
 GPS week: 1193   Day: 3   MJD: 52598                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  31834    906    -0.10    -0.07     0.05    20.30
 emr |   288     0  20298    101  1347.13    13.07     0.07    14.88
 esa |   288     0  19664   1536  1346.59    12.99     0.09    10.58
 gfz |   288     0  28366    332    -0.34     0.41     0.04    30.14
 igr |   288     0  29440    555     0.03    -0.08     0.05     0.00
 jpl |   288     0  22380    299   -10.76    -0.54     0.05    24.11
 ngs |    96     0   2586      0    -0.04     0.02     4.07     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio |
 -----+-------------------------------------------------+
    1 |    44   -93    43    58   -35   -76 -5969     - |
    2 |    94    33     X    67   167  -183 -8036     - |
    3 |     X  -159    24    34   -20    87  1083     - |
    4 |  -101  -303  -114   -39  -184   370  -264     - |
    5 |   154  -161   137    62   -31  -178  6678     - |
    6 |     X  -364  -128    98  -131   180 -3647     - |
    7 |    76   -39   167   188    23  -325   443     - |
    8 |   100   -34    93   181    17  -362 -4875     - |
    9 |    53  -412    15    73  -115   120   792     - |
   10 |   160   -17    69   279   -91  -510 -1297     - |
   11 |     4    33   214    16    25  -150  6531     - |
   13 |  -102   -83  -183   -58   -67   307  4630     - |
   14 |    76   -72    12    22   -38   -52  4737     - |
   15 |   119   -98     -   142  -142  -237 -1509     - |
   17 |    94   -90    86    39  -158  -106  -529     - |
   18 |    29   -98   153    -6   -39   -24  4003     - |
   20 |    97   -61   113    55    10  -171  3273     - |
   22 |    22    70   207    94   111  -271  4803     - |
   23 |   144  -217  -157    21  -122    56 -1443     - |
   24 |    59  -169  -152    48  -128    61 -3129     - |
   25 |   -52  -223   -86  -111   -46   363  2934     - |
   26 |   -80  -326     X   -52  -121   345  -368     - |
   27 |    -9  -172   107   121   -54   -90  -423     - |
   28 |    73    23   -35    57    58  -138   -13     - |
   29 |   -68  -348     -    87  -167   197  -643     - |
   30 |   -43  -305   -91   -36   -77   343 -3557     - |
   31 |   -23   -23   190     8     9   -54 -4363     - |
 -----+-------------------------------------------------+
 ALBH |    -9   116     -     -    37   -62     -     - |
 ALGO |  -115   -32   589   -98  -105   -21     -     - |
 AMC2 |  -132   180     -     -   -12     -     -     - |
 ANKR |   -35     -    68     -     -     -     -     - |
 AOML |  -160     -     -    43   121    81     -     - |
 ARTU |     -     -     -    47    80   -59     -     - |
 ASC1 |   136     -     -   -14  -179   -97     -     - |
 AUCK |    18     -     X     -    -6   -15     -     - |
 BAHR |   -57   128    33   -55   -43    23     -     - |
 BILI |    87     -     -   -59   -62     0     -     - |
 BJFS |     -   204     -  -258   118   120     -     - |
 BOGT |   154     -  -179   -38     -     X     -     - |
 BRAZ |    11     -     -    -7     -     -     -     - |
 BRMU |    31     -     -   -21   -42     -     -     - |
 BRUS |   -46    63     -     -   128     -     -     - |
 CAS1 |   -43     -   117   -12    13     -     -     - |
 CEDU |  -156     -     -     -   -47   132     -     - |
 CHAT |    -2     -    22    -6    70     -     -     - |
 CHUR |   126  -172     -     -  -180     -     -     - |
 COCO |    56     -  -220   116   -37   -96     -     - |
 CRO1 |    70    97     -     -   100  -114     -     - |
 DAEJ |  -115   156     -     -    -2     -     -     - |
 DAVR |  -163     -     -     7   -85   128     -     - |
 DRAO |     2    92   -85   -17    -5     -     -     - |
 DUBO |   -30     -     -     -     -    25     -     - |
 EISL |     -     -     -   -50   -54    63     -     - |
 FAIR |     -    66    48   -96   -19    58     -     - |
 FORT |   129     -     X  -234     X   192     -     - |
 GODE |   -66    90     -     -   106     -     -     - |
 GOLD |  -106     -     -    71     1     -     -     - |
 GRAZ |   -21   179  -221     -   239     -     -     - |
 GUAM |    -3     -     -   -83   -85   106     -     - |
 GUAT |   -16     -     -     -    81    14     -     - |
 HERS |   -36    49     -     -   295     -     -     - |
 HOB2 |   -27    11   163  -103    39    74     -     - |
 HRAO |   -14     -  -145     -    95    76     -     - |
 IISC |     1     -  -237   -25     -   135     -     - |
 INVK |    -2     -     -     1     -     -     -     - |
 IRKT |     -   141   162   -75     -   -65     -     - |
 JAB1 |  -159     -     -     -   -94   134     -     - |
 JPLM |     -   114     -   -56   201     -     -     - |
 KERG |   -69    26     -    -7   -77    52     -     - |
 KGN0 |     -    30     -     -   134   -19     -     - |
 KIRU |  -102    91   109     -    87     -     -     - |
 KOKB |     -   263  -179   -26   207   -50     -     - |
 KOSG |  -103     -     -    69   216     -     -     - |
 KOUR |    27     -  -120   109    45  -108     -     - |
 KSTU |   -81     -     -    55     -     -     -     - |
 LHAS |     -     -  -161    56   670     -     -     - |
 MAC1 |   -11     -     -  -171  -104   216     -     - |
 MADR |    35  -127     -    34   -41     -     -     - |
 MAS1 |   -15   103   -77   -14    -5     -     -     - |
 MATE |    98     -     -   -66   -60     -     -     - |
 MCM4 |  -137     -   703   170  -463  -337     -     - |
 MDO1 |   -45   214  -166   -14   165     -     -     - |
 METS |   -92   155     -    -9    82     -     -     - |
 MIZU |     -    -7     -     4  -112     -     -     - |
 MKEA |   180     -  -346     -    23     -     -     - |
 NKLG |  -114     -    84    74  -122   -38     -     - |
 NLIB |     -     -   -18     6     -     -     -     - |
 NOUM |     -     -     -   170     -  -213     -     - |
 NRC2 |    -3    82   250  -127    97     -     -     - |
 NRIL |    -5     -     -   -57    -3    72     -     - |
 NTUS |  -178     -     -    31  -183   112     -     - |
 NYA1 |    64     -     -   -35   116   -10     -     - |
 NYAL |     -  -183   258     -  -132     -     -     - |
 OHI2 |    59     -     -   -57   -77    22     -     - |
 OS0G |   -50    17    96    45   -17   -67     -     - |
 PERT |    -4   189  -259     -   -57     -     -     - |
 PETP |     -     -     -   -49     -    61     -     - |
 PIE1 |    -7    91  -114     -   -84     -     -     - |
 POTS |     -     -   -88    31   109     -     -     - |
 QAQ1 |   -20     -     -    14     -     -     -     - |
 RESO |    22     -     -   -32     -    23     -     - |
 REYK |   113     -  -100   -35   101     -     -     - |
 RIOG |    18     -     -   -12   -64     -     -     - |
 SANT |   -32     -   -12   -64   -35   112     -     - |
 SCUB |   154     -     -  -104     -     -     -     - |
 SELE |   340     -  -772     -    22     5     -     - |
 SFER |     7    92     -     -   160   -62     -     - |
 STJO |     -    27     -    -8   190    -7     -     - |
 SUTH |   136     -  -288    10   439     -     -     - |
 THTI |     -     -  -201   -22  -146   116     -     - |
 THU3 |    -2     -     -     2   -28     -     -     - |
 TIDB |    78   -60     X     X   -30   -28     -     - |
 TIXI |   164     -     -  -110     -     -     -     - |
 TLSE |   -46    63     -     -   170     -     -     - |
 TOW2 |   -39     -     -    -7   -54    42     -     - |
 TSKB |    40    77    18   -52   -17   -24     -     - |
 TWTF |   -19   -55     -   -11   197    56     -     - |
 URUM |    29     -     -   -19   -16     -     -     - |
 USN1 |     -   530     -     -   169  -327     -     - |
 USNO |    19    94  -169     -     6     -     -     - |
 USUD |    -8    80     -   -32   -46     -     -     - |
 VILL |     X     -   754  -265     X     -     -     - |
 WES2 |   -96    45   101     9     -     -     -     - |
 WILL |   -52    71     -     -    95     -     -     - |
 WSRT |   -51   196   -36   -50   -49     -     -     - |
 WTZR |   -76   165  -252     0   -63    75     -     - |
 WUHN |  -212    24     -   131  -149     -     -     - |
 YAKT |    23  -106     -     -    17    46     -     - |
 YAR2 |   -24     -     -     -    80    21     -     - |
 YELL |   -10     -   142   -44    87     1     -     - |
 YSSK |    36     -     -   -24    10     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |    38    65   183    29    46    32  4486     - |  288   4.03
    2 |   125    73     X    31    97    64  3226     - |  288   3.15
    3 |     X    89    60    56   111    44  3462     - |  281   2.57
    4 |    61    45   131    36    75    25  1449     - |  288   0.69
    5 |    73    69   137    26    54    44  6152     - |  288   3.25
    6 |     X    38   101    28    63    19 11476     - |  278  10.59
    7 |   169    59   135    57    78    67  1379     - |  288   0.82
    8 |    34    43    86    28    82    40  9065     - |  288   5.63
    9 |    39    87   149    29    76    24  1895     - |  288   1.77
   10 |    72    73   101    22    43    44  3814     - |  288   3.46
   11 |    64    40   126    36    58    40   866     - |  288   0.29
   13 |    40    57   185    39    38    31   768     - |  288   0.27
   14 |    44    69    68    39    64    32   836     - |  288   0.26
   15 |    74    41     -    67    45    31  4872     - |  288   2.20
   17 |    56    48    73    22    70    33  3769     - |  287   3.24
   18 |    71    74   128    56    51    46  1144     - |  288   0.40
   20 |    95    55    47    17    42    50   971     - |  288   0.19
   22 |    66    73    78    29    55    38  2863     - |  288   2.48
   23 |    80    78    99    28    39    50  7905     - |  288   6.49
   24 |    64    45    76    35    57    58  1187     - |  288   1.63
   25 |    43    92    83    31    38    48  2151     - |  288   1.41
   26 |    38    59     X    29    86    55  1083     - |  288   0.77
   27 |    38    48    95    21    76    40  1730     - |  288   1.68
   28 |    60    61   176    24    66    61  2521     - |  288   0.68
   29 |    35    56     -    37   109    57  1595     - |  288   1.27
   30 |    73    71    49    19    38    41  1648     - |  288   1.24
   31 |    83    36    53    70    56    60  1895     - |  286   1.75
 -----+-------------------------------------------------+--------------
 ALBH |    62   109     -     -    27    23     -     - |  288   0.07
 ALGO |    31    13    36    19    32    20     -     - |  288   0.05
 AMC2 |    42    58     -     -    26     -     -     - |  281   0.07
 ANKR |    17     -    32     -     -     -     -     - |  288  18.66
 AOML |    42     -     -    22    33    27     -     - |  288  34.07
 ARTU |     -     -     -     9    16    12     -     - |  288  15.69
 ASC1 |    25     -     -    17    28    15     -     - |  270    >>>
 AUCK |    67     -     X     -    25    57     -     - |  260  17.08
 BAHR |    37    29    40    23    17    20     -     - |  288   0.65
 BILI |    49     -     -    24    18    64     -     - |  287  12.94
 BJFS |     -    91     -    92    92   100     -     - |  286    >>>
 BOGT |    56     -    83    17     -     X     -     - |  288  38.38
 BRAZ |    18     -     -    12     -     -     -     - |  261    >>>
 BRMU |    50     -     -    34    60     -     -     - |  285  21.82
 BRUS |    39    53     -     -    29     -     -     - |  288   0.06
 CAS1 |    84     -   102    25    31     -     -     - |  288   8.32
 CEDU |    27     -     -     -    49    23     -     - |  288 167.45
 CHAT |    53     -    84    20    19     -     -     - |  287  14.90
 CHUR |    37    51     -     -    32     -     -     - |  172   0.48
 COCO |    24     -    77    28    13    23     -     - |  288  17.33
 CRO1 |    49   134     -     -    36    46     -     - |  287  32.12
 DAEJ |    47    65     -     -    55     -     -     - |  287   2.25
 DAVR |    75     -     -    36    37    32     -     - |  288  25.11
 DRAO |    21    19    81    34    24     -     -     - |  288   0.08
 DUBO |    20     -     -     -     -    17     -     - |  287  11.52
 EISL |     -     -     -    34    27    43     -     - |  230  47.83
 FAIR |     -    15    39    12    23    24     -     - |  288   0.06
 FORT |    77     -     X    39     X    93     -     - |  288    >>>
 GODE |    53    72     -     -    41     -     -     - |  284   0.28
 GOLD |    37     -     -    25    29     -     -     - |  287  25.53
 GRAZ |    46    55    80     -    33     -     -     - |  287    >>>
 GUAM |    28     -     -    23    16    24     -     - |  288  23.89
 GUAT |    20     -     -     -    34    17     -     - |  285    >>>
 HERS |    50    69     -     -    48     -     -     - |  235  28.42
 HOB2 |    45    72    63    28    23    25     -     - |  288   0.08
 HRAO |    40     -    36     -    17    35     -     - |  288   4.66
 IISC |    37     -    37    32     -    17     -     - |  288  30.80
 INVK |    22     -     -    14     -     -     -     - |  287  12.45
 IRKT |     -    18    88    14     -    27     -     - |  288   0.32
 JAB1 |    33     -     -     -    21    28     -     - |  272  28.05
 JPLM |     -   142     -    70    69     -     -     - |  272    >>>
 KERG |    64    48     -    89    23    82     -     - |  283   2.74
 KGN0 |     -    49     -     -    35    30     -     - |  283   0.25
 KIRU |    63    58   126     -    72     -     -     - |  288   1.63
 KOKB |     -   101    68    35    72    47     -     - |  288   0.06
 KOSG |    47     -     -    32    20     -     -     - |  288 113.61
 KOUR |    39     -   158    41    27    33     -     - |  287   1.99
 KSTU |    91     -     -    62     -     -     -     - |  275  10.35
 LHAS |     -     -    34    12    22     -     -     - |  164  11.07
 MAC1 |    76     -     -    38    35    42     -     - |  286  18.01
 MADR |    88   117     -    50    66     -     -     - |  282  25.87
 MAS1 |    25    27    38    23    12     -     -     - |  288   2.33
 MATE |    21     -     -    14    25     -     -     - |  288   0.17
 MCM4 |    77     -   107    34    34    31     -     - |  288  11.67
 MDO1 |    31    80    38    26    23     -     -     - |  288  27.74
 METS |    73    66     -    52    44     -     -     - |  287   0.54
 MIZU |     -   102     -    50   104     -     -     - |  215   0.46
 MKEA |    38     -    72     -    46     -     -     - |  255  53.43
 NKLG |    18     -    76    21    28    24     -     - |  287    >>>
 NLIB |     -     -    37    13     -     -     -     - |  247   0.03
 NOUM |     -     -     -    18     -    22     -     - |  288    >>>
 NRC2 |    33    23    35    16    13     -     -     - |  288   0.02
 NRIL |    76     -     -    36    55    37     -     - |  258  11.96
 NTUS |    76     -     -    27    17    75     -     - |  288  12.91
 NYA1 |    59     -     -    30    17    43     -     - |  288   0.07
 NYAL |     -    19    26     -    40     -     -     - |  276   0.06
 OHI2 |    79     -     -    56    47    22     -     - |  288  10.44
 OS0G |    37    20    48    24    15    20     -     - |  288   0.31
 PERT |    37    43    74     -    16     -     -     - |  288  13.55
 PETP |     -     -     -   175     -   219     -     - |  212  19.47
 PIE1 |    11    18    34     -    14     -     -     - |  288   0.05
 POTS |     -     -    21     7    46     -     -     - |  288  17.96
 QAQ1 |    28     -     -    19     -     -     -     - |  286   9.93
 RESO |    35     -     -    19     -    37     -     - |  277  11.77
 REYK |    37     -    89    19    15     -     -     - |  277   9.31
 RIOG |    30     -     -    20    40     -     -     - |  287  13.39
 SANT |    33     -    68    17    36    18     -     - |  288   5.36
 SCUB |    51     -     -    34     -     -     -     - |  287  28.48
 SELE |    24     -    38     -    54    19     -     - |  288  29.67
 SFER |    31    24     -     -    23    15     -     - |  287   0.50
 STJO |     -    12     -    15    10    17     -     - |  288  26.49
 SUTH |    24     -    44    23    18     -     -     - |  288  25.37
 THTI |     -     -    54    16    24    17     -     - |  287   2.22
 THU3 |    34     -     -    23    13     -     -     - |  271   8.86
 TIDB |    61   176     X     X    66    65     -     - |  184   0.09
 TIXI |    36     -     -    24     -     -     -     - |  287  10.40
 TLSE |    54    73     -     -    38     -     -     - |  249   0.57
 TOW2 |    22     -     -    25    38    31     -     - |  287  12.80
 TSKB |    29    35    87    21    28    31     -     - |  288   2.34
 TWTF |    40   113     -    33    49    40     -     - |  288   0.56
 URUM |    11     -     -     8    20     -     -     - |  288 100.18
 USN1 |     -    59     -     -    39    36     -     - |  271   0.04
 USNO |    20    23    22     -    34     -     -     - |  288   0.02
 USUD |    27   112     -    42    44     -     -     - |  288  24.38
 VILL |     X     -    36    13     X     -     -     - |  287   7.64
 WES2 |    49   121    42    31     -     -     -     - |  288   0.05
 WILL |    51    70     -     -    35     -     -     - |  280   1.06
 WSRT |    28    86    42    33    40     -     -     - |  288   0.04
 WTZR |    34    75    53    24    19    21     -     - |  288   0.03
 WUHN |    50    76     -    28    23     -     -     - |  287  26.94
 YAKT |    34    76     -     -    24    35     -     - |  288   0.41
 YAR2 |    39     -     -     -    26    33     -     - |  288   6.02
 YELL |    46     -    66    69    52   140     -     - |  288   0.06
 YSSK |    10     -     -     7    19     -     -     - |  287  18.66
 -----+-------------------------------------------------+--------------
 TOT  |    53    69    86    37    47    49  4067     - |


 BEST CLOCK FIT: USNO   288   0.02 (ns) 

