
 GPS week: 1199   Day: 0   MJD: 52637                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2587      0    -0.05     0.15     4.78     0.00
 cod |   288     0  24035      0    -0.24     0.27     0.06    19.99
 esa |   288     0  18605     31     0.39    -0.53     0.09    12.25
 gfz |   288     0  15744    598     0.01    -0.74     0.06    19.62
 igu |    96     0   2493      0    -0.06     0.22     6.19     0.00
 jpl |   288     0  13775    211    -3.19    -0.10     0.05    27.69
 ngs |    96     0   2587      0    -0.06     0.19     4.77     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  27459     29  -365.35   -58.73     0.06    20.45

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  6811    66   124   -41 12915    50  6307     -  -131 |
    2 |  7009    16   204    22 11059    -7  5768     -  -154 |
    3 |   764    51    17    76  3486   136   661     -  -219 |
    4 | -2021    79   202   -24   880     X -1675     -  -172 |
    5 | -2287   131   163    26  5453   -44 -2472     -  -222 |
    6 | -3429   152    59    83  2571   124 -4174     -  -352 |
    7 | -3254    53   100   156 -2566  -147 -3196     -  -160 |
    8 |   805    24   135   205  2358  -303  1144     -   -83 |
    9 | -3682    81    -5   153 -3673   108 -3161     -  -296 |
   10 |-10323   182   212    65-10579  -376 -9062     -  -108 |
   11 |  4536    28    17    51 -1822    49  4137     -  -116 |
   13 |  5293    97   -61  -288  -980   490  5343     -  -103 |
   14 |   855    88   157    22 -2163   -56   915     -  -164 |
   15 |  -527   230     -    12 14397  -189  -134     -  -117 |
   17 | -2996   249    26    43 -8973  -209 -3301     -  -150 |
   18 |  3835   110   299   -87 -1173    -9  3941     -  -197 |
   20 |  4221   -12   104   223 -1752    32  4181     -  -287 |
   22 | 11462   -39   190   366 23512  -431 11540     -  -143 |
   23 |  2230   180   -96   147  7776    76  1058     -  -308 |
   24 | -2706   129    -8   -73  7559   201 -2814     -  -180 |
   25 | -2856    15   -22   134 -4786   225 -2569     -  -292 |
   26 | -2989    80    70    17 -2936   370 -2997     -  -369 |
   27 | -1630     5    98    50-25911    42 -1459     -  -141 |
   28 |  4587   105  -172     6 -4507    12  4518     -   -12 |
   29 | -4485    68   165  -190     -   513 -4144     -  -344 |
   30 |   655    -3    91    30 -1668   363   377     -  -342 |
   31 | -9850   111   -19    70-18235   -45 -8705     -  -131 |
 -----+-------------------------------------------------------+
 ALBH |     -   -51     -     -     -   -57     -     -   127 |
 ALGO |     -   139  -194     -     -  -137     -     -   166 |
 AMC2 |     -   -69     -     -     -  -238     -     -   393 |
 AOML |     -  -175     -     -     -     -     -     -   172 |
 AREQ |     -    52  -119    -3     -    33     -     -   -17 |
 ARTU |     -     -     -  -122     -    86     -     -     - |
 ASC1 |     -     -  -231     -     -     -     -     -   138 |
 AUCK |     -    34    71     -     -     -     -     -   -76 |
 BAHR |     -    16   113    68     -    15     -     -  -169 |
 BILI |     -    69     -   -70     -     -     -     -     - |
 BJFS |     -     -     -  -374     -     -     -     -   359 |
 BOR1 |     -   -77     -     -     -     -     -     -    75 |
 BRMU |     -     7    26   -19     -     -     -     -    -4 |
 BRUS |     -     -     -     -     -  -100     -     -   135 |
 CAS1 |     -    -8    19   -61     -    71     -     -   -42 |
 CHAT |     -  -107  -136     -     -     -     -     -   187 |
 CHUR |     -    26     -     -     -     -     -     -   -25 |
 COCO |     -   127  -184     -     -    50     -     -   -82 |
 CRO1 |     -     -     -     -     -  -101     -     -   137 |
 DARW |     -   -22     -     -     -    16     -     -     - |
 DAVR |     -    58     -   -19     -     -     -     -   -39 |
 DRAO |     -   126     -     -     -     -     -     -  -123 |
 EISL |     -     -   -55   -83     -   131     -     -   -65 |
 FAIR |     -     -    87  -124     -     -     -     -    66 |
 FORT |     -     -  -801     X     -   398     -     -   -80 |
 GODE |     -  -132  -102     -     -     -     -     -   192 |
 GOLD |     -   -33  -316     -     -    15     -     -   202 |
 GRAZ |     -     -  -235     -     -     -     -     -   141 |
 GUAT |     -     -     -  -203     -     7     -     -   188 |
 HOB2 |     -  -157   576     -     -    33     -     -  -236 |
 HRAO |     -   -54     -     -     -  -136     -     -   236 |
 IISC |     -     -   -60     -     -   116     -     -  -122 |
 JPLM |     -     -     -  -164     -     -     -     -   157 |
 KARR |     -    -7     -     7     -     -     -     -     - |
 KERG |     -     2   -93    95     -     -     -     -   -38 |
 KIRU |     -  -165   -29     -     -    44     -     -   121 |
 KOKB |     -    -9     -     -     -     -     -     -     9 |
 KOSG |     -  -171     -     -     -     -     -     -   168 |
 LPGS |     -     -     -     -     -  -106     -     -   144 |
 MAC1 |     -   -53  -136     X     -     -     -     -   132 |
 MALI |     -     -  -215  -512     -     -     -     -   620 |
 MAS1 |     -    77   -24   -36     -     -     -     -   -24 |
 MATE |     -     -  -106     -     -     -     -     -    63 |
 MCM4 |     -   -25     -     -     -   439     -     -  -455 |
 MDO1 |     -  -406   757     -     -     -     -     -   -52 |
 MKEA |     -    11  -220  -202     -    26     -     -   282 |
 NLIB |     -     -     -     -     -    28     -     -   -38 |
 NRC2 |     -     8   -46    79     -  -245     -     -   278 |
 NRIL |     -     7     -  -114     -    76     -     -     - |
 NTUS |     -   -49     -     -     -     -     -     -    48 |
 OHI2 |     -    75     -   -16     -   -43     -     -     - |
 OS0G |     -     -    38     0     -     -     -     -   -22 |
 PETP |     -   -28     -     -     -    20     -     -     - |
 PIMO |     -     -     -   737     -    34     -     -  -851 |
 POTS |     -  -114  -139   -76     -     -     -     -   269 |
 RBAY |     -     -     -   180     -     -     -     -  -173 |
 REYK |     -  -154     -     -     -     -     -     -   150 |
 SANT |     -   -65   310     -     -     -     -     -  -123 |
 SCH2 |     -  -169     -     -     -     -     -     -   166 |
 STJO |     -  -204     -     -     -     -     -     -   200 |
 SUTH |     -     2   -19     -     -     -     -     -    10 |
 THTI |     -     -  -139     -     -     -     -     -    83 |
 THU3 |     -     6     -    -6     -     -     -     -     - |
 TIDB |     -    -8   -10  -132     -     -     -     -   141 |
 TLSE |     -  -223     -     -     -     -     -     -   218 |
 TOW2 |     -   141     -     -     -  -102     -     -     - |
 TSKB |     -    72   -10     -     -     -     -     -   -64 |
 TWTF |     -  -289     -     -     -     -     -     -   282 |
 USN1 |     -     -     -     -     -  -337     -     -   456 |
 USNO |     -     -     -     -     -    88     -     -  -119 |
 USUD |     -   -41    26     -     -  -113     -     -   179 |
 VILL |     -   -41  -493     -     -     -     -     -   330 |
 WILL |     -   -89     -     -     -     -     -     -    87 |
 WSRT |     -    24    39     -     -     -     -     -   -47 |
 WTZR |     -     8    39     -     -     -     -     -   -32 |
 WUHN |     -    -2  -122   140     -     -     -     -   -60 |
 YAKT |     -  -124     -     -     -  -123     -     -   288 |
 YAR2 |     -   -75     -     -     -  -177     -     -   313 |
 YELL |     -    27   108     -     -   -49     -     -   -25 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  3780   118   131    78  5222    69  4029     -   133 |  281   3.37
    2 |  5409    39    43    93  6013    61  5008     -    46 |  288   2.20
    3 |  2460    59    71    89  3055    72  2514     -    87 |  288   2.30
    4 |   982    85    80    80   931     X   992     -    53 |  286   0.72
    5 |  5828    47   121    36  4263    44  5641     -    60 |  288   4.05
    6 |  9747    42   159    19  3250    44  9933     -    87 |  288   8.60
    7 |  2144    47   114    83  1946    70  2246     -    31 |  288   1.07
    8 |  3593    61    43    41  2181    65  3458     -   110 |  288   2.93
    9 |  4037    56    87    24  2750    70  4201     -    55 |  288   2.30
   10 |  3445    67    45    30  6342    65  4443     -    53 |  288   2.65
   11 |  2114    77   102    91  1128    44  1563     -   106 |  288   0.35
   13 |   713   125   190    86   717   103   808     -    69 |  288   0.41
   14 |  2103    69    57    31  1198    44  2138     -    49 |  288   0.35
   15 |  5602    56     -    55  9593    53  5452     -    57 |  288   2.85
   17 |  5996   101   125    49  7124    48  5568     -    56 |  288   1.81
   18 |  1085   104   121   112   873    50  1190     -    57 |  288   0.28
   20 |  1480    75    80    58   860    28  1540     -    43 |  288   0.26
   22 | 10886    42    54    63 17584    73 10791     -    38 |  288   3.29
   23 |  7867    65   181    58  2448    41  8904     -    64 |  288   7.34
   24 |  9120    93   110    98  6601    80  8053     -   115 |  288   2.08
   25 |  3647    53    58    47  2431    61  3984     -    84 |  288   1.85
   26 |  1234   191    90   185  1129    87  1196     -    84 |  283   0.69
   27 |  1624    45   109    34 15113    31  1611     -    87 |  288   0.73
   28 |  2621    48   132   134  4192    56  2722     -    37 |  288   0.79
   29 |  2946   153   116    87     -   155  2462     -   118 |  281   0.95
   30 |  1258    69    58    75  1745    51  1420     -    39 |  288   1.08
   31 |  4247    68   150    75  9200    68  4153     -    83 |  288   1.09
 -----+-------------------------------------------------------+--------------
 ALBH |     -    24     -     -     -    15     -     -    16 |  288   0.12
 ALGO |     -    18    28     -     -    15     -     -    22 |  288   0.05
 AMC2 |     -    15     -     -     -    11     -     -    18 |  288   0.04
 AOML |     -    22     -     -     -     -     -     -    22 |  285  31.30
 AREQ |     -    79    43    23     -    21     -     -    71 |  288  21.11
 ARTU |     -     -     -    31     -    22     -     -     - |  288  16.64
 ASC1 |     -     -    33     -     -     -     -     -    20 |  284    >>>
 AUCK |     -    33    44     -     -     -     -     -    20 |  288  19.34
 BAHR |     -    24    52    25     -    45     -     -    33 |  288   0.70
 BILI |     -    23     -    24     -     -     -     -     - |  287  12.25
 BJFS |     -     -     -   123     -     -     -     -   118 |  286    >>>
 BOR1 |     -    35     -     -     -     -     -     -    34 |  286   0.38
 BRMU |     -    32    33    31     -     -     -     -    34 |  288  21.97
 BRUS |     -     -     -     -     -    15     -     -    21 |  286   0.06
 CAS1 |     -    60    62    17     -    21     -     -    46 |  288   8.66
 CHAT |     -    52    56     -     -     -     -     -    23 |  287  13.14
 CHUR |     -    17     -     -     -     -     -     -    16 |  285   1.21
 COCO |     -    30   126     -     -    44     -     -    38 |  288  10.68
 CRO1 |     -     -     -     -     -    19     -     -    26 |  286  23.90
 DARW |     -    38     -     -     -    28     -     -     - |  288  21.28
 DAVR |     -    78     -    27     -     -     -     -    74 |  288  17.80
 DRAO |     -    16     -     -     -     -     -     -    15 |  288   0.07
 EISL |     -     -    74    38     -    40     -     -    50 |  288  38.11
 FAIR |     -     -    31    16     -     -     -     -    22 |  288   0.06
 FORT |     -     -    47     X     -    21     -     -    24 |  288   0.07
 GODE |     -    17    25     -     -     -     -     -    20 |  288   0.13
 GOLD |     -    48   141     -     -    25     -     -    30 |  288  20.35
 GRAZ |     -     -   168     -     -     -     -     -   100 |  278  61.37
 GUAT |     -     -     -    26     -    26     -     -    49 |  284    >>>
 HOB2 |     -    65    58     -     -    27     -     -    35 |  288   0.10
 HRAO |     -    81     -     -     -    24     -     -    83 |  288   3.44
 IISC |     -     -    51     -     -    33     -     -    27 |  288  29.39
 JPLM |     -     -     -    35     -     -     -     -    33 |  253  38.18
 KARR |     -    18     -    18     -     -     -     -     - |  288  13.49
 KERG |     -    60    36    31     -     -     -     -    42 |  287   1.08
 KIRU |     -    49    47     -     -    37     -     -    21 |  288   1.52
 KOKB |     -    56     -     -     -     -     -     -    55 |  281   0.08
 KOSG |     -    24     -     -     -     -     -     -    23 |  286  79.65
 LPGS |     -     -     -     -     -    29     -     -    40 |  288  20.89
 MAC1 |     -    71    98     X     -     -     -     -    90 |  288 624.49
 MALI |     -     -    89    32     -     -     -     -    61 |  288  18.83
 MAS1 |     -    22    32    27     -     -     -     -    21 |  288   1.67
 MATE |     -     -    31     -     -     -     -     -    19 |  288   0.12
 MCM4 |     -   101     -     -     -    40     -     -   108 |  286 180.04
 MDO1 |     -    58    70     -     -     -     -     -    22 |  288  23.16
 MKEA |     -    26    96    57     -    25     -     -   107 |  288  42.45
 NLIB |     -     -     -     -     -    49     -     -    67 |  287 490.66
 NRC2 |     -    30    30    24     -    23     -     -    38 |  288   0.07
 NRIL |     -    49     -    41     -    20     -     -     - |  288  13.68
 NTUS |     -    21     -     -     -     -     -     -    21 |  288  10.31
 OHI2 |     -    67     -    46     -    26     -     -     - |  288   8.06
 OS0G |     -     -    36    23     -     -     -     -    15 |  288   0.64
 PETP |     -    66     -     -     -    48     -     -     - |  287  11.72
 PIMO |     -     -     -   138     -   165     -     -   124 |  218  21.97
 POTS |     -    35    34    19     -     -     -     -    32 |  288  17.72
 RBAY |     -     -     -    44     -     -     -     -    42 |  131    >>>
 REYK |     -    32     -     -     -     -     -     -    32 |  285  14.72
 SANT |     -    64    41     -     -     -     -     -    53 |  288   5.87
 SCH2 |     -    15     -     -     -     -     -     -    14 |  285   5.88
 STJO |     -    25     -     -     -     -     -     -    24 |  283   0.09
 SUTH |     -    69    50     -     -     -     -     -    62 |  288  20.72
 THTI |     -     -    51     -     -     -     -     -    31 |  287   2.31
 THU3 |     -    26     -    27     -     -     -     -     - |  288   8.23
 TIDB |     -    89    40    70     -     -     -     -   169 |  288   0.15
 TLSE |     -    44     -     -     -     -     -     -    43 |  286   0.44
 TOW2 |     -    30     -     -     -    22     -     -     - |  288  14.12
 TSKB |     -    41    69     -     -     -     -     -    18 |  288   0.78
 TWTF |     -    48     -     -     -     -     -     -    47 |  286   0.27
 USN1 |     -     -     -     -     -    18     -     -    25 |  286   0.06
 USNO |     -     -     -     -     -    15     -     -    20 |  216   0.06
 USUD |     -    49    79     -     -    29     -     -    36 |  288  14.16
 VILL |     -    72   182     -     -     -     -     -    61 |  288   4.11
 WILL |     -    20     -     -     -     -     -     -    20 |  286   4.01
 WSRT |     -    51    46     -     -     -     -     -    34 |  288   0.12
 WTZR |     -    44    43     -     -     -     -     -    29 |  288   0.10
 WUHN |     -    23    51    29     -     -     -     -    28 |  287  24.12
 YAKT |     -    31     -     -     -    26     -     -    35 |  288   0.59
 YAR2 |     -    53     -     -     -    50     -     -    36 |  288   3.36
 YELL |     -    17    71     -     -    24     -     -    49 |  288   0.06
 -----+-------------------------------------------------------+--------------
 TOT  |  4775    61    88    65  6189    47  4766     -    59 |


 BEST CLOCK FIT: AMC2   288   0.04 (ns) 

