
 GPS week: 1152   Day: 5   MJD: 52313                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2672      0    -0.22     0.44     4.07     0.00
 cod |   288     0  25581      5     0.11    -0.03     0.08    16.59
 emr |   288     0  11710      0   113.55    17.81     0.08    16.75
 esa |   288     0  18464   1553     0.35    -1.53     0.13     8.27
 gfz |   288     0  14753     11    -0.04     0.23     0.07    19.94
 igu |    96     0   2200      0    -0.11     0.48     4.36     0.00
 jpl |   282     1  11751    858    -0.59     4.29     0.07    19.21
 ngs |    96     0   2672      0    -0.21     0.41     3.89     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  27147    320   663.63    -2.68     0.07    19.24

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  1459   -39  -117   172   -30  5572   123  1225     -    34 |
    2 | -6973    34   -85   103    81     -   100 -6501     -  -132 |
    3 | -5111   -91  -123   256   116   930   133 -4201     -  -109 |
    4 |  4313   225  -139   -58   122     -   -13  3159     -  -174 |
    5 | -3900    71  -169    52   269 -8276   179 -3403     -  -301 |
    6 | -1969   223   -62   -39   191  -845  -188 -2155     -  -230 |
    7 |  1015   260  -271   -34    39   268   300  1192     -  -157 |
    8 | -2003    74   -43    42  -100 -2965   157 -2040     -   -18 |
    9 |  4654    22  -130   359   147 13504   -96  4159     -  -162 |
   10 | -2372   176  -246   142    88 -5753   103 -2286     -  -140 |
   11 |  5695  -139    88   -27   -14  2267    26  5687     -    54 |
   13 |  2614    -2   162   -75  -203   382  -161  2698     -   181 |
   14 |  4681   -51   150  -332   140  2610   -10  4572     -  -103 |
   15 | -3003   184   -32     -    85     -    18 -2689     -  -230 |
   17 | -3778     -   118     X     -     -   201 -3918     -  -198 |
   18 |  4976   119    76    14   -35  3016   -11  5000     -  -134 |
   20 |  7417  -225     5   113    22  2256   200  7400     -    22 |
   21 |  8578    65    53     X   120     -   110  8456     -  -311 |
   22 |  5040   -50    -9   300   156  8584   133  4345     -  -303 |
   23 | -4662   260   -78   206   -20-10286    28 -3614     -  -239 |
   24 | -5906   206  -304  -198   158  2974   105 -5581     -   -50 |
   25 |  7230    19    49   -65   190  9256  -118  5998     -  -177 |
   26 | -3726   155  -177   584    45   699  -128 -3711     -  -163 |
   27 | -8485   -61   -93   548     4-15986    48 -7146     -  -119 |
   28 | -2127   119    76   -84  -149   812   114 -2153     -   -34 |
   29 |  2348    52    43   -20   135 -4475   -72  1748     -  -178 |
   30 | -6353    16     2   125   261-11427  -116 -6649     -  -283 |
   31 |    86    11   -33   232   -47  6948   229   108     -  -140 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -108     -    40     -     -     8     -     -    69 |
 ALGO |     -   -37   139     X  -107     -  -114     -     -   133 |
 AMC2 |     -   -65     -     -     -     -     -     -     -    56 |
 ANKR |     -   -14     -    28     -     -     -     -     -     - |
 AREQ |     -  -197     -     -   -22     -     -     -     -   192 |
 AUCK |     -    34     -     X     -     -   -73     -     -    43 |
 BAHR |     -   -56    16   165     -     -     -     -     -   -37 |
 BILI |     -   120     -     -  -100     -     -     -     -     - |
 BOR1 |     -   -44     -     -     -     -     -     -     -    38 |
 BRUS |     -   -36     -     -     -     -   -36     -     -    67 |
 CAS1 |     -   -79     -    91   -67     -   -22     -     -   120 |
 CEDU |     -   391     -  -784     -     -     -     -     -     - |
 COCO |     -    44     -  -163    61     -   -26     -     -    -7 |
 CRO1 |     -  -175     -    41    86     -    11     -     -    31 |
 DAV1 |     -   -57     -     -   -99     -     -     -     -   153 |
 DRAO |     -   -30     8     -     -     -     -     -     -    19 |
 FAIR |     -     -    99     -     -     -   -93     -     -     4 |
 GALA |     -  -108     -  -157    12     -    42     -     -   109 |
 GODE |     -   -39     -     -     -     -     -     -     -    33 |
 GOLD |     -   -98     -     -     -     -     X     -     -    85 |
 GRAZ |     -   -50     -    63     -     -     -     -     -    16 |
 GUAM |     -   217     -  -194   -25     -  -190     -     -   109 |
 HARB |     -   107     -     -   -89     -     -     -     -     - |
 HOB2 |     -    29     -   -85     -     -     -     -     -    11 |
 HRAO |     -    41     -     -     -     -  -231     -     -   189 |
 IISC |     -   -21     -  -124     -     -     -     -     -    72 |
 KERG |     -  -201     -     -     -     -   431     -     -  -234 |
 KOSG |     -  -154     -     -     -     -     -     -     -   133 |
 KSTU |     -     -     -     -     -     -   -50     -     -    50 |
 KWJ1 |     -     -     -     -    19     -   -46     -     -    28 |
 MAC1 |     -   -58     -   -45   -93     -    32     -     -   138 |
 MAG0 |     -    -5     -     -     -     -     5     -     -     - |
 MAS1 |     -   -40   124    22   -65     -     9     -     -   -24 |
 MATE |     -  -159     -   -34     -     -     X     -     -   151 |
 MAW1 |     -    57     -     -     -     -     -     -     -   -49 |
 MCM4 |     -   165     -     -     -     -     -     -     -  -143 |
 MDO1 |     -     -   -23   -41     -     -     -     -     -    36 |
 MEDI |     -  -139     -     -     -     -     -     -     -   120 |
 METS |     -  -144     -     -     -     -     -     -     -   124 |
 MKEA |     -   283   228   -91  -262     -  -138     -     -     X |
 NKLG |     -   110     -     -     -     -     -     -     -   -95 |
 NLIB |     -     -     -  -212     -     -     -     -     -    91 |
 NPLD |     -  -128     -     -     -     -     -     -     -   111 |
 NRC2 |     -  -202    15   733     -     -   -39     -     -  -116 |
 NTUS |     -   -64     -     -     -     -     -     -     -    55 |
 NYA1 |     -    45     -     -  -166     -    35     -     -   100 |
 NYAL |     -     -     3   145     -     -     -     -     -   -66 |
 OHIG |     -   -86     -  -273    87     -     -     -     -   102 |
 ONSA |     -   -57     -   186   -39     -     -     -     -     9 |
 PENC |     -   323     -     -     -     -     -     -     -  -279 |
 PERT |     -     1     -    60     -     -     -     -     -   -27 |
 PIE1 |     -     -     -  -133     -     -     -     -     -    57 |
 POTS |     -   -39     -     -     -     -     -     -     -    33 |
 REYK |     -   -52     -     -     -     -     -     -     -    45 |
 SANT |     -     2     -     -   -71     -    46     -     -    28 |
 SELE |     -   187     -  -375     -     -     -     -     -     - |
 SEY1 |     -     -     -  -619     -     -     -     -     -   266 |
 SFER |     -  -538     -     -     -     -     -     -     -   464 |
 STJO |     -  -198   168     -  -100     -     -     -     -   130 |
 SUTH |     -     -     -     X  -128     -     -     -     -   133 |
 THTI |     -     -     -   -42     -     -   -64     -     -    79 |
 TLSE |     -    54     -     -     -     -     -     -     -   -47 |
 TRO1 |     -  -137     -     -    -2     -     -     -     -   122 |
 TROM |     -     -     -   115     -     -     -     -     -   -50 |
 TSKB |     -     -   100  -275     -     -     -     -     -    20 |
 URUM |     -    -1     -     -     -     -     -     -     -     1 |
 USNO |     -    20   215  -435     -     -     X     -     -   -17 |
 USUD |     -   -56     -    68     -     -  -157     -     -   169 |
 VILL |     -   -53     -    78     -     -     -     -     -    13 |
 WHIT |     -    54     -     -   -45     -     -     -     -     - |
 WSRT |     -   -98     -    47     -     -     -     -     -    64 |
 WTZR |     -   -60     -   100     -     -     3     -     -     6 |
 WUHN |     -   -33     -  -308  -373     -     -     -     -   547 |
 YAR2 |     -     -     -     -     -     -   -70     -     -    70 |
 YELL |     -   -99   175  -266  -127     -    41     -     -   140 |
 ZWEN |     -   -12     -     -   -53     -     -     -     -    65 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3023    72    48   151    66  4074    65  3254     -    42 |  288   2.86
    2 |  4721    82    47    84   118     -    46  4521     -    95 |  288   1.85
    3 |  6434    79    46    59   129  4283    81  5764     -    37 |  288   2.70
    4 |  4607   152   130   364    62     -    68  3884     -   184 |  281   0.52
    5 |  3042   128    36    86    48  5938    34  3004     -   195 |  288   2.79
    6 |  6488   110    95   128    92  2926    35  6340     -    45 |  288   6.90
    7 |  1779    60   111    92    74  2403    60  1836     -   129 |  288   1.53
    8 |  3266   155    75    88    88  2275    64  3400     -    92 |  288   2.20
    9 |  2792    68    63   153    39  6578    44  2803     -    74 |  287   1.97
   10 |  6393    92    98   221    83  3302    55  6440     -    42 |  288   2.66
   11 |  1063    59    91   183    51  1303    41   943     -    39 |  288   0.39
   13 |  1395    81    64   153    75  1027   110  1246     -    63 |  288   0.34
   14 |  1125    52   119   260    77  1804    44  1040     -   124 |  288   0.20
   15 |  3374   240   136     -   135     -   143  3121     -   129 |  278   2.77
   17 |  2293     -   134     X     -     -   322  2472     -   163 |  276   3.40
   18 |   862    43    90   255    93  1754    66   873     -    86 |  288   0.26
   20 |  1211    97    86   162    60  1727   130  1288     -    73 |  288   0.21
   21 |  3091    86    83     X    37     -   120  2920     -   134 |  288   2.20
   22 |  4888    60    45   101   124  5746    50  4285     -    87 |  288   1.58
   23 |  7718   135    62   124    64  3262    63  8133     -    74 |  288   5.46
   24 |  2054   106    52   116    41  3255    74  2106     -    42 |  281   1.61
   25 |  4325   234   101   184   139  4702    49  3284     -    81 |  279   1.77
   26 |  1052    86    68   230    71   702    74  1149     -    54 |  288   0.74
   27 |  6880   141    96   215    33 11269    73  5963     -    84 |  284   3.12
   28 |  2460   115    79   138    80  1688    73  2573     -    74 |  288   0.69
   29 |  3039    73   152   138    88  2144    31  2813     -    66 |  288   0.74
   30 |  5266   102    60   103    30  7494    58  5099     -    57 |  288   1.65
   31 |  5545    89    63   150    83  4422    45  5269     -    56 |  288   4.93
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    34     -   110     -     -    29     -     -    25 |  288   0.10
 ALGO |     -    35    48     X    34     -    22     -     -    32 |  288   0.05
 AMC2 |     -    17     -     -     -     -     -     -     -    14 |  286   0.05
 ANKR |     -    73     -   147     -     -     -     -     -     - |  288  12.90
 AREQ |     -    46     -     -    37     -     -     -     -    26 |  288  13.61
 AUCK |     -    80     -     X     -     -    55     -     -    46 |  264  17.46
 BAHR |     -    88    48   147     -     -     -     -     -    61 |  288   0.31
 BILI |     -    27     -     -    22     -     -     -     -     - |  287  13.19
 BOR1 |     -    27     -     -     -     -     -     -     -    23 |  286   0.53
 BRUS |     -    34     -     -     -     -    40     -     -    32 |  288   0.05
 CAS1 |     -   155     -    55    50     -    99     -     -    74 |  288   9.91
 CEDU |     -    36     -    72     -     -     -     -     -     - |  288  19.51
 COCO |     -    92     -    96    42     -    58     -     -    53 |  288  10.56
 CRO1 |     -    53     -    98    28     -    39     -     -    35 |  288   0.11
 DAV1 |     -   120     -     -    35     -     -     -     -    79 |  288  16.84
 DRAO |     -    16    22     -     -     -     -     -     -    17 |  288   0.05
 FAIR |     -     -    42     -     -     -    46     -     -    39 |  284   0.11
 GALA |     -    50     -   153    35     -    51     -     -    31 |  288  48.93
 GODE |     -    15     -     -     -     -     -     -     -    13 |  286   0.07
 GOLD |     -    70     -     -     -     -     X     -     -    60 |  285  37.57
 GRAZ |     -    46     -   136     -     -     -     -     -    85 |  287  25.24
 GUAM |     -   115     -    56    32     -    52     -     -    56 |  288  30.94
 HARB |     -    32     -     -    26     -     -     -     -     - |  287   5.40
 HOB2 |     -    78     -    74     -     -     -     -     -    42 |  288   0.09
 HRAO |     -    78     -     -     -     -    28     -     -    50 |  288  31.55
 IISC |     -   170     -   164     -     -     -     -     -   179 |  288  46.88
 KERG |     -   154     -     -     -     -   107     -     -    39 |  287   1.48
 KOSG |     -    28     -     -     -     -     -     -     -    24 |  286  15.35
 KSTU |     -     -     -     -     -     -    53     -     -    53 |  219  15.34
 KWJ1 |     -     -     -     -   210     -   172     -     -   142 |  244 139.69
 MAC1 |     -   104     -    67    95     -    84     -     -   106 |  288  18.80
 MAG0 |     -    39     -     -     -     -    34     -     -     - |  278  13.12
 MAS1 |     -    34    67   138    45     -    75     -     -    32 |  288   1.97
 MATE |     -    46     -    93     -     -     X     -     -    22 |  288   0.18
 MAW1 |     -    80     -     -     -     -     -     -     -    69 |  274  24.14
 MCM4 |     -    92     -     -     -     -     -     -     -    79 |  288  17.80
 MDO1 |     -     -    20    82     -     -     -     -     -    31 |  288  26.79
 MEDI |     -    29     -     -     -     -     -     -     -    25 |  286   0.23
 METS |     -   131     -     -     -     -     -     -     -   113 |  268  24.80
 MKEA |     -    44    59   152    31     -    36     -     -     X |  285  54.08
 NKLG |     -    28     -     -     -     -     -     -     -    24 |  287    >>>
 NLIB |     -     -     -    36     -     -     -     -     -    15 |  218 192.44
 NPLD |     -    28     -     -     -     -     -     -     -    24 |  285   0.07
 NRC2 |     -    25    53    23     -     -    43     -     -    32 |  288   0.07
 NTUS |     -    53     -     -     -     -     -     -     -    46 |  288   7.85
 NYA1 |     -    39     -     -    26     -    24     -     -    21 |  288   0.09
 NYAL |     -     -    56   105     -     -     -     -     -    26 |  288   0.08
 OHIG |     -    89     -    83    38     -     -     -     -    32 |  288  11.17
 ONSA |     -    49     -   106    33     -     -     -     -    36 |  288   0.15
 PENC |     -    35     -     -     -     -     -     -     -    30 |  285   7.81
 PERT |     -   109     -    54     -     -     -     -     -   103 |  288  18.18
 PIE1 |     -     -     -    99     -     -     -     -     -    43 |  264   0.07
 POTS |     -    48     -     -     -     -     -     -     -    42 |  275  18.97
 REYK |     -    28     -     -     -     -     -     -     -    24 |  286  12.36
 SANT |     -    51     -     -   111     -    61     -     -    42 |  283  28.77
 SELE |     -    25     -    50     -     -     -     -     -     - |  268  37.25
 SEY1 |     -     -     -   134     -     -     -     -     -    58 |  122  35.70
 SFER |     -    24     -     -     -     -     -     -     -    21 |  212   1.05
 STJO |     -    24    67     -    41     -     -     -     -    36 |  288   2.72
 SUTH |     -     -     -     X    58     -     -     -     -    60 |  266  34.72
 THTI |     -     -     -    55     -     -    27     -     -    25 |  287   1.81
 TLSE |     -    58     -     -     -     -     -     -     -    50 |  236   0.44
 TRO1 |     -    91     -     -    65     -     -     -     -   136 |  288   9.78
 TROM |     -     -     -    90     -     -     -     -     -    39 |  286  11.88
 TSKB |     -     -    35   184     -     -     -     -     -    52 |  288   0.64
 URUM |     -    29     -     -     -     -     -     -     -    25 |  288  39.37
 USNO |     -    22    45    35     -     -     X     -     -    51 |  288   0.05
 USUD |     -    56     -   160     -     -    60     -     -    60 |  288   0.50
 VILL |     -    37     -    55     -     -     -     -     -    21 |  288  24.44
 WHIT |     -    32     -     -    27     -     -     -     -     - |  283    >>>
 WSRT |     -    38     -    78     -     -     -     -     -    17 |  288   0.06
 WTZR |     -    50     -    98     -     -    26     -     -    28 |  288   0.10
 WUHN |     -    67     -   138    44     -     -     -     -    92 |  287  33.84
 YAR2 |     -     -     -     -     -     -    28     -     -    28 |  271   5.71
 YELL |     -    20    58    90    20     -    26     -     -    23 |  288   0.32
 ZWEN |     -    32     -     -    18     -     -     -     -    19 |  277  18.23
 -----+-------------------------------------------------------------+--------------
 TOT  |  4073    84    78   135    72  4355    73  3892     -    71 |


 BEST CLOCK FIT: BRUS   288   0.05 (ns) 

