
 GPS week: 1183   Day: 1   MJD: 52526                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  27346    505     0.16     0.29     0.05    19.41
 emr |   288     0  10652      6   458.91    11.48     0.07    13.01
 esa |   288     0  18294   2158   458.87    11.43     0.06    14.54
 gfz |   288     0  25930    206     0.42    -0.79     0.03    36.61
 igr |   288     0  23657    110     0.69    -0.89     0.06     0.00
 jpl |   288     0  20073   1053    -2.46    10.70     0.06    16.43
 ngs |    96     0   2681     16     0.54    -0.77     4.32     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio |
 -----+-------------------------------------------------+
    1 |    -6  -192  -119   229   -13  -247  1241     - |
    2 |     -     -     -   167   -66  -372  7114     - |
    3 |   -26  -210     X    50   -13    88 -2472     - |
    4 |    15  -304   -38    15  -147   243   715     - |
    5 |   -67    16   165    12   -29  -115 -6540     - |
    6 |   -78  -111   -43   -18   -55   259  5684     - |
    7 |   -11  -203    61   213   -97  -398 -3427     - |
    8 |    81  -248    85   175     7  -377  -884     - |
    9 |    -3  -106     3  -101   -87   314 -2040     - |
   10 |    25     5   105   162   -58  -587 -7915     - |
   11 |    81    48    96   -23    90  -170  2768     - |
   13 |   -68   -33     X   -44    76   208  2720     - |
   14 |    80   235   -36   -92   -12   -45  4196     - |
   15 |   -23     6     -    10  -123     -  1933     - |
   17 |   -17   163     X   -49     4     -  2957     - |
   18 |   -10   340    69  -151    64    20  5277     - |
   20 |    -8    -4   -23    95    33  -207  4201     - |
   21 |    26     1     -   -14    10     -  6436     - |
   22 |   -51   -53   236   168   -13  -489  4908     - |
   23 |    54    -7    42   -49   -59    18 -2350     - |
   24 |    38  -181   -96    82   -47     0 -3696     - |
   25 |    36  -114  -222   -15    10   300 -3871     - |
   26 |   -48   -60    84  -146  -123   415 -1311     - |
   27 |    94  -276     8    55   -89     X -2207     - |
   28 |    48    73   239   -51    61  -220  7213     - |
   29 |   -65  -178     -    21    44   190 -4707     - |
   30 |  -159   -77  -130   -72   -95   530 -6991     - |
   31 |    80  -107     X    77    33  -196 -8713     - |
 -----+-------------------------------------------------+
 ALBH |   -76     -  -339     -   130   391     -     - |
 ALGO |  -139   182   229   -78     -   -10     -     - |
 ALIC |   -84     -     -     -     -    99     -     - |
 AMC2 |   -62     -     -     -     3    73     -     - |
 ANKR |    -5     -     7     -   -61     -     -     - |
 AOML |   -85     -     -   -54     -   220     -     - |
 ARTU |    19     -     -    34   -24   -98     -     - |
 ASC1 |    67     -     -   -27   -11   -18     -     - |
 AUCK |    52     -     X     -   130   -61     -     - |
 BAHR |    93     -   -31   -26    38   -25     -     - |
 BILI |    35     -     -   -19   -62     -     -     - |
 BJFS |   -34     -     -    18     -     -     -     - |
 BOGT |     X     -  -244    97     -     X     -     - |
 BOR1 |  -118     -   157     -     -     -     -     - |
 BRMU |     -     -     -  -108  -117   242     -     - |
 CAS1 |     8     -    85   -38     8     -     -     - |
 CHAT |  -258     -   179    66    60     -     -     - |
 COCO |    98     -  -229    57   -14   -39     -     - |
 CRO1 |     -     -    24     -    80   -22     -     - |
 DAVR |    43     -     -   -23    37     X     -     - |
 DRAO |    36   134    -6   -64    54     -     -     - |
 EISL |     -     -     X   111   517  -248     -     - |
 FAIR |   -57     -   136   -77    51   118     -     - |
 FORT |     X     -     -   -97   -26   217     -     - |
 GALA |    70     -  -110     9    30    -3     -     - |
 GODE |    44     -   -58     -    78     -     -     - |
 GOLD |    21     -     -   -11    29     -     -     - |
 GOPE |    21     -   -28     -     -     -     -     - |
 GOUG |     -     -     -   -17     -    38     -     - |
 GRAZ |    51     -   -68     -     -     -     -     - |
 HARB |   132     -     -   -70     -     -     -     - |
 HOB2 |    31   165   -86   -41   -12     -     -     - |
 HRAO |    29     -   156     -  -127  -172     -     - |
 IISC |   -80     -     X   -12  -109   115     -     - |
 INVK |     9     -     -    -5     -     -     -     - |
 IRKT |   198     -   -75    32     -  -240     -     - |
 KELY |   150     -     -     -     -  -177     -     - |
 KERG |     -   115     -   -41     -     -     -     - |
 KIT3 |     -     -     -    10    28   -22     -     - |
 KOSG |   -32     -    17    10     -     -     -     - |
 KOUR |   153     -     -   -70     -   -26     -     - |
 LAE1 |   -70     -     -    10    69    61     -     - |
 LHAS |     -     -  -160    50    59   -49     -     - |
 MAC1 |  -176     -     -     -   -71   207     -     - |
 MAG0 |    30     -     -     -     -   -35     -     - |
 MAS1 |    36     -     -   -19     3     -     -     - |
 MCM4 |     -     -   379     X     -  -336     -     - |
 MDO1 |     -     -   -46    18  -112     -     -     - |
 MKEA |    72     -   -96     -   -38     -     -     - |
 NICO |    -8     -     -     -     -     9     -     - |
 NKLG |     -     -    70  -116    37   196     -     - |
 NLIB |     -     -   -11     4   203     -     -     - |
 NRC2 |    82   321  -268   -51     1     -     -     - |
 NRIL |    57     -     -    -9     7   -39     -     - |
 NTUS |  -100     -     -    13   -15    90     -     - |
 NYA1 |    93     -     -   -49    66     -     -     - |
 NYAL |     -  -136   321     -  -212  -176     -     - |
 OS0G |   -52     -   -27    53   -36   -33     -     - |
 PERT |   -34     -     -     -     -    40     -     - |
 PIE1 |     -   233  -209     -   124     -     -     - |
 POTS |  -106     -     -    56   -30     -     -     - |
 QAQ1 |   109     -     -   -58     -     -     -     - |
 RESO |   -36     -     -    26     -   -15     -     - |
 REYK |  -165     -     X    88   -10     -     -     - |
 RIOG |    24     -     -    14    96   -59     -     - |
 SANT |   -76     -   188   -54   101    44     -     - |
 SCUB |   113     -     -   -60     -     -     -     - |
 STJO |   -52   166     -   -11    48   -44     -     - |
 SUTH |   111     -  -105   -17    18     -     -     - |
 SYOG |   446     -     -  -122     -  -225     -     - |
 THTI |     -     -   114   -45    76     X     -     - |
 TIXI |   -73     -     -    28   -71    24     -     - |
 TOW2 |   -77     -     -    41     -     -     -     - |
 TRO1 |   -43     -     -    23     -     -     -     - |
 TWTF |   105     -     -   -56   165     -     -     - |
 URUM |    -9     -     -    22     -   -39     -     - |
 USNO |   -36   102   -44     -   -22     -     -     - |
 VILL |   -54     -     -    29     -     -     -     - |
 WSRT |   -44     -    20    16    18     -     -     - |
 WTZR |  -154   300   -81   -52   -92   132     -     - |
 WUHN |  -173     -     -  -103   -71   433     -     - |
 YELL |   130     -  -247    28     7    26     -     - |
 YSSK |   -69     -     -    37   -88     -     -     - |
 ZWEN |   -47     -   -20    33    54     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |    83    59   163    28    58    49  5662     - |  288   3.88
    2 |     -     -     -    21   168    47  3896     - |  264   2.10
    3 |    49    98     X    26   138    38  2833     - |  288   1.81
    4 |    83    71    26    30    51    51  1870     - |  288   1.02
    5 |    65    94    45    19    52    25  8703     - |  288   3.40
    6 |    44    52    67    28    42    34  6336     - |  288   6.06
    7 |    50    90    43    17    55    34  1095     - |  288   0.52
    8 |    70    91    48    44    69   105  4013     - |  288   2.49
    9 |    57    75    70    23    56    47  2946     - |  288   2.13
   10 |    83    38   146    37    48    51  2944     - |  288   3.01
   11 |    61    32   149    44    64    55   783     - |  288   0.30
   13 |    50    70     X    19    68    49  1733     - |  288   0.32
   14 |    43   103    89    27   106    38   895     - |  288   0.23
   15 |    72    92     -    15    40     -  3308     - |  287   3.72
   17 |    40    56     X    26   139     -  7293     - |  288   3.25
   18 |    77    66    89    22    32    47  1549     - |  288   0.27
   20 |    60    52    76    20    59    31   961     - |  288   0.22
   21 |    67    86     -    27    35     - 10373     - |  288   3.84
   22 |    63    78    52    32    71    71  4170     - |  288   1.39
   23 |    72    67    90    34    89    34  8192     - |  288   6.74
   24 |    60    59    46    20    26    60  4109     - |  288   2.56
   25 |    49    71    43    21    29    55  3988     - |  288   3.38
   26 |    43    52    38    30    56    33  2036     - |  288   0.78
   27 |    76    76    89    26    81     X  1055     - |  288 204.43
   28 |    60    81    90    27    56    60  1721     - |  288   0.62
   29 |   133   115     -    28   106    73  1068     - |  288   0.39
   30 |    49    72    98    21    56    42  1189     - |  288   1.72
   31 |    50    91     X    15    56    58  2703     - |  288   1.08
 -----+-------------------------------------------------+--------------
 ALBH |    27     -    63     -    37    80     -     - |  288   0.08
 ALGO |    31    23    28    23     -    52     -     - |  288   0.02
 ALIC |    86     -     -     -     -   101     -     - |  288  62.83
 AMC2 |    45     -     -     -    35    54     -     - |  288   0.04
 ANKR |    18     -    23     -    24     -     -     - |  288  31.99
 AOML |    30     -     -     9     -    30     -     - |  288  20.49
 ARTU |    29     -     -    17    13    32     -     - |  288  20.95
 ASC1 |    23     -     -    14    17    23     -     - |  285    >>>
 AUCK |    74     -     X     -    67    87     -     - |  264  18.31
 BAHR |    26     -    24    28    35    55     -     - |  288   0.43
 BILI |    68     -     -    36    27     -     -     - |  287  11.66
 BJFS |    63     -     -    33     -     -     -     - |  287  20.23
 BOGT |     X     -    31    12     -     X     -     - |  178  21.34
 BOR1 |    42     -    56     -     -     -     -     - |  178   0.28
 BRMU |     -     -     -    67    65   149     -     - |  288  48.22
 CAS1 |    44     -    40    19    76     -     -     - |  288   7.86
 CHAT |    72     -    57    20    22     -     -     - |  287  18.99
 COCO |    50     -    78    23    14    95     -     - |  288  11.08
 CRO1 |     -     -    34     -    53    30     -     - |  288  24.57
 DAVR |    32     -     -    17    51     X     -     - |  284 300.33
 DRAO |    35    38    56    25    27     -     -     - |  286   0.08
 EISL |     -     -     X    12    36    26     -     - |  226  24.01
 FAIR |    34     -    33    23    12    73     -     - |  288   0.11
 FORT |     X     -     -    45    31   101     -     - |  281 331.59
 GALA |    45     -    54    38    45    43     -     - |  288  26.07
 GODE |    13     -    18     -    30     -     -     - |  288   0.13
 GOLD |    46     -     -    25    72     -     -     - |  282  20.72
 GOPE |    13     -    17     -     -     -     -     - |  288  17.35
 GOUG |     -     -     -    15     -    33     -     - |  287    >>>
 GRAZ |    41     -    55     -     -     -     -     - |  287    >>>
 HARB |    27     -     -    15     -     -     -     - |  287   5.62
 HOB2 |    48    30    30    27    93     -     -     - |  288   0.13
 HRAO |    27     -    35     -    33    34     -     - |  288  31.70
 IISC |    89     -     X    84    90    97     -     - |  260    >>>
 INVK |    37     -     -    20     -     -     -     - |  288  14.88
 IRKT |    60     -    53    23     -    24     -     - |  288   0.19
 KELY |    45     -     -     -     -    53     -     - |  258   7.54
 KERG |     -    53     -    19     -     -     -     - |  287    >>>
 KIT3 |     -     -     -     8    25    18     -     - |  288 118.87
 KOSG |    30     -    29    21     -     -     -     - |  288  40.65
 KOUR |    29     -     -    33     -   102     -     - |  276  31.09
 LAE1 |    29     -     -    23    21    50     -     - |  287  24.70
 LHAS |     -     -    30     9    15    21     -     - |  288  12.55
 MAC1 |    94     -     -     -    38   111     -     - |  288  14.16
 MAG0 |    53     -     -     -     -    63     -     - |  287  11.96
 MAS1 |    39     -     -    21    24     -     -     - |  263   2.34
 MCM4 |     -     -    70     X     -    62     -     - |  206  11.52
 MDO1 |     -     -    21     8    32     -     -     - |  288   8.71
 MKEA |    32     -    42     -    37     -     -     - |  287  41.18
 NICO |    22     -     -     -     -    26     -     - |  288  17.06
 NKLG |     -     -    90    26    29    40     -     - |  287 121.91
 NLIB |     -     -   113    45   108     -     -     - |  215 274.15
 NRC2 |    31    27    37    26    19     -     -     - |  288   0.08
 NRIL |    72     -     -    39    47    65     -     - |  288  15.16
 NTUS |    63     -     -    18    26    75     -     - |  288  13.07
 NYA1 |    32     -     -    17    26     -     -     - |  288   0.06
 NYAL |     -    14    29     -    25    31     -     - |  288   0.05
 OS0G |    29     -    23    13    24    27     -     - |  288   0.14
 PERT |    76     -     -     -     -    90     -     - |  288  16.65
 PIE1 |     -    43    39     -    22     -     -     - |  288   0.04
 POTS |    18     -     -     9    17     -     -     - |  288  11.69
 QAQ1 |    43     -     -    23     -     -     -     - |  286  11.09
 RESO |    53     -     -    22     -    87     -     - |  287  13.42
 REYK |    35     -     X    19    26     -     -     - |  270  12.71
 RIOG |    23     -     -    29    44    61     -     - |  285  14.98
 SANT |    38     -    62    39    31    35     -     - |  288  24.99
 SCUB |    24     -     -    12     -     -     -     - |  288  17.69
 STJO |    41    23     -    27    33    30     -     - |  288  23.94
 SUTH |    30     -    67    23    24     -     -     - |  288  31.21
 SYOG |    52     -     -    32     -    58     -     - |  265   0.67
 THTI |     -     -    32    13    57     X     -     - |  277   5.03
 TIXI |    53     -     -    19    31    51     -     - |  287  12.34
 TOW2 |    38     -     -    20     -     -     -     - |  288  15.55
 TRO1 |    34     -     -    18     -     -     -     - |  288  10.64
 TWTF |    45     -     -    24    80     -     -     - |  287   0.37
 URUM |    22     -     -    18     -    21     -     - |  288  19.87
 USNO |    21    23    18     -    27     -     -     - |  288   0.06
 VILL |    51     -     -    27     -     -     -     - |  252   9.21
 WSRT |    37     -    35    23    34     -     -     - |  288   0.05
 WTZR |    19    22    28    12    17    26     -     - |  288   0.14
 WUHN |    26     -     -    27    21    47     -     - |  287  33.16
 YELL |    47     -    57    24    74    72     -     - |  288   0.03
 YSSK |    47     -     -    25    25     -     -     - |  287  13.52
 ZWEN |    26     -    21    13    13     -     -     - |  288  22.50
 -----+-------------------------------------------------+--------------
 TOT  |    51    67    64    27    56    60  4317     - |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

