
 GPS week: 1192   Day: 2   MJD: 52590                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  32441    323     0.63    -0.80     0.05    24.59
 emr |   288     0  19408     61  1250.88     9.47     0.08    16.06
 esa |   288     0  19080   1977  1251.46     9.34     0.10    10.84
 gfz |   288     0  27629    251     0.67    -0.86     0.06    22.22
 igr |   288     0  28733     93     0.11    -0.24     0.06     0.00
 jpl |   288     0  21785    139     3.70    -3.65     0.05    26.30
 ngs |    96     0   2578     21     0.88    -1.37     4.56     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio |
 -----+-------------------------------------------------+
    1 |    23   -57   317     7    15  -113 -3747     - |
    2 |    37   -47   219   110    39  -197 -2896     - |
    3 |   -49  -249   101    35   -81   125 -4254     - |
    4 |   -51  -345  -280    38  -177   341  1364     - |
    5 |   143  -104    73   117    70  -201  5732     - |
    6 |    68  -315    51   128   -27     -  1565     - |
    7 |   142   -14   306   163     2  -374  -705     - |
    8 |   140   -25   315   104    10  -314-12776     - |
    9 |    48  -318   -63    -6   -33   183 -6356     - |
   10 |   194   -51   214   290   -38  -486 -1384     - |
   11 |     6   196   270   -61    88  -189  1737     - |
   13 |    14    71    20   -76    72     -  5905     - |
   14 |    90    89   160   -67    98  -149  4313     - |
   15 |   123   -86     -   202    45  -233  5045     - |
   17 |   120  -207   283   156   -16  -234 -4545     - |
   18 |    56   -69   323   -74   -81   -81  4570     - |
   20 |   105    38   114     6    91  -177  4800     - |
   22 |   145   172     X   156    50  -713 -3478     - |
   23 |   104  -211   199   -67   -56     5  1776     - |
   24 |    85  -252   -86    51   -61    67  4390     - |
   25 |   -64  -172   -66  -106    41   306 -5200     - |
   26 |   -69  -405    57   -43  -141   328  -159     - |
   27 |   -33  -125   125    99    10   -29  2427     - |
   28 |    79   200   -65   -19     0  -154  5658     - |
   29 |   -79  -392     -    69   -81   258 -2790     - |
   30 |   -45  -364  -119   -30   -92   344   145     - |
   31 |    -6    72   165    24    43  -115 -5354     - |
 -----+-------------------------------------------------+
 ALBH |  -109   -63     -     -   121   139     -     - |
 ALGO |  -113   152  -384    10     -   162     -     - |
 AMC2 |  -153     2     -     -   -50   142     -     - |
 AOML |  -173     -     -   -87     -   236     -     - |
 ARTU |     3     -     -    17    94   -17     -     - |
 ASC1 |    -2     -    -3   -45   -95    41     -     - |
 AUCK |     0     -     X     -   -84     0     -     - |
 BAHR |    93   282  -181  -143   -10   -63     -     - |
 BILI |    17     -     -   -19   -32     -     -     - |
 BJFS |     -   127     -  -126   118    29     -     - |
 BOR1 |  -158   242     -     -   -81     -     -     - |
 BRMU |   -92     -     -  -195  -118   251     -     - |
 BRUS |   -65   100     -     -    36     -     -     - |
 CAS1 |    11     -    83   -52    39     -     -     - |
 CEDU |   -17     -     -     -   -37    15     -     - |
 CHAT |   -58     -   183   -25    75     -     -     - |
 CHUR |   -51    79     -     -   -87     -     -     - |
 COCO |    79     -  -128    11   -49   -31     -     - |
 CRO1 |    -7   -15     -     -   177    14     -     - |
 DAEJ |   -47    72     -     -  -366     -     -     - |
 DAVR |    65     -     -    -9    53   -53     -     - |
 DGAR |     -     -  -225     -     -    93     -     - |
 DRAO |   -74    11   226   -36   -23     -     -     - |
 EISL |   -19     -  -377    -4   -66   186     -     - |
 FAIR |     -    69  -127   -78   -90    70     -     - |
 FORT |     X     -    39  -299  -155   246     -     - |
 GODE |   -92   141     -     -    84     -     -     - |
 GOLD |   -57     -     -    63    62     -     -     - |
 GOUG |     -     -     -   -61     -    52     -     - |
 GRAZ |  -111   304  -195     -     -     -     -     - |
 GUAM |     -     -     -  -115   -20    97     -     - |
 HARB |    31     -     -   -34     -     -     -     - |
 HERS |   -39    59     -     -   234     -     -     - |
 HOB2 |    22   175  -325     8  -201     -     -     - |
 HRAO |   -15     -     6     -     4    12     -     - |
 IISC |    94     -  -116   -18   -12   -25     -     - |
 INVK |   -25     -     -    28     -     -     -     - |
 IRKT |    78    89   216   -37   -73  -186     -     - |
 JAB1 |   -75     -     -     -   -88    70     -     - |
 JPLM |     -   -87     -    63   384     -     -     - |
 KERG |   112   -90     -  -188  -285   109     -     - |
 KIRU |    -4   160  -180     -   159     -     -     - |
 KOKB |     -   231   -22   -13     -  -121     -     - |
 KOSG |   -42     -     -    46   175     -     -     - |
 KOUR |    11     -    83   119    66  -145     -     - |
 LHAS |     5     -  -103   -30   -61    64     -     - |
 MAC1 |   -30     -     -     -   -68    28     -     - |
 MADR |     -    48     -   -34  -118     -     -     - |
 MAG0 |    22     -     -     -     -   -21     -     - |
 MAS1 |    53     -   -25   -47   187     -     -     - |
 MATE |   195     -     -  -216   358     -     -     - |
 MCM4 |   147  -406     X   320   -99  -398     -     - |
 MDO1 |    37  -110     X    36    87     -     -     - |
 METS |   -47   123     -   -34   173     -     -     - |
 MKEA |    -1     -     1     -   -51     -     -     - |
 NICO |   -33     -     -     -    48    31     -     - |
 NKLG |    98     -     -   160     -  -224     -     - |
 NLIB |    41     -   -41   -25   112     -     -     - |
 NOUM |     -     -     -   192     -  -162     -     - |
 NRC2 |   129   174  -712    79   -19     -     -     - |
 NRIL |  -215     -     -    27   132   135     -     - |
 NTUS |  -168     -     -    17     -   142     -     - |
 NYA1 |    26     -     -   -29    84     -     -     - |
 NYAL |     -   107   -31     -  -156   -50     -     - |
 OHI2 |    10     -     -   -88   -47    65     -     - |
 OS0G |    18   163   -11  -173   -65    35     -     - |
 PERT |  -116    67    63     -   134    42     -     - |
 PIE1 |    -1    36   -52     -   -48     -     -     - |
 POTS |    33     -  -142    33    47     -     -     - |
 QAQ1 |    50     -     -   -56     -     -     -     - |
 RABT |    86     -     -     -     -   -80     -     - |
 RESO |    17     -     -   -19     -     -     -     - |
 REYK |   -44     -     -    25   -17    21     -     - |
 RIOG |    26     -     -   -28   -78     -     -     - |
 SANT |     3     -     X   -32    21    24     -     - |
 SCH2 |   -17    25     -     -   167     -     -     - |
 SCUB |   -19     -     -    22     -     -     -     - |
 SELE |   -75     -   621     -   208  -186     -     - |
 SFER |   -70   108     -     -     4     -     -     - |
 STJO |     -   -17     -   -18   201    26     -     - |
 SUTH |    79     -   104  -139   -13     -     -     - |
 THTI |     -     -   -59  -238  -160   225     -     - |
 THU3 |    14     -     -   -16     -     -     -     - |
 TIDB |    54    20     X     X     -   -63     -     - |
 TIXI |    26     -     -   -72    27    37     -     - |
 TLSE |   -22    33     -     -     7     -     -     - |
 TOW2 |     4     -     -   -80   -55    63     -     - |
 TRO1 |   -93     -     -   103   151     -     -     - |
 TSKB |    28    64    76   -71   -14   -37     -     - |
 TWTF |    37  -210     -    25   128    66     -     - |
 URUM |   -16     -     -    17   -11     -     -     - |
 USNO |   -15    22     -     -   -21     -     -     - |
 USUD |   134   -55     -  -109    57     -     -     - |
 VILL |  -425     -  -530   689     -     -     -     - |
 WES2 |   -17   146  -305    75    -9     -     -     - |
 WILL |   -34    52     -     -   116     -     -     - |
 WSRT |   -97   167   142   -82   -96     -     -     - |
 WTZR |  -134   249  -159  -161   -99   176     -     - |
 YELL |   -51     -  -158   -27  -138   127     -     - |
 YSSK |   120     -     -  -132    75     -     -     - |
 ZECK |   -53     -     -    59     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |    40    39   179    29    31    40 10128     - |  288   5.53
    2 |    80    83    42    27    56    30  6294     - |  288   2.88
    3 |   139    52    72    58    74    89  4531     - |  285   1.93
    4 |    57    56   131    36    61    34   955     - |  288   0.74
    5 |    69    32    82    46    71    43  6161     - |  288   2.88
    6 |   120   162    59    80    80     -  9999     - |  282   8.66
    7 |   142   144   151   145   159   140  1409     - |  287   0.98
    8 |    31    81    93    21    47    43  8392     - |  259    >>>
    9 |    51    41    98    45    40    33  4635     - |  288   2.37
   10 |    75    32    47    41    58    37  3029     - |  288   2.15
   11 |    41    67    80    32    67    18  1294     - |  288   0.30
   13 |    43    37   150    58    66     -  1899     - |  288   0.21
   14 |    51    76   168    41    53    50  1111     - |  288   0.25
   15 |    46    34     -    44    46    26  4236     - |  288   2.05
   17 |    50    30    59    32    45    19  2163     - |  288   2.61
   18 |    71    33   162    57    71    41  1121     - |  288   0.46
   20 |    81    49    96    31    83    41   918     - |  288   0.19
   22 |    56    78     X    46   114   119  4096     - |  288   2.44
   23 |    81    64   186   136    90    81  7479     - |  288   6.65
   24 |    49    49   146    24    73    35  4029     - |  288   3.33
   25 |    70   113    45    42   115   140  5279     - |  288   2.71
   26 |    39    41    29    33    69    32   549     - |  288   0.47
   27 |    34    55    81    22    49    36  3374     - |  288   1.09
   28 |    50    33   119    22    50    24  1224     - |  288   0.31
   29 |    57    45     -   118    85    49   889     - |  288   0.66
   30 |    79    45    28    53    47    40  1535     - |  288   0.96
   31 |    63    56   261    56    84    53  3912     - |  286   1.40
 -----+-------------------------------------------------+--------------
 ALBH |    33    87     -     -    25    29     -     - |  288   0.12
 ALGO |    27    15    35    29     -    29     -     - |  288   0.04
 AMC2 |    24    71     -     -    32    34     -     - |  288   0.09
 AOML |    17     -     -    39     -    32     -     - |  288  32.86
 ARTU |   125     -     -    83    34    59     -     - |  285    >>>
 ASC1 |    19     -    44    21    35    21     -     - |  270    >>>
 AUCK |   100     -     X     -    53    94     -     - |  264  17.37
 BAHR |    42    53    22    27    35    22     -     - |  288   0.45
 BILI |    29     -     -    32    21     -     -     - |  286    >>>
 BJFS |     -   117     -    84   157    62     -     - |  288    >>>
 BOR1 |    38    59     -     -    42     -     -     - |  279   0.63
 BRMU |    31     -     -    43    71    40     -     - |  288  24.36
 BRUS |    43    65     -     -    35     -     -     - |  287   0.06
 CAS1 |    46     -    39    58    21     -     -     - |  288   8.13
 CEDU |    35     -     -     -    50    33     -     - |  288  18.73
 CHAT |    30     -    40    26    41     -     -     - |  287  13.16
 CHUR |    81   124     -     -    73     -     -     - |  234   0.91
 COCO |    25     -    60    35    31    22     -     - |  288  24.62
 CRO1 |    43   134     -     -    55    69     -     - |  284  32.08
 DAEJ |    46    70     -     -    92     -     -     - |  287   1.64
 DAVR |    74     -     -    36    20    43     -     - |  288  29.03
 DGAR |     -     -    79     -     -    33     -     - |  219  11.61
 DRAO |    13    27    22    28    54     -     -     - |  288   0.11
 EISL |    65     -   106    63    71    30     -     - |  246  48.88
 FAIR |     -    68   297   109    49    28     -     - |  275   0.36
 FORT |     X     -   151   150    80   142     -     - |  286  42.20
 GODE |    66   101     -     -    32     -     -     - |  285   0.09
 GOLD |    22     -     -    25    49     -     -     - |  288  22.97
 GOUG |     -     -     -    18     -    16     -     - |  287    >>>
 GRAZ |    36    75    87     -     -     -     -     - |  282  30.62
 GUAM |     -     -     -    28    23    24     -     - |  288  21.44
 HARB |    36     -     -    40     -     -     -     - |  286  11.11
 HERS |    47    72     -     -    48     -     -     - |  240  20.01
 HOB2 |    50    89    91   130    34     -     -     - |  288   0.09
 HRAO |    33     -    31     -    23    32     -     - |  288   3.43
 IISC |    29     -    82    27    24    20     -     - |  288  36.39
 INVK |    45     -     -    50     -     -     -     - |  262  11.53
 IRKT |    44    47    66    34    57    21     -     - |  288   0.22
 JAB1 |    31     -     -     -    26    29     -     - |  288  23.77
 JPLM |     -    61     -    44    71     -     -     - |  275    >>>
 KERG |    54    39     -    69    39    29     -     - |  287   1.22
 KIRU |    34    88    88     -    38     -     -     - |  288 130.29
 KOKB |     -    58    38    31     -    31     -     - |  288   0.10
 KOSG |    34     -     -    38    13     -     -     - |  288  30.07
 KOUR |    34     -    31    42    26    46     -     - |  285   1.26
 LHAS |    26     -    74    20    45    11     -     - |  288  10.56
 MAC1 |    51     -     -     -    28    48     -     - |  288  15.73
 MADR |     -   134     -    97    62     -     -     - |  269  28.83
 MAG0 |    30     -     -     -     -    28     -     - |  287    >>>
 MAS1 |    59     -   114    50    54     -     -     - |  280   3.10
 MATE |    79     -     -    87    20     -     -     - |  133   1.33
 MCM4 |    53   145     X   118    76    72     -     - |  287    >>>
 MDO1 |    76   108     X   121    74     -     -     - |  288  24.38
 METS |    25    81     -    47    33     -     -     - |  287   1.49
 MKEA |    25     -    56     -    34     -     -     - |  284  52.76
 NICO |    23     -     -     -    25    21     -     - |  286  13.78
 NKLG |    30     -     -    29     -    25     -     - |  287    >>>
 NLIB |    14     -    28    15    51     -     -     - |  288   0.04
 NOUM |     -     -     -    20     -    17     -     - |  287    >>>
 NRC2 |    19    18    30    26    24     -     -     - |  288   0.12
 NRIL |    42     -     -    43    34    42     -     - |  281  16.96
 NTUS |    22     -     -    18     -    25     -     - |  288  14.80
 NYA1 |    41     -     -    45    75     -     -     - |  288   0.09
 NYAL |     -    29    48     -    84    21     -     - |  272   0.24
 OHI2 |    46     -     -    61    18    28     -     - |  288  15.19
 OS0G |    32    92    42    26    24    36     -     - |  288   0.44
 PERT |    26    77    30     -    78    52     -     - |  252  15.46
 PIE1 |    25    22    77     -    30     -     -     - |  288   0.04
 POTS |    26     -    38    24    17     -     -     - |  288  15.20
 QAQ1 |    25     -     -    28     -     -     -     - |  288  17.55
 RABT |    26     -     -     -     -    24     -     - |  210  19.38
 RESO |    32     -     -    35     -     -     -     - |  283  13.29
 REYK |    36     -     -    30    27    35     -     - |  288  12.07
 RIOG |    66     -     -    73    63     -     -     - |  261  14.47
 SANT |    25     -     X    28    20    23     -     - |  288  10.79
 SCH2 |    52    79     -     -    43     -     -     - |  269  34.44
 SCUB |   102     -     -   113     -     -     -     - |  281  28.17
 SELE |    31     -    54     -    51    12     -     - |  288  41.06
 SFER |    21    32     -     -    69     -     -     - |  285 623.05
 STJO |     -    31     -    58    40    35     -     - |  288  25.79
 SUTH |    42     -    49    56    62     -     -     - |  288  29.78
 THTI |     -     -    66    27    40    29     -     - |  287   1.59
 THU3 |    25     -     -    27     -     -     -     - |  255   8.71
 TIDB |    51   142     X     X     -    65     -     - |  246   0.19
 TIXI |    43     -     -    21    23    34     -     - |  287    >>>
 TLSE |    29    45     -     -    42     -     -     - |  285   0.53
 TOW2 |    45     -     -    25    23    32     -     - |  285  22.75
 TRO1 |    47     -     -    52    37     -     -     - |  288  11.37
 TSKB |    41    27    78    40    77    24     -     - |  288   1.11
 TWTF |    37   103     -    63    75    51     -     - |  288   0.39
 URUM |    17     -     -    18    33     -     -     - |  288  13.08
 USNO |    10    15     -     -    48     -     -     - |  288   0.04
 USUD |    45   112     -    39    82     -     -     - |  288    >>>
 VILL |    31     -   107    29     -     -     -     - |  243   5.98
 WES2 |    57   160    76    62    71     -     -     - |  288   0.08
 WILL |    55    85     -     -    35     -     -     - |  279   1.40
 WSRT |    35    76    47    25    32     -     -     - |  288   0.05
 WTZR |    27    99    51    41    19    29     -     - |  288   0.07
 YELL |   107     -   125    79    93   163     -     - |  288 352.65
 YSSK |    21     -     -    23    30     -     -     - |  287  17.18
 ZECK |    43     -     -    47     -     -     -     - |  287  15.40
 -----+-------------------------------------------------+--------------
 TOT  |    53    77    98    57    59    52  4557     - |


 BEST CLOCK FIT: PIE1   288   0.04 (ns) 

