
 GPS week: 1172   Day: 4   MJD: 52452                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  29461    228    -0.29     1.65     0.06    22.47
 emr |   288     0  18460    420   -24.68    -7.37     0.08    14.85
 esa |   288     0  19891   1488   -24.59    -7.43     0.08    14.60
 gfz |   288     0  25902    574     0.05    -0.44     0.05    25.43
 igr |   288     0  27796    208     0.21    -0.15     0.06     0.00
 jpl |   288     0  19120     25    -6.28    -1.20     0.06    22.66
 ngs |    96     0   2475     78     0.14    -0.54     4.61     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio |
 -----+-------------------------------------------------+
    1 |    -9  -148   155   105   -63  -120  4358     - |
    2 |   -77  -269   248    72   -91    15 -8283     - |
    3 |    13  -229   176     4   -44    22 -4257     - |
    4 |    91  -205  -122   123   -72   -19   214     - |
    5 |   -22   -66   179   -59   -10    18 -3652     - |
    6 |   124  -162    46  -100   -97    86 -1484     - |
    7 |    -2  -151    42   142   -75  -103 -3278     - |
    8 |   -76  -125   154    94  -133   -58 -1904     - |
    9 |  -118  -206   259    31   -63    53  6052     - |
   10 |    56   -80    85    -3   -56   -62  3644     - |
   11 |    18    75   -39    52    71  -108  2015     - |
   13 |    38    25     X    20   -44   -94  1951     - |
   14 |   -21    29  -109    65    -8     2   178     - |
   15 |    88  -189     -    33   -47     -  5166     - |
   18 |   -26   -46    84   -25    32    36  6360     - |
   20 |   -43   -17   166   -86   -44    49  6101     - |
   21 |   130   -94     7   -53     8   -15 -3123     - |
   22 |  -143  -159   186    83  -127    40  -815     - |
   23 |    99  -218  -201    44  -101   156  2803     - |
   24 |    94  -132  -108    88   -80   -48 -9028     - |
   25 |   -49  -226     6   193   -75   -31  -566     - |
   26 |    59  -205     X    56   -78    15   531     - |
   27 |   103  -199    63     -  -119    99     X     - |
   28 |   -33    41    74     6    24   -59 -4367     - |
   30 |    -7  -125   104    25   -66    -7  2977     - |
   31 |   -59  -247   271    87  -197   -56 -1516     - |
 -----+-------------------------------------------------+
 ALBH |   118    41  -223     -   227     -     -     - |
 ALGO |  -115   114   -19   -83    -7   144     -     - |
 ANKR |    64     -   -99     -     -     -     -     - |
 ARTU |    38     -     -    29    12   -70     -     - |
 ASC1 |     -     -     -    22     -   -25     -     - |
 AUCK |   -19     -     X     -    58    19     -     - |
 BAHR |   115    31   -44   -49   -61   -52     -     - |
 BJFS |     -    32     -   -88   -29    79     -     - |
 BOR1 |  -115   175     -     -   -37     -     -     - |
 CAS1 |    15     -    64   -50   -86     -     -     - |
 CEDU |   -85     -     -     -    20    85     -     - |
 CHAT |   -30     -    96   -29   -39     -     -     - |
 CHUR |   -44    66     -     -  -111     -     -     - |
 COCO |    47     -    11   119    -2  -187     -     - |
 CRO1 |     7    12   -22     -  -117     -     -     - |
 DARW |    40     -     -     -     -   -40     -     - |
 DAVR |    19     -     -   -91   -23    83     -     - |
 DRAO |    93   130  -258    -8   121     -     -     - |
 EISL |    66     -    -3   -84     -    33     -     - |
 FAIR |   -84    51     -    13    -5    36     -     - |
 GALA |    59     -     2     1     -   -60     -     - |
 GODE |    23    14   -50     -    58     -     -     - |
 GOLD |   -96     -     -    84   -10     -     -     - |
 GOUG |     -     -     -  -142     -   160     -     - |
 GRAZ |     5   129  -138     -   -24     -     -     - |
 HARB |   -72     -     -    63     -     -     -     - |
 HOB2 |   -54   144   123  -167   -17    69     -     - |
 HRAO |     2     -   -22     -    -8    12     -     - |
 IISC |    15     -  -195    17   -58    91     -     - |
 IRKT |   125     0    60   -26     9  -134     -     - |
 JPLM |     -    13     -    -8    83     -     -     - |
 KERG |    -2     X     -    -2   -35     4     -     - |
 KIRU |   113   102  -278     -    99     -     -     - |
 KOKB |   -31   114     -   -46  -109     8     -     - |
 KOSG |    27     -     -   -24   105     -     -     - |
 KOUR |   -38     -    35    32    37   -21     -     - |
 KWJ1 |     -     -     -   -20    -6    22     -     - |
 LAE1 |  -102     -     -   127     -   -42     -     - |
 LPGS |  -140     -     -   124  -116     -     -     - |
 MAC1 |  -132     -     -     -  -144   131     -     - |
 MADR |     X    14     -    -8     X     -     -     - |
 MAS1 |   142     -     X  -125  -143     -     -     - |
 MATE |     0     -     -     0   -65     -     -     - |
 MBAR |   -19     -     -   -35   -34    58     -     - |
 MCM4 |  -167     -   153     X     -    70     -     - |
 MDO1 |     -   219  -330    61   274     -     -     - |
 METS |   -21   142     -   -63    -6     -     -     - |
 MKEA |    21     -   -33     -    31     -     -     - |
 MSKU |   -73     -     -    60   -37    -1     -     - |
 NKLG |     -     -    59   -34     -     -     -     - |
 NLIB |     -   446     X  -260   419     -     -     - |
 NPLD |   -66   100     -     -     6     -     -     - |
 NRC2 |   -19   184  -157     -   135     -     -     - |
 NRIL |     -     -     -   -64     -    71     -     - |
 NYA1 |   169     -     -     X     6  -167     -     - |
 NYAL |     -   108  -110     -    63     -     -     - |
 OHI2 |    32     -     -   -33   -61     5     -     - |
 OS0G |   -18   174   -19   -61    44   -16     -     - |
 PDEL |    -9     -     -     -     -     9     -     - |
 PERT |     -   153     -     -     -  -100     -     - |
 PIE1 |    -1   186  -185     -   164     -     -     - |
 PIMO |   -94     -     -   145     -   -63     -     - |
 POTS |    -1     -     -     1   -33     -     -     - |
 PRDS |   -18    27     -     -     4     -     -     - |
 QAQ1 |   -31     -     -    27     -     -     -     - |
 RESO |   -41     -     -    47     -   -12     -     - |
 REYK |    64     -   130  -131    90     -     -     - |
 RIOG |   -51     -    79     -     -     -     -     - |
 SANT |   -85     -   206   -26   -15   -19     -     - |
 SCH2 |   -73   110     -     -     8     -     -     - |
 SELE |     -     -   324     -     -  -208     -     - |
 SEY1 |     -     -    33   -41   -72    25     -     - |
 SFER |   -79     -   122     -   -11     -     -     - |
 STJO |    35    85  -260    32    91    42     -     - |
 SUTH |     5     -    42   -28    67     -     -     - |
 SUWN |   129  -195     -     -   -39     -     -     - |
 SYOG |    20   118     -   -35     -   -56     -     - |
 THTI |     -     -  -109   314     -  -282     -     - |
 TIDB |    14   117     X    11   -63  -103     -     - |
 TIXI |     1     -     -    -8  -101     8     -     - |
 TOW2 |   -37     -     -    33     -     -     -     - |
 TRO1 |  -108     -     -    96    12     -     -     - |
 TSKB |   -97   -18   102  -103   152   157     -     - |
 TWTF |     -  -107     -    63    58     -     -     - |
 URUM |    55     -     -   -48   200     -     -     - |
 USNO |   200   269  -582     -   303     -     -     - |
 USUD |     -   -29     -    68   116   -57     -     - |
 VILL |   350     -   294  -478   312     -     -     - |
 WES2 |   113     -     -  -100     -     -     -     - |
 WHIT |   -60     -     -     -     -    60     -     - |
 WILL |     1    -2     -     -     9     -     -     - |
 WSRT |   -33   190     3   -84    73     -     -     - |
 WTZR |     -     X    -7   -68    62    79     -     - |
 WUHN |   -84     -     -    74   -83     -     -     - |
 YELL |   -29     -  -144    54   -43    60     -     - |
 YSSK |    18     -     -   -15    14     -     -     - |
 ZWEN |  -132     -  -109   180   -10     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |    74   201   143    41    46    35 11342     - |  284   5.19
    2 |    48    51    87    17    78    19  3500     - |  288   2.00
    3 |    45    62    50    32    54    30  1989     - |  288   1.88
    4 |    84    54   149    33    53    48  1258     - |  288   0.77
    5 |    77    75    27    35    47    97  4590     - |  288   3.43
    6 |   103    61    49    53    62    92 11353     - |  288   9.94
    7 |    57    49    41    30    49    58  2548     - |  288   0.88
    8 |    43    66   116    39    46    40  2551     - |  288   2.46
    9 |    49    72    86    29    66    67  3656     - |  288   2.32
   10 |    66    34    87    36    59    48  5518     - |  288   2.19
   11 |    76    73    93    42    48    25   778     - |  288   0.32
   13 |    21    67     X    44   102    29  1167     - |  288   0.31
   14 |    41    71    72    44    49    51  1238     - |  288   0.32
   15 |    67    66     -    38    99     -  4491     - |  288   2.95
   18 |    66    39    54    40    68    33  1868     - |  288   0.45
   20 |    63    52   100    42    81    30   947     - |  288   0.18
   21 |    65    32   164    55    65    44  2540     - |  288   2.82
   22 |    48    66    27    18    68    26  2340     - |  288   1.61
   23 |    78    37    97    75    52    56  5117     - |  288   6.02
   24 |    72    47   131    48    67    31  5567     - |  288   2.45
   25 |    74   119    52    60    51   103  4894     - |  288   2.68
   26 |   122    77     X    45    73    67  1362     - |  282   0.45
   27 |    50    86   130     -   159    88     X     - |  234  92.73
   28 |    44    57    43    25    52    53  6028     - |  288   0.53
   30 |    54    74    51    26    42    92  4725     - |  288   1.91
   31 |    55    47   173    42    82    34  1495     - |  288   1.53
 -----+-------------------------------------------------+--------------
 ALBH |    59   134    78     -    36     -     -     - |  288   0.12
 ALGO |    48    22    46    39    26    34     -     - |  288   0.04
 ANKR |    17     -    26     -     -     -     -     - |  287  33.20
 ARTU |    37     -     -    17    32    47     -     - |  287  11.43
 ASC1 |     -     -     -    47     -    53     -     - |  271    >>>
 AUCK |    22     -     X     -    51    22     -     - |  264  13.45
 BAHR |    47    39    51    78    22    54     -     - |  288   0.47
 BJFS |     -   156     -   203    77   138     -     - |  288    >>>
 BOR1 |    69   105     -     -    51     -     -     - |  281   0.52
 CAS1 |    84     -   104    22    21     -     -     - |  287   9.57
 CEDU |    23     -     -     -    38    23     -     - |  288  13.01
 CHAT |    43     -    86    28    34     -     -     - |  287  12.24
 CHUR |    43    65     -     -    38     -     -     - |  285   0.52
 COCO |    33     -    78    34    21    67     -     - |  288   8.91
 CRO1 |    29    33    38     -    68     -     -     - |  288   0.11
 DARW |   173     -     -     -     -   172     -     - |  197  14.66
 DAVR |    67     -     -    32    32    51     -     - |  288  24.10
 DRAO |    32    26    30    33    64     -     -     - |  288   0.12
 EISL |   129     -    83    76     -    23     -     - |  285 143.72
 FAIR |    50    18     -    23    24    38     -     - |  286   0.07
 GALA |    31     -    30    21     -    20     -     - |  288  17.90
 GODE |    48    88    47     -    23     -     -     - |  286   0.13
 GOLD |    18     -     -    16    29     -     -     - |  288  19.70
 GOUG |     -     -     -    36     -    40     -     - |  287    >>>
 GRAZ |    72   116   186     -    58     -     -     - |  288 146.84
 HARB |    24     -     -    22     -     -     -     - |  287   5.37
 HOB2 |    55    92    74    23    20    50     -     - |  288   0.05
 HRAO |    52     -    26     -    42    48     -     - |  288  14.37
 IISC |    23     -    49    42    36    59     -     - |  288    >>>
 IRKT |    39    36    57    33    99    39     -     - |  288   0.23
 JPLM |     -   107     -    62    85     -     -     - |  272    >>>
 KERG |    44     X     -    38    38    58     -     - |  287   1.71
 KIRU |    41    82    57     -    50     -     -     - |  288   3.30
 KOKB |    30   140     -    36    56    65     -     - |  288   0.10
 KOSG |    35     -     -    31    23     -     -     - |  284  11.46
 KOUR |    28     -    42    47    37    58     -     - |  288 188.12
 KWJ1 |     -     -     -   135   152   152     -     - |  245 102.70
 LAE1 |    39     -     -    36     -    56     -     - |  287  15.18
 LPGS |    22     -     -    19    67     -     -     - |  150  20.67
 MAC1 |    31     -     -     -    52    31     -     - |  288  12.67
 MADR |     X    86     -    50     X     -     -     - |  225  13.63
 MAS1 |    32     -     X    29    99     -     -     - |  263   2.33
 MATE |    19     -     -    17    19     -     -     - |  288   0.09
 MBAR |    30     -     -    65    35    64     -     - |  288  24.60
 MCM4 |    84     -   179     X     -    62     -     - |  288  53.34
 MDO1 |     -    29    25    16    64     -     -     - |  288   8.03
 METS |    44    85     -    36    24     -     -     - |  287   0.50
 MKEA |    14     -    22     -    38     -     -     - |  283  28.90
 MSKU |    58     -     -    51    39    56     -     - |  282  21.48
 NKLG |     -     -    33    19     -     -     -     - |  286    >>>
 NLIB |     -   113     X    66    85     -     -     - |  203   0.32
 NPLD |    49    74     -     -    34     -     -     - |  285   0.07
 NRC2 |    43    47    43     -    42     -     -     - |  288   0.09
 NRIL |     -     -     -    28     -    32     -     - |  288  16.30
 NYA1 |    43     -     -     X   108    43     -     - |  286   0.13
 NYAL |     -    16    16     -    35     -     -     - |  288   0.13
 OHI2 |   109     -     -    58    37    52     -     - |  288  14.09
 OS0G |    48    69    33    17    24    44     -     - |  288   0.13
 PDEL |    42     -     -     -     -    42     -     - |  288  57.39
 PERT |     -    39     -     -     -    25     -     - |  264  12.89
 PIE1 |    50    82    45     -    51     -     -     - |  288   0.07
 PIMO |    48     -     -    28     -    44     -     - |  194  15.34
 POTS |    75     -     -    66   124     -     -     - |  276  20.99
 PRDS |    58    87     -     -    42     -     -     - |  287   2.71
 QAQ1 |    45     -     -    40     -     -     -     - |  288  18.45
 RESO |    84     -     -    53     -    30     -     - |  287  15.62
 REYK |    28     -    57    48    23     -     -     - |  288  20.22
 RIOG |    47     -    73     -     -     -     -     - |  180  10.73
 SANT |    63     -    40    38    66    45     -     - |  288  13.60
 SCH2 |    34    52     -     -    32     -     -     - |  283   5.85
 SELE |     -     -    50     -     -    32     -     - |   96  30.56
 SEY1 |     -     -   158    80   182    58     -     - |  278  31.36
 SFER |    14     -    22     -    35     -     -     - |  287   1.46
 STJO |    68    41    47    63    24    46     -     - |  288  18.97
 SUTH |    24     -    47    17    48     -     -     - |  288  13.98
 SUWN |    57    86     -     -    46     -     -     - |  285   0.84
 SYOG |    80   110     -    27     -    56     -     - |  288   0.53
 THTI |     -     -    94    33     -    94     -     - |  216   1.32
 TIDB |    38   115     X    44    27    39     -     - |  270   0.19
 TIXI |    51     -     -    29    37    34     -     - |  287  12.43
 TOW2 |    26     -     -    23     -     -     -     - |  288  17.41
 TRO1 |    80     -     -    70    16     -     -     - |  288   9.89
 TSKB |    35    32    55    31    39    26     -     - |  288   0.71
 TWTF |     -   173     -   101    57     -     -     - |  249   1.05
 URUM |    18     -     -    16    39     -     -     - |  236  44.37
 USNO |    33    24    34     -    28     -     -     - |  288   0.06
 USUD |     -    90     -    35    93    30     -     - |  288   0.29
 VILL |    34     -    54    47    22     -     -     - |  288  14.54
 WES2 |    29     -     -    26     -     -     -     - |  276   0.18
 WHIT |    48     -     -     -     -    47     -     - |  288  48.37
 WILL |    73   110     -     -    32     -     -     - |  285   3.52
 WSRT |    42    29    61    31    30     -     -     - |  286   0.05
 WTZR |     -     X    50    26    47    33     -     - |  210   0.13
 WUHN |    57     -     -    50    29     -     -     - |  286  16.00
 YELL |    53     -    40    50    26    41     -     - |  288   0.11
 YSSK |    16     -     -    15    41     -     -     - |  287  16.87
 ZWEN |    17     -    26    15    25     -     -     - |  288  21.39
 -----+-------------------------------------------------+--------------
 TOT  |    56    80    80    49    59    58  4608     - |


 BEST CLOCK FIT: ALGO   288   0.04 (ns) 

