
 GPS week: 1244   Day: 5   MJD: 52957                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2660     57     0.19    -0.26     4.66     0.00
 cod |   288     0  23854    901     0.04    -0.36     0.05    19.96
 emr |   288     0  21041     35   687.75     9.54     0.05    22.10
 esa |   288     0  18248   3567     1.11    -2.20     0.08    10.13
 gfz |   288     0  18071    283    -0.19    -0.23     0.04    27.14
 iga |    96     0   2484     29  -229.24    86.17     0.10     0.00
 igu |    96     0   2484      4  -229.11    85.88     3.41     0.00
 ngs |    96     0   2660     50   -44.62   -18.33     4.60     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  31398   1240   219.83    12.44     0.05    20.67

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  4315    44   -49    45    17  -101   140  2988     -   -33 |
    2 |  1974  -101  -182    86   104    -6 -1078  1315     -   111 |
    3 | -4015  -107   -54    39    87  -132 -3072 -3641     -    14 |
    4 | -2152    63  -110   166    55    40  -169 -2108     -   -97 |
    5 | -2685  -156    57   153    21    31   286 -2530     -   -12 |
    6 |  1593     X    -7     X    48    -5 21928  1394     -   -56 |
    7 |  -250    47   -65     X   162   -25 -3363  -521     -  -181 |
    8 | -8710   114   -85   136    15   173-10822 -7394     -  -105 |
    9 | -2559  -139   -58   153    95   -17  5395 -2091     -    -4 |
   10 | -2732    71   -35    -4   -53   105  1866 -2208     -    40 |
   11 |  2574    96  -121   155    32     2   713  2889     -   -81 |
   13 |  4614   119   -75   142   -30    29   570  4484     -   -64 |
   14 |  5554    20   -25    73    43    31  1069  5591     -   -84 |
   15 | -1572    -9    88   -37   -67    38  9491 -1918     -    24 |
   16 |  6406  -150   122     0   -29   -64 -1120  6251     -    53 |
   17 | -5897    -2   -49   127    32   265 -6649 -4988     -   -51 |
   18 |  5185   -24  -122   141    82    46  -904  5034     -   -22 |
   20 |  5010   144  -170   250    20  -124   213  4980     -  -106 |
   21 |  4590   -96     7   288     7   -46 -1751  4424     -   -65 |
   23 | 17161   110  -191   187   228     -     -  8039     -  -175 |
   24 |   293   -20    18   107    32   -80  6383   185     -   -94 |
   25 |  -822   -12   -19    -4     -     -     -  -126     -    34 |
   26 | -5591   -43    11    21    24   -73  -736 -5514     -   -12 |
   27 | -1027   129   -94    63    68    14 -5902 -1066     -  -164 |
   28 |  4080   166    30   203  -220    37 -5754  3655     -     0 |
   29 | -1482   -54   -22   208    28   -76   300 -1535     -   -63 |
   30 | -3884  -165     3   236    47   -63  1937 -3730     -   -21 |
   31 | -7038     X   -74  -167    62    15 -7602 -6468     -    80 |
 -----+-------------------------------------------------------------+
 ALBH |     -    80   -71     -     -     -     -     -     -    -1 |
 AMC2 |     -  -124   -39     -     -     -     -     -     -   161 |
 AOML |     -   -71     -     -     -     -     -     -     -    68 |
 AREQ |     -   -27   109     -   -86     -     -     -     -    22 |
 ARTU |     -   -19     -     -    14     -     -     -     -     - |
 ASC1 |     -  -197     -   -37   135     -     -     -     -    30 |
 AUCK |     -   318     -     X  -503     -     -     -     -   344 |
 BAHR |     -    13     4     X    25     -     -     -     -   -49 |
 BOGT |     -    92     -     -     -     -     -     -     -   -89 |
 BOR1 |     -     -    53     -     -     -     -     -     -   -57 |
 BREW |     -     -   -42     -     -     -     -     -     -    45 |
 BRMU |     -     -     -     -   -18     -     -     -     -    24 |
 BRUS |     -     -    35     -     -     -     -     -     -   -37 |
 CAS1 |     -     0     -     9    -3     -     -     -     -     X |
 CEDU |     -  -160     -   140     -     -     -     -     -    85 |
 CHAT |     -    15     -    -9     8     -     -     -     -   -20 |
 CHUR |     -   160     -     -     -     -     -     -     -  -154 |
 CRO1 |     -   -12     8     -     -     -     -     -     -     0 |
 DAKA |     -    43     -     -   -31     -     -     -     -     - |
 DAV1 |     -     6     -     -    -4     -     -     -     -     X |
 DRAO |     -    23   -31     -     -     -     -     -     -    11 |
 DWH1 |     -     -     9     -     -     -     -     -     -    -9 |
 FAIR |     -     -   -84  -415   159     -     -     -     -   100 |
 FORT |     -   298  -140     X    52     -     -     -     -  -177 |
 GLPS |     -   -16     -     -    12     -     -     -     -     - |
 GODE |     -  -109   137     X     -     -     -     -     -   -41 |
 GRAZ |     -     -    99     -     -     -     -     -     -  -105 |
 GUAM |     -   107     -  -392     -     -     -     -     -    91 |
 GUAT |     -     X     -     -   -77     -     -     -     -   101 |
 HERS |     -     -  -201     -     -     -     -     -     -   214 |
 HOB2 |     -    57   256  -597     -     -     -     -     -   -48 |
 HRAO |     -    29     -     -   -21     -     -     -     -     - |
 IISC |     -   106     -  -148    -1     -     -     -     -   -28 |
 JPLM |     -     -  -132     -     -     -     -     -     -   141 |
 KERG |     -     -    92  -383    51     -     -     -     -    22 |
 KGN0 |     -     -    37     -     -     -     -     -     -   -40 |
 KIRU |     -   -50     -    64     -     -     -     -     -    17 |
 KOKB |     -     -    13     -     -     -     -     -     -   -14 |
 KOSG |     -   -53     -     -     -     -     -     -     -    51 |
 KOUR |     -    -2     -    53     -     -     -     -     -   -25 |
 LAE1 |     -   -44     -     -     -     -     -     -     -    43 |
 LHAS |     -     -     -   -97    41     -     -     -     -    -6 |
 MAS1 |     -     -    46     X   -34     -     -     -     -    -5 |
 MATE |     -     -     -   225     X     -     -     -     -  -110 |
 MAW1 |     -   224     -     -  -169     -     -     -     -     5 |
 MDO1 |     -   -61   -41     -   -57     -     -     -     -   178 |
 MEDI |     -     -    73     -     -     -     -     -     -   -78 |
 METS |     -   -61    82     -     -     -     -     -     -   -29 |
 MIZU |     -     -    20     -     -     -     -     -     -   -21 |
 MKEA |     -    12     -  -164   -36     -     -     -     -   115 |
 NKLG |     -     -     -     -    49     -     -     -     -   -64 |
 NLIB |     -     -   -32     -     -     -     -     -     -    34 |
 NNOR |     -     -   -42    91     -     -     -     -     -     - |
 NOT1 |     -     -    83     -     -     -     -     -     -   -88 |
 NRC1 |     -     -   160  -350     -     -     -     -     -     - |
 NSSP |     -   -98     -     -     -     -     -     -     -    95 |
 NTUS |     -   -65     -     -     -     -     -     -     -    63 |
 OHI2 |     -    63     -     -   -46     -     -     -     -     - |
 ONSA |     -   153     -  -301     -     -     -     -     -     - |
 PERT |     -     1    52   -57    -4     -     -     -     -   -23 |
 PIE1 |     -     -   -75     X     -     -     -     -     -    80 |
 PIMO |     -     -     -  -233    87     -     -     -     -     X |
 POTS |     -   -18     -   136    16     -     -     -     -   -70 |
 PRDS |     -  -115   -90     -     -     -     -     -     -   207 |
 REYK |     -  -281     -     -     -     -     -     -     -   271 |
 RIOG |     -   -22     -   196   -47     -     -     -     -   -13 |
 SANT |     -  -181     -   154   -26     -     -     -     -   108 |
 SCH2 |     -   -49    35     -     -     -     -     -     -    10 |
 SELE |     -     -     -   132     -     -     -     -     -   -65 |
 SFER |     -     -   -32     -     -     -     -     -     -    34 |
 SPT0 |     -     -    52     -     -     -     -     -     -   -56 |
 STJO |     -   -13    30     -     -     -     -     -     -   -19 |
 STR1 |     -     -    23     -     -     -     -     -     -   -25 |
 SUTH |     -    77     -   -94     -     -     -     -     -   -28 |
 SUWN |     -     -     5     -     -     -     -     -     -    -5 |
 THTI |     -     -     -  -227     0     -     -     -     -   112 |
 THU3 |     -   -11     -     -     8     -     -     -     -     X |
 TIXI |     -   385     -     -  -283     -     -     -     -     - |
 TLSE |     -     -   104     -     -     -     -     -     -  -111 |
 TOW2 |     -    58     -     -   -43     -     -     -     -     - |
 TSKB |     -     -    44     X   -42     -     -     -     -     8 |
 TWTF |     -     -    29     -     -     -     -     -     -   -31 |
 USN1 |     -     -    55     -     -     -     -     -     -   -59 |
 USNO |     -     -    -6     -     -     -     -     -     -     6 |
 USUD |     -   -76   124  -138     -     -     -     -     -     9 |
 VILL |     -    19     -     X     -     -     -     -     -   -19 |
 WES2 |     -   -20   166  -407     -     -     -     -     -    41 |
 WHIT |     -   -93     -     -     -     -     -     -     -    90 |
 WSRT |     -    -8    95     -     2     -     -     -     -   -96 |
 WTZR |     -   -15   105     X     -     -     -     -     -   -98 |
 YAKT |     -  -114     -     -     -     -     -     -     -   110 |
 YAR2 |     -   -53     -     -     -     -     -     -     -    51 |
 YELL |     -     -     -     X   -33     -     -     -     -    43 |
 YSSK |     -    68     -     -   -50     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  8343    70    34   168    34   109  2710  6006     -   104 |  288   4.57
    2 |  4587    57   107    57    57    45  3358  4000     -    53 |  288   2.44
    3 |  4123   152    67   117    47    78  2488  3799     -    42 |  288   2.78
    4 |  1403    45    29    42    20    44   596  1233     -    61 |  288   0.92
    5 |  1828    39    43    23    17    79  1902  1779     -    60 |  288   1.93
    6 | 13612     X    54     X    28   264 10243 13746     -    77 |  276  10.89
    7 |  2789   173   115     X    60   192  2076  2534     -    56 |  280   1.05
    8 |  9005    48    40    39    36    94  4674  8094     -    86 |  288   5.58
    9 |  4705    22    34    95    17    47  4818  4985     -    53 |  288   2.10
   10 |  5038    57    32    30    40    62  1379  4596     -    37 |  288   2.18
   11 |  1130    85   114   109    64    87   694  1103     -    41 |  288   0.29
   13 |   761    82    68   109    35    34   512   717     -    79 |  288   0.41
   14 |   949    51    36    30    38   126   474   966     -    56 |  288   0.19
   15 |  5108    36    26    93    40    82  5216  4470     -    82 |  288   2.28
   16 |  2457    53   103    48    53    68  1080  2404     -    43 |  288   0.31
   17 |  3728    67    31    48    25    87  3910  3574     -    87 |  288   0.92
   18 |  1699    50    28   138    24    56  1058  1824     -    78 |  288   0.28
   20 |  2033    55    41   101    31   134   463  1703     -    53 |  288   0.20
   21 |  1861    50    72   102    44    92  1891  1947     -    48 |  288   0.43
   23 | 15757   112   119   140    47     -     - 18980     -    55 |  239    >>>
   24 |  2970    40    45   121    27    71  4230  3185     -    40 |  288   3.19
   25 |  3305    49    91   154     -     -     -  3798     -    75 |  288   2.30
   26 |  1107    54    50    75    33    96   936   986     -    86 |  288   0.55
   27 |  1787    51    48    77    27    33  4693  1423     -   103 |  288   1.00
   28 |  4709    34    60   179    17    53  3343  4249     -    61 |  288   0.45
   29 |  1169    45    46    75    30   103   796   941     -    61 |  288   0.61
   30 |  1162    39    34    54    19    75  1451  1133     -    47 |  288   0.95
   31 |  1627     X    23   113    33   122  5029  1243     -    33 |  277   1.27
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    58    40     -     -     -     -     -     -    25 |  288   8.69
 AMC2 |     -    43    29     -     -     -     -     -     -    19 |  288   0.03
 AOML |     -    25     -     -     -     -     -     -     -    24 |  283  34.04
 AREQ |     -    67    34     -    49     -     -     -     -   113 |  284  22.30
 ARTU |     -    87     -     -    64     -     -     -     -     - |  253  10.80
 ASC1 |     -    32     -    32    26     -     -     -     -    33 |  280    >>>
 AUCK |     -    25     -     X    35     -     -     -     -    34 |  264  11.83
 BAHR |     -    44    25     X    19     -     -     -     -     8 |  288   0.43
 BOGT |     -    41     -     -     -     -     -     -     -    40 |  203  32.97
 BOR1 |     -     -    11     -     -     -     -     -     -    12 |  288   0.63
 BREW |     -     -    20     -     -     -     -     -     -    22 |  288   0.08
 BRMU |     -     -     -     -    32     -     -     -     -    42 |  288    >>>
 BRUS |     -     -    11     -     -     -     -     -     -    12 |  288   0.03
 CAS1 |     -    16     -    28    15     -     -     -     -     X |  288   8.13
 CEDU |     -    24     -    36     -     -     -     -     -    33 |  288  19.02
 CHAT |     -    38     -    34    20     -     -     -     -    36 |  275  10.66
 CHUR |     -    78     -     -     -     -     -     -     -    75 |  260   2.02
 CRO1 |     -    19    19     -     -     -     -     -     -    23 |  288  19.36
 DAKA |     -    67     -     -    50     -     -     -     -     - |  210  25.29
 DAV1 |     -    19     -     -    14     -     -     -     -     X |  285  14.78
 DRAO |     -    27    34     -     -     -     -     -     -    20 |  288   0.42
 DWH1 |     -     -    33     -     -     -     -     -     -    35 |  287   0.87
 FAIR |     -     -   101   148   125     -     -     -     -   138 |  256   0.81
 FORT |     -    65    27     X    33     -     -     -     -    35 |  288   0.19
 GLPS |     -    23     -     -    17     -     -     -     -     - |  286  31.63
 GODE |     -    23    17     X     -     -     -     -     -    26 |  288   0.30
 GRAZ |     -     -    66     -     -     -     -     -     -    70 |  285 103.74
 GUAM |     -    92     -   103     -     -     -     -     -    84 |  288  20.80
 GUAT |     -     X     -     -    31     -     -     -     -    41 |  288    >>>
 HERS |     -     -    41     -     -     -     -     -     -    44 |  241  13.97
 HOB2 |     -    29    34    41     -     -     -     -     -    20 |  288   0.07
 HRAO |     -    48     -     -    35     -     -     -     -     - |  287  20.17
 IISC |     -    45     -    65    39     -     -     -     -    79 |  288  20.87
 JPLM |     -     -    21     -     -     -     -     -     -    22 |  288  16.22
 KERG |     -     -    39    63    24     -     -     -     -    37 |  287   1.71
 KGN0 |     -     -    14     -     -     -     -     -     -    15 |  287   0.53
 KIRU |     -    25     -    77     -     -     -     -     -    37 |  287  48.01
 KOKB |     -     -    46     -     -     -     -     -     -    50 |  288   0.06
 KOSG |     -    19     -     -     -     -     -     -     -    18 |  288 108.12
 KOUR |     -    26     -    46     -     -     -     -     -    25 |  288   1.45
 LAE1 |     -    28     -     -     -     -     -     -     -    27 |  287  16.52
 LHAS |     -     -     -    49     9     -     -     -     -    22 |  288  12.20
 MAS1 |     -     -    46     X   104     -     -     -     -    92 |  287   2.25
 MATE |     -     -     -    56     X     -     -     -     -    28 |  288   0.26
 MAW1 |     -    46     -     -    44     -     -     -     -    91 |  288  20.61
 MDO1 |     -    99    55     -    38     -     -     -     -   103 |  235 235.22
 MEDI |     -     -    10     -     -     -     -     -     -    11 |  288   0.10
 METS |     -    28    15     -     -     -     -     -     -    23 |  287  11.55
 MIZU |     -     -    14     -     -     -     -     -     -    15 |  286   0.48
 MKEA |     -    26     -    49    23     -     -     -     -    21 |  288  35.52
 NKLG |     -     -     -     -    24     -     -     -     -    32 |  285 668.25
 NLIB |     -     -    19     -     -     -     -     -     -    20 |  253 975.63
 NNOR |     -     -    61   133     -     -     -     -     -     - |  111    >>>
 NOT1 |     -     -    12     -     -     -     -     -     -    12 |  288    >>>
 NRC1 |     -     -     9    19     -     -     -     -     -     - |  221   0.05
 NSSP |     -    22     -     -     -     -     -     -     -    22 |  285  10.63
 NTUS |     -    31     -     -     -     -     -     -     -    30 |  287  13.94
 OHI2 |     -    28     -     -    21     -     -     -     -     - |  287   8.67
 ONSA |     -    41     -    81     -     -     -     -     -     - |  240   0.04
 PERT |     -    29    54    41    23     -     -     -     -    47 |  288   6.62
 PIE1 |     -     -    38     X     -     -     -     -     -    41 |  288   0.06
 PIMO |     -     -     -   129    48     -     -     -     -     X |  287  21.33
 POTS |     -    46     -    58    21     -     -     -     -    16 |  288  17.65
 PRDS |     -    35    29     -     -     -     -     -     -    19 |  288   2.40
 REYK |     -    22     -     -     -     -     -     -     -    21 |  226   9.41
 RIOG |     -    52     -   102    34     -     -     -     -    54 |  273  16.61
 SANT |     -    21     -    78    15     -     -     -     -    39 |  288   2.44
 SCH2 |     -    33    17     -     -     -     -     -     -    25 |  280  69.24
 SELE |     -     -     -    49     -     -     -     -     -    24 |  288  32.01
 SFER |     -     -    18     -     -     -     -     -     -    19 |  283   0.47
 SPT0 |     -     -    13     -     -     -     -     -     -    14 |  288   0.03
 STJO |     -    21    13     -     -     -     -     -     -    13 |  288   0.07
 STR1 |     -     -    30     -     -     -     -     -     -    32 |  288   8.81
 SUTH |     -    33     -    36     -     -     -     -     -    34 |  288  17.69
 SUWN |     -     -    29     -     -     -     -     -     -    31 |  288   1.64
 THTI |     -     -     -    70    34     -     -     -     -    25 |  287   1.86
 THU3 |     -    27     -     -    19     -     -     -     -     X |  288   7.05
 TIXI |     -    15     -     -    11     -     -     -     -     - |  156   8.92
 TLSE |     -     -    13     -     -     -     -     -     -    14 |  287   0.67
 TOW2 |     -    43     -     -    32     -     -     -     -     - |  283  10.25
 TSKB |     -     -    24     X    29     -     -     -     -    24 |  288   1.13
 TWTF |     -     -    30     -     -     -     -     -     -    32 |  288   0.39
 USN1 |     -     -    12     -     -     -     -     -     -    13 |  288   0.04
 USNO |     -     -    17     -     -     -     -     -     -    18 |  288   0.03
 USUD |     -    55    34    55     -     -     -     -     -    31 |  288  14.45
 VILL |     -    37     -     X     -     -     -     -     -    35 |  288   5.73
 WES2 |     -    44    15    42     -     -     -     -     -    23 |  288   0.06
 WHIT |     -    91     -     -     -     -     -     -     -    88 |  277   5.01
 WSRT |     -    42    34     -    46     -     -     -     -    27 |  288   0.05
 WTZR |     -    39    21     X     -     -     -     -     -    20 |  288   0.09
 YAKT |     -    17     -     -     -     -     -     -     -    16 |  288   0.49
 YAR2 |     -    32     -     -     -     -     -     -     -    30 |  288   8.34
 YELL |     -     -     -     X    78     -     -     -     -   102 |  285   0.06
 YSSK |     -    27     -     -    20     -     -     -     -     - |  287  12.38
 -----+-------------------------------------------------------------+--------------
 TOT  |  4659    52    47    85    40    98  3415  4596     -    50 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

