
 GPS week: 1154   Day: 1   MJD: 52323                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2664      0     0.02    -0.14     4.57     0.00
 cod |   288     0  26621    117    -0.01    -0.19     0.09    15.94
 emr |   288     0  11239      0   272.26    19.24     0.08    18.43
 esa |   288     0  17268   1184    -0.18     0.00     0.15     7.81
 gfz |   288     0  15816     85    -0.03    -0.04     0.08    18.92
 igu |    96     0   2196      0     0.03    -0.11     3.94     0.00
 jpl |   279     0  11372    820     2.16     0.07     0.08    20.23
 ngs |    96     0   2664      0     0.02    -0.15     4.55     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24475    718   622.93    -2.30     0.08    18.67

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  4840   -93    -6   114   134  1198    61  5117     -  -135 |
    2 |  -569    27  -180   217   175     -   163  -234     -  -187 |
    3 | -3045   -19  -283   260   168   371   126 -3247     -   -40 |
    4 | -4574   163  -136   -48    92 -1172   134 -3918     -  -140 |
    5 | -5148   177  -176    12    23  -672    30 -4694     -   -23 |
    6 | -4296   186  -190   210    79  -178    13 -3027     -  -136 |
    7 |  3368   285  -319   -62   126 -3827   195  2940     -  -147 |
    8 |  8680  -163    22   965   -31  -418   201  7057     -  -252 |
    9 |  2032   203   -44   180  -135  6413    12  1841     -   -67 |
   10 | -5400   135   -57  -102   -32 -5219   207 -5590     -  -107 |
   11 |  3889    17    22   -18  -161  1179   221  3851     -    35 |
   13 |  9116   -97   267    33  -119  1574   -84  8442     -   -38 |
   14 |  3449   -34   141   -68   -65  2685   -66  3486     -    13 |
   15 | -4636   112   -57     -     4     -    93 -4992     -   -87 |
   17 |   928     -   -68     X   151     -  -129   607     -     X |
   18 |  4696    42   130   -64  -121  1598    -6  4695     -   -12 |
   20 |  5842  -136    37   264   -23  1168    71  5940     -   -49 |
   21 |  3390    76   -26    22  -103     -    28  2733     -    43 |
   22 | -2135  -228   -91     7   457  -812   -73 -1631     -  -140 |
   23 | -2679   116   100   101   -54  -612   270 -2196     -  -309 |
   24 |  -971   190  -120    95   -48     -   205  -948     -  -127 |
   25 |    28    86  -172    53   274  6859  -123  -637     -  -148 |
   26 | -2034   146   -23   341    32  -359   -44 -2133     -  -251 |
   27 | -9334  -108   113   247   222 -5780    29 -8633     -  -355 |
   28 | -2919    97    99  -138  -118  8424    51 -2244     -   -36 |
   29 | -1920    79    20    47   -23  1139  -168 -1945     -    14 |
   30 | -1195   122   -75    35   246 -9739  -158 -1176     -  -199 |
   31 |   552    48  -141   229   -59 -3630   159   408     -   -32 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -183     -     -     -     -   -40     -     -   199 |
 ALGO |     -  -157    29     X  -198     -   185     -     -   112 |
 AMC2 |     -  -172     -     -     -     -     -     -     -   147 |
 AOML |     -   103     -     -     -     -     -     -     -   -88 |
 AREQ |     -   -74     -   -86     -     -   -74     -     -   175 |
 ARTU |     -    43     -     -   -36     -     -     -     -     - |
 ASC1 |     -   -27     -     X    23     -     -     -     -     X |
 AUCK |     -    12     -     X     -     -   -55     -     -    49 |
 BAHR |     -   -73    86   105     -     -     -     -     -   -68 |
 BILI |     -  -120     -     -    32     -    67     -     -     - |
 BOR1 |     -   139     -     -     -     -     -     -     -  -119 |
 BRMU |     -    24     -  -166    81     -     -     -     -   -33 |
 BRUS |     -   -64     -     -     -     -    29     -     -    25 |
 CAS1 |     -   -70     -   127   -51     -   -43     -     -   103 |
 CEDU |     -   244     -  -498     -     -     -     -     -     - |
 COCO |     -    50     -  -212   146     -    -6     -     -   -95 |
 CRO1 |     -  -256     -     -     -     -    -5     -     -   223 |
 DARW |     -    60     -     -     -     -   -48     -     -     - |
 DAV1 |     -   -81     -     -   -73     -     -     -     -   143 |
 DRAO |     -   -34    15     -     -     -     -     -     -    14 |
 EISL |     -  -333     -   680     -     -     -     -     -     - |
 FAIR |     -     -    86  -169     -     -     X     -     -   -14 |
 FORT |     -  -381   251     7     -     -     -     -     -     - |
 GALA |     -   -19     -  -199   -35     -   -17     -     -   154 |
 GODE |     -     5     -  -148     -     -     -     -     -    59 |
 GRAZ |     -    38     -  -169     -     -     -     -     -    31 |
 GUAM |     -   347     -  -683   150     -  -172     -     -    37 |
 HARB |     -   -23     -     -    19     -     -     -     -     - |
 HOB2 |     -     1     -   173     -     -     -     -     -   -59 |
 HRAO |     -    32     -     -     -     -  -217     -     -   203 |
 IISC |     -    53     -   174     -     -     -     -     -  -135 |
 KARR |     -   -45     -     -    38     -     -     -     -     - |
 KERG |     -    56     -     -     -     -     -     -     -   -48 |
 KIRU |     -  -127     -   -54     -     -   126     -     -     - |
 KOSG |     -  -101     -     -     -     -     -     -     -    87 |
 KSTU |     -   -45     -     -     -     -     -     -     -    38 |
 KWJ1 |     -  -102     -     -    93     -   -39     -     -    46 |
 LPGS |     -     -     -     -  -149     -   106     -     -     3 |
 MAC1 |     -    45     -   -86  -150     -    83     -     -    58 |
 MATE |     -   -48     -  -259     -     -     X     -     -   158 |
 MCM4 |     -   372     -     -  -260     -     X     -     -   -51 |
 MDO1 |     -     -  -153   135     -     -     -     -     -    99 |
 MEDI |     -  -169     -     -     -     -     -     -     -   144 |
 METS |     -   210     -     -     -     -     -     -     -  -179 |
 MKEA |     -    22    82     0   -53     -   -41     -     -    -3 |
 MSKU |     -  -100     -     -    84     -     -     -     -     - |
 NKLG |     -    -5     -   -27     -     -     -     -     -    15 |
 NLIB |     -  -285     -  -100     -     -     -     -     -   340 |
 NPLD |     -   -59     -     -     -     -     -     -     -    50 |
 NRC2 |     -   233   295  -566     -     -  -368     -     -   134 |
 NTUS |     -  -130     -     -     -     -     -     -     -   111 |
 OHIG |     -    -6     -   -42  -102     -     -     -     -   126 |
 ONSA |     -  -112     -   361   -39     -     -     -     -   -15 |
 PENC |     -   106     -     -     -     -     -     -     -   -90 |
 PETP |     -    25     -     -   -21     -     -     -     -     - |
 POTS |     -    -6     -     -   -35     -     -     -     -    41 |
 REYK |     -    -5     -     -     -     -     -     -     -     4 |
 RIOG |     -  -100     -     -  -170     -    77     -     -   178 |
 SANT |     -   238     -    -1  -191     -     -     -     -    26 |
 SELE |     -   138     -  -282     -     -     -     -     -     - |
 SFER |     -  -186     -     -     -     -     -     -     -   159 |
 STJO |     -  -192   197     -  -161     -     -     -     -   134 |
 SUTH |     -  -246     -    60    76     -     -     -     -    42 |
 THTI |     -     -     -  -125     -     -     -     -     -    52 |
 TSKB |     -    95   184  -596     -     -     -     -     -     - |
 URUM |     -   -27     -     -     -     -     -     -     -    23 |
 USNO |     -   -50   136     -     -     -   -35     -     -   -55 |
 WHIT |     -    21     -     -   -18     -     -     -     -     - |
 WSRT |     -   -73     -    62     -     -     -     -     -    36 |
 WTZR |     -   -97     -    57     -     -   -14     -     -    73 |
 YAR2 |     -     -     -     -     -     -  -142     -     -   154 |
 YELL |     -  -140    78   101     -     -    37     -     -   -36 |
 YSSK |     -    69     -     -     -     -   -54     -     -     - |
 ZWEN |     -   -65     -     -   -72     -     -     -     -   129 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  9003    74    70   117    62  6427    54  9033     -    73 |  288   4.81
    2 |  4795    56    59   177    72     -    57  4783     -   117 |  288   1.40
    3 |  3601    51    91   125    86  2129    71  3679     -    51 |  288   2.13
    4 |  3774    77    64   132    84   585    48  3154     -    60 |  282   0.65
    5 |  5761    85    56    63    21  4631    60  5562     -    68 |  288   2.85
    6 |  7824   155    88   240   158  4746    53  9038     -    91 |  288   7.71
    7 |  2085    56    78   132   153  4824    92  1923     -   106 |  288   1.66
    8 |  5575   148   116    85    91  3134    99  5246     -   166 |  281   2.30
    9 |  3453   258   154   195   117  6165   137  3238     -   148 |  281   2.10
   10 |  4450   104    84   107    59  4794    62  4366     -    83 |  288   1.79
   11 |  1137   104    63   181    36  1121    44  1089     -    62 |  288   0.33
   13 |  2202    95    64   101    46  1013    92  2271     -    80 |  288   0.47
   14 |  1145    48    97   178    69  2131    70  1101     -    65 |  288   0.37
   15 |  5659   162    64     -    60     -    50  5764     -    78 |  280   3.09
   17 |  2524     -    77     X    69     -    69  2686     -     X |  268   2.28
   18 |  1056    47    97   115    57  1436    68  1182     -    47 |  288   0.32
   20 |  1159   105    54    48    76  1100   159  1159     -    37 |  288   0.27
   21 |  5909    70    46   261    35     -    81  5203     -    54 |  288   4.54
   22 |  7248    45    70   273   112  2075    72  6937     -    44 |  288   1.80
   23 |  6144    49    86    95    77  1910    35  6302     -   155 |  288   5.88
   24 |  2799    66    70   219    37     -    58  2602     -   103 |  281   2.07
   25 |  7934   147    37   297   125  2047    81  7941     -    90 |  279   1.33
   26 |  1339    48    80   152    43  1180    82  1416     -    35 |  288   0.86
   27 |  6556   168   101   345   165  8928    66  6181     -   134 |  281   4.16
   28 |  1996    78    68   185    92  3139    81  1383     -    69 |  288   1.49
   29 |  1196    66    42    69    51   951    65  1064     -    48 |  288   0.77
   30 |   668    84    43    57    44  6521    54   888     -    62 |  288   1.00
   31 |  2078    56    39   192    48  4624    90  2289     -    77 |  288   1.95
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    50     -     -     -     -    61     -     -    53 |  288   0.11
 ALGO |     -    65    29     X    21     -    43     -     -    53 |  288   0.07
 AMC2 |     -    30     -     -     -     -     -     -     -    25 |  286   0.03
 AOML |     -    28     -     -     -     -     -     -     -    24 |  257  32.47
 AREQ |     -    32     -    56     -     -    57     -     -    38 |  288  38.37
 ARTU |     -    18     -     -    15     -     -     -     -     - |  287  34.58
 ASC1 |     -    73     -     X    61     -     -     -     -     X |  270    >>>
 AUCK |     -    51     -     X     -     -   166     -     -   156 |  264  20.52
 BAHR |     -    39    33   104     -     -     -     -     -    47 |  288   0.27
 BILI |     -    51     -     -    42     -    60     -     -     - |  287  17.56
 BOR1 |     -    48     -     -     -     -     -     -     -    41 |  286   0.71
 BRMU |     -    62     -    68    28     -     -     -     -    60 |  288  39.57
 BRUS |     -    79     -     -     -     -   103     -     -   102 |  267   0.08
 CAS1 |     -    59     -    98    38     -    46     -     -    23 |  288  10.09
 CEDU |     -    32     -    65     -     -     -     -     -     - |  288  15.83
 COCO |     -    85     -    99   109     -    44     -     -    28 |  288  11.88
 CRO1 |     -    61     -     -     -     -    59     -     -    54 |  288   0.09
 DARW |     -    50     -     -     -     -    40     -     -     - |  274  17.48
 DAV1 |     -    87     -     -    25     -     -     -     -    64 |  287  18.97
 DRAO |     -    48    31     -     -     -     -     -     -    25 |  288   0.05
 EISL |     -    23     -    46     -     -     -     -     -     - |  144  32.05
 FAIR |     -     -    76    70     -     -     X     -     -    90 |  287   0.21
 FORT |     -   102    77   147     -     -     -     -     -     - |  169    >>>
 GALA |     -    40     -    51    48     -    87     -     -    55 |  288  42.65
 GODE |     -   189     -   139     -     -     -     -     -   101 |  288   0.06
 GRAZ |     -    78     -   221     -     -     -     -     -    96 |  285    >>>
 GUAM |     -   112     -   209    59     -    70     -     -    58 |  288  23.93
 HARB |     -    13     -     -    11     -     -     -     -     - |  287   3.94
 HOB2 |     -    44     -    65     -     -     -     -     -    46 |  287   0.10
 HRAO |     -    40     -     -     -     -    35     -     -    38 |  287  35.56
 IISC |     -    48     -    79     -     -     -     -     -    41 |  288  48.69
 KARR |     -    50     -     -    42     -     -     -     -     - |  288  22.77
 KERG |     -    77     -     -     -     -     -     -     -    66 |  285   1.98
 KIRU |     -    90     -    61     -     -    65     -     -     - |  288   3.41
 KOSG |     -    40     -     -     -     -     -     -     -    34 |  286  98.26
 KSTU |     -   143     -     -     -     -     -     -     -   123 |  219  25.33
 KWJ1 |     -   170     -     -   175     -   136     -     -   161 |  245 274.87
 LPGS |     -     -     -     -   219     -   159     -     -   193 |  230    >>>
 MAC1 |     -    28     -   201    31     -    64     -     -    43 |  287  17.74
 MATE |     -    55     -   139     -     -     X     -     -    45 |  287    >>>
 MCM4 |     -    82     -     -    77     -     X     -     -    94 |  288  38.90
 MDO1 |     -     -    17    44     -     -     -     -     -    16 |  250  19.69
 MEDI |     -    47     -     -     -     -     -     -     -    40 |  286   0.13
 METS |     -    35     -     -     -     -     -     -     -    30 |  285  80.12
 MKEA |     -    56   128    52    70     -    70     -     -    35 |  288  53.67
 MSKU |     -   182     -     -   154     -     -     -     -     - |  278  33.04
 NKLG |     -    40     -   109     -     -     -     -     -    62 |  287    >>>
 NLIB |     -   155     -   232     -     -     -     -     -    66 |  224 102.18
 NPLD |     -    27     -     -     -     -     -     -     -    23 |  285   0.06
 NRC2 |     -    71    29    46     -     -    46     -     -    48 |  288   0.05
 NTUS |     -    19     -     -     -     -     -     -     -    16 |  287   6.36
 OHIG |     -    56     -    81    33     -     -     -     -    20 |  288  13.08
 ONSA |     -    31     -   115    50     -     -     -     -    40 |  288   0.41
 PENC |     -    53     -     -     -     -     -     -     -    45 |  285   7.89
 PETP |     -    35     -     -    30     -     -     -     -     - |  287  20.83
 POTS |     -    68     -     -    68     -     -     -     -    40 |  288  15.93
 REYK |     -    58     -     -     -     -     -     -     -    50 |  274  10.76
 RIOG |     -    84     -     -    51     -    81     -     -    45 |  288  16.65
 SANT |     -    38     -    96    56     -     -     -     -    91 |  287  30.76
 SELE |     -    26     -    53     -     -     -     -     -     - |  248  36.65
 SFER |     -   282     -     -     -     -     -     -     -   241 |  287  28.96
 STJO |     -    26    20     -    37     -     -     -     -    33 |  288   2.36
 SUTH |     -    35     -   191    55     -     -     -     -    64 |  288  32.81
 THTI |     -     -     -    65     -     -     -     -     -    27 |  287   2.94
 TSKB |     -    27    79   203     -     -     -     -     -     - |  288   1.99
 URUM |     -    46     -     -     -     -     -     -     -    40 |  288  25.90
 USNO |     -    71    27     -     -     -    41     -     -    60 |  288   0.04
 WHIT |     -    21     -     -    18     -     -     -     -     - |  288  20.08
 WSRT |     -    42     -   118     -     -     -     -     -    45 |  288   0.06
 WTZR |     -    69     -   127     -     -    39     -     -    31 |  288   0.06
 YAR2 |     -     -     -     -     -     -    18     -     -    20 |  270   6.05
 YELL |     -   255   152   109     -     -    69     -     -   120 |  287   0.18
 YSSK |     -    38     -     -     -     -    30     -     -     - |  277  17.38
 ZWEN |     -    55     -     -    30     -     -     -     -    65 |  280  17.84
 -----+-------------------------------------------------------------+--------------
 TOT  |  4571    89    76   147    78  3943    76  4549     -    78 |


 BEST CLOCK FIT: AMC2   286   0.03 (ns) 

