
 GPS week: 1169   Day: 5   MJD: 52432                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2514      0     0.14    -0.34     4.07     0.00
 cod |   288     0  19611      0    47.56  -153.09     0.06    25.93
 esa |   288     0  15896    945    -0.30    -5.02     0.16    11.57
 gfz |     0     0      0      0     0.00     0.00     0.00     0.00
 igu |    96     0   2284      0     0.32    -0.62     4.01     0.00
 jpl |   284     0  12328      0    -1.06     6.28     0.05    37.44
 ngs |    96     0   2514      0     0.11    -0.24     3.93     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0   7856     35  -162.24   -23.26     0.08    25.06

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -3605     7   -18     --11367   -16 -2735     -    10 |
    2 | -1917     6   128     -     -  -150 -2050     -    35 |
    3 | -8830   -23   237     - -5592   -92 -8221     -    -2 |
    4 | -2182    67  -118     -  -489   116 -2307     -  -107 |
    5 | -2492    60  -112     - -1871    47 -2089     -   -47 |
    6 |  7996   137  -193     - 21599     2  6191     -   -59 |
    7 | -6419    50   -28     --16044     6 -5487     -   -46 |
    8 |  6209    15  -154     -  8625    34  5301     -    30 |
    9 | -5382    -4    72     - -2024    50 -5235     -   -66 |
   10 |  -953    27   147     -  6908    31  -647     -  -121 |
   11 |  3146   -32  -379     -  -552    78  3137     -   148 |
   13 |  6280    42  -416     -   784     7  6039     -   144 |
   14 |  3547   -75    17     -  1153   -38  3660     -    97 |
   15 | -6373   109     -     - -5961   -23 -6170     -   -98 |
   17 | -1027     -     X     -     -   280  -629     -  -418 |
   18 |   380   -78   -89     -  1686    35   847     -    95 |
   20 |  5594   -33  -181     -  1807   115  5634     -    27 |
   21 |  3965   -13     X     -     -   -50  3283     -    58 |
   22 | -2175   -41    33     -  -296   -75 -1921     -    87 |
   23 |  3096    89   -79     -  2174    82  3237     -  -121 |
   24 |  5924   118     1     - 10050    -9  5272     -  -118 |
   25 | -3438   -39  -130     -  -293   -40 -3536     -   132 |
   26 |  -477    53  -125     -    59   177  -388     -  -130 |
   27 | -1336   -48   135     -  4865    66 -1215     -   -45 |
   28 |  8205   -39  -258     -  1829    12  7197     -   151 |
   30 |   852    19   -76     - -3860    26   828     -    -1 |
   31 | -8871   -45   274     --13567   -76 -8080     -     3 |
 -----+-------------------------------------------------------+
 ALBH |     -  -231     -     -     -   161     -     -     - |
 AUCK |     -  -165   370     -     -     -     -     -     - |
 BAHR |     -   -76   171     -     -     -     -     -     - |
 BRMU |     -   285  -639     -     -     -     -     -     - |
 BRUS |     -   -44     -     -     -    31     -     -     - |
 CAS1 |     -    55   131     -     -   -81     -     -     - |
 CEDU |     -   109  -244     -     -     -     -     -     - |
 CHAT |     -    26     X     -     -   -18     -     -     - |
 COCO |     -    45    25     -     -   -40     -     -     - |
 DARW |     -    93     -     -     -   -65     -     -     - |
 DRAO |     -  -128     -     -     -     -     -     -   132 |
 FAIR |     -     -   -45     -     -    14     -     -     - |
 GALA |     -    30   261     -     -  -103     -     -     - |
 GODE |     -   166  -373     -     -     -     -     -     - |
 GOLD |     -    50     -     -     -   -35     -     -     - |
 GUAM |     -    24     -     -     -   -17     -     -     - |
 HOB2 |     -  -126   284     -     -     -     -     -     - |
 HRAO |     -   -27     -     -     -    18     -     -     - |
 IISC |     -    45  -102     -     -     -     -     -     - |
 KOUR |     -    73  -314     -     -    47     -     -     - |
 KSTU |     -   -23     -     -     -    16     -     -     - |
 KWJ1 |     -   -60     -     -     -    42     -     -     - |
 MAC1 |     -   -56    21     -     -    33     -     -     - |
 MAS1 |     -  -123   277     -     -     -     -     -     - |
 MDO1 |     -  -282   633     -     -     -     -     -     - |
 NKLG |     -   -73   163     -     -     -     -     -     - |
 NRC2 |     -   -88   -38     -     -    74     -     -     - |
 NYA1 |     -   256     -     -     -  -177     -     -     - |
 PERT |     -   -26    60     -     -     -     -     -     - |
 PIE1 |     -  -154   345     -     -     -     -     -     - |
 POL2 |     -   -10     -     -     -     7     -     -     - |
 POTS |     -    48  -108     -     -     -     -     -     - |
 RAMO |     -    57     -     -     -   -39     -     -     - |
 REYK |     -    19     -     -     -   -14     -     -     - |
 RIOG |     -    36   -25     -     -   -17     -     -     - |
 SANT |     -   125   193     -     -  -145     -     -     - |
 SEY1 |     -     -  -461     -     -   143     -     -     - |
 SFER |     -  -133   149     -     -    46     -     -     - |
 STJO |     -    94     -     -     -   -65     -     -     - |
 SUTH |     -   -93   209     -     -     -     -     -     - |
 TOW2 |     -    20     -     -     -   -14     -     -     - |
 TSKB |     -     -  -358     -     -   111     -     -     - |
 USNO |     -    -4     -     -     -     3     -     -     - |
 USUD |     -  -122   273     -     -     -     -     -     - |
 WSRT |     -   -84   188     -     -     -     -     -     - |
 WTZR |     -   -91    99     -     -    33     -     -     - |
 WUHN |     -     -   548     -     -  -169     -     -     - |
 YAR2 |     -    -9     -     -     -     6     -     -     - |
 YELL |     -   120   -36     -     -   -75     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6161    57   232     -  4093    60  5929     -    42 |  288   3.32
    2 |  2119    53    72     -     -    25  1999     -    38 |  288   1.52
    3 |  5598    56   136     -  4229    54  5482     -    90 |  280   2.78
    4 |   974    53    97     -   676    28   850     -    45 |  288   0.61
    5 |  3514    54   175     -  3620    24  3698     -    45 |  288   2.13
    6 |  9962    79   187     -  8907    71  9698     -   101 |  282   7.64
    7 |  4384    95   218     -  6899    58  4594     -    55 |  282   0.68
    8 |  6966    41   160     -  5907    39  6835     -    47 |  288   4.94
    9 |  1307    61   145     -  1455    52  1334     -    46 |  288   1.22
   10 |  2298    72   230     -  3332    44  2226     -    74 |  288   2.04
   11 |  1623    67   168     -   555    60  1318     -    43 |  288   0.31
   13 |  1551    57   134     -   630    39  1828     -    52 |  288   0.41
   14 |  1420    91   184     -   949    93  1302     -    78 |  288   0.35
   15 |  4587    55     -     -  6608    28  4518     -    56 |  287   2.92
   17 |  4033     -     X     -     -   143  4324     -   214 |  140   1.58
   18 |  2025    78   204     -  1157    48  1574     -    63 |  288   0.35
   20 |  1209    77    66     -  1061    32  1209     -    95 |  288   0.22
   21 |  4963   121     X     -     -    73  4954     -   163 |  260   3.32
   22 |  3060    48    78     -  1090    50  3066     -    70 |  288   1.09
   23 |  4821    81   233     -  4925    78  4553     -   125 |  271   4.69
   24 |  3785    54   123     -  4280    41  3316     -    85 |  288   2.19
   25 |  3285    89   107     -  2036    40  2989     -   100 |  288   2.11
   26 |  1017    71   143     -   568    50  1086     -    68 |  288   0.40
   27 |  4547    55   195     -  5333    39  4592     -    98 |  288   4.88
   28 |  5030    33    88     -   667    47  4157     -    24 |  288   0.42
   30 |  2640    85   222     -  1892    48  2531     -    29 |  288   0.49
   31 |  2897    74   242     -  6651    66  2279     -    87 |  281   1.54
 -----+-------------------------------------------------------+--------------
 ALBH |     -    29     -     -     -    20     -     -     - |  279   0.10
 AUCK |     -   112   252     -     -     -     -     -     - |  187  12.24
 BAHR |     -    70   157     -     -     -     -     -     - |  288   0.50
 BRMU |     -    36    80     -     -     -     -     -     - |  288  30.52
 BRUS |     -    43     -     -     -    30     -     -     - |  284   0.10
 CAS1 |     -    71   103     -     -    46     -     -     - |  288   7.57
 CEDU |     -    65   145     -     -     -     -     -     - |  288  14.46
 CHAT |     -    50     X     -     -    35     -     -     - |  281  15.35
 COCO |     -    31   131     -     -    36     -     -     - |  288  14.87
 DARW |     -    99     -     -     -    69     -     -     - |  231  18.92
 DRAO |     -    20     -     -     -     -     -     -    21 |  288   0.07
 FAIR |     -     -   255     -     -    79     -     -     - |  225   0.25
 GALA |     -    34    97     -     -    22     -     -     - |  288  24.91
 GODE |     -    61   134     -     -     -     -     -     - |  288  32.95
 GOLD |     -    46     -     -     -    31     -     -     - |  282  20.20
 GUAM |     -    55     -     -     -    38     -     -     - |  219  18.30
 HOB2 |     -    80   179     -     -     -     -     -     - |  288   0.10
 HRAO |     -    38     -     -     -    26     -     -     - |  280  17.47
 IISC |     -    46   103     -     -     -     -     -     - |  287  24.00
 KOUR |     -    57   131     -     -    46     -     -     - |  288  53.68
 KSTU |     -    80     -     -     -    55     -     -     - |  233  13.41
 KWJ1 |     -   118     -     -     -    82     -     -     - |  172  79.33
 MAC1 |     -    71   223     -     -    41     -     -     - |  288  16.00
 MAS1 |     -   109   244     -     -     -     -     -     - |  130   2.64
 MDO1 |     -    74   165     -     -     -     -     -     - |  288  67.38
 NKLG |     -    86   192     -     -     -     -     -     - |  214 269.06
 NRC2 |     -    37   100     -     -    38     -     -     - |  288   0.10
 NYA1 |     -    37     -     -     -    26     -     -     - |  281    >>>
 PERT |     -    51   114     -     -     -     -     -     - |  287  13.88
 PIE1 |     -    56   126     -     -     -     -     -     - |  288   0.04
 POL2 |     -    22     -     -     -    14     -     -     - |  280  11.50
 POTS |     -    41    92     -     -     -     -     -     - |  288  11.88
 RAMO |     -    29     -     -     -    20     -     -     - |  283  20.14
 REYK |     -    44     -     -     -    30     -     -     - |  281  14.13
 RIOG |     -    33   152     -     -    52     -     -     - |  288  13.31
 SANT |     -    33   156     -     -    32     -     -     - |  288  19.19
 SEY1 |     -     -   192     -     -    59     -     -     - |  254  30.06
 SFER |     -    70   130     -     -    26     -     -     - |  287   1.24
 STJO |     -    79     -     -     -    55     -     -     - |  284   2.11
 SUTH |     -   118   265     -     -     -     -     -     - |  275  15.86
 TOW2 |     -    65     -     -     -    45     -     -     - |  279  13.72
 TSKB |     -     -   176     -     -    54     -     -     - |  277   1.03
 USNO |     -    38     -     -     -    26     -     -     - |  278   0.06
 USUD |     -    74   167     -     -     -     -     -     - |  286   0.32
 WSRT |     -    44    99     -     -     -     -     -     - |  288   0.08
 WTZR |     -    40   118     -     -    25     -     -     - |  288   0.11
 WUHN |     -     -   156     -     -    48     -     -     - |  275  23.36
 YAR2 |     -    43     -     -     -    30     -     -     - |  273   3.08
 YELL |     -    55   111     -     -    33     -     -     - |  288   0.10
 -----+-------------------------------------------------------+--------------
 TOT  |  4070    64   161     -  4012    47  3933     -    79 |


 BEST CLOCK FIT: PIE1   288   0.04 (ns) 

