
 GPS week: 1204   Day: 6   MJD: 52678                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2587      0     0.14    -0.26     4.47     0.00
 cod |   288     0  25980    196     0.44    -1.19     0.08    18.80
 emr |   288     0  18715    288   456.96    43.89     0.09    14.43
 esa |   288     0  19370    709    -0.39    -0.09     0.11    10.65
 gfz |   288     0  16363    335    -0.14     0.24     0.08    17.30
 igu |    96     0   2493      0     0.06    -0.13     4.38     0.00
 jpl |   288     0  10826    351     0.31    -0.02     0.08    16.73
 ngs |    96     0   2587      0     0.12    -0.24     4.24     0.00
 usn |   288     0  28068    793   742.48     9.68     0.07    22.08

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------+
    1 |-11431    62  -168    80   172-18887   -89 -9984   -74 |
    2 | -2312   -75   -50   -28   118 -2648  -144 -1760    59 |
    3 | -5186   -74  -172    53    49   845    54 -4544    85 |
    4 | -4637    94  -197   -31   185  4430   460 -4614  -211 |
    5 | -2457   137  -231   175   115  7414  -108 -2239   -88 |
    6 | -7749    44   -78   177    35 -2805  -694 -6908    56 |
    7 | -2190     8  -126    63   345  -606  -133 -2359  -193 |
    8 | -4420   141   -88    64   323 -8051  -315 -3721  -262 |
    9 | -2646   191  -134   -72   -36  1067   213 -1899  -115 |
   10 | -3335    56    10    53   202 -5977  -485 -3062    -8 |
   11 |  2104   -89     0    36   160  2822  -180  2145   -17 |
   13 |  5163    66   -22    -5     X  1852   523  5199  -188 |
   14 |  5329    54   -45   158  -187  4240    67  5298    22 |
   15 |  8121    78   -84     -  -105 18542  -459  7099   200 |
   17 |  5779    59   -86     -   -94     -     -  4215    79 |
   18 |  4091    68    40   270  -317  3369  -217  3895   136 |
   20 |  6551  -121   -88   199   267  3603   -68  6380  -112 |
   22 |  9826     8  -144   162   138  4071  -606  9203   162 |
   23 |  -350   192   -69    92  -192  5375   309  -851   -98 |
   24 | -2392    24  -167    14   100   488   205 -2137   -55 |
   25 | -4472    56  -129   105  -135 -3311   218 -4453     9 |
   26 |  1547   137  -123   154   -35  2623   664  1174  -270 |
   27 |   119   -75   -82   265   364-18909   246   -58  -417 |
   28 |  6851    32    87   -25    43  3669    91  6544  -149 |
   29 |   269   134  -171   186   -89  1805   265    23  -149 |
   30 | -4898    96  -165   108    87  -585   311 -4919  -242 |
   31 |  2776   -31  -104   114   107 -4671  -136  2379    -7 |
 -----+-------------------------------------------------------+
 ALGO |     -  -206   -48     X     -     -     -     -   206 |
 AMC2 |     -  -173   -94     -     -     -   118     -   111 |
 AOML |     -   -82     -     -     -     -     -     -    70 |
 AREQ |     -     -    74   -65    -1     -   -33     -     9 |
 ARTU |     -   -44     -   124   -54     -    27     -     - |
 ASC1 |     -     -     -   531  -239     -     -     -   -68 |
 AUCK |     -   -16     -     X     -     -     -     -    14 |
 BAHR |     -   -27    87     -     -     -     -     -   -34 |
 BJFS |     -     -    85     -  -179     -     -     -    86 |
 BRUS |     -     -   140     -     -     -     -     -   -92 |
 CAS1 |     -   -65     -   151   -43     -     -     -    15 |
 CHAT |     -     -     -    38  -118     -     -     -    74 |
 CHUR |     -   186     X     -     -     -     -     -  -158 |
 COCO |     -    95     -  -399   157     -     -     -   -12 |
 CRO1 |     -  -142   119     -     -     -     8     -    33 |
 DAEJ |     -    61   -80     -     -     -     -     -     X |
 DAVR |     -  -119     -     -   141     -     -     -   -30 |
 DRAO |     -   -16    27     -     -     -     -     -    -4 |
 FAIR |     -     -    -4    -3  -166     -  -158     -   250 |
 FLIN |     -   -20     -     -     -     -    23     -     - |
 FORT |     -     -     -   -11     7     -     -     -     - |
 GODE |     -  -117   198  -167     -     -     -     -    53 |
 GOLD |     -   -20     -  -140     -     -   -38     -   113 |
 GUAM |     -   202     -   -36     -     -  -111     -   -70 |
 HERS |     -  -357    11     -     -     -     -     -   300 |
 HOB2 |     -    51   155  -144     -     -     -     -   -66 |
 HRAO |     -   -76     -     -   -93     -   -95     -   207 |
 IISC |     -  -192     -     3  -138     -   210     -    52 |
 JPLM |     -     -   -24     -   -77     -   -48     -   112 |
 KERG |     -     -    -6   -29     8     -     -     -    11 |
 KIRU |     -     -    41   -56     -     -     -     -     - |
 KOKB |     -     1   183     -   -58     -     -     -   -75 |
 KOSG |     -  -159     -     -     -     -     -     -   135 |
 KSTU |     -   -12     -     -     -     -     -     -    10 |
 LPGS |     -     -     -  -473     -     -     -     -   228 |
 MAS1 |     -   -44    74    36    33     -     -     -   -54 |
 MATE |     -   -89     -   116     -     -     -     -    20 |
 MCM4 |     -    97     -     -     -     -  -120     -   -11 |
 MDO1 |     -    41   143  -432     -     -    33     -    56 |
 MEDI |     -    41     -     -     -     -     -     -   -35 |
 METS |     -   -77    95     -     -     -     -     -     4 |
 MIZU |     -     -    28     -     -     -     -     -   -18 |
 MKEA |     -    39     -    27  -188     -   -32     -   124 |
 NANO |     -    -6     -     -     -     -     7     -     - |
 NKLG |     -  -205     -   431   -27     -     -     -   -21 |
 NLIB |     -  -159   225     -     -     -   -48     -    29 |
 NRC2 |     -   976   -77 -1019  -183     -     -     -  -160 |
 NYA1 |     -   -46     -     -     -     -     -     -    39 |
 NYAL |     -     -   -48   108     -     -     -     -   -21 |
 OHI2 |     -    56     -     -   -61     -     -     -     - |
 OS0G |     -     7    72   -64     -     -     -     -   -22 |
 PERT |     -    73    72   -98   -81     -   -47     -    37 |
 PIE1 |     -   -39   196   -97     -     -  -111     -    42 |
 POTS |     -  -123     -    68     5     -     -     -    68 |
 PRDS |     -   -97    78     -     -     -     -     -    33 |
 QUIN |     -   -10     -     -     -     -    11     -     - |
 RBAY |     -   339     -     -  -133     -     -     -  -108 |
 RESO |     -    63     -     -   -68     -     -     -     - |
 REYK |     -     4     -     -     -     -     -     -    -3 |
 SANT |     -   -52     -  -662     -     -   422     -     X |
 SCH2 |     -   -94    -3     -     -     -     -     -    83 |
 SELE |     -   115     -  -265     -     -     -     -    33 |
 SFER |     -  -275     -     -     -     -     -     -   234 |
 STJO |     -   -87    64     -  -113     -     -     -   122 |
 SUTH |     -  -152     -    47     -     -  -111     -   191 |
 THTI |     -     -     -   135   -41     -     -     -   -33 |
 TIDB |     -    60    93  -211   -12     -     X     -     X |
 TSKB |     -   -41   126  -176   -14     -     -     -    48 |
 TWTF |     -   -52  -113     -     -     -     -     -   119 |
 UNSA |     -     -     -     -   -18     -     -     -    14 |
 URUM |     -   -35     -     -     -     -     -     -    30 |
 USNO |     -    47   130  -104     -     -     -     -   -75 |
 USUD |     -  -174   -26    83     -     -    64     -    74 |
 VILL |     -   116     -  -589     -     -    87     -   120 |
 WES2 |     -     -    51   -69     -     -     -     -     - |
 WILL |     -   -84    81     -     -     -   -69     -    73 |
 WSRT |     -  -125   245    -7     -     -     -     -   -51 |
 WTZR |     -  -144   281   118     -     -     -     -  -117 |
 WUHN |     -   260     -   344   161     -     -     -  -511 |
 YELL |     -  -248     -   690     -     -     -     -  -124 |
 ZWEN |     -   121     -  -401   -48     -     -     -   128 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  4263    86    75   105    60  9880    40  3821    45 |  288   3.59
    2 |  7027    74    64   272    30  4545    39  5919    40 |  288   2.45
    3 |  6063    96    38   135   104  2926    50  5114    62 |  288   1.45
    4 |  1641    54    69   199    47  3775    78  1639    34 |  288   0.71
    5 |  4313    53    57    68    43  4953    40  4285    29 |  288   3.92
    6 |  6060    83    51   191    45  4177   145  5493    86 |  288   5.60
    7 |  1305    98    84   193    34   633   126  1324    38 |  288   0.44
    8 |  7032   239    61    88   167  5444    76  6808    99 |  286   2.75
    9 |  7835   198   138   198    96  4336    87  6994   116 |  284   2.32
   10 |  7028    81    31    61    99  3305    55  6527    29 |  288   2.97
   11 |  1855    85   165   160    70  2985    58  1905    66 |  288   0.47
   13 |  1038    79    55    47     X  1612    71  1133    38 |  288   0.38
   14 |  1183    84    59   139    31  2301    95  1093    37 |  288   0.20
   15 |  3942    75   248     -   123  5689   142  3235    56 |  288   2.54
   17 |  7365   138   125     -    61     -     -  6639    30 |  286   1.91
   18 |  1100    77    59   202    54  1556   133  1152    54 |  288   0.26
   20 |  1170    59   124    91    25  1936    43  1132    43 |  288   0.21
   22 |  5342   129   199    70    90  6186   129  6028    58 |  288   5.46
   23 |  9153    59    92   132    71  3683   121  9464    39 |  288   7.20
   24 |  3165    69    80   140    31  2315    59  3293    32 |  288   2.85
   25 |  1669   118    96    73   228  1248   164  1649   199 |  285   1.16
   26 |  2465    65    63   144    71  1203   217  2738    65 |  288   1.17
   27 |  1544   160    64   227   136 11584    86  1661    90 |  285   1.52
   28 |  1594    60    46    65    56  2169    51  1443    44 |  288   0.58
   29 |  1699   118    77   143    57   738   111  1914   102 |  288   0.55
   30 |  1727    69    76    82    27   975    40  1899    46 |  288   0.88
   31 |   984   104    57   143    43  2710    39  1263   144 |  288   0.74
 -----+-------------------------------------------------------+--------------
 ALGO |     -    27    21     X     -     -     -     -    14 |  288   0.05
 AMC2 |     -   107    91     -     -     -   267     -   119 |  288   0.04
 AOML |     -    21     -     -     -     -     -     -    18 |  280  22.44
 AREQ |     -     -    84    52    32     -    49     -    71 |  288  20.20
 ARTU |     -    48     -    68    27     -    78     -     - |  288  20.45
 ASC1 |     -     -     -    69    26     -     -     -    26 |  283    >>>
 AUCK |     -    63     -     X     -     -     -     -    54 |  264  15.75
 BAHR |     -    37    32     -     -     -     -     -    36 |  288   0.36
 BJFS |     -     -   106     -    98     -     -     -    78 |  287    >>>
 BRUS |     -     -    81     -     -     -     -     -    53 |  286   0.07
 CAS1 |     -    76     -    43    45     -     -     -    40 |  288   8.38
 CHAT |     -     -     -    62    35     -     -     -    31 |  251  13.94
 CHUR |     -    59     X     -     -     -     -     -    50 |  260   1.51
 COCO |     -    55     -    48    25     -     -     -    26 |  288  10.71
 CRO1 |     -    47    47     -     -     -    68     -    48 |  288  19.60
 DAEJ |     -    41    54     -     -     -     -     -     X |  286   1.49
 DAVR |     -    69     -     -    73     -     -     -    69 |  286  24.61
 DRAO |     -    25    16     -     -     -     -     -    18 |  288   0.08
 FAIR |     -     -    43    99    90     -    32     -    52 |  288   0.06
 FLIN |     -    14     -     -     -     -    16     -     - |  288   9.48
 FORT |     -     -     -   118    72     -     -     -     - |  153   0.06
 GODE |     -    36    70    44     -     -     -     -    27 |  288   0.09
 GOLD |     -    33     -    53     -     -    28     -    13 |  288  20.66
 GUAM |     -    41     -   105     -     -    43     -    25 |  288  21.62
 HERS |     -    69    77     -     -     -     -     -    43 |  264  21.88
 HOB2 |     -    97   121    56     -     -     -     -    48 |  288   0.12
 HRAO |     -    71     -     -    60     -    45     -    47 |  288  19.30
 IISC |     -    75     -    71    63     -    99     -   141 |  288  38.26
 JPLM |     -     -   101     -    48     -    28     -    30 |  288  33.85
 KERG |     -     -    53    63    44     -     -     -    29 |  287   1.48
 KIRU |     -     -    50    68     -     -     -     -     - |   95   1.32
 KOKB |     -    87    22     -    32     -     -     -    97 |  288   0.19
 KOSG |     -    30     -     -     -     -     -     -    26 |  286  39.41
 KSTU |     -    60     -     -     -     -     -     -    51 |  275  11.91
 LPGS |     -     -     -    92     -     -     -     -    44 |  288  52.26
 MAS1 |     -    50    54   188    31     -     -     -    38 |  288   2.87
 MATE |     -    42     -    43     -     -     -     -    39 |  288   0.07
 MCM4 |     -   155     -     -     -     -    63     -   124 |  276    >>>
 MDO1 |     -    20    26    65     -     -    24     -    13 |  288   4.95
 MEDI |     -    56     -     -     -     -     -     -    47 |  276   0.10
 METS |     -    55    83     -     -     -     -     -    57 |  287   0.15
 MIZU |     -     -   270     -     -     -     -     -   177 |  224   0.47
 MKEA |     -   106     -    60    22     -    22     -    68 |  288  32.48
 NANO |     -    23     -     -     -     -    26     -     - |  288  53.90
 NKLG |     -    41     -    58    37     -     -     -    17 |  287 104.60
 NLIB |     -    59   186     -     -     -    52     -    38 |  288   0.04
 NRC2 |     -    27    50    54    17     -     -     -    16 |  288   0.04
 NYA1 |     -    45     -     -     -     -     -     -    38 |  284   0.13
 NYAL |     -     -    40   179     -     -     -     -    62 |  287   0.14
 OHI2 |     -    34     -     -    37     -     -     -     - |  288  18.84
 OS0G |     -    47    32    28     -     -     -     -    25 |  288   0.06
 PERT |     -    93    70    60    34     -    45     -    34 |  288  12.70
 PIE1 |     -    24   137    45     -     -    48     -    51 |  288   0.03
 POTS |     -    81     -    64    94     -     -     -   115 |  277  13.17
 PRDS |     -    33    59     -     -     -     -     -    18 |  287   2.30
 QUIN |     -    22     -     -     -     -    25     -     - |  288  39.48
 RBAY |     -    70     -     -    74     -     -     -    75 |  285  97.55
 RESO |     -    14     -     -    15     -     -     -     - |  287  10.73
 REYK |     -    52     -     -     -     -     -     -    44 |  288  15.99
 SANT |     -    71     -   142     -     -   100     -     X |  266   5.42
 SCH2 |     -    47    60     -     -     -     -     -    18 |  288   4.92
 SELE |     -   167     -   153     -     -     -     -   206 |  286  40.56
 SFER |     -    45     -     -     -     -     -     -    38 |  284   0.62
 STJO |     -   121    84     -   323     -     -     -   102 |  288   0.10
 SUTH |     -    45     -    75     -     -    48     -    46 |  288  19.08
 THTI |     -     -     -    80    32     -     -     -    36 |  287   4.23
 TIDB |     -    98   108    57    32     -     X     -     X |  246   0.09
 TSKB |     -    44    33   129    42     -     -     -    31 |  288   1.90
 TWTF |     -    74   173     -     -     -     -     -    71 |  288   0.27
 UNSA |     -     -     -     -    62     -     -     -    49 |  281  24.06
 URUM |     -    57     -     -     -     -     -     -    48 |  288  18.11
 USNO |     -    32    21    28     -     -     -     -    15 |  288   0.02
 USUD |     -    49   136   164     -     -   102     -    39 |  288  18.34
 VILL |     -    42     -   160     -     -    78     -    32 |  288   4.57
 WES2 |     -     -    58    78     -     -     -     -     - |  276   0.07
 WILL |     -    31    69     -     -     -    23     -    19 |  288   1.05
 WSRT |     -    45    78    30     -     -     -     -    54 |  288   0.03
 WTZR |     -    53    70    36     -     -     -     -    29 |  288   0.04
 WUHN |     -    31     -   134    44     -     -     -    45 |  287  27.25
 YELL |     -    46     -    70     -     -     -     -    22 |  288   0.08
 ZWEN |     -    63     -    58    29     -     -     -    58 |  288  19.62
 -----+-------------------------------------------------------+--------------
 TOT  |  4468    78    94   114    80  4385    83  4238    65 |


 BEST CLOCK FIT: USNO   288   0.02 (ns) 

