
 GPS week: 1203   Day: 4   MJD: 52669                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  30326    286    -0.08     0.17     0.07    21.70
 emr |   288     0  19677    488    43.41    49.04     0.08    15.52
 esa |   288     0  20227   1984    41.26    49.06     0.11    11.12
 gfz |   288     0  28371    566    -0.01    -0.20     0.05    28.10
 igr |   288     0  29165    132    -0.12     0.44     0.06     0.00
 jpl |   288     0  20065     56     0.16    -1.47     0.06    23.56
 ngs |    96     0   2588      0    -0.03    -0.05     4.33     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio |
 -----+-------------------------------------------------+
    1 |    37    -3  -101   -23     6    38-10843     - |
    2 |  -199   -65   -82    -8    69   279  5164     - |
    3 |   -57   -59     X    85   -38   -10  6118     - |
    4 |   326  -195     -   267   102  -496  -520     - |
    5 |    16  -300    59    53  -262   107 -3962     - |
    6 |   162  -173    34    27  -108   -87 -7047     - |
    7 |    38  -304  -100    97  -117    98   493     - |
    8 |  -183  -134   -23   171   -22    66  4428     - |
    9 |    41  -189   127    54  -140   -55 -3787     - |
   10 |   -39  -292    82   -39  -302   242 -3995     - |
   11 |   112   131  -127    91    90  -242  4787     - |
   13 |   264   243   145   156   354  -666  4331     - |
   14 |    72    27   193   -60   -45  -111  4262     - |
   15 |   -22  -179     -   -87  -377   243 -2583     - |
   17 |    10  -290    91   104  -139     - -1416     - |
   18 |    20   -46   280   -90  -114   -13  2883     - |
   20 |   -95     X   -72    -9   -64   135  6734     - |
   22 |  -248   145     -   -77   117   291 -5235     - |
   23 |    28  -215  -131   -25  -217   216 -1048     - |
   24 |    58  -392   205    86  -140     -   685     - |
   25 |    68   -87   200    67   -73  -189 -5294     - |
   26 |   158  -123   287   151   -77  -380   328     - |
   27 |   -14   -93    17   125   108   -83  -926     - |
   28 |   131    71  -105   -21    80   -94  3451     - |
   29 |   123  -104   249   139    20  -328   264     - |
   30 |   192  -299    42     1    -5     -  2849     - |
   31 |   -62   -15     X   -27    64   101  -138     - |
 -----+-------------------------------------------------+
 ALBH |   -88   190     -     -   135   -41     -     - |
 ALGO |   -32    27     X  -243   165   302     -     - |
 AMC2 |   -26    38     -     -   -24    -1     -     - |
 ANKR |   -35     -    68     -     -     -     -     - |
 AOML |    61     -     -   -52    51     6     -     - |
 AREQ |     -   -46     -    87    78   -74     -     - |
 ARTU |    38     -     -     8   -37   -45     -     - |
 ASC1 |  -247     -    92  -336     -   584     -     - |
 AUCK |    49     -     X     -    70   -45     -     - |
 BAHR |   -49    76   -66   -19   -70    49     -     - |
 BILI |    98     -     -   -89   -59    16     -     - |
 BJFS |     -  -302     -   167    36     -     -     - |
 BOGT |     -     -     X   -62    13    74     -     - |
 BOR1 |   -47    65     -     -    -9     -     -     - |
 BRAZ |     -     -     -   -53     -    63     -     - |
 BRUS |   -88   123     -     -   135     -     -     - |
 CAS1 |   -77     -   139   -59   -69    76     -     - |
 CEDU |    42     -   -81     -   -86     -     -     - |
 CHAT |     4     -     -    -3   549     -     -     - |
 COCO |    77     -   -88    54   -95   -94     -     - |
 CRO1 |   -13    77     -     -    36   -36     -     - |
 DRAO |   -48    96     7   -19    -7     -     -     - |
 FAIR |     -    29   111   -62  -107     -     -     - |
 FORT |     -     -  -235   -25  -138   142     -     - |
 GODE |   -13   163  -195     -    90     -     -     - |
 GOLD |  -306     -    -2   185   148     -     -     - |
 GRAZ |   -81   113     X     -    56     -     -     - |
 GUAM |   143     -     -  -126    56    21     -     - |
 HARB |   -57     -     -    44     -     -     -     - |
 HOB2 |   -52    72    87   -28   -41     -     -     - |
 IISC |    93     -   106  -114   125     -     -     - |
 INVK |    19     -     -   -15     -     -     -     - |
 IRKT |   -52    82   165   -47    99   -29     -     - |
 JPLM |     -    67     -   -37    22     -     -     - |
 KERG |   -40   139   -98     1   -56   -10     -     - |
 KIRU |   382     X  -746     -     X     -     -     - |
 KIT3 |     1     -     -    27     -   -33     -     - |
 KOKB |     -   182   -89    -7    55   -70     -     - |
 KOSG |    54     -     -   -42   136     -     -     - |
 KUNM |    30     -     -     -   -27   -28     -     - |
 MAC1 |    -7     -     -   -32   -47    45     -     - |
 MADR |    45    14     -   -41    49     -     -     - |
 MALI |     -     -   -89     X     9    42     -     - |
 MAS1 |    41   142  -112   -66     5     -     -     - |
 MATE |    52     -     -   -40    10     -     -     - |
 MCM4 |    78   -82     -   -38   -54    -6     -     - |
 MDO1 |    24    63   -77   -21    47     -     -     - |
 METS |    53   -20     -   -30    78     -     -     - |
 MIZU |     -   123     -   -68   368     -     -     - |
 MKEA |   -16     -    30     -     2     -     -     - |
 NKLG |     -     -    -4   -80     -    97     -     - |
 NLIB |    14    29    -9   -21   206     -     -     - |
 NOUM |     -     -     -   143     -  -171     -     - |
 NRC2 |   136     -  -318    20  -175     -     -     - |
 NRIL |     X     -     -   -56   -50    67     -     - |
 NTUS |  -190     -     -   178  -179   -37     -     - |
 NYA1 |   103     -     -   -80    53     -     -     - |
 NYAL |     -    -2   163     -   -39   -75     -     - |
 OHI2 |    78     -     -   -33   -85   -32     -     - |
 OS0G |    21   -48   -18    83   -41   -78     -     - |
 PDEL |  -257     -     -   130     -    82     -     - |
 PIE1 |   -16    88   -92     -   -98     -     -     - |
 PIMO |     -     -   -59    88   -98   -77     -     - |
 POTS |    92     -   -35   -58    93     -     -     - |
 PRDS |   -82   115     -     -    21     -     -     - |
 QAQ1 |     9     -     -    -7     -     -     -     - |
 RAMO |  -176     -     -     -     -   162     -     - |
 REYK |    -5     -    13    -1    89     -     -     - |
 RIOG |   -57     -   334   -88  -114     -     -     - |
 SANT |     -     -     X  -409     X   487     -     - |
 SCH2 |    -2     3     -     -   107     -     -     - |
 SCUB |    69     -     -   -54     -     -     -     - |
 SELE |    52     -  -102     -    14     -     -     - |
 SFER |  -123   138    51     -    18     -     -     - |
 SSIA |     -     -     -  -128     -   152     -     - |
 STJO |  -103   114     -    34     -   -21     -     - |
 SUTH |    45     -   -60   -11   -15     -     -     - |
 SYOG |  -141    65     -   133     -   -75     -     - |
 THTI |     -     -  -215    12    44    87     -     - |
 THU3 |    14     -     -   -11     -     -     -     - |
 TIDB |    59    83     X     X    19  -108     -     - |
 TLSE |   -55    69     -     -     5     5     -     - |
 TOW2 |   -50     -     -   -30     -    81     -     - |
 TRO1 |   -33     -     -    25    -3     -     -     - |
 TSKB |     4   121  -107   -22    27    -6     -     - |
 TWTF |    44     3     -   -36   132     -     -     - |
 USNO |   -48   140  -101     -    38     -     -     - |
 VILL |   117     -  -464    93   -31     -     -     - |
 WES2 |    19   189  -154   -56     -     -     -     - |
 WILL |   -31    44     -     -    86     -     -     - |
 WSRT |     8   188  -154   -49    63     -     -     - |
 WTZR |  -102   176   190  -108    -4    17     -     - |
 WUHN |  -180   -46     -   165   -58     -     -     - |
 YAR2 |   -74     -     -     -    56    68     -     - |
 YELL |    70     -   343    51   -15  -292     -     - |
 YSSK |    98     -     -   -75     -     -     -     - |
 ZECK |   -57     -     -   -35     -    95     -     - |
 ZWEN |   -78     -   163     4  -113     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |   102   128   147    35    57    76  6146     - |  288   5.57
    2 |    23    35    97    61    60    55  2571     - |  288   2.25
    3 |    33    76     X    35    88    70  2482     - |  288   1.71
    4 |   134    89     -    39    35    56  1467     - |  288   0.71
    5 |    56    45    53    42    61    65  7503     - |  288   1.82
    6 |    51    77   122    43    34    68  8585     - |  288   7.12
    7 |    42    60   176    28    39    72  1181     - |  288   0.45
    8 |   137    68   176    77    69    79  7012     - |  288   1.89
    9 |   118    84   113    71    40    75  2718     - |  288   2.38
   10 |    85    75    40    59    56    73  4733     - |  288   3.27
   11 |    90   162   250    34    56    52   959     - |  288   0.33
   13 |   101    81    84    27    30    57   769     - |  288   0.38
   14 |    68    63    65    49    53    70   355     - |  288   0.20
   15 |   101    77     -    82    94    49  4871     - |  284   3.53
   17 |   170   203   153    76    97     -  4777     - |  287   3.62
   18 |    61    69   143    23    43    61  1206     - |  288   0.33
   20 |    62     X   149    49   129    52   776     - |  288   0.20
   22 |    47    61     -    39   109    74  7644     - |  288   5.02
   23 |    62    74    75    42    42    76  7440     - |  288   6.42
   24 |   114   180   181    55   124     -  3413     - |  285   1.60
   25 |   194    51   137   202    62    64  2870     - |  288   1.60
   26 |    61    64   186    19    43   102  1458     - |  288   0.59
   27 |   118    68   204    74    73    84  1901     - |  288   1.22
   28 |    44    41   120    45    71    40  1492     - |  288   1.18
   29 |   138    74   113    42    62    70  1728     - |  288   0.77
   30 |    70    42    67    31    40     -  5950     - |  288   0.56
   31 |    44    41     X    38   127    57  4185     - |  288   1.56
 -----+-------------------------------------------------+--------------
 ALBH |    41    89     -     -    29    28     -     - |  288   0.12
 ALGO |    17    26     X    20    19    18     -     - |  288   0.10
 AMC2 |    42    98     -     -    29    35     -     - |  288   0.06
 ANKR |    14     -    28     -     -     -     -     - |  288  13.88
 AOML |    28     -     -    33    40    34     -     - |  288  42.26
 AREQ |     -    40     -    29    31    45     -     - |  288  20.76
 ARTU |    28     -     -    22    23    21     -     - |  284  19.74
 ASC1 |    34     -    56    38     -    35     -     - |  288    >>>
 AUCK |    46     -     X     -    77    42     -     - |  264  15.93
 BAHR |    33    37    50    49    18    31     -     - |  288   0.51
 BILI |    36     -     -    21    22    32     -     - |  287  10.11
 BJFS |     -    87     -    48    46     -     -     - |  284    >>>
 BOGT |     -     -     X    86   114   102     -     - |  287  24.99
 BOR1 |    31    43     -     -    33     -     -     - |  287   0.59
 BRAZ |     -     -     -    67     -    79     -     - |  284    >>>
 BRUS |    53    74     -     -    35     -     -     - |  288   0.05
 CAS1 |    91     -   115    54    49   116     -     - |  288   9.45
 CEDU |    58     -   113     -    43     -     -     - |  288  20.34
 CHAT |    39     -     -    30    49     -     -     - |  107  10.95
 COCO |    51     -    82    31    17    38     -     - |  288  11.08
 CRO1 |    48   141     -     -    37    55     -     - |  288  24.30
 DRAO |    17    25    53    29    18     -     -     - |  288   0.09
 FAIR |     -    76    94    22    57     -     -     - |  272   0.06
 FORT |     -     -    85    29    34    47     -     - |  288   0.15
 GODE |    39    98    87     -    26     -     -     - |  288   0.08
 GOLD |   172     -   122   102    64     -     -     - |  286  24.48
 GRAZ |    44    61     X     -    31     -     -     - |  285  37.11
 GUAM |    39     -     -    40    78    36     -     - |  287  15.75
 HARB |    41     -     -    32     -     -     -     - |  286  33.37
 HOB2 |    84    94    84    73   100     -     -     - |  288   0.10
 IISC |    40     -   205    62    60     -     -     - |  287  31.60
 INVK |    28     -     -    22     -     -     -     - |  288  10.75
 IRKT |    38    27    40    21   114    26     -     - |  288   0.82
 JPLM |     -   112     -    62    32     -     -     - |  274  15.89
 KERG |    97    20    66    26    17    69     -     - |  287   1.88
 KIRU |    31     X    61     -     X     -     -     - |  131   1.92
 KIT3 |    45     -     -    41     -    36     -     - |  274    >>>
 KOKB |     -    40    37    22    19    21     -     - |  288   0.08
 KOSG |    37     -     -    29    22     -     -     - |  288  86.74
 KUNM |    22     -     -     -    49    20     -     - |  288  41.85
 MAC1 |    80     -     -    79    48    53     -     - |  288  16.35
 MADR |   131    94     -    87    54     -     -     - |  260  16.61
 MALI |     -     -    57     X    54    27     -     - |  288  31.01
 MAS1 |    35    29    36    30    14     -     -     - |  288   1.36
 MATE |    25     -     -    19    25     -     -     - |  288   0.18
 MCM4 |    68   187     -    66   101   122     -     - |  288    >>>
 MDO1 |    33    85    48    39    18     -     -     - |  288  32.05
 METS |    30    81     -    43    32     -     -     - |  287   0.61
 MIZU |     -    83     -    46    68     -     -     - |  265   0.56
 MKEA |    20     -    40     -    27     -     -     - |  288  32.22
 NKLG |     -     -    92   145     -   139     -     - |  286    >>>
 NLIB |   139   173   187    90   139     -     -     - |  280 252.65
 NOUM |     -     -     -    22     -    26     -     - |  288    >>>
 NRC2 |    32     -    50    16    22     -     -     - |  288   0.02
 NRIL |     X     -     -    34    33    41     -     - |  274  14.05
 NTUS |    52     -     -    30    52    33     -     - |  288  10.94
 NYA1 |    43     -     -    33    28     -     -     - |  288   0.04
 NYAL |     -    33    39     -    66    22     -     - |  288   0.03
 OHI2 |    73     -     -    47    21    41     -     - |  288  13.81
 OS0G |    19    35    27    11    67    13     -     - |  288   0.55
 PDEL |    27     -     -    20     -    27     -     - |  288  56.74
 PIE1 |    32    20    49     -    23     -     -     - |  288   0.05
 PIMO |     -     -   196    58    97   121     -     - |  282  24.44
 POTS |    32     -    26    20    54     -     -     - |  277  22.50
 PRDS |    55    76     -     -    51     -     -     - |  279   3.82
 QAQ1 |    31     -     -    24     -     -     -     - |  270   9.67
 RAMO |    16     -     -     -     -    14     -     - |  287  21.71
 REYK |    35     -    62    36    80     -     -     - |  288  14.88
 RIOG |    45     -    72    51    35     -     -     - |  288  12.82
 SANT |     -     -     X    23     X    27     -     - |   85   3.87
 SCH2 |    87   121     -     -    36     -     -     - |  236   1.80
 SCUB |    47     -     -    36     -     -     -     - |  288  22.00
 SELE |    26     -    51     -    59     -     -     - |  234  36.14
 SFER |    89    77   171     -    86     -     -     - |  285 227.08
 SSIA |     -     -     -    34     -    40     -     - |  284    >>>
 STJO |    66    63     -    98     -    98     -     - |  261  53.47
 SUTH |    29     -   104    56    51     -     -     - |  288  14.00
 SYOG |    70    81     -    74     -   111     -     - |  288   0.68
 THTI |     -     -    66    39    42    62     -     - |  287   4.22
 THU3 |    34     -     -    26     -     -     -     - |  288  10.17
 TIDB |    59    46     X     X    76    38     -     - |  278   0.13
 TLSE |    55    87     -     -    30    33     -     - |  288   0.43
 TOW2 |    56     -     -    44     -    24     -     - |  288  10.77
 TRO1 |    49     -     -    38    23     -     -     - |  288  13.81
 TSKB |    37    18    77    24    28    34     -     - |  288   0.91
 TWTF |    49    85     -    22    51     -     -     - |  288   0.68
 USNO |    28    19    39     -    30     -     -     - |  288   0.04
 VILL |    23     -    34    14    56     -     -     - |  288   1.48
 WES2 |    32    87    66    34     -     -     -     - |  288   0.08
 WILL |    45    63     -     -    40     -     -     - |  278   4.50
 WSRT |    28    85    39    33    43     -     -     - |  288   0.04
 WTZR |    30    57    23    12    26    20     -     - |  288   0.08
 WUHN |    47    90     -    29    43     -     -     - |  287  16.97
 YAR2 |    52     -     -     -    26    48     -     - |  288   5.20
 YELL |    27     -    48    52    99    67     -     - |  288   0.02
 YSSK |    25     -     -    19     -     -     -     - |  287   9.68
 ZECK |    33     -     -    21     -    17     -     - |  288  13.13
 ZWEN |    33     -    29    26    30     -     -     - |  277  19.68
 -----+-------------------------------------------------+--------------
 TOT  |    66    82   106    52    59    61  4327     - |


 BEST CLOCK FIT: YELL   288   0.02 (ns) 

