
 MAC1 |    29     -     -     -    23    24     -     - |  288  15.08
 MADR |    50   101     -    41     -     X     -     - |  285  31.20
 MAG0 |    25     -     -     -     -    20     -     - |  287  17.69
 MAS1 |    47     -     X    30    23     -     -     - |  263   1.60
 MATE |    23     -     -    15    14     -     -     - |  288   0.07
 MCM4 |     -     -     X    17    37    22     -     - |  288   5.70
 MDO1 |    45   130    39    32    38     -     -     - |  288  38.29
 MIZU |     -   107     -    42     -     -     -     - |   92   0.37
 MKEA |    25     -    40     -    62     -     -     - |  284  39.61
 NKLG |    29     -     -    18     -    23     -     - |  286 321.26
 NLIB |    32     -     X    20    91     -     -     - |  239   0.40
 NOUM |     -     -     -    16     -    21     -     - |  288    >>>
 NPLD |    57    92     -     -    50     -     -     - |  286   0.08
 NRC2 |    22    48    42    29    19     -     -     - |  288   0.03
 NRIL |    25     -     -    15    20    17     -     - |  288  20.31
 NTUS |     -     -     -    18    32    23     -     - |  288  16.93
 NYA1 |    32     -     -    20    70     -     -     - |  288   0.17
 NYAL |     -   127    91     -    53    48     -     - |  288   0.21
 OHI2 |    31     -     -    32    18    30     -     - |  288   8.52
 OS0G |    19    13    39    15    23    21     -     - |  288   0.51
 PERT |     -    20    20     -    27     -     -     - |  288  19.78
 PETP |    41     -     -    26     -     -     -     - |  287  21.70
 PIE1 |    34    22    69     -    26     -     -     - |  288   0.03
 POTS |    27     -    36    15    21     -     -     - |  288  18.09
 PRDS |    90   145     -     -    54     -     -     - |  230   1.68
 QAQ1 |    25     -     -    16     -     -     -     - |  288  16.17
 RBAY |   105     -     -     -    77    85     -     - |  277  61.98
 RESO |    39     -     -    33     -    35     -     - |  287  15.13
 REYK |    19     -     -    12    19     -     -     - |  287  13.40
 RIOG |    24     -    54    26    22     -     -     - |  288  16.92
 SANT |    34     -     X    70   128    88     -     - |  288  31.44
 SCH2 |    53    85     -     -    43     -     -     - |  284  21.37
 SELE |    36     -    47     -    25    17     -     - |  288  37.34
 STJO |    52    31     -     -     -    33     -     - |  179 690.48
 SUTH |    29     -    82    38    22     -     -     - |  288  33.91
 THTI |     -     -    79    53     -    72     -     - |  287    >>>
 THU3 |    28     -     -    18    16     -     -     - |  288   9.65
 TIDB |    59   122    46     X     -     X     -     - |  180   0.13
 TIXI |    24     -     -    11     -    21     -     - |  287  12.57
 TOW2 |    26     -     -    18    18    18     -     - |  288  20.87
 TRO1 |    52     -     -    33    19     -     -     - |  288   9.76
 TSKB |    33    25    52    17     -    17     -     - |  288   1.24
 TWTF |    53   101     -    31    52     -     -     - |  288   0.49
 USNO |    28    45     X     -    37     -     -     - |  268   0.07
 USUD |     -    66     -    26   113     -     -     - |  278    >>>
 VILL |     -     -    85    33     X     -     -     - |  143  22.51
 WES2 |     -    88    27    28     -     -     -     - |  288   0.05
 WILL |    58    93     -     -    44     -     -     - |  281   1.57
 WSRT |    22    56    30    20    22     -     -     - |  288   0.03
 WTZR |    21    78    44    18    20    22     -     - |  288   0.07
 WUHN |    23    88     -    25    21    25     -     - |  287  34.50
 YAKT |    33    53     -     -    51     -     -     - |  283   0.62
 YAR2 |    33     -     -     -     -    26     -     - |  288   6.24
 YSSK |    22     -     -    14     -     -     -     - |  287  20.09
 ZAMB |    34     -     -    21     -     -     -     - |  282  17.93
 ZECK |    36     -     -    23     -     -     -     - |  288  17.01
 -----+-------------------------------------------------+--------------
 TOT  |    49    74    71    33    51    43  5023     - |


 BEST CLOCK FIT: AMC2   288   0.03 (ns) 

