
 GPS week: 1205   Day: 3   MJD: 52682                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2484     21    -0.63     0.71     4.10     0.00
 cod |   288     0  19437     74    -0.29     0.67     0.06    22.21
 emr |   288     0  16693      0  -853.33    -8.01     0.06    20.51
 esa |   288     0  16466    200    -0.55     2.87     0.41     0.00
 gfz |   288     0  14272      5     0.01     0.49     0.05    25.98
 igu |    96     0   2391      0     0.12    -0.70     4.06     0.00
 jpl |   288     0  12054      0    -1.04     0.69     0.04    31.30
 ngs |    96     0   2484     22    -0.69     0.81     3.88     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio |
 -----+-------------------------------------------------------+
    1 |  8537    18    10   788  -256  4096   215  7824     - |
    2 |  3261   -84   107   568   -20  7708    79  3263     - |
    3 |  2870  -181    24   293   200  2467   -59  2971     - |
    4 |  -679   169  -239   645    -7  -540    47  -600     - |
    5 | -8427   146  -160  1046   -21 -7351   189 -7289     - |
    6 | -5854   165   -98   988   104 -6839  -155 -5062     - |
    7 |  -800   209  -290   162    23 -2069   230  -783     - |
    8 | -1441   -32  -278   533   115     -   121 -1392     - |
    9 |  6324   102  -254   959   129  6601   -35  5136     - |
   10 |   642    60  -231   417    24  6517    99   991     - |
   11 |  4656   -24    56   420   -58   478    32  4692     - |
   13 |  6764   104   -28   896   -53  3935  -111  6710     - |
   14 |  2730     2    96   484   -84   906    67  2719     - |
   15 |   529    77   -17     -    34  8410   -78   -68     - |
   18 |  3477    27    38   348   -51  1154   -25  3604     - |
   20 |  5701  -281  -128   651     8  2224   301  5873     - |
   22 |-20663  -208    76  -295   100-12631   225-22525     - |
   23 |-11720     0  -175   239   -16   775   142-10753     - |
   24 |    42    69  -214   774    78  5104    29    -7     - |
   25 |  3894    60    55   876    49  5487  -129  2552     - |
   26 | -3419   140  -268   342   136 -1863   -40 -3374     - |
   27 |  2150    37  -201   527   122-19152    46  2124     - |
   28 |  7940   183   -42   343  -135  5665   101  7906     - |
   29 | -1574   275  -310   211     6   907    25 -1578     - |
   30 | -6305   108  -211   957   112 -2862  -312 -5792     - |
   31 | -2923   -54    21   387    16 -9632   116 -2125     - |
 -----+-------------------------------------------------------+
 ALGO |     -   -56    25  -829     -     -    23     -     - |
 AMC2 |     -    34   136     -     -     -  -113     -     - |
 BAHR |     -   -31    33   416     -     -     -     -     - |
 BILI |     -     -     -     -   -16     -    14     -     - |
 BJFS |     -     -  -120     -    95     -     -     -     - |
 BOR1 |     -  -136   147     -     -     -     -     -     - |
 CAS1 |     -    26     -   597   -22     -     -     -     - |
 CEDU |     -    -5     -   563     -     -     4     -     - |
 COCO |     -     1     -   -16     5     -    -5     -     - |
 CRO1 |     -     -    74     -     -     -   -49     -     - |
 DARW |     -   -10     -     -     -     -     7     -     - |
 DAVR |     -    25     -     -  -114     -    79     -     - |
 DRAO |     -    26   -28     -     -     -     -     -     - |
 FAIR |     -     -    37  -366   -41     -     9     -     - |
 GODE |     -   -85    92  -755     -     -     -     -     - |
 GOLD |     -    42     -   109     -     -   -30     -     - |
 GRAZ |     -  -109   118   294     -     -     -     -     - |
 GUAM |     -   192     -   204     -     -  -136     -     - |
 HERS |     -  -203   219     -     -     -     -     -     - |
 HOB2 |     -    30    99  -659     -     -   -86     -     - |
 HRAO |     -    47     -     -     -     -   -34     -     - |
 JPLM |     -     -   -68     -    54     -     -     -     - |
 KERG |     -   -61    38 -1517    22     -     -     -     - |
 KIRU |     -  -124   134   403     -     -     -     -     - |
 KOKB |     -    26   137     -  -130     -     -     -     - |
 MAC1 |     -   104     -   487   -89     -     -     -     - |
 MAS1 |     -   -26    74   391   -37     -     -     -     - |
 MAW1 |     -   151     -     -  -129     -     -     -     - |
 MCM4 |     -   292     -     -     -     -  -207     -     - |
 MDO1 |     -   -55    59 -1931     -     -     -     -     - |
 METS |     -  -136   147     -     -     -     -     -     - |
 MIZU |     -     -   100     -     -     -   -66     -     - |
 MKEA |     -    90     -   385    13     -   -74     -     - |
 NKLG |     -     -     -   296  -103     -    85     -     - |
 NLIB |     -     -    96    37     -     -   -63     -     - |
 NRC2 |     -     0    72 -1730    70     -  -106     -     - |
 NRIL |     -     -     -     -   -86     -    71     -     - |
 OS0G |     -   -98   106 -1724     -     -     -     -     - |
 PERT |     -     -    81   306   -67     -     2     -     - |
 PIMO |     -     -     -   382  -272     -   226     -     - |
 POTS |     -   -48     -   348    43     -    -2     -     - |
 PRDS |     -   -39    42     -     -     -     -     -     - |
 SANT |     -    30     -  -353   -26     -     -     -     - |
 SELE |     -    41     -   587     -     -   -29     -     - |
 STJO |     -   -52   125     -     -     -   -45     -     - |
 TOW2 |     -     4     -     -   101     -   -87     -     - |
 TSKB |     -   -95   103 -3236     -     -     -     -     - |
 USNO |     -    10    -2     -     -     -    -6     -     - |
 VILL |     -   -93     - -2696    79     -     -     -     - |
 WES2 |     -   -67    73 -2413     -     -     -     -     - |
 WILL |     -   -42    45     -     -     -     -     -     - |
 WTZR |     -  -227   246   330     -     -     -     -     - |
 WUHN |     -     -    10   195    -8     -     -     -     - |
 YAKT |     -     -   266     -     -     -  -174     -     - |
 YELL |     -  -169     - -1829     -     -   120     -     - |
 ZWEN |     -  -167     -   825    98     -    37     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  2848    59    81    78    45  4559    26  3616     - |  288   3.41
    2 |  2560    39    31   190    28  2709    37  2609     - |  288   2.18
    3 |  3056    26    41    93    39  2396    23  3132     - |  288   1.89
    4 |  1351    80    64   164    62   981    50  1323     - |  288   0.56
    5 |  6144    45    45   396    31  3370    67  5395     - |  288   2.86
    6 |  8352    41    47   331    73  4207    50  7217     - |  288   6.53
    7 |  1080    61    40   255    32  1677    79  1071     - |  288   0.45
    8 |  3812    93   101   165   155     -    38  3831     - |  278   2.86
    9 |  4831   156    73  1264    84  4148    61  5440     - |  278   2.26
   10 |  3819    45    47   114    37  4250    34  3755     - |  288   3.08
   11 |  1059    40    65   205    45   765    47  1033     - |  288   0.45
   13 |  1374    50   103    47    50  1996    70  1308     - |  288   0.35
   14 |  1134    52    53   113    45   595    60  1142     - |  288   0.18
   15 |  5358    78    44     -    36  7416    49  5552     - |  288   3.08
   18 |   825    45    20   480    31   819    55   819     - |  288   0.31
   20 |   785    55    63   149    31  1052    30   815     - |  288   0.23
   22 | 11978    87    82   146    48  9863    99 10283     - |  288   8.59
   23 |  5630    41    72   340    39  3430    29  6398     - |  288   6.51
   24 |  1818    70    82   269    42  2325    50  1781     - |  288   1.57
   25 |  5458   144    62   207   161  1922    42  4572     - |  278   1.47
   26 |  1883    46    72   146    28  1557    36  1879     - |  288   0.77
   27 |  1160    87   117   244    58 10084    95  1279     - |  277   1.07
   28 |  1645    91    49    65    45  3404    36  1709     - |  288   0.33
   29 |  1316    53    65   244    26   985    31  1282     - |  288   0.81
   30 |  1960    50    40   325    51  1868   132  1831     - |  288   0.39
   31 |  5116    38    22   136    43  4280    57  5022     - |  288   1.47
 -----+-------------------------------------------------------+--------------
 ALGO |     -    21    22   123     -     -    23     -     - |  288   0.05
 AMC2 |     -    29    52     -     -     -    22     -     - |  288   0.03
 BAHR |     -    41    44    76     -     -     -     -     - |  287   0.75
 BILI |     -     -     -     -    24     -    20     -     - |  287  11.79
 BJFS |     -     -    69     -    55     -     -     -     - |  284    >>>
 BOR1 |     -    62    68     -     -     -     -     -     - |  283   0.60
 CAS1 |     -    27     -    64    23     -     -     -     - |  288   8.04
 CEDU |     -    41     -   211     -     -    29     -     - |  288  21.33
 COCO |     -    40     -    99    19     -    36     -     - |  288  10.61
 CRO1 |     -     -    27     -     -     -    17     -     - |  288  25.96
 DARW |     -    49     -     -     -     -    35     -     - |  285  19.61
 DAVR |     -    51     -     -    19     -    35     -     - |  288  24.17
 DRAO |     -    34    37     -     -     -     -     -     - |  286   0.08
 FAIR |     -     -    26   713    22     -    20     -     - |  285   0.07
 GODE |     -    40    43   115     -     -     -     -     - |  279   0.08
 GOLD |     -    93     -   476     -     -    66     -     - |  280  21.30
 GRAZ |     -    79    85   421     -     -     -     -     - |  284  19.72
 GUAM |     -    48     -    91     -     -    34     -     - |  285  17.80
 HERS |     -    52    56     -     -     -     -     -     - |  241  29.68
 HOB2 |     -    62    42   110     -     -    42     -     - |  288   0.06
 HRAO |     -    34     -     -     -     -    24     -     - |  288  24.34
 JPLM |     -     -    65     -    51     -     -     -     - |  279  14.03
 KERG |     -    48    55   146    23     -     -     -     - |  287   1.53
 KIRU |     -    58    63   158     -     -     -     -     - |  253 109.88
 KOKB |     -    50    33     -    55     -     -     -     - |  288   0.05
 MAC1 |     -    22     -   117    19     -     -     -     - |  288  16.22
 MAS1 |     -    17    23    74    16     -     -     -     - |  288   3.88
 MAW1 |     -    35     -     -    30     -     -     -     - |  288  36.40
 MCM4 |     -    35     -     -     -     -    25     -     - |  120   6.54
 MDO1 |     -    27    30   190     -     -     -     -     - |  281   9.24
 METS |     -    47    51     -     -     -     -     -     - |  286   0.48
 MIZU |     -     -    79     -     -     -    51     -     - |  275   0.47
 MKEA |     -    94     -   173    84     -    21     -     - |  288  36.95
 NKLG |     -     -     -   193    44     -    37     -     - |  287 533.53
 NLIB |     -     -   169   395     -     -   111     -     - |  247 153.06
 NRC2 |     -    22    20   150    25     -    27     -     - |  288   0.02
 NRIL |     -     -     -     -    57     -    47     -     - |  286  20.93
 OS0G |     -    46    50    93     -     -     -     -     - |  288   0.20
 PERT |     -     -    45    84    34     -    21     -     - |  288  16.89
 PIMO |     -     -     -   298    35     -    29     -     - |  269  27.19
 POTS |     -    51     -   117    12     -    42     -     - |  277  17.14
 PRDS |     -    42    45     -     -     -     -     -     - |  281   2.64
 SANT |     -    27     -   177    23     -     -     -     - |  269  10.63
 SELE |     -    53     -   194     -     -    37     -     - |  275  39.89
 STJO |     -    29    19     -     -     -    25     -     - |  288   0.03
 TOW2 |     -    31     -     -    22     -    30     -     - |  288  14.96
 TSKB |     -    19    21    79     -     -     -     -     - |  288   1.66
 USNO |     -    27    19     -     -     -    25     -     - |  288   0.02
 VILL |     -    13     -  2243    11     -     -     -     - |  288   2.47
 WES2 |     -    51    56   244     -     -     -     -     - |  275   0.09
 WILL |     -    53    57     -     -     -     -     -     - |  274   4.12
 WTZR |     -   126   136    79     -     -     -     -     - |  287 255.71
 WUHN |     -     -    51   103    40     -     -     -     - |  283  28.31
 YAKT |     -     -   117     -     -     -    77     -     - |  273   0.82
 YELL |     -    22     -   205     -     -    16     -     - |  288   0.03
 ZWEN |     -    70     -  1123    17     -    43     -     - |  288  25.09
 -----+-------------------------------------------------------+--------------
 TOT  |  4097    58    63   413    51  4062    41  3885     - |


 BEST CLOCK FIT: USNO   288   0.02 (ns) 

