
 GPS week: 1277   Day: 4   MJD: 53187                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2784     25     0.10     0.12     3.11     0.00
 cod |   288     0  25475     52    -0.12     0.38     0.06    16.62
 emr |   288     0  11743    276   461.55    34.47     0.05    22.12
 esa |   288     0  18134    633   460.61    34.55     0.09    10.06
 gfz |   287     0  21084      0    -0.03     0.36     0.05    20.40
 iga |    96     0   2688     48     0.11     0.78     0.11     0.00
 igu |    96     0   2688      0     0.14     0.76     3.80     0.00
 jpl |   288     0  15186    289    -4.36    -0.16     0.06    16.11
 ngs |    96     0   2688      0     0.16     0.68     2.77     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  29072   1564   461.55    34.43     0.07    14.68

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -5290    18  -108   107    44   -13 -9517   -57 -5003     -    40 |
    3 | -4126    39   -28    53    21  -119 -7118    44 -3248     -   -91 |
    4 | -3496    -2  -115   -76   134  -315  1055   -32 -3315     -    60 |
    5 |  1892    44    64  -159   -82   154-12156   240  2525     -   -56 |
    6 |  -423    99   -36   -81    -2  -210-10794    99   -63     -   -54 |
    7 | -3096  -117   -47   265   -20   -48  1291   111 -2884     -   -13 |
    8 | -1076    34   -88   -59   -52    96 15789    12  -797     -   199 |
    9 |  2447    55    96  -107   -80     4   263    83  2051     -   -69 |
   10 |  1594    13    57   -26    10   129  7206    58  1131     -  -129 |
   11 |  2162   -37   -96  -261   274    50  3321     1  2527     -     X |
   13 |  1673   108   -91  -402   130   -64   494   -13  2154     -   124 |
   14 |  4281    68    26  -167   -14    74  2212    30  4493     -     X |
   15 |   726    40   -33   447  -102    87  4047    32  1601     -  -194 |
   16 |  3067    38   -70   405  -135   -63  2426   -52  3249     -     0 |
   17 | -3612   -39     X   377  -133   -82  3403    81 -3169     -   -79 |
   18 |  3432    93    81   138   -94   127  1340    52  3557     -  -220 |
   19 |  2920   -33    -7   608   -41  1325  1950   -60  3224     -  -278 |
   20 |  3149  -112    31   462    52   -32  1339    92  3615     -  -359 |
   21 |  2426    54    97    90  -106   190  -971    74  2638     -  -169 |
   22 |  3342    -3    40    95    89  -179 -8675   -52  2884     -  -217 |
   23 | 11963  -132     -     -   347     -     -     X     -     -  -352 |
   24 | -3251    -4   -41   148  -132  -288  8384    92 -2392     -    92 |
   25 | -6170    13    -8  -222   151  -107 -2936    38 -5265     -   -81 |
   26 | -4458    68    20   -32    30   127  1768    62 -3909     -  -160 |
   27 | -2511   -26   -46   -65   -30   -95 -1518    13 -2389     -   179 |
   28 |   848     7  -209  -294   225   -40  1365  -120  1442     -   261 |
   29 | -1307    49    -2     X   -17 -1243  2510    12 -1508     -   -37 |
   30 | -1793   -79    88  -168   107   -54 -2835     X -1411     -   -76 |
   31 | -2114   -18   -39  -153    75    13 -3639    38 -1738     -    60 |
 -----+-------------------------------------------------------------------+
 ALBH |     -    -8     -     -     -     -     -    22     -     -   -15 |
 ALGO |     -     -  -177   780     -     -     -   -82     -     -  -177 |
 ALRT |     -   -30     -     -    25     -     -     -     -     -     - |
 AMC2 |     -   -24     -     -     -     -     -   -84     -     -   121 |
 ARTU |     -    22     -   190     0     -     -  -141     -     -     - |
 ASC1 |     -    30     -     -   -82     -     -     -     -     -    79 |
 ASPA |     -     -     -     -    70     -     -     -     -     -   -97 |
 AUCK |     -   -20     -    33     -     -     -     -     -     -     - |
 BAHR |     -     -    13     -    33     -     -     -     -     -   -65 |
 BOGT |     -    50     -   128  -104     -     -     -     -     -     X |
 BOR1 |     -    29     -     -     -     -     -     -     -     -   -32 |
 BRMU |     -     -     -     -    32     -     -     -     -     -   -45 |
 BRUS |     -    31     -     -     -     -     -  -111     -     -    88 |
 CAS1 |     -   -15     -    24     -     -     -     -     -     -     - |
 CEDU |     -  -145     -   240     -     -     -     -     -     -     - |
 COCO |     -    16     -   -26     -     -     -     -     -     -     - |
 CRO1 |     -     -    31   107   -50     -     -   -46     -     -     X |
 DAKA |     -   -67     -     -    55     -     -     -     -     -     - |
 DGAR |     -   -75     -     -    10     -     -   -24     -     -    96 |
 DRAO |     -   -42   -56     -     -     -     -    59     -     -    67 |
 DWH1 |     -   491     -     -     -     -     -  -289     -     -  -240 |
 FAIR |     -     -     -    30    26     -     -   -68     -     -    17 |
 FORT |     -   339     -  -378    94     -     -     -     -     -  -225 |
 GLPS |     -    11     -     -    31     -     -   -50     -     -     - |
 GODE |     -   -71     -    42     -     -     -     -     -     -    52 |
 GOLD |     -   -19     -   -68     -     -     -     4     -     -    65 |
 GUAT |     -     -     -     -    -4     -     -     -     -     -     6 |
 HOFN |     -     -     -     -   -24     -     -    30     -     -     - |
 HRAO |     -     -     -     -     -     -     -   -32     -     -    35 |
 IISC |     -     -     -     5    -2     -     -     -     -     -     X |
 ISPA |     -     -     -     -    92     -     -   -25     -     -  -101 |
 JPLM |     -     -     -     -   -35     -     -     -     -     -    48 |
 KERG |     -     -    98  -272    23     -     -     -     -     -     7 |
 KGN0 |     -   -33     -     -     -     -     -     -     -     -    37 |
 KIRU |     -   -51     -     -     -     -     -   -96     -     -   164 |
 KIT3 |     -     -     -   -58   -21     -     -   -13     -     -    83 |
 KOKB |     -    23     -     -  -165     -     -    59     -     -   138 |
 KOSG |     -   -91     -     -     -     -     -     -     -     -   103 |
 KOUR |     -   172     -  -345   -27     -     -    79     -     -    -7 |
 KUNM |     -     -     -     -     -     -     -    66     -     -   -72 |
 LAE1 |     -    42     -     -   -85     -     -     -     -     -    71 |
 LHAS |     -   -48     -     -   -11     -     -   -18     -     -    89 |
 LPGS |     -    43     -   -89     -     -     -    -3     -     -    17 |
 MAC1 |     -    -9     -    15     -     -     -     -     -     -     - |
 MAS1 |     -   -36   108  -236   -18     -     -    31     -     -    32 |
 MATE |     -     -     -   204     -     -     -     -     -     -  -140 |
 MBAR |     -    42     -     -  -129     -     -    55     -     -    70 |
 MDO1 |     -   -15   150     -  -111     -     -     -     -     -   -56 |
 METS |     -  -100     -     -     -     -     -     -     -     -   113 |
 MIZU |     -     -     -  -306     -     -     -     -     -     -   210 |
 MKEA |     -   -28     -   -75     -     -     -     -     -     -    83 |
 NKLG |     -     -     -   -61     -     -     -    38     -     -     - |
 NLIB |     -     -     -     -     -     -     -    36     -     -   -40 |
 NNOR |     -     -     -  -172     -     -     -   107     -     -     - |
 NPLD |     -     1     -     -     -     -     -     -     -     -    -1 |
 NRC1 |     -     -     -     -  -142     -     -    -6     -     -   204 |
 NRIL |     -     8     -     -    42     -     -   -61     -     -     - |
 NSSP |     -   -48     -     -     -     -     -     -     -     -    55 |
 NTUS |     -  -156     -    94     -     -     -     -     -     -   112 |
 NYA1 |     -    88     -     -  -119     -     -     -     -     -    66 |
 OHI2 |     -   152     -    -6  -153     -     -    40     -     -     - |
 PDEL |     -    30     -     -    -5     -     -   -24     -     -     - |
 PERT |     -   -76   -13     X   143     -     -     -     -     -   -91 |
 PETP |     -     -     -     -     7     -     -    -8     -     -     - |
 PIE1 |     -     -     -  -463     -     -     -   289     -     -     X |
 POTS |     -   -67     -     -    34     -     -     -     -     -    29 |
 PRDS |     -   -48     -     -     -     -     -     -     -     -    54 |
 PTBB |     -    26     -     -     -     -     -     -     -     -   -30 |
 REYK |     -  -197     -     -     -     -     -     -     -     -   223 |
 RIOG |     -    80     -     -   -16     -     -     -     -     -   -68 |
 SANT |     -  -131     -   134   -78     -     -     -     -     -   178 |
 SFER |     -   -26     -     -     -     -     -     -     -     -    30 |
 STJO |     -     -   -13     -     -     -     -   -75     -     -   103 |
 SUTM |     -     -     -     -   -30     -     -    38     -     -     - |
 THTI |     -     -   203   -32   -47     -     -   -98     -     -  -111 |
 THU3 |     -    49     -     -     -     -     -     -     -     -   -55 |
 TIDB |     -     -   -26    83   -82     -     -     -     -     -    96 |
 TRO1 |     -  -174     -     -    20     -     -     -     -     -   171 |
 TSKB |     -   -75     -   254   -67     -     -     -     -     -     3 |
 TWTF |     -    99     -     -     -     -     -    66     -     -  -128 |
 URUM |     -   -55     -     -     -     -     -     -     -     -    62 |
 USNO |     -   -27   119     -     -     -     -     -     -     -  -149 |
 USUD |     -     -     -   -54     -     -     -    60     -     -   -30 |
 VILL |     -   207     -  -673     -     -     -     -     -     -   228 |
 WHIT |     -   -22     -     -     -     -     -     -     -     -    25 |
 WILL |     -   -45     -     -     -     -     -     -     -     -    51 |
 WTZR |     -   -35     -   -98     -     -     -     -     -     -   107 |
 WUHN |     -     -     -     -   226     -     -     -     -     -  -315 |
 YAKT |     -   -81     -     -     -     -     -    -8     -     -   101 |
 YELL |     -   -86    18   298   -44     -     -     -     -     -   -75 |
 ZWEN |     -     -     -  -236    40     -     -     -     -     -   107 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  8191    83   105    94    32   138  7779    67  7909     -   184 |  288   4.39
    3 |  3978   120    41    47    13    75  3043    44  3372     -    80 |  288   1.80
    4 |  1095   181    94   209    59   192  1319    96  1195     -   119 |  288   1.20
    5 |  2500    31    71    83    40    74  9270   134  3727     -    66 |  288   2.03
    6 |   989    51    35    35    51    62  7549   103  1185     -   164 |  288   1.72
    7 |  1867    40    38    71    99    60   627    56  1887     -    44 |  288   0.81
    8 |  3219    53    33    71    24   120  8415    55  3132     -    40 |  288   1.25
    9 |  4279    61    37    43    49    46  2569    64  3947     -    33 |  288   2.63
   10 |  5240    53    27   128    25    71  2920    66  5708     -    58 |  288   2.48
   11 |   959    83    36    58    33    50  1350   146   995     -     X |  288   0.43
   13 |  1022    41    71    85    41    49  1206   131   709     -   127 |  288   0.22
   14 |   716    57    25    78    56    46  1317   139   599     -     X |  288   0.18
   15 |  4691   131   114   154    69   139  5349   137  4408     -    88 |  288   2.73
   16 |   818    57    34   150    14    37  1642    36   782     -    61 |  288   0.23
   17 |  1902   170     X   113   133   150  3225   142  1811     -    90 |  288   1.04
   18 |   968    48    35    50    28    48  1015    97   916     -    49 |  288   0.43
   19 |  1355   145    21    78    26   129   322    94  1117     -    80 |  288   0.23
   20 |   445    54    61    43    81    83   511    93   407     -   214 |  288   0.19
   21 |   557    71    55    70    42   145   816    92   541     -    87 |  288   0.34
   22 |  3172    59    42    73    49    61  5350   130  2678     -    54 |  288   0.59
   23 |  8521   129     -     -   164     -     -     X     -     -   131 |  287   3.04
   24 |  3737   154   110   113   125   195  3577   132  2973     -   145 |  288   2.57
   25 |  1917    52    46    28    34    49  1846    61  2153     -    96 |  288   1.69
   26 |   966    49    54    61    58    74  1108    72  1038     -    37 |  288   0.44
   27 |  1179    66    43    43    25    39   523    59  1425     -    96 |  288   0.96
   28 |  1793    56    53    67    39    66  2351    67  1791     -    89 |  288   0.44
   29 |  2089    61    28     X    39   238  1326    67  2092     -    33 |  288   0.52
   30 |   833    40    26    79    35   216  1753     X   650     -    91 |  288   0.79
   31 |  2400    46    21    33    24    81  1726    36  2366     -    68 |  288   0.84
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    29     -     -     -     -     -    24     -     -    18 |  288   0.07
 ALGO |     -     -    14    64     -     -     -    21     -     -    27 |  288   0.02
 ALRT |     -    14     -     -    12     -     -     -     -     -     - |  287   6.18
 AMC2 |     -    27     -     -     -     -     -    15     -     -    23 |  288   0.03
 ARTU |     -    30     -    33    19     -     -    36     -     -     - |  288  10.99
 ASC1 |     -    36     -     -    26     -     -     -     -     -    26 |  288    >>>
 ASPA |     -     -     -     -    44     -     -     -     -     -    62 |  285    >>>
 AUCK |     -   146     -   242     -     -     -     -     -     -     - |  101   7.80
 BAHR |     -     -    15     -    20     -     -     -     -     -    33 |  288   0.89
 BOGT |     -    40     -   181    67     -     -     -     -     -     X |  288   9.79
 BOR1 |     -    33     -     -     -     -     -     -     -     -    37 |  285   0.52
 BRMU |     -     -     -     -    23     -     -     -     -     -    33 |  285    >>>
 BRUS |     -    27     -     -     -     -     -    39     -     -    28 |  288   0.04
 CAS1 |     -    44     -    73     -     -     -     -     -     -     - |  288   7.74
 CEDU |     -    41     -    67     -     -     -     -     -     -     - |  288  10.41
 COCO |     -    32     -    53     -     -     -     -     -     -     - |  288  13.03
 CRO1 |     -     -    23    61    37     -     -    20     -     -     X |  281  16.73
 DAKA |     -    44     -     -    36     -     -     -     -     -     - |  285  15.29
 DGAR |     -    23     -     -    43     -     -    35     -     -    36 |  288  13.53
 DRAO |     -    40    26     -     -     -     -    35     -     -    18 |  286    >>>
 DWH1 |     -    29     -     -     -     -     -    33     -     -    42 |  288   0.75
 FAIR |     -     -     -    41    24     -     -    37     -     -    76 |  288   0.05
 FORT |     -    54     -    53    50     -     -     -     -     -    26 |  288   0.19
 GLPS |     -    30     -     -    21     -     -    26     -     -     - |  288   7.51
 GODE |     -    23     -    65     -     -     -     -     -     -    31 |  288   0.05
 GOLD |     -    33     -   108     -     -     -    27     -     -    30 |  288  12.36
 GUAT |     -     -     -     -    19     -     -     -     -     -    26 |  285    >>>
 HOFN |     -     -     -     -    29     -     -    36     -     -     - |  287    >>>
 HRAO |     -     -     -     -     -     -     -    43     -     -    48 |  286   0.45
 IISC |     -     -     -   133    66     -     -     -     -     -     X |  239  13.19
 ISPA |     -     -     -     -    49     -     -    38     -     -    45 |  288  10.13
 JPLM |     -     -     -     -    18     -     -     -     -     -    26 |  285   9.44
 KERG |     -     -    25    74    24     -     -     -     -     -    56 |  288   1.40
 KGN0 |     -    37     -     -     -     -     -     -     -     -    42 |  285   0.57
 KIRU |     -    26     -     -     -     -     -    19     -     -    22 |  288   9.99
 KIT3 |     -     -     -    70    23     -     -    32     -     -    48 |  288  40.66
 KOKB |     -    24     -     -    21     -     -    47     -     -    48 |  288   0.06
 KOSG |     -    26     -     -     -     -     -     -     -     -    29 |  286  38.07
 KOUR |     -    30     -    56    39     -     -    25     -     -    38 |  288   1.10
 KUNM |     -     -     -     -     -     -     -    42     -     -    47 |  286  20.60
 LAE1 |     -    41     -     -    24     -     -     -     -     -    69 |  287  11.09
 LHAS |     -    23     -     -    37     -     -    34     -     -    41 |  288  11.87
 LPGS |     -    53     -    66     -     -     -    38     -     -    34 |  288  49.33
 MAC1 |     -    54     -    89     -     -     -     -     -     -     - |  288  11.96
 MAS1 |     -    23    22    60    31     -     -    49     -     -    73 |  288   3.02
 MATE |     -     -     -    25     -     -     -     -     -     -    17 |   99    >>>
 MBAR |     -    35     -     -    16     -     -    39     -     -    22 |  288  23.43
 MDO1 |     -    34    21     -    25     -     -     -     -     -    26 |  288  12.43
 METS |     -    25     -     -     -     -     -     -     -     -    28 |  285  12.46
 MIZU |     -     -     -   170     -     -     -     -     -     -   116 |  280   0.46
 MKEA |     -    53     -    59     -     -     -     -     -     -    48 |  288  20.46
 NKLG |     -     -     -   189     -     -     -   118     -     -     - |  286    >>>
 NLIB |     -     -     -     -     -     -     -    10     -     -    11 |  288   0.04
 NNOR |     -     -     -    51     -     -     -    32     -     -     - |  288  14.90
 NPLD |     -    23     -     -     -     -     -     -     -     -    27 |  285   0.05
 NRC1 |     -     -     -     -    24     -     -    17     -     -    26 |  287   0.06
 NRIL |     -    23     -     -    25     -     -    22     -     -     - |  288   8.99
 NSSP |     -    38     -     -     -     -     -     -     -     -    43 |  286  21.20
 NTUS |     -    16     -    60     -     -     -     -     -     -    37 |  288   9.67
 NYA1 |     -    24     -     -    24     -     -     -     -     -    26 |  288   0.05
 OHI2 |     -    55     -   107    34     -     -    31     -     -     - |  288   6.81
 PDEL |     -    14     -     -    17     -     -    19     -     -     - |  287  53.12
 PERT |     -    29    27     X    45     -     -     -     -     -    31 |  288   5.05
 PETP |     -     -     -     -    27     -     -    34     -     -     - |  286  11.48
 PIE1 |     -     -     -   102     -     -     -    63     -     -     X |  153   0.28
 POTS |     -    49     -     -    31     -     -     -     -     -    60 |  288  20.92
 PRDS |     -    17     -     -     -     -     -     -     -     -    20 |  286   1.94
 PTBB |     -    60     -     -     -     -     -     -     -     -    67 |  286   0.44
 REYK |     -    22     -     -     -     -     -     -     -     -    25 |  285   9.56
 RIOG |     -    59     -     -   114     -     -     -     -     -    97 |  288   9.60
 SANT |     -   131     -   166    81     -     -     -     -     -   183 |  282   9.06
 SFER |     -    21     -     -     -     -     -     -     -     -    24 |  279 310.85
 STJO |     -     -    16     -     -     -     -    23     -     -    33 |  288   0.04
 SUTM |     -     -     -     -    17     -     -    22     -     -     - |  287   8.49
 THTI |     -     -    29    61    45     -     -    56     -     -    56 |  288  10.44
 THU3 |     -    10     -     -     -     -     -     -     -     -    12 |  288   7.51
 TIDB |     -     -    23    46    29     -     -     -     -     -    51 |  288   0.07
 TRO1 |     -    49     -     -    67     -     -     -     -     -    43 |  288   9.60
 TSKB |     -    32     -    66    48     -     -     -     -     -    27 |  288   1.40
 TWTF |     -    42     -     -     -     -     -    67     -     -    73 |  253   0.44
 URUM |     -    33     -     -     -     -     -     -     -     -    38 |  288  52.31
 USNO |     -    33    18     -     -     -     -     -     -     -    18 |  288   0.05
 USUD |     -     -     -    45     -     -     -    24     -     -    18 |  288   9.99
 VILL |     -    36     -    50     -     -     -     -     -     -    30 |  288   9.95
 WHIT |     -    17     -     -     -     -     -     -     -     -    19 |  288   8.39
 WILL |     -    40     -     -     -     -     -     -     -     -    46 |  284  72.03
 WTZR |     -    40     -    42     -     -     -     -     -     -    55 |  288   0.07
 WUHN |     -     -     -     -    33     -     -     -     -     -    46 |  284  12.86
 YAKT |     -    80     -     -     -     -     -    62     -     -    57 |  281    >>>
 YELL |     -    22    18    35    28     -     -     -     -     -    19 |  288   0.04
 ZWEN |     -     -     -    77    16     -     -     -     -     -    64 |  288  17.48
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3108    60    48    90    50   109  3803    59  2771     -    67 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ALGO |   288     0     0   288   13.81   | 4.87e-14  1.61e-14  3.39e-15 |
 BRUS |   288     0     0   288   12.53   | 4.99e-14  9.32e-15  2.63e-15 |
 AMC2 |   288     0     0   288   10.27   | 4.36e-14  8.37e-15  2.23e-15 |
 USNO |   288     0     0   288    9.39   | 5.45e-14  1.03e-14  2.52e-15 |
 KOKB |   288     0     0   288    7.96   | 4.22e-14  1.09e-14  3.61e-15 |
 GODE |   288     0     0   288    7.67   | 5.98e-14  1.72e-14  2.52e-15 |
 NPLD |   285     0     0   284    7.52   | 5.27e-14  1.42e-14  4.29e-15 |
 YELL |   288     0     0   288    6.73   | 4.06e-14  7.89e-15  2.95e-15 |
 WTZR |   288     0     0   288    4.23   | 5.26e-14  3.53e-14  5.57e-15 |
 NRC1 |   287     0     0   286    3.63   | 6.46e-14  1.85e-14  8.14e-15 |
 TIDB |   288     0     0   288    2.69   | 1.72e-13  1.52e-14  4.60e-15 |
 FAIR |   288     0     0   288    2.12   | 5.93e-14  1.08e-14  3.80e-15 |
 NYA1 |   288     0     0   288    2.12   | 3.75e-14  1.06e-14  5.17e-15 |
 ALBH |   288     0     0   288    1.89   | 5.28e-14  1.21e-14  7.25e-15 |
 STJO |   288     0     0   143    1.89   | 3.82e-14  8.58e-15  3.52e-15 |
 DRAO |   286     1     0   284    1.30   | 8.27e-14  2.24e-14  7.55e-15 |
 NLIB |   288     0     0   143    1.25   | 5.94e-14  1.00e-14  3.31e-15 |
 FORT |   288     0     0   143    0.67   | 7.29e-14  2.96e-14  2.29e-14 |
 PIE1 |   153     0     0     9    0.37   | 6.77e-14  9.68e-15         - |
 G26  |   288     0     0   288    0.20   | 3.12e-13  9.08e-14  4.61e-14 |
 G30  |   288     0     0   288    0.18   | 3.33e-13  8.95e-14  5.98e-14 |
 G13  |   288     0     2    60    0.18   | 5.18e-13  5.38e-14  2.07e-14 |
 G23  |   287     2     0   141    0.18   | 5.13e-13  6.85e-14  1.69e-13 |
 PTBB |   286     0     0   285    0.15   | 3.12e-13  7.82e-14  3.77e-14 |
 G07  |   288     0     0   288    0.15   | 2.97e-13  8.13e-14  7.14e-14 |
 KGN0 |   285     0     0   284    0.14   | 3.74e-13  1.10e-13  7.51e-14 |
 SFER |   279     0     0   276    0.10   | 3.81e-13  1.21e-13  5.12e-14 |
 TWTF |   253     0     0   250    0.10   | 4.35e-13  1.26e-13         - |
 BOR1 |   285     0     0   284    0.08   | 4.36e-13  1.11e-13  5.40e-14 |
 G29  |   288     0     0   288    0.06   | 3.68e-13  1.12e-13  3.83e-14 |
 DWH1 |   288     0     0   288    0.05   | 5.55e-13  1.33e-13  8.04e-14 |
 G27  |   288     0     0   288    0.05   | 3.49e-13  1.10e-13  1.00e-13 |
 G04  |   288     0     0   288    0.05   | 4.90e-13  1.19e-13  8.74e-14 |
 MIZU |   280     0     0   135    0.05   | 3.57e-13  9.24e-14  4.44e-14 |
 G06  |   288     0     0   288    0.04   | 5.64e-13  1.44e-13  1.60e-13 |
 G31  |   288     0     0   288    0.04   | 2.55e-13  1.40e-13  5.91e-14 |
 G17  |   288     0     0   288    0.03   | 4.45e-13  1.31e-13  9.77e-14 |
 TSKB |   288     0     0   288    0.02   | 9.94e-13  2.12e-13  1.66e-13 |
 G20  |   288     0     3    18    0.02   | 6.33e-13  6.84e-14  1.31e-14 |
 KERG |   288     0     0   288    0.01   | 1.22e-12  4.85e-13  1.10e-13 |
 BAHR |   288     0     0   143    0.01   | 3.35e-13  9.12e-14  7.39e-14 |
 G03  |   288     0     0   288    0.01   | 1.32e-12  4.70e-13  1.93e-13 |
 KOUR |   288     0     0   288    0.01   | 1.55e-12  3.86e-13  9.24e-14 |
 G25  |   288     0     0   288    0.01   | 1.42e-12  3.76e-13  1.52e-13 |
 G08  |   288     0     5    69    0.01   | 1.41e-12  3.67e-13  1.49e-13 |
 G05  |   288     0     0   288    0.01   | 1.29e-12  3.94e-13  2.35e-13 |
 MAS1 |   288     0     0   288    0.01   | 1.92e-12  5.76e-13  3.43e-13 |
 HRAO |   286     0     0   286    0.00   | 1.16e-13  3.12e-14  4.18e-14 |
 SUTM |   287     0     1   141    0.00   | 6.88e-13  2.19e-13  5.04e-13 |
 PRDS |   286     0     0   141    0.00   | 1.48e-12  4.29e-13  2.06e-13 |
 G10  |   288     0     1   144    0.00   | 1.33e-12  3.97e-13  2.61e-13 |
 YAKT |   281     0     1     9    0.00   | 5.09e-13  4.00e-13  2.61e-13 |
 GPST |   288     0     0     0    0.00   | 2.64e-14  8.85e-15  2.07e-15 |
 IISC |   239     0     0     0    0.00   |        -         -         - |
 AUCK |   101     0     0     0    0.00   |        -         -         - |
 NKLG |   286     1     0     0    0.00   |        -         -         - |
 WUHN |   284     0     0     0    0.00   |        -         -         - |
 PETP |   286     0     0     0    0.00   |        -         -         - |
 METS |   285     0     0     0    0.00   |        -         -         - |
 MATE |    99     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.68e-13  7.29e-14  2.67e-14 |
 G24  |   288     0     0     0    0.00   | 1.26e-12  4.31e-13  2.84e-13 |
 G22  |   288     4     5     0    0.00   | 1.38e-12  2.39e-13  1.09e-13 |
 G21  |   288     0     6     0    0.00   | 1.08e-12  1.51e-13  2.50e-14 |
 G19  |   288     0     5     0    0.00   | 6.91e-13  7.59e-14  1.83e-14 |
 G18  |   288     0     6     0    0.00   | 1.23e-12  1.17e-13  5.28e-14 |
 G16  |   288     0     4     0    0.00   | 4.84e-13  4.99e-14  2.49e-14 |
 G15  |   288     0     0     0    0.00   | 1.51e-12  4.96e-13  2.99e-13 |
 G14  |   288     0     6     0    0.00   | 6.28e-13  7.48e-14  1.75e-14 |
 G11  |   288     0     5     0    0.00   | 7.62e-13  7.01e-14  5.42e-14 |
 G09  |   288     0     0     0    0.00   | 1.34e-12  5.28e-13  3.08e-13 |
 G01  |   288     0     0     0    0.00   | 1.56e-12  7.37e-13  3.43e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 WILL |   284     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.03e-13  5.64e-13  4.96e-13 |
 VILL |   288     0     1     0    0.00   | 1.12e-12  1.37e-12  1.03e-12 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     1     0    0.00   | 3.83e-13  2.60e-13  6.55e-13 |
 SANT |   282     0     0     0    0.00   | 1.92e-12  6.71e-13  6.47e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   285     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.81e-12  5.71e-13  3.87e-13 |
 PDEL |   287     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   286     2     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     1     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   | 7.86e-13  8.00e-13  8.94e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   286     0     0     0    0.00   |        -         -         - |
 KOSG |   286     0     1     0    0.00   | 7.22e-13  7.33e-13  2.58e-12 |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   285     0     0     0    0.00   | 5.91e-13  3.64e-13  1.07e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 GUAT |   285     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAKA |   285     0     0     0    0.00   |        -         -         - |
 CRO1 |   281     1     0     0    0.00   |        -         -         - |
 COCO |   288     0     1     0    0.00   | 2.96e-13  1.62e-12  1.35e-12 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   285     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   285     0     0     0    0.00   |        -         -         - |
 ASC1 |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   287     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.12e-17  1.34e-16  8.02e-16 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      YELL      AMC2 |
------------------------------------------+------------------------------+
