
 GPS week: 1276   Day: 5   MJD: 53181                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2575      0     0.11    -0.11     3.08     0.00
 cod |   288     0  24316    314     0.25    -0.91     0.05    21.39
 esa |   288     0  16335   1509   279.84    26.37     2.63     0.00
 gfz |   288     0  20269      9     0.33    -0.61     0.04    26.04
 iga |    96     0   2575     16     0.07    -0.09     0.13     0.00
 igu |    96     0   2575      0     0.07    -0.08     3.25     0.00
 jpl |   288     0  15325    147     9.81    -2.54     0.04    25.95
 ngs |    96     0   2575      0     0.11    -0.12     2.68     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  26880    723   276.68    30.13     0.04    26.61

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  1880    64   909    29    94  3417     X   672     -   -80 |
    3 | -2831    -3   598   -47   -99   243   124 -2868     -   -12 |
    4 | -3031     X     8   115  -315  2978   -26 -2897     -  -100 |
    5 | -2606    -4 -1890   116    35  4032    72 -2054     -  -143 |
    6 | -5542    64   756   -78  -200-10969   111 -4960     -   -33 |
    8 | -2628     6   778    72   -51  8246   -61 -2773     -   -46 |
    9 |   842   -68 -1435   101   -96  1520    14   976     -   -51 |
   10 |  1701    59   -54    -5    14 -2575     9  1662     -   -47 |
   11 |  6935   -79  1864    49  -191  2303    18  5940     -     8 |
   13 |  1133   -21  1835   143  -126   700   -33  1733     -  -107 |
   14 |   377    85  1816   -33    13   698   154   923     -  -105 |
   15 | -3900     4  2418   -21   126   738    40 -2534     -    -5 |
   16 |  4373    59  -683   -88   199  1628   132  4185     -   -26 |
   17 | -2960    61 -1049   120    60  5893    30 -2913     -  -180 |
   18 |  3281     7  1981     2    85  1490   144  3469     -   -72 |
   19 |  4527   159 -1059  -127  1139   401    -6  4469     -     X |
   20 |  2980    46  4003    78   370  1629   128  2819     -  -170 |
   21 |  4470   -19  2249    -1   170  2263   142  4716     -   -54 |
   22 | -5374    25  -356    18   -36 -1371    23 -4696     -   -50 |
   24 |   149    -4  4699   134  -145   993   -13   718     -  -123 |
   25 | -2545    29 -1294    28   -91-12451   177 -1727     -  -145 |
   26 | -5243   -96   608    61  -233 -1997   -56 -4942     -    44 |
   27 | -4327   -26  2530    12  -121 -4302   -38 -4139     -    27 |
   28 |  8197   -87 -1498   145  -179  3031  -128  6640     -   -10 |
   29 | -2419   -99 -3023    24  -103 -2750   -21 -2567     -    66 |
   30 |   827   -53 -1989   -42  -272 -1459   185    -9     -   -14 |
   31 |  1258   -12   731    23   -60 -3762   -35  -246     -     4 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -     -     -     -     -    10     -     -   -10 |
 ALGO |     -     - -1312     -     -     -    71     -     -   -69 |
 ALRT |     -   -76     -    62     -     -     -     -     -     - |
 AMC2 |     -  -102     -     -     -     -  -126     -     -   205 |
 ARTU |     -    51 -2434   -16     -     -   -26     -     -     - |
 ASC1 |     -  -187     -   154     -     -     -     -     -     X |
 ASPA |     -     -     -     8     -     -     -     -     -    -8 |
 BAHR |     -     -     -   -40     -     -     -     -     -    40 |
 BILI |     -     -     -   183     -     -  -184     -     -     - |
 BOGT |     -   108  3254   -65     -     -     -     -     -   -24 |
 BOR1 |     -    66     -     -     -     -     -     -     -   -53 |
 BREW |     -     -     -     -     -     -   -15     -     -    15 |
 BRMU |     -     -     -    28     -     -     -     -     -   -27 |
 BRUS |     -    30     -     -     -     -   -12     -     -   -13 |
 CAS1 |     -   105  3289   -47     -     -    39     -     -   -76 |
 CEDU |     -    97  1566     -     -     -    25     -     -  -102 |
 CHAT |     -   -29     -    24     -     -     -     -     -     - |
 CHUR |     -   191     -     -     -     -     -     -     -  -153 |
 CRO1 |     -     - -1372   -13     -     -    37     -     -   -30 |
 DAV1 |     -     1     -     0     -     -     -     -     -     - |
 DGAR |     -  -136     -   -66     -     -   -24     -     -   198 |
 DWH1 |     -   317     -     -     -     -  -300     -     -    39 |
 FAIR |     -    -9 -3076   -24     -     -   -18     -     -    49 |
 FLIN |     -     9     -     -     -     -    -8     -     -     - |
 GLPS |     -    51 -2219    23     -     -   -66     -     -     - |
 GODE |     -   -67  -933     -     -     -     -     -     -    54 |
 GOLD |     -   -80  -824     -     -     -   -83     -     -   145 |
 GUAT |     -  -115     -  -121     -     -     -     -     -   211 |
 HRAO |     -     -     -     -     -     -     6     -     -    -6 |
 IISC |     -     - -2572    -1     -     -     -     -     -     1 |
 ISPA |     -   121     -    62     -     -    13     -     -  -171 |
 JPLM |     -     -     -  -221     -     -   135     -     -    83 |
 KIT3 |     -     - -3202   -74     -     -    -3     -     -    75 |
 KOKB |     -     -     -   -60     -     -    27     -     -    32 |
 KOSG |     -  -131     -     -     -     -     -     -     -   106 |
 LHAS |     -   -29     -  -122     -     -    -7     -     -   150 |
 LPGS |     -   139  1945  -402     -     -     -     -     -   291 |
 MAC1 |     -     7  3467  -105     -     -   137     -     -   -36 |
 MADR |     -     -     -     -     -     -  -208     -     -   203 |
 MAG0 |     -   -35     -     -     -     -    29     -     -     - |
 MAS1 |     -   -50 -1110   -12     -     -     -     -     -    52 |
 MAW1 |     -    49     -   -31     -     -     -     -     -    -9 |
 MBAR |     -   -21     -   -64     -     -    77     -     -     4 |
 MDO1 |     -   106     -   -69     -     -     -     -     -   -18 |
 METS |     -  -105     -     -     -     -     -     -     -    84 |
 MKEA |     -     -   447     -     -     -    -3     -     -     3 |
 NKLG |     -   -43  -628     -     -     -     -     -     -    34 |
 NLIB |     -     -     -     -     -     -   124     -     -  -121 |
 NPLD |     -     9     -     -     -     -     -     -     -    -7 |
 NRC1 |     -     -     -   -31     -     -  -142     -     -   168 |
 NRIL |     -    -2     -    13     -     -   -12     -     -     - |
 NSSP |     -   -42     -     -     -     -     -     -     -    34 |
 NTUS |     -  -107 -3331     -     -     -     -     -     -    86 |
 NYA1 |     -    59     -   -81     -     -     -     -     -    32 |
 OHI2 |     -   128  1508  -108     -     -     4     -     -     - |
 PERT |     -   -68  1306   136     -     -     -     -     -   -78 |
 PETP |     -     -     -   -30     -     -    30     -     -     - |
 POTS |     -  -101     -    97     -     -     -     -     -   -13 |
 RESO |     -    35     -     -     -     -   -29     -     -     - |
 RIOG |     -   100     -  -121     -     -     -     -     -    37 |
 SANT |     -    85   780    43     -     -     -     -     -  -110 |
 SCH2 |     -   -20     -     -     -     -   -48     -     -    63 |
 STJO |     -     -     -     -     -     -   -51     -     -    50 |
 THTI |     -     -  3085    24     -     -     -     -     -   -24 |
 TID1 |     -     -     -     -     -     -    -3     -     -     3 |
 TIDB |     -     5  1762     -     -     -     -     -     -    -4 |
 TIXI |     -   -34 -2331     -     -     -    28     -     -     - |
 TOW2 |     -    22   925   -18     -     -     -     -     -     - |
 TRO1 |     -     -     -   -19     -     -     -     -     -    19 |
 URUM |     -    13     -     -     -     -     -     -     -   -10 |
 USNO |     -    17     -     -     -     -     -     -     -   -13 |
 USUD |     -     -  -184     -     -     -    47     -     -   -46 |
 VILL |     -  -102 -1499     -     -     -     -     -     -    82 |
 WHIT |     -    32     -     -     -     -     -     -     -   -26 |
 WILL |     -   -18     -     -     -     -     -     -     -    14 |
 WTZR |     -   -47 -2195     -     -     -     -     -     -    38 |
 WUHN |     -     -     -   111     -     -     -     -     -  -108 |
 YAKT |     -  -122     -     -     -     -   -40     -     -   137 |
 YAR2 |     -   -34     -     -     -     -     -     -     -    27 |
 YELL |     -    73 -1443   -10     -     -     -     -     -   -48 |
 YKRO |     -  -128     -   105     -     -     -     -     -     - |
 YSSK |     -   -45     -     -     -     -    37     -     -     - |
 ZWEN |     -     - -2899    63     -     -     -     -     -   -62 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7343    46  1478    23   129  7151     X  5536     -    32 |  288   4.23
    3 |  3748    59  2214    32   134  1873    46  3600     -    53 |  288   1.99
    4 |  3308     X  4001    37   265  2034    61  2614     -    38 |  275   1.40
    5 |  2536    18  2788    24    87  1913    24  2306     -    16 |  288   1.91
    6 |  1617    43  5152    20    40  7475    36  1678     -    27 |  288   0.86
    8 |  1835    54  3119    27    42  4967    82  1700     -    37 |  288   1.88
    9 |  4964    57  2953    42    79  2892    60  5218     -   103 |  288   2.94
   10 |  3071    46  5836    23   333  4304    34  3469     -    47 |  288   2.89
   11 |  2168    78  5220    58    75  1007    92  1931     -    40 |  288   0.40
   13 |  1502    55  5648    36    57   864   104  1287     -    64 |  288   0.21
   14 |  1265    63  2731    58    92  1075    96  2202     -    30 |  288   0.41
   15 |  6602   149  1141    58   186  4224   121  5023     -   117 |  277   3.18
   16 |   897    56  5150    17    98   927    35   790     -    34 |  288   0.18
   17 |  1769   187  3014    76   145  3781    91  1706     -   135 |  269   1.34
   18 |   965    56  2547    22    43   740    50   843     -    37 |  288   0.39
   19 |   915    82  2196    53   164   879    38   741     -     X |  288   0.29
   20 |   869    37  3576    35    48  1018    87   725     -    35 |  288   0.21
   21 |  3013    34  2155    60   114  2572    59  2441     -    70 |  288   0.64
   22 |  2134    59  4094    41    30   613    55  1573     -    34 |  288   0.34
   24 |  2699   131  3994    44   148  2094   110  2036     -    68 |  277   1.96
   25 |  4676    48  4386    34   217  5946    55  3570     -    33 |  288   2.32
   26 |  1232    43  6161    21    59  1950    33  1246     -    27 |  288   0.78
   27 |   908    64  3362    41    36  3409    86   891     -    66 |  288   1.14
   28 |  2302    22  1756    38    75  1531    40  2898     -    52 |  288   0.71
   29 |  1244    43  1147    22    44  2126    30  1139     -    23 |  288   0.63
   30 |  3542    46  2219    18    62  2244    32  3266     -    37 |  288   1.00
   31 |  3461    50  3517    23    89  2481    55  2676     -    28 |  288   1.10
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -     -     -     -     -    16     -     -    15 |  288   0.08
 ALGO |     -     -  1306     -     -     -    13     -     -    13 |  288   0.04
 ALRT |     -    16     -    13     -     -     -     -     -     - |  288   6.51
 AMC2 |     -    38     -     -     -     -    18     -     -    22 |  288   0.04
 ARTU |     -    64  3947    65     -     -    48     -     -     - |  284  10.35
 ASC1 |     -   183     -   151     -     -     -     -     -     X |  283    >>>
 ASPA |     -     -     -    30     -     -     -     -     -    30 |  288    >>>
 BAHR |     -     -     -    16     -     -     -     -     -    16 |  288   1.03
 BILI |     -     -     -    12     -     -    13     -     -     - |  286  10.60
 BOGT |     -    43  3888    81     -     -     -     -     -   107 |  288  11.56
 BOR1 |     -    48     -     -     -     -     -     -     -    38 |  288   0.51
 BREW |     -     -     -     -     -     -    20     -     -    19 |  288   0.04
 BRMU |     -     -     -    46     -     -     -     -     -    45 |  276    >>>
 BRUS |     -    39     -     -     -     -    33     -     -    13 |  288   0.04
 CAS1 |     -    31  1176    29     -     -    30     -     -    31 |  288   8.83
 CEDU |     -    39  1042     -     -     -    46     -     -    22 |  288  10.46
 CHAT |     -    24     -    20     -     -     -     -     -     - |  287  13.67
 CHUR |     -    17     -     -     -     -     -     -     -    14 |  288   7.66
 CRO1 |     -     -  2343    85     -     -    33     -     -    74 |  273  18.22
 DAV1 |     -    42     -    35     -     -     -     -     -     - |  288  18.52
 DGAR |     -    41     -    31     -     -    23     -     -    51 |  288  15.64
 DWH1 |     -    42     -     -     -     -    26     -     -    18 |  288   1.05
 FAIR |     -    20  1041    21     -     -    18     -     -    19 |  288   0.06
 FLIN |     -    21     -     -     -     -    18     -     -     - |  288   7.55
 GLPS |     -    31  3505    11     -     -    23     -     -     - |  288  13.15
 GODE |     -    23   907     -     -     -     -     -     -    19 |  287   0.08
 GOLD |     -    24  1961     -     -     -    55     -     -    45 |  288  15.76
 GUAT |     -    27     -    26     -     -     -     -     -    16 |  287    >>>
 HRAO |     -     -     -     -     -     -    22     -     -    21 |  288   0.86
 IISC |     -     -  1034    56     -     -     -     -     -    55 |  288  16.08
 ISPA |     -    23     -    20     -     -    18     -     -    18 |  288  10.54
 JPLM |     -     -     -    54     -     -    55     -     -    19 |  288   5.11
 KIT3 |     -     -  2643    22     -     -    34     -     -    24 |  288  43.90
 KOKB |     -     -     -    43     -     -    56     -     -    24 |  288   0.07
 KOSG |     -    32     -     -     -     -     -     -     -    26 |  288 107.87
 LHAS |     -    48     -    27     -     -    29     -     -    24 |  288  10.76
 LPGS |     -    38  1269    34     -     -     -     -     -    20 |  288 119.99
 MAC1 |     -    70  1880    22     -     -    44     -     -    33 |  288  13.60
 MADR |     -     -     -     -     -     -    41     -     -    40 |  288  14.61
 MAG0 |     -    14     -     -     -     -    12     -     -     - |  286  10.28
 MAS1 |     -    45  2521    20     -     -     -     -     -    29 |  288   2.25
 MAW1 |     -    27     -    27     -     -     -     -     -    17 |  288  29.88
 MBAR |     -    35     -    41     -     -    76     -     -   109 |  288  23.47
 MDO1 |     -    82     -   142     -     -     -     -     -    80 |  288  13.11
 METS |     -    30     -     -     -     -     -     -     -    24 |  287  11.58
 MKEA |     -     -  1282     -     -     -    44     -     -    43 |  288  23.13
 NKLG |     -    20  1599     -     -     -     -     -     -    16 |  287    >>>
 NLIB |     -     -     -     -     -     -    74     -     -    72 |  255   0.09
 NPLD |     -    27     -     -     -     -     -     -     -    22 |  287   0.04
 NRC1 |     -     -     -    33     -     -    22     -     -    22 |  288   0.04
 NRIL |     -    32     -    19     -     -    26     -     -     - |  288  10.07
 NSSP |     -    23     -     -     -     -     -     -     -    19 |  288  14.61
 NTUS |     -    35  1093     -     -     -     -     -     -    28 |  288   9.05
 NYA1 |     -    25     -    23     -     -     -     -     -    16 |  288   0.08
 OHI2 |     -    36  1008    24     -     -    15     -     -     - |  288   6.66
 PERT |     -    33   736    15     -     -     -     -     -    35 |  288   4.92
 PETP |     -     -     -    12     -     -    12     -     -     - |  287  12.51
 POTS |     -    35     -    29     -     -     -     -     -    24 |  288  21.42
 RESO |     -    24     -     -     -     -    20     -     -     - |  288   7.41
 RIOG |     -    47     -    34     -     -     -     -     -    22 |  240   9.42
 SANT |     -    35  1735    47     -     -     -     -     -    65 |  288  15.81
 SCH2 |     -    18     -     -     -     -    25     -     -    19 |  288  14.12
 STJO |     -     -     -     -     -     -    17     -     -    16 |  288   0.09
 THTI |     -     -  2772    20     -     -     -     -     -    20 |  288   7.38
 TID1 |     -     -     -     -     -     -    40     -     -    39 |  288   0.08
 TIDB |     -    40  1666     -     -     -     -     -     -    32 |  288   0.09
 TIXI |     -    25  1067     -     -     -    21     -     -     - |  287   7.66
 TOW2 |     -    18  1393    15     -     -     -     -     -     - |  288  11.13
 TRO1 |     -     -     -    71     -     -     -     -     -    69 |  288   9.30
 URUM |     -    21     -     -     -     -     -     -     -    17 |  288  13.20
 USNO |     -    39     -     -     -     -     -     -     -    32 |  280   0.05
 USUD |     -     -  2958     -     -     -    19     -     -    18 |  288  11.53
 VILL |     -    23  1695     -     -     -     -     -     -    19 |  287  10.72
 WHIT |     -    23     -     -     -     -     -     -     -    19 |  288  13.83
 WILL |     -    67     -     -     -     -     -     -     -    54 |  285  28.48
 WTZR |     -    37   997     -     -     -     -     -     -    29 |  288   0.05
 WUHN |     -     -     -    32     -     -     -     -     -    31 |  287  13.18
 YAKT |     -    62     -     -     -     -    38     -     -    19 |  288   0.49
 YAR2 |     -    23     -     -     -     -     -     -     -    19 |  288   6.70
 YELL |     -    35  2184    16     -     -     -     -     -    28 |  288   0.07
 YKRO |     -    30     -    25     -     -     -     -     -     - |  286  24.64
 YSSK |     -    16     -     -     -     -    13     -     -     - |  287   9.83
 ZWEN |     -     -  1908    20     -     -     -     -     -    20 |  288  15.28
 -----+-------------------------------------------------------------+--------------
 TOT  |  3084    53  2630    44   129  3251    44  2682     -    43 |


 BEST CLOCK FIT: NPLD   287   0.04 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BREW |   288     0     0   288   13.84   | 4.18e-14  9.78e-15  2.57e-15 |
 ALGO |   288     0     0   288   13.84   | 3.35e-14  5.18e-15  2.98e-15 |
 YELL |   288     0     0   288    8.51   | 3.38e-14  5.89e-15  3.15e-15 |
 BRUS |   288     0     0   288    8.45   | 4.16e-14  7.82e-15  2.53e-15 |
 NPLD |   287     0     0   258    7.92   | 4.27e-14  1.01e-14  2.92e-15 |
 USNO |   280     0     0   277    7.70   | 4.88e-14  1.51e-14  2.26e-15 |
 ALBH |   288     0     0   288    7.39   | 5.66e-14  1.12e-14  9.01e-15 |
 AMC2 |   288     0     0   288    5.60   | 4.51e-14  1.08e-14  2.35e-15 |
 KOKB |   288     0     0   288    5.16   | 4.51e-14  1.41e-14  4.11e-15 |
 GODE |   287     0     0   286    4.05   | 6.87e-14  1.37e-14  4.48e-15 |
 WTZR |   288     0     0   288    3.53   | 4.76e-14  2.64e-14  4.40e-15 |
 STJO |   288     0     0   288    3.49   | 4.30e-14  6.22e-15  4.86e-15 |
 NRC1 |   288     0     0   288    3.01   | 4.29e-14  9.32e-15  2.77e-15 |
 NLIB |   255     0     0   254    2.88   | 4.12e-14  7.72e-15         - |
 NYA1 |   288     0     0   288    1.73   | 3.44e-14  7.22e-15  6.03e-15 |
 TIDB |   288     0     1   144    1.07   | 1.58e-13  1.63e-14  6.98e-15 |
 FAIR |   288     0     0   288    0.86   | 5.23e-14  1.23e-14  6.16e-15 |
 TID1 |   288     0     0   143    0.33   | 5.54e-14  9.35e-15  6.42e-15 |
 G29  |   288     0     0   288    0.08   | 4.00e-13  1.12e-13  6.20e-14 |
 G26  |   288     0     0   288    0.07   | 3.35e-13  8.90e-14  1.02e-13 |
 BOR1 |   288     0     0   288    0.06   | 4.62e-13  1.28e-13  3.92e-14 |
 G17  |   269     0     0   260    0.05   | 6.44e-13  1.13e-13  1.15e-13 |
 DWH1 |   288     0     0   288    0.05   | 5.00e-13  1.36e-13  8.56e-14 |
 G30  |   288     0     0   288    0.05   | 3.37e-13  1.08e-13  5.01e-14 |
 YAKT |   288     0     0   143    0.05   | 4.24e-13  1.27e-13  5.39e-14 |
 G27  |   288     0     0   288    0.04   | 4.00e-13  1.21e-13  1.03e-13 |
 G31  |   288     0     0   288    0.04   | 2.40e-13  1.19e-13  9.32e-14 |
 G06  |   288     0     0   288    0.04   | 4.68e-13  1.50e-13  6.15e-14 |
 HRAO |   288     0     0   288    0.03   | 1.13e-13  4.45e-14  9.22e-14 |
 G14  |   288     0     5    15    0.03   | 5.36e-13  5.58e-14  2.56e-14 |
 G04  |   275     0     0   273    0.02   | 4.68e-13  1.85e-13  1.60e-13 |
 G05  |   288     0     0   288    0.01   | 1.24e-12  3.41e-13  1.68e-13 |
 BAHR |   288     0     0   143    0.01   | 3.63e-13  9.34e-14  6.87e-14 |
 G08  |   288     0     0   288    0.01   | 1.32e-12  4.55e-13  1.87e-13 |
 G03  |   288     0     0   234    0.01   | 1.30e-12  3.27e-13  1.10e-13 |
 MAS1 |   288     0     0   143    0.00   | 1.81e-12  4.36e-13  1.40e-13 |
 JPLM |   288     0     1   145    0.00   | 5.26e-13  2.42e-13  6.51e-13 |
 GPST |   288     0     0     0    0.00   | 2.80e-14  5.60e-15  1.12e-15 |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 MAG0 |   286     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.39e-13  6.64e-14  4.25e-14 |
 G25  |   288     0     0     0    0.00   | 1.49e-12  4.62e-13  1.82e-13 |
 G24  |   277     0     0     0    0.00   | 1.37e-12  4.66e-13  1.62e-13 |
 G22  |   288     0     6     0    0.00   | 6.80e-13  6.54e-14  2.56e-14 |
 G21  |   288     0     6     0    0.00   | 1.15e-12  1.32e-13  4.91e-14 |
 G20  |   288     0     6     0    0.00   | 6.31e-13  6.95e-14  2.18e-14 |
 G19  |   288     1     6     0    0.00   | 6.26e-13  7.77e-14  3.97e-14 |
 G18  |   288     1     6     0    0.00   | 1.29e-12  1.34e-13  4.65e-14 |
 G16  |   288     0     6     0    0.00   | 4.55e-13  5.02e-14  2.00e-14 |
 G15  |   277     0     0     0    0.00   | 1.68e-12  6.21e-13  3.90e-13 |
 G13  |   288     0     4     0    0.00   | 6.05e-13  6.54e-14  2.14e-14 |
 G11  |   288     0     5     0    0.00   | 6.18e-13  7.12e-14  4.88e-14 |
 G10  |   288     0     0     0    0.00   | 1.25e-12  3.91e-13  3.26e-13 |
 G09  |   288     0     0     0    0.00   | 1.28e-12  5.37e-13  2.03e-13 |
 G01  |   288     0     0     0    0.00   | 1.39e-12  6.81e-13  4.37e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 YKRO |   286     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   | 1.00e-12  9.45e-13  3.98e-13 |
 WILL |   285     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   |        -         -         - |
 VILL |   287     0     3     0    0.00   | 1.18e-12  1.03e-12  9.59e-13 |
 USUD |   288     1     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.48e-13  2.64e-13  5.96e-13 |
 SCH2 |   288     0     0     0    0.00   | 5.92e-13  4.95e-13  1.35e-12 |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   240     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.71e-12  4.74e-13  2.64e-13 |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     1     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 8.05e-13  1.06e-12  6.23e-12 |
 KIT3 |   288     1     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   287     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   273     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   276     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ASC1 |   283     0     0     0    0.00   |        -         -         - |
 ARTU |   284     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.59e-17  3.11e-16  1.87e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      ALGO      USNO |
------------------------------------------+------------------------------+
