
 GPS week: 1154   Day: 0   MJD: 52322                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2569      0    -0.05     0.02     4.61     0.00
 cod |   288     0  26417    100    -0.16     0.17     0.10    16.27
 emr |   288     0  10544    289   254.96    15.66     0.12    12.69
 esa |   288     0  16835   1527    -0.06    -0.02     0.16     8.85
 gfz |   288     0  15437    155    -0.04     0.09     0.08    20.97
 igu |    96     0   2288      0     0.03    -0.15     4.62     0.00
 jpl |   280     0  11929   1099     3.24    -3.45     0.07    24.47
 ngs |    96     0   2569      0    -0.04     0.01     4.49     0.00
 usn |   288     0  24514    328   628.05    -4.66     0.10    16.76

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------+
    1 |   801   -74   186   -86   135  5929    65   571  -250 |
    2 |  -925    88   -16     X    50 -4667   162 -1680  -280 |
    3 | -1958    44     X    78    21  2627    -2 -1285  -109 |
    4 | -5507    48   -14    51   149 -1845    -3 -5740  -247 |
    5 | -6785   188  -316   187     8-21345    71 -5197  -115 |
    6 |-10064   195  -285   179   267-18575  -122 -8409  -293 |
    7 |  -286   156  -250   -60   112 -1347   175  -297  -161 |
    8 | -4953   -74    21    93   -96  9076   220 -4627    20 |
    9 | -4232   211   -91   223   -40   656  -135 -4286   -51 |
   10 |  1717    83  -106    62   -81   979   146   811   -61 |
   11 |  7494  -165   164   159   -49   935   -24  7497    32 |
   13 |  8610  -169   365    59    12 -1402  -241  8240   -34 |
   14 |  6421     6    73   108   -78   651    -4  6522   -18 |
   15 |  2889   147  -231     -   188     -   -68  2428  -170 |
   18 |  5239   123   -67   191   -85   722   -36  5335   -32 |
   20 |  5839  -103   201   127    12  -407   191  5810  -231 |
   21 |  2736    26   -20     X   -89     -   126  1815    43 |
   22 | -8810   -61    91    55     8 -5535   118 -7687  -153 |
   23 |   527   191   -70    45    76  6441   106   376  -306 |
   24 | -5866    92  -275   135   114     -    65 -5961  -125 |
   25 |   741    61   -41   111    56  5564    84   898  -196 |
   26 |    77   154   -86   304   -21  -331   -51  -373  -174 |
   27 |  3281  -205   125   136   157 19792    54  3505  -183 |
   28 | -5389   -34   109  -156   -17 -6516   -18 -4599    69 |
   29 | -3211    98   -94   152    -1 -1350   -38 -3276   -84 |
   30 |  -754   138  -205   216   199 -6702  -167 -1220  -195 |
   31 | 11988    23  -133   156    51 17800    68 10406  -103 |
 -----+-------------------------------------------------------+
 ALBH |     -  -123     -     -     -     -   -21     -   150 |
 ALGO |     -   -65    67     X  -188     -   -17     -   271 |
 AMC2 |     -  -111     -     -     -     -     -     -   107 |
 ANKR |     -    45     -   -83     -     -     -     -     - |
 AOML |     -   492     -     -     -     -     -     -  -478 |
 AREQ |     -     6     -   -27    62     -  -144     -   132 |
 ARTU |     -    29     -     -   -77     -    48     -     - |
 ASC1 |     -  -279     -  -354     -     -     -     -   373 |
 AUCK |     -    59     -     X     -     -   -99     -    87 |
 BAHR |     -   -54   218    26     -     -     -     -  -126 |
 BILI |     -   -66     -     -    51     -     -     -     - |
 BOR1 |     -   181     -     -     -     -     -     -  -175 |
 BRMU |     -    64     -  -221   -25     -     -     -    85 |
 BRUS |     -   -35     -     -     -     -   -40     -    92 |
 CAS1 |     -  -155     -   253  -120     -    -5     -   173 |
 CEDU |     -   397     -  -730     -     -     -     -     - |
 COCO |     -   -15     -  -114    30     -    79     -   -73 |
 CRO1 |     -   -73     -     -  -157     -   -70     -   366 |
 DARW |     -   -10     -     -     -     -     6     -     - |
 DAV1 |     -   -34     -     -   -49     -     -     -    94 |
 DRAO |     -     1   -43     -     -     -     -     -    32 |
 EISL |     -    91     -  -167     -     -     -     -     - |
 FAIR |     -     -    57  -131     -     -     X     -    25 |
 GALA |     -   -30     -     -    48     -   -99     -   110 |
 GODE |     -    96     -  -621     -     -     -     -   223 |
 GOLD |     -   -51     -     -     -     -     X     -    50 |
 GRAZ |     -   -25     -     -     -     -     -     -    24 |
 GUAM |     -    88     -    94   -83     -   -96     -   104 |
 HARB |     -   -15     -     -    12     -     -     -     - |
 HOB2 |     -   109     -  -281     -     -     -     -    43 |
 HRAO |     -   -54     -     -     -     -  -137     -   246 |
 IISC |     -  -204     -   -85     -     -     -     -   230 |
 KARR |     -    -4     -     -     3     -     -     -     - |
 KERG |     -  -372     -     -     -     -   519     -  -363 |
 KIRU |     -     2     -  -172     -     -    63     -     - |
 KOSG |     -  -104     -     -     -     -     -     -   101 |
 KWJ1 |     -     -     -     -    46     -    -8     -   -44 |
 LPGS |     -     -     -     -     X     -    38     -   -55 |
 MAC1 |     -    14     -     -  -165     -    78     -    83 |
 MATE |     -   -24     -  -191     -     -     X     -   124 |
 MAW1 |     -    43     -     -     -     -     -     -   -42 |
 MCM4 |     -   140     -     -  -126     -     X     -    23 |
 MDO1 |     -   -97    41  -294     -     -     -     -   190 |
 MEDI |     -  -209     -     -     -     -     -     -   203 |
 METS |     -   -56     -     -     -     -     -     -    54 |
 MKEA |     -    -3   268   147   103     -  -164     -  -155 |
 MSKU |     -   -13     -     -    10     -     -     -     - |
 NLIB |     -   214     -  -394     -     -     -     -     X |
 NPLD |     -   -18     -     -     -     -     -     -    18 |
 NRC2 |     -  -105   -32   440     -     -  -171     -   137 |
 NTUS |     -   -69     -     -     -     -     -     -    67 |
 OHIG |     -     -     -  -183    12     -     -     -    81 |
 ONSA |     -   -53     -   103   -48     -     -     -    58 |
 PENC |     -   136     -     -     -     -     -     -  -132 |
 PERT |     -   -27     -    75     -     -     -     -   -13 |
 PETP |     -   -38     -     -    29     -     -     -     - |
 PIE1 |     -  -307     -  -135     -     -     -     -   318 |
 PIMO |     -     -     -     -     -     -   462     -  -675 |
 POTS |     -    29     -     -   -41     -     -     -    23 |
 REYK |     -    39     -     -     -     -     -     -   -38 |
 SANT |     -    62     -   -31   -92     -     -     -    69 |
 SELE |     -   114     -  -209     -     -     -     -     - |
 SFER |     -  -171     -     -     -     -     -     -   166 |
 STJO |     -  -173   219     -   -94     -     -     -   120 |
 SUTH |     -  -261     -   292   -15     -     -     -    81 |
 THTI |     -     -     -   -30     -     -   -98     -   151 |
 USNO |     -     9    65     -     -     -   -25     -   -24 |
 VILL |     -    -1     -   -48     -     -     -     -    27 |
 WHIT |     -    83     -     -   -64     -     -     -     - |
 WSRT |     -   -15     -   -34     -     -     -     -    33 |
 WTZR |     -  -119     -   130     -     -   -23     -    80 |
 YAR2 |     -     -     -     -     -     -   -87     -   127 |
 YELL |     -   -72   101     X     -     -   -30     -    37 |
 YSSK |     -     3     -     -     -     -    -2     -     - |
 ZWEN |     -     5     -     9  -101     -     -     -   117 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  4632    64   167   194    92  2863    51  4632   114 |  288   3.55
    2 |  7035   110    39     X    54  4423    79  6815   173 |  288   3.53
    3 |  3982   112     X   104    47  2503    83  3687    34 |  288   1.26
    4 |  2888    68    82    90    52  1025   102  2695    44 |  280   0.49
    5 |  7861   110   109    68    29  9148    54  7323    43 |  288   3.28
    6 |  9962    62    67   170    62  8782    60 10342   158 |  288   6.93
    7 |  1396    75    31   225    56   623    60  1314    54 |  288   0.33
    8 |  5352   168   217   331    67  9615    63  5620   150 |  281   2.70
    9 |  3812   340    95   248    42  2537    59  3929   115 |  278   1.26
   10 |  4234    53   108    95    79  2692    32  4139    91 |  288   2.48
   11 |  1894    98   131   156    75   671    30  2001    55 |  288   0.32
   13 |   944    74   191   141   100   969    79  1144    47 |  288   0.57
   14 |   921   102   136    90    59   686    55   999   118 |  288   0.22
   15 |  6027   183    93     -   230     -   130  6040    75 |  278   3.36
   18 |   870    64   197   215    87   556    62   868    39 |  288   0.31
   20 |  1214    62   102   147    57   756    43  1370    71 |  288   0.21
   21 |  7641   294   114     X   113     -    65  6576   279 |  288   4.77
   22 |  4664   100   110   108   154  3175    54  4234   123 |  288   1.61
   23 |  5483    98   103    98    54  1839    40  5573    80 |  288   5.64
   24 |  2679   108   118   191   116     -   119  2593   188 |  281   2.46
   25 |  2550   181   102   292   182  2991    44  2395   130 |  281   2.18
   26 |  3265    85   136   232    40  1208    41  3030    71 |  288   0.75
   27 |  7000   134   110    69    91  9369    86  5829   204 |  280   4.39
   28 |  3902   101    70   112    38  3074    35  3378    83 |  288   0.71
   29 |   683    69    97   172    36   861    42   761    94 |  288   0.80
   30 |  2661    61   103    84    56  3411    50  2370    38 |  288   0.55
   31 |  3420    96   146    67    80  9013    82  4831    70 |  288   2.89
 -----+-------------------------------------------------------+--------------
 ALBH |     -    25     -     -     -     -    31     -    45 |  288   0.10
 ALGO |     -    47    49     X    23     -    23     -    37 |  288   0.05
 AMC2 |     -    43     -     -     -     -     -     -    42 |  286   0.06
 ANKR |     -    41     -    75     -     -     -     -     - |  288  12.57
 AOML |     -    51     -     -     -     -     -     -    49 |  178  23.94
 AREQ |     -    69     -   117    56     -    58     -    48 |  288  43.29
 ARTU |     -    85     -     -   115     -    50     -     - |  286  43.34
 ASC1 |     -   305     -   298     -     -     -     -   310 |  234    >>>
 AUCK |     -    90     -     X     -     -    61     -    22 |  264  15.93
 BAHR |     -    69   127    80     -     -     -     -    62 |  288   0.47
 BILI |     -    15     -     -    12     -     -     -     - |  287  17.79
 BOR1 |     -    33     -     -     -     -     -     -    32 |  268   0.40
 BRMU |     -   150     -   176    71     -     -     -    82 |  286  42.06
 BRUS |     -    63     -     -     -     -    68     -    71 |  266   0.07
 CAS1 |     -    95     -   158    50     -    39     -    72 |  288   8.62
 CEDU |     -    58     -   107     -     -     -     -     - |  288  14.55
 COCO |     -    94     -    73   121     -    52     -    47 |  288  11.95
 CRO1 |     -    64     -     -    37     -    27     -    74 |  288   0.21
 DARW |     -   116     -     -     -     -    77     -     - |  276  23.66
 DAV1 |     -   127     -     -    49     -     -     -   155 |  288  17.63
 DRAO |     -    34    71     -     -     -     -     -    27 |  288   0.11
 EISL |     -    58     -   106     -     -     -     -     - |  148  25.97
 FAIR |     -     -   173   217     -     -     X     -    38 |  287   0.09
 GALA |     -    54     -     -    62     -    51     -    68 |  288  46.60
 GODE |     -    58     -    95     -     -     -     -    42 |  252   6.32
 GOLD |     -    36     -     -     -     -     X     -    35 |  286  37.44
 GRAZ |     -    76     -     -     -     -     -     -    73 |  284  10.28
 GUAM |     -   120     -   127    40     -    60     -    47 |  288  27.53
 HARB |     -    15     -     -    11     -     -     -     - |  287   2.35
 HOB2 |     -    67     -   126     -     -     -     -    44 |  288   0.07
 HRAO |     -    70     -     -     -     -    36     -    57 |  288  37.22
 IISC |     -   169     -   352     -     -     -     -    58 |  278  54.15
 KARR |     -    72     -     -    56     -     -     -     - |  288  21.50
 KERG |     -   141     -     -     -     -    62     -    77 |  287   1.30
 KIRU |     -    47     -   102     -     -    62     -     - |  288   2.50
 KOSG |     -    56     -     -     -     -     -     -    55 |  286  14.42
 KWJ1 |     -     -     -     -   199     -   136     -   190 |  256 116.05
 LPGS |     -     -     -     -     X     -   135     -   197 |  184  70.97
 MAC1 |     -    72     -     -    39     -    60     -    32 |  288  23.55
 MATE |     -    70     -    65     -     -     X     -    54 |  288   0.05
 MAW1 |     -    78     -     -     -     -     -     -    76 |  271  22.24
 MCM4 |     -    79     -     -    88     -     X     -   111 |  288  10.37
 MDO1 |     -    79   101   179     -     -     -     -    60 |  288  27.87
 MEDI |     -    37     -     -     -     -     -     -    36 |  286   0.14
 METS |     -    43     -     -     -     -     -     -    42 |  285  21.15
 MKEA |     -    46   133   184    36     -    66     -   214 |  282  52.94
 MSKU |     -    78     -     -    61     -     -     -     - |  267  33.19
 NLIB |     -    33     -    61     -     -     -     -     X |  274   0.06
 NPLD |     -    26     -     -     -     -     -     -    25 |  285   0.05
 NRC2 |     -    42    53    66     -     -    28     -    35 |  288   0.07
 NTUS |     -    38     -     -     -     -     -     -    37 |  288   7.58
 OHIG |     -     -     -   104    49     -     -     -    63 |  288  14.63
 ONSA |     -    66     -    51    32     -     -     -    54 |  288   0.13
 PENC |     -    60     -     -     -     -     -     -    58 |  285   5.97
 PERT |     -    65     -   134     -     -     -     -    44 |  288  19.46
 PETP |     -    19     -     -    15     -     -     -     - |  286  18.61
 PIE1 |     -    24     -    85     -     -     -     -    40 |  263   0.05
 PIMO |     -     -     -     -     -     -   316     -   462 |  157  14.90
 POTS |     -    69     -     -    39     -     -     -    61 |  277  14.67
 REYK |     -    43     -     -     -     -     -     -    42 |  286   9.72
 SANT |     -   127     -   300    43     -     -     -    84 |  286  31.70
 SELE |     -   139     -   255     -     -     -     -     - |  225  35.22
 SFER |     -    29     -     -     -     -     -     -    28 |  287   0.96
 STJO |     -    58    71     -    25     -     -     -    33 |  288   1.89
 SUTH |     -    79     -   118   253     -     -     -   255 |  246  41.96
 THTI |     -     -     -   174     -     -    56     -    47 |  287   2.83
 USNO |     -    52    57     -     -     -    21     -    29 |  288   0.06
 VILL |     -    48     -    61     -     -     -     -    34 |  288  25.98
 WHIT |     -    35     -     -    27     -     -     -     - |  288  15.21
 WSRT |     -    35     -    40     -     -     -     -    36 |  288   0.08
 WTZR |     -    56     -    95     -     -    38     -    60 |  288   0.10
 YAR2 |     -     -     -     -     -     -    17     -    25 |  272   4.47
 YELL |     -   247   152     X     -     -   109     -    94 |  288   0.18
 YSSK |     -    40     -     -     -     -    27     -     - |  277  18.02
 ZWEN |     -    49     -    76    40     -     -     -    40 |  288  15.81
 -----+-------------------------------------------------------+--------------
 TOT  |  4615    99   118   157    85  4617    73  4487   102 |


 BEST CLOCK FIT: ALGO   288   0.05 (ns) 

