
 GPS week: 1166   Day: 4   MJD: 52410                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  27932     62    -0.01    -0.07     0.06    18.08
 emr |   288     0  12190     19  2086.61    26.20     0.07    14.81
 esa |   288     0  20417   1618  2086.67    26.64     0.08    12.51
 gfz |   288     0  25112    823     0.31    -0.74     0.04    27.00
 igr |   288     0  26311     47     0.08    -0.07     0.04     0.00
 jpl |   288     0  21586    154    -0.11     7.16     0.04    27.59
 ngs |    96     0   2683      0     0.20    -0.16     4.50     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio |
 -----+-------------------------------------------------+
    1 |  -122    -9   213    31    40   -44  3430     - |
    2 |   -90   -85    50    37   -90    52 -2458     - |
    3 |  -134  -125   357    55   -66   -28  3980     - |
    4 |   111  -102  -221   102    -8   -33   256     - |
    5 |   116  -169    40   -31    -6    26 -2705     - |
    6 |    81  -222    22    83  -157   -25 -1890     - |
    7 |   160  -191    29    40   -20   -51  7613     - |
    8 |     6  -107   290    73   -54  -159 -4001     - |
    9 |    37  -178    38    38  -118    18 -2530     - |
   10 |   180  -120  -206     1    -4    47  7271     - |
   11 |   -37   180   338   -23    92  -210  4543     - |
   13 |    22   281   -90    37    10  -162 -2588     - |
   14 |   -27   159   -54   -29   108   -16  3295     - |
   15 |    71  -181     -    52   -91     - -3853     - |
   17 |   108  -242     X    61   -87     -  2842     - |
   18 |  -137     6   463    18   -24  -131  3346     - |
   20 |  -154    51   223   -41   -52    13  3731     - |
   21 |    -9   -14     X   123     7  -109  3191     - |
   22 |  -187  -118   -15   155   -71    42 -6396     - |
   23 |   145  -213     X  -113   -38   173 -3966     - |
   24 |   148  -109  -256    68   -56    12 -2014     - |
   25 |   -79   -89   -27   102    17    15  3198     - |
   26 |     7  -110   115   -23   -86    22  1780     - |
   27 |  -131  -117    23   156  -159   -15  2856     - |
   28 |   -13   129   251   -29    -1  -150 -2287     - |
   29 |     0  -182   125   107   -83   -68  -901     - |
   30 |    51  -128   -45   213   -50  -156 -4077     - |
   31 |   -30   -88     3    15   -33    51-11677     - |
 -----+-------------------------------------------------+
 ALBH |    -9     -     X     -   154     6     -     - |
 ALGO |  -118   159  -141  -108    26   162     -     - |
 ANKR |    74     -  -107     -    18     -     -     - |
 AOML |   -20     -     -  -111     -   121     -     - |
 ARTU |  -112     -     -   399   -95  -317     -     - |
 ASC1 |     -     -     -    64    32   -63     -     - |
 AUCK |   -22     -     X     -    37    15     -     - |
 BAHR |    95   244  -116   -41    38  -101     -     - |
 BILI |    60     -     -  -117  -152    75     -     - |
 BRMU |   -13     -     -   -53  -120    60     -     - |
 CAS1 |   -30     -   112   -52   -14    20     -     - |
 CEDU |  -184     -     -     -  -136   121     -     - |
 CHAT |  -100     -   210   -31    34     -     -     - |
 CRO1 |    41    51   -33     -    32   -39     -     - |
 DARW |   -27     -     -     -     -    17     -     - |
 DAV1 |   -46     -     -   -54     9    93     -     - |
 DRAO |    61   151    39  -142    81     -     -     - |
 DUBO |  -118     -     -     -     -    77     -     - |
 EISL |     -     -   -28    39   256   -26     -     - |
 FAIR |     -   144   -26   -53    38   -18     -     - |
 FORT |    12     -    55   -70   163    37     -     - |
 GALA |   136     -  -276    46    25    -7     -     - |
 GOLD |   -87     -     -    58    12     -     -     - |
 GOUG |     -     -     -     7     -    -7     -     - |
 GRAZ |    66     -   -95     -     -     -     -     - |
 HARB |    81     -     -   -54     -     -     -     - |
 HOB2 |   120     -   -53   -56   129     -     -     - |
 HRAO |   -34     -    28     -    38     9     -     - |
 IISC |  -102     -   -59     9     -    83     -     - |
 IRKT |   172   216   -85   -93     -   -99     -     - |
 KERG |    -5     -     -  -193  -103   192     -     - |
 KIRU |   188     -  -271     -   126     -     -     - |
 KOKB |   -61     -    80     4     -     -     -     - |
 KOSG |    -9     -   109   -44   164     -     -     - |
 KOUR |    22     -   -11    -4    60    -6     -     - |
 KSTU |    90     -     -   -61     -     -     -     - |
 KWJ1 |     -     -     -  -175   -18   171     -     - |
 LAE1 |  -201     -     -     -   -55   132     -     - |
 LHAS |    68     -  -312     8     -    89     -     - |
 LPGS |  -310     -     -   207  -293     -     -     - |
 MAC1 |  -196     -     -     -   -55   129     -     - |
 MADR |   112     -     -   -75    25     X     -     - |
 MALI |   -11     -  -170     X    21    81     -     - |
 MAS1 |    47   145    31   -98    -2   -27     -     - |
 MATE |     -    58     -   -32  -362     -     -     - |
 MCM4 |   157     -    17     -  -298  -112     -     - |
 MDO1 |    86   225  -201   -87   119     -     -     - |
 METS |     4     -     -    -3   -18     -     -     - |
 MKEA |   -44     -    64     -    72     -     -     - |
 MSKU |   -32     -     -    21     -     -     -     - |
 NICO |    24     -     -     -     -   -16     -     - |
 NKLG |    30     -     -   -56   178    36     -     - |
 NLIB |     -     -  -111    52    60     -     -     - |
 NOUM |     -     -     -     7     -    -7     -     - |
 NRC2 |   -10   118  -124     -   -35     -     -     - |
 NRIL |     -     -     -   -79     -    77     -     - |
 NYAL |     -     -   164     -   -30   -74     -     - |
 OHI2 |   -61     -     -    41    59     -     -     - |
 ONSA |   -94     -     -     X     4    62     -     - |
 PERT |    67   101    97     -    24  -142     -     - |
 PIE1 |     7     -   -10     -   104     -     -     - |
 POL2 |    99     -     -     -    -3   -65     -     - |
 POTS |    29     -     -   -19    52     -     -     - |
 RESO |     -     -     -   -19     -    18     -     - |
 REYK |    -6     -   168   -52    61   -22     -     - |
 RIOG |    -9     -     -     6     -     -     -     - |
 SANT |   -27     -    75    89    27  -103     -     - |
 SFER |   -60     -    87     -   137     -     -     - |
 STJO |    34   126     -   -84   -17    -8     -     - |
 SUTH |    15     -   -90    32   189     -     -     - |
 THTI |     -     -     -   151   109  -148     -     - |
 TIDB |   -27     -     -     1     -    16     -     - |
 TIXI |    -5     -     -   -25     -    27     -     - |
 TOW2 |   -75     -     -   -57  -117   105     -     - |
 TRO1 |   -59     -     -    40    75     -     -     - |
 TROM |     -   120  -142     -  -153     -     -     - |
 TSKB |     -   163  -369     -  -111    79     -     - |
 USNO |   -68    53    35     -   -37     -     -     - |
 USUD |    30     -     -   -20    48     -     -     - |
 VILL |    49     -   -70     X    38     -     -     - |
 WES2 |    33     -    49   -45    32     -     -     - |
 WSRT |   -26     -    61   -11   132     -     -     - |
 WTZR |   -75     -   -30   -70    -7   132     -     - |
 YELL |   -26     -  -146   -21   -92   103     -     - |
 YSSK |   158     -     -  -106   -16     -     -     - |
 ZECK |    61     -     -   -41     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |    43    77    95    51    26    25 10466     - |  288   5.28
    2 |    62    73    70    34    54    27  4462     - |  288   3.23
    3 |   180    94   119    42    53    58  3327     - |  287   2.16
    4 |    84    39   165    32    64    44  2779     - |  288   0.70
    5 |    92    83    30    26    47    26  5862     - |  288   2.78
    6 |   160    70   233    44    76    32  8501     - |  286   8.93
    7 |   145    75   193    53    52    79  4282     - |  287   1.82
    8 |    45    90    69    20    34    20  6972     - |  288   4.39
    9 |    40    62    85    40    77    58  5015     - |  288   2.82
   10 |    77    38    51    40    42    43  4337     - |  283   2.15
   11 |    78    35    73    23    69    35   748     - |  288   0.38
   13 |    26    54    76    51    75    18  7810     - |  288   1.04
   14 |    64    41    65    23    44    17   977     - |  288   0.21
   15 |    59    34     -    39    24     -  2450     - |  288   2.62
   17 |    61    94     X    53    64     -  2535     - |  288   3.22
   18 |    93    42   141    31    53    49   991     - |  288   0.40
   20 |   101    51    78    27    35    30   870     - |  288   0.18
   21 |   115   126     X   124    66   111  3903     - |  287   3.99
   22 |    58    64    38    27    54    31  2407     - |  288   2.06
   23 |    79   126     X   121   108    74  6578     - |  282   6.14
   24 |    80    49    89    33    44    32  2476     - |  288   1.53
   25 |    54    44    51    31    46    27  2330     - |  288   1.56
   26 |    90   164    46    26    45    47   774     - |  288   0.65
   27 |    37    92    80    23    34    22  5437     - |  288   2.38
   28 |    67   117    60    37    44    22  3053     - |  288   0.54
   29 |    27    80   118    38    57    43  1268     - |  288   0.50
   30 |    66    55    34    28    44    37  2622     - |  288   1.09
   31 |   161   101   154    53    56    77  2625     - |  287   1.38
 -----+-------------------------------------------------+--------------
 ALBH |    24     -     X     -    25    16     -     - |  288   0.47
 ALGO |    33    51   107    40    15    23     -     - |  288   0.02
 ANKR |    19     -    27     -    16     -     -     - |  288  48.03
 AOML |    40     -     -    31     -    35     -     - |  288  23.05
 ARTU |    34     -     -    22    20    19     -     - |  287  12.12
 ASC1 |     -     -     -    13    17    12     -     - |  269    >>>
 AUCK |    23     -     X     -    29    15     -     - |  264  18.61
 BAHR |    32    16    24    13    26    21     -     - |  288   0.66
 BILI |    38     -     -    26    29    23     -     - |  287  10.18
 BRMU |    28     -     -    23    17    18     -     - |  284  31.41
 CAS1 |   101     -    44    55    15    33     -     - |  288   9.61
 CEDU |    24     -     -     -    31    16     -     - |  288  16.13
 CHAT |    52     -    27    32    20     -     -     - |  287  16.73
 CRO1 |    35    13    85     -    33    27     -     - |  288   0.12
 DARW |    53     -     -     -     -    35     -     - |  285  22.13
 DAV1 |   125     -     -    87    57    72     -     - |  287  24.38
 DRAO |    31    33    32    17    25     -     -     - |  288   0.08
 DUBO |    25     -     -     -     -    17     -     - |  288  13.61
 EISL |     -     -   101    24    28    43     -     - |  288  22.90
 FAIR |     -    74    95   122   101    72     -     - |  288   0.27
 FORT |    28     -    93    35    18    27     -     - |  288   0.23
 GALA |    40     -    30    35    23    32     -     - |  285  27.66
 GOLD |    40     -     -    27    20     -     -     - |  288  19.11
 GOUG |     -     -     -    20     -    20     -     - |  287    >>>
 GRAZ |   106     -   153     -     -     -     -     - |  205  83.70
 HARB |    33     -     -    22     -     -     -     - |  265   5.97
 HOB2 |    54     -    65    36    28     -     -     - |  288   0.06
 HRAO |    20     -    29     -    22    19     -     - |  288  25.12
 IISC |    25     -    41    26     -    32     -     - |  288  31.56
 IRKT |    30    15    26    21     -    15     -     - |  288   0.10
 KERG |    64     -     -    52    34    27     -     - |  287   1.23
 KIRU |    28     -    40     -    43     -     -     - |  288   1.83
 KOKB |    32     -    36    30     -     -     -     - |  288   0.04
 KOSG |    36     -    32    32    14     -     -     - |  288  51.36
 KOUR |    30     -   121    40    19    89     -     - |  288  28.30
 KSTU |    36     -     -    24     -     -     -     - |  281  15.38
 KWJ1 |     -     -     -   173    77   169     -     - |  234 134.53
 LAE1 |    30     -     -     -    40    20     -     - |  278  19.59
 LHAS |    30     -    32    21     -    21     -     - |  288  11.33
 LPGS |   172     -     -   115   152     -     -     - |   97  12.94
 MAC1 |    26     -     -     -    22    17     -     - |  288  14.80
 MADR |    41     -     -    28    40     X     -     - |  131   7.92
 MALI |   103     -   164     X    51    28     -     - |  286    >>>
 MAS1 |    43    45    23    37    13    50     -     - |  288   1.85
 MATE |     -   110     -    60    41     -     -     - |  177   0.14
 MCM4 |   177     -   143     -    53    62     -     - |  277  39.34
 MDO1 |    40    34    21    18    23     -     -     - |  288  19.39
 METS |    44     -     -    30    46     -     -     - |  287   0.27
 MKEA |    30     -    43     -    23     -     -     - |  287  36.55
 MSKU |    35     -     -    24     -     -     -     - |  270  30.37
 NICO |    41     -     -     -     -    27     -     - |  288  12.35
 NKLG |    23     -     -    21    21    18     -     - |  287    >>>
 NLIB |     -     -    32    15    41     -     -     - |  288   0.06
 NOUM |     -     -     -    18     -    17     -     - |  288    >>>
 NRC2 |    44    42    29     -    27     -     -     - |  288   0.07
 NRIL |     -     -     -    18     -    18     -     - |  288   9.88
 NYAL |     -     -    19     -    21     9     -     - |  288   0.15
 OHI2 |    75     -     -    50    45     -     -     - |  285   9.23
 ONSA |    69     -     -     X    82    45     -     - |  284    >>>
 PERT |    53    56    79     -    24    36     -     - |  288  22.81
 PIE1 |    21     -    31     -    32     -     -     - |  288   0.03
 POL2 |    18     -     -     -    16    11     -     - |  288  17.82
 POTS |    56     -     -    37    18     -     -     - |  277  12.05
 RESO |     -     -     -    15     -    15     -     - |  287  11.21
 REYK |    47     -    43    26    12    21     -     - |  288  12.46
 RIOG |    61     -     -    41     -     -     -     - |  276  17.25
 SANT |    38     -   157    34    17    36     -     - |  280  20.36
 SFER |    29     -    41     -    43     -     -     - |  287   0.77
 STJO |    54    35     -    47    21    34     -     - |  288   2.26
 SUTH |    27     -    54    30    29     -     -     - |  288  27.16
 THTI |     -     -     -    26    30    26     -     - |  287   2.57
 TIDB |    21     -     -    45     -    43     -     - |  288   0.12
 TIXI |    42     -     -    38     -    26     -     - |  287   9.41
 TOW2 |    25     -     -    22    25    27     -     - |  287  14.50
 TRO1 |    46     -     -    31    17     -     -     - |  288   9.94
 TROM |     -    48    57     -    44     -     -     - |  288  12.33
 TSKB |     -    34    41     -    37    15     -     - |  288   1.59
 USNO |    38    23    41     -    29     -     -     - |  288   0.05
 USUD |    40     -     -    27    34     -     -     - |  288   0.32
 VILL |    27     -    39     X    30     -     -     - |  253  13.51
 WES2 |    25     -    21    18    53     -     -     - |  288  15.40
 WSRT |    31     -    36    27    26     -     -     - |  288   0.04
 WTZR |    34     -    35    24    17    22     -     - |  288   0.11
 YELL |    55     -    91    76    15   138     -     - |  288   0.05
 YSSK |    32     -     -    21    26     -     -     - |  278  11.97
 ZECK |    24     -     -    16     -     -     -     - |  288  22.88
 -----+-------------------------------------------------+--------------
 TOT  |    64    70    82    45    43    45  4498     - |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

