
 GPS week: 1193   Day: 6   MJD: 52601                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2580      0    -0.06     0.92     4.38     0.00
 cod |   288     0  23539    169     0.32     0.29     0.07    18.55
 emr |   288     0  17276      6  1391.73    14.49     0.07    20.18
 esa |   288     0  17396    342     0.65     0.63     0.11    12.25
 gfz |   288     0  15392     24    -0.02     0.34     0.06    22.33
 igu |    96     0   2484      0    -0.06     0.93     4.38     0.00
 ngs |    96     0   2580      0    -0.06     0.92     4.00     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |    49     0   4018     99 -5571.79   -45.41     0.07    26.69

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  1658   -36  -105    91   122     -   981     -  -232 |
    2 |   289   -97  -125   161   105  5261   596     -     X |
    3 | -2566    34  -287   105   245 -4906 -3001     -  -319 |
    4 | -6126    95   -77    91   -23  2728 -5294     -  -179 |
    5 |  5131    61  -174   106    73 13541  3582     -  -119 |
    6 |  2503   307  -213   -79   101 14105  2588     -  -354 |
    7 |   -28   -39     9   134   -30 -3371    25     -   -88 |
    8 |   449   -59   -10    31    62  7081   176     -  -107 |
    9 | -1373   -27   -69   193    -4   706 -1231     -   -88 |
   10 | -2006    95   -73    46     6 -2627 -1951     -  -217 |
   11 |  3335    25   -20   188  -106 -2099  3403     -     2 |
   13 |  4931    51   130   -48  -104  -641  4919     -  -144 |
   14 |  3300    -1    58  -185   -64   873  3536     -   559 |
   15 |  -848    88  -184     -   115  5837  -606     -  -113 |
   17 |  -381  -178     6   114   135  3381     3     -  -438 |
   18 |  4246    47   -37   181  -112 -1976  4194     -    31 |
   20 |  5617    77     9    88   -90   550  5493     -  -149 |
   22 | -1385   -30  -168   -27   220 -7664 -1005     -  -145 |
   23 | -6323   141  -103    14    -8 -2707 -6421     -  -120 |
   24 | -5191   195   -69   -33   -49 -3796 -5098     -  -165 |
   25 |  1402    15  -210    36   182  9493  1519     -  -124 |
   26 | -1877    92   -34    79   -67 -3327 -1492     -  -108 |
   27 |  2160   -93   -33   -12   148-20803  1742     -  -171 |
   28 |   849   -67   120  -257   105  3231  1225     -   -78 |
   29 |  -748     1  -156   108    88 -1185  -720     -   -29 |
   30 |  -660    37  -126    68    86 -2726  -860     -  -196 |
   31 | -6534    -3   -82    16   116 -9036 -6497     -  -229 |
 -----+-------------------------------------------------------+
 ALBH |     -   -28    -1     -     -     -     -     -   116 |
 AUCK |     -   126     -  -177     -     -     -     -   -28 |
 BAHR |     -    32    95   -53   -67     -     -     -   -80 |
 BJFS |     -     -   149     -  -222     -     -     -   432 |
 BOGT |     -   216     -  -331     -     -     -     -     9 |
 BOR1 |     -  -113    71     -     -     -     -     -   144 |
 BRMU |     -   -60     -    -6   100     -     -     -  -251 |
 CAS1 |     -    87     -    74   -71     -     -     -  -205 |
 CHAT |     -    -9     -   -39     -     -     -     -   143 |
 CHUR |     -   -59    10     -     -     -     -     -   571 |
 COCO |     -    62     -  -230    94     -     -     -   -95 |
 CRO1 |     -   -52   -36     -     -     -     -     -   346 |
 DAVR |     -    55     -     -   -64     -     -     -    88 |
 DRAO |     -   -59    64     -     -     -     -     -   -44 |
 EISL |     -    57     -     X   -69     -     -     -   107 |
 FAIR |     -     -    55   -52   -31     -     -     -    51 |
 FORT |     -   333     -  -211   -71     -     -     -  -111 |
 GODE |     -  -146   105     -     -     -     -     -   126 |
 GUAM |     -    14     -   -85    48     -     -     -   -64 |
 GUAT |     -    98     -     -  -123     -     -     -   204 |
 HERS |     -  -143    25     -     -     -     -     -   446 |
 IISC |     -    34     -    26   -48     -     -     -    25 |
 JPLM |     -     -    98     -  -112     -     -     -   110 |
 KARR |     -    -7     -     -     6     -     -     -     - |
 KERG |     -   -74    82     -    -3     -     -     -   -47 |
 KOKB |     -   -77    71     -     -     -     -     -     - |
 KOUR |     -   -30     -    25     -     -     -     -    45 |
 MAC1 |     -   179     -   -45  -180     -     -     -   281 |
 MADR |     -    42   -38     -     -     -     -     -     - |
 MAS1 |     -   -62   104  -120    35     -     -     -   -56 |
 MATE |     -    49     -   -76     -     -     -     -     5 |
 MDO1 |     -    58   200  -450     -     -     -     -   -85 |
 MEDI |     -   -95    62     -     -     -     -     -   116 |
 METS |     -  -156   114     -     -     -     -     -   136 |
 MKEA |     -   160     -   -31   -91     -     -     -  -124 |
 NRC2 |     -     -  -112   391  -125     -     -     -    61 |
 OHI2 |     -    38     -     -   -31     -     -     -     - |
 OS0G |     -  -137    59   120    14     -     -     -   -95 |
 PIE1 |     -     9   227  -261     -     -     -     -  -368 |
 POTS |     -   -75     -    34     -     -     -     -   217 |
 RBAY |     -    20     -     -  -103     -     -     -   459 |
 RESO |     -   -26     -     -    22     -     -     -     - |
 RIOG |     -   128     -   -28   -85     -     -     -   -25 |
 SANT |     -   -16     -    64     -     -     -     -  -112 |
 SCH2 |     -  -178   124     -     -     -     -     -   227 |
 SELE |     -  -256     -   381     -     -     -     -    10 |
 SFER |     -   -98    60     -     -     -     -     -   135 |
 SUTH |     -    62     -  -103     -     -     -     -    22 |
 THTI |     -     -     -   206   -93     -     -     -  -101 |
 TIDB |     -   -35    62   140  -104     -     -     -     - |
 TLSE |     -  -160    94     -     -     -     -     -   236 |
 TRO1 |     -  -112     -     -    93     -     -     -     X |
 TSKB |     -     7    47   -61     -     -     -     -   -74 |
 TWTF |     -    18   -85     -     -     -     -     -   312 |
 USNO |     -   -91    97     -     -     -     -     -   -61 |
 USUD |     -    77  -111    47     -     -     -     -    42 |
 VILL |     -    52     -  -142     -     -     -     -   174 |
 WES2 |     -     -     5    -8     -     -     -     -     - |
 WILL |     -   -23    -6     -     -     -     -     -   120 |
 WSRT |     -  -129   185   -77     -     -     -     -   -87 |
 WTZR |     -   -17   211  -320     -     -     -     -     7 |
 WUHN |     -     -  -129   103     -     -     -     -   170 |
 YAKT |     -   -62    13     -     -     -     -     -   197 |
 YELL |     -   -21     -    13     -     -     -     -    54 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6208    51    25   131    93     -  5739     -    57 |  288   3.11
    2 |  5190    63    50    92    36  5058  5541     -     X |  288   3.79
    3 |  7143   205    93    92   188  5632  6873     -    79 |  280   2.48
    4 |  4361    88    41   124    40  1510  3956     -    46 |  288   0.73
    5 |  7694    41    35    70    36  9876  6387     -    34 |  288   4.17
    6 | 13044   205    95   241   151  7725 10767     -    81 |  278   9.67
    7 |  1357   231   196   176   122  1666  1315     -   157 |  281   0.81
    8 |  5627    77    58    50    92  4723  5200     -    29 |  288   5.25
    9 |  2443    84    88   141    57  2013  2375     -    28 |  288   1.80
   10 |  3070    62    28    28    37  1896  3024     -    54 |  288   3.09
   11 |   991    62    31    49    52   922   915     -    15 |  288   0.44
   13 |   776   100    30    93    53   376   743     -    48 |  288   0.24
   14 |   767    87    84    70   109   354   789     -   140 |  288   0.18
   15 |  4133    50    28     -    40  4198  4463     -    43 |  288   3.57
   17 |  2981    98    73   144    66  2602  3124     -    86 |  288   2.28
   18 |  1082    70    27    51    34   942  1076     -    41 |  288   0.49
   20 |   966    99    51   168    72   699   958     -    48 |  288   0.22
   22 |  4132    64    30    45    23  3504  4097     -    45 |  288   2.78
   23 |  5776    78    83    85    48  3761  5733     -    35 |  288   6.11
   24 |  1902   110    82   122   104  2172  1991     -    44 |  288   1.81
   25 |  2259    60    52    28    60  3548  2120     -    34 |  288   1.89
   26 |  1383    34   104    74    49  1375  1034     -    32 |  288   0.57
   27 |  3039    55    46   170    71 12253  2889     -    43 |  288   1.57
   28 |  1277    55    69   167    40  2603  1215     -    28 |  288   0.27
   29 |   581    41    96    56    67  1558   650     -    29 |  288   0.74
   30 |  2283    50    33    59    18  2517  2122     -    58 |  288   0.84
   31 |  2531   200    53    86   133  4155  2534     -    62 |  281   1.80
 -----+-------------------------------------------------------+--------------
 ALBH |     -    65    62     -     -     -     -     -    35 |  282   0.24
 AUCK |     -   141     -   227     -     -     -     -    61 |  188  12.74
 BAHR |     -    37    35    30    20     -     -     -    25 |  288   0.38
 BJFS |     -     -    76     -    53     -     -     -   145 |  288    >>>
 BOGT |     -    46     -    66     -     -     -     -    26 |  288  40.84
 BOR1 |     -    57    44     -     -     -     -     -    40 |  283   0.70
 BRMU |     -   104     -   126    64     -     -     -    85 |  288  30.87
 CAS1 |     -    80     -    95    41     -     -     -    62 |  288   7.63
 CHAT |     -    60     -    70     -     -     -     -    49 |  286  11.29
 CHUR |     -   111    38     -     -     -     -     -   306 |  253   0.67
 COCO |     -    22     -    42    17     -     -     -    31 |  288  26.53
 CRO1 |     -    77   115     -     -     -     -     -   117 |  270  25.20
 DAVR |     -    45     -     -    34     -     -     -    25 |  287  16.38
 DRAO |     -    21    19     -     -     -     -     -    33 |  287   0.10
 EISL |     -    45     -     X    31     -     -     -    31 |  273  26.28
 FAIR |     -     -    37    56    20     -     -     -    25 |  288   0.08
 FORT |     -    56     -    73    48     -     -     -    62 |  288   0.10
 GODE |     -    73    74     -     -     -     -     -    42 |  285   0.18
 GUAM |     -    28     -    43    26     -     -     -    30 |  288  28.09
 GUAT |     -    30     -     -    26     -     -     -    68 |  282    >>>
 HERS |     -    97    48     -     -     -     -     -   142 |  244  36.07
 IISC |     -    21     -    28    21     -     -     -    14 |  288  30.79
 JPLM |     -     -   103     -    85     -     -     -    84 |  275    >>>
 KARR |     -    35     -     -    29     -     -     -     - |  288  12.21
 KERG |     -    78    48     -    37     -     -     -    23 |  287   1.45
 KOKB |     -    69    64     -     -     -     -     -     - |  284   0.10
 KOUR |     -    94     -   137     -     -     -     -    56 |  285   3.00
 MAC1 |     -    89     -    70    29     -     -     -    77 |  288  14.73
 MADR |     -    48    44     -     -     -     -     -     - |  173  16.77
 MAS1 |     -    21    36    44    27     -     -     -    19 |  288   1.31
 MATE |     -    17     -    28     -     -     -     -    15 |  288   0.09
 MDO1 |     -    43    46    82     -     -     -     -    49 |  281  22.54
 MEDI |     -    61    49     -     -     -     -     -    30 |  284   0.11
 METS |     -    32    31     -     -     -     -     -    36 |  285   0.52
 MKEA |     -    72     -    97    27     -     -     -    40 |  288  46.82
 NRC2 |     -     -    45    30    40     -     -     -    26 |  288   0.02
 OHI2 |     -    36     -     -    30     -     -     -     - |  288  18.54
 OS0G |     -    29    43    23    25     -     -     -    33 |  288   0.15
 PIE1 |     -    93   151   345     -     -     -     -   118 |  288 110.25
 POTS |     -    38     -    33     -     -     -     -    77 |  287  16.88
 RBAY |     -    50     -     -    99     -     -     -   169 |  278  31.11
 RESO |     -    22     -     -    18     -     -     -     - |  287  10.25
 RIOG |     -    40     -   208    93     -     -     -    29 |  276  14.77
 SANT |     -    26     -    30     -     -     -     -    53 |  286   6.70
 SCH2 |     -    87    59     -     -     -     -     -   142 |  286  13.22
 SELE |     -    12     -    17     -     -     -     -     7 |  288  25.56
 SFER |     -    94    96     -     -     -     -     -    59 |  284 677.07
 SUTH |     -    33     -    51     -     -     -     -    38 |  287  18.40
 THTI |     -     -     -    53    27     -     -     -    37 |  287   2.62
 TIDB |     -    33    53    39    33     -     -     -     - |  240   0.09
 TLSE |     -    48    48     -     -     -     -     -    79 |  283   0.82
 TRO1 |     -    21     -     -    17     -     -     -     X |  288  36.16
 TSKB |     -    35    14    42     -     -     -     -    36 |  288   1.24
 TWTF |     -    59    82     -     -     -     -     -   108 |  288   0.36
 USNO |     -    41    35     -     -     -     -     -    40 |  284   0.03
 USUD |     -    40    61    52     -     -     -     -    29 |  288  20.96
 VILL |     -    66     -    76     -     -     -     -    61 |  287   4.89
 WES2 |     -     -   129   213     -     -     -     -     - |  280   0.14
 WILL |     -    47    52     -     -     -     -     -    30 |  281   1.67
 WSRT |     -    34    49    39     -     -     -     -    41 |  288   0.05
 WTZR |     -    53    68    43     -     -     -     -    17 |  284   0.11
 WUHN |     -     -    37    66     -     -     -     -    59 |  158  22.29
 YAKT |     -    27    44     -     -     -     -     -    53 |  288   0.28
 YELL |     -    56     -    63     -     -     -     -    55 |  288   0.05
 -----+-------------------------------------------------------+--------------
 TOT  |  4378    75    68   107    65  4379  4005     -    66 |


 BEST CLOCK FIT: NRC2   288   0.02 (ns) 

