
 GPS week: 1205   Day: 6   MJD: 52685                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2592      0     0.09    -0.12     3.81     0.00
 cod |   288     0  23732      0     0.06    -0.21     0.06    30.27
 esa |   288     0  18621   1176     0.11    -0.15     0.09    20.38
 gfz |   288     0  15254    178     0.19    -0.52     0.07    26.71
 igu |    96     0   2569      0    -0.01     0.01     4.37     0.00
 ngs |    96     0   2592      0     0.09    -0.12     3.75     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  26500    369   815.86    12.36     0.08    22.63

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------+
    1 |   715    84   124   -30  4202   234     -  -188 |
    2 | -4815    13   -81   -17  7897 -4658     -    76 |
    3 |  -728   -59   -55   180 14514  -185     -   -85 |
    4 | -1073   201  -149   200 -3657 -1507     -  -370 |
    5 |-10256   100    64    34-18507 -8817     -  -230 |
    6 |  4956    47   166    51 10386  4589     -  -272 |
    7 | -2916   168  -201   190 -2103 -2766     -  -268 |
    8 |  1691   102   -28    33 -6121  1668     -  -154 |
    9 | -9693   201    22    16  1397 -9032     -  -322 |
   10 | -7289   120   -52    22  -755 -7207     -  -139 |
   11 |  3761    37   -15   158  3270  3795     -  -223 |
   13 |  1553   165     2    33   400  1966     -  -262 |
   14 |  6038   171   133   -74  3712  5850     -  -261 |
   15 |  1358    26     -    -8  9433   325     -   -25 |
   17 |  4824   126     -    17  4443  4723     -  -188 |
   18 |  2017   103   173   -98  1144  2050     -  -178 |
   20 |  4476   103   173    23  1359  4507     -  -350 |
   22 | -5064   -73   117  -153 -7826 -5438     -   171 |
   23 |  5454   137    25   -70  4534  5418     -  -124 |
   24 |  3693    82   -68   165   -66  3683     -  -244 |
   25 |   762    51    31     9  1681   351     -  -112 |
   26 |  -404   138    74    48 -2393  -525     -  -307 |
   27 |  1116    85    71    -2-12387   936     -  -181 |
   28 | -2132   203  -115    23 -1139 -1840     -  -195 |
   29 |  2648   148   118   -17 -6359  2211     -  -282 |
   30 | -1390    83    64   111   539  -627     -  -298 |
   31 |   695   -14   -41   121 -6511   296     -   -88 |
 -----+-------------------------------------------------+
 ALBH |     -   -64   -66     -     -     -     -   145 |
 ALGO |     -   -40     X     -     -     -     -    53 |
 AMC2 |     -  -169     -     -     -     -     -   226 |
 AREQ |     -     -    86   -60     -     -     -   -10 |
 ARTU |     -     0    35   -27     -     -     -     - |
 ASC1 |     -     -     -    83     -     -     -   -98 |
 AUCK |     -    21   110     -     -     -     -  -106 |
 BJFS |     -     -     -  -417     -     -     -   492 |
 BOR1 |     -   -92     -     -     -     -     -   123 |
 BRUS |     -  -105     -     -     -     -     -   140 |
 CAS1 |     -     3   339   -68     -     -     -    44 |
 CEDU |     -  -153  -279     -     -     -     -   456 |
 CHAT |     -     5   143     -     -     -     -  -136 |
 CHUR |     -    53     -     -     -     -     -   -71 |
 COCO |     -   111  -238   105     -     -     -   -58 |
 CRO1 |     -   102     -     -     -     -     -  -136 |
 DAVR |     -    50     -   -64     -     -     -     9 |
 DRAO |     -    70     -     -     -     -     -   -93 |
 FAIR |     -     -     X     2     -     -     -    -2 |
 GODE |     -  -111   -25     -     -     -     -   172 |
 GOLD |     -   -25  -100     -     -     -     -   125 |
 GRAZ |     -    55    51     -     -     -     -  -120 |
 GUAM |     -     -  -165     -     -     -     -   148 |
 HRAO |     -   -29     -     -     -     -     -    38 |
 IISC |     -   -86  -165  -273     -     -     -   658 |
 JPLM |     -     -     -  -243     -     -     -   287 |
 KERG |     -    -7    18    57     -     -     -   -75 |
 KIRU |     -  -148  -101     -     -     -     -   290 |
 KOKB |     -   -17     -    56     -     -     -   -44 |
 KOSG |     -  -216     -     -     -     -     -   289 |
 KUNM |     -   -45     -     -     -     -     -    60 |
 MAC1 |     -    85     -  -217     -     -     -   143 |
 MALI |     -     -  -214     X     -     -     -   193 |
 MAS1 |     -     -    31    81     -     -     -  -124 |
 MATE |     -   -99   211     -     -     -     -   -57 |
 MAW1 |     -    -3     -  -170     -     -     -   204 |
 MDO1 |     -   -87     X     -     -     -     -   116 |
 MEDI |     -   -70     -     -     -     -     -    93 |
 MKEA |     -   -21   -65   -95     -     -     -   198 |
 NLIB |     -    10   101     -     -     -     -  -105 |
 NRC2 |     -   -96   -15  -101     -     -     -   264 |
 NYA1 |     -    42     -  -163     -     -     -   137 |
 NYAL |     -     -   155     -     -     -     -  -140 |
 OS0G |     -    85   -21     -     -     -     -   -95 |
 PERT |     -     -   -42    32     -     -     -     - |
 PIE1 |     -     -   -25     -     -     -     -    22 |
 PIMO |     -     -     -   820     -     -     -  -968 |
 POL2 |     -  -311     -     -     -     -     -   416 |
 POTS |     -  -111   -22     -     -     -     -   168 |
 PRDS |     -   -75     -     -     -     -     -   101 |
 RBAY |     -     -     -   510     -     -     -  -602 |
 SANT |     -    44     X     -     -     -     -   -59 |
 SCH2 |     -  -150     -     -     -     -     -   200 |
 SELE |     -     -  -485     -     -     -     -   437 |
 SFER |     -  -111     -     -     -     -     -   149 |
 STJO |     -   -60     -  -116     -     -     -   219 |
 SUTH |     -    68  -127     -     -     -     -    23 |
 THTI |     -     -    77   -15     -     -     -   -52 |
 THU3 |     -    52     -   -59     -     -     -     - |
 TRO1 |     -  -223     -    10     -     -     -   288 |
 TROM |     -     -  -267     -     -     -     -   241 |
 TSKB |     -    17   -58     -     -     -     -    30 |
 TWTF |     -  -347     -     -     -     -     -   464 |
 USNO |     -    74    84     -     -     -     -  -175 |
 VILL |     -   235  -398     -     -     -     -    44 |
 WES2 |     -    -3     4     -     -     -     -     - |
 WILL |     -   -71     -     -     -     -     -    95 |
 WSRT |     -   -26   119     -     -     -     -   -72 |
 WUHN |     -  -148   289   217     -     -     -  -318 |
 YAR2 |     -  -141     -     -     -     -     -   188 |
 YELL |     -    57  -133     -     -     -     -    49 |
 ZWEN |     -  -366   672   -98     -     -     -     X |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  4025    66    87    69  5311  5008     -    92 |  288   4.56
    2 |  2976    27    36    22  6517  3144     -    57 |  288   3.60
    3 |  5166    75   140    31  8427  4840     -    97 |  288   2.25
    4 |  2776    78    40    55  1624  2804     -    81 |  288   0.75
    5 |  4180    37    40    33 11020  2830     -    42 |  288   2.51
    6 |  6778    53   112    66  8254  6726     -    77 |  288   5.17
    7 |  1140    73   221    95  1351  1081     -    47 |  288   0.73
    8 |  2856    71    64    38  3274  2899     -    99 |  288   2.31
    9 |  4567   113   102   125  3502  5204     -   205 |  288   3.43
   10 |  3214    44    50    90  1652  3243     -   121 |  288   2.32
   11 |   427   105    96    74  2232   445     -    44 |  288   0.36
   13 |  1367   111   124    72  1260  1192     -    50 |  288   0.43
   14 |   755    75   105    64  1769   885     -   114 |  288   0.39
   15 |  6251    53     -    39  2993  5536     -    50 |  288   3.92
   17 |  1999    56     -    48  2115  1784     -    54 |  288   1.84
   18 |  1186    86    91    17  1436  1050     -    58 |  288   0.41
   20 |   747    85    63    42  1565   835     -   178 |  288   0.24
   22 |  5898    78   141   116  3906  6274     -    71 |  288   5.08
   23 |  7872    45    56    39  3083  7896     -    41 |  288   7.26
   24 |  1958    73    53    47  3921  1894     -    58 |  288   1.75
   25 |  5691   163    62   204  1552  5220     -    62 |  288   1.50
   26 |   886    78   164    78  1167   902     -    49 |  288   0.83
   27 |  1208    93   155    45  7131  1433     -    58 |  288   1.52
   28 |  2977    63    77    37  1844  3106     -    62 |  288   1.15
   29 |  2006    38    47    53  2752  2054     -    51 |  288   0.53
   30 |  5480    38   101    65  1600  4889     -    64 |  288   1.47
   31 |  2592    48    81   112  4403  2426     -   125 |  288   1.53
 -----+-------------------------------------------------+--------------
 ALBH |     -    44    59     -     -     -     -    19 |  288   0.24
 ALGO |     -    14     X     -     -     -     -    19 |  288   0.03
 AMC2 |     -    25     -     -     -     -     -    33 |  286   0.03
 AREQ |     -     -    72    44     -     -     -    56 |  286  21.48
 ARTU |     -    29    20    28     -     -     -     - |  288  23.10
 ASC1 |     -     -     -    28     -     -     -    32 |  271    >>>
 AUCK |     -    84   263     -     -     -     -   132 |  264  12.05
 BJFS |     -     -     -    92     -     -     -   109 |  286    >>>
 BOR1 |     -    15     -     -     -     -     -    21 |  286   0.57
 BRUS |     -    14     -     -     -     -     -    19 |  286   0.02
 CAS1 |     -    97    32   121     -     -     -   273 |  288   8.74
 CEDU |     -    47    49     -     -     -     -    45 |  288  21.11
 CHAT |     -    36    46     -     -     -     -    52 |  287  13.06
 CHUR |     -    47     -     -     -     -     -    63 |  279   0.52
 COCO |     -    55    32    34     -     -     -    89 |  288  10.72
 CRO1 |     -    30     -     -     -     -     -    40 |  281  23.23
 DAVR |     -    24     -    25     -     -     -    28 |  288  26.70
 DRAO |     -    29     -     -     -     -     -    39 |  288   0.17
 FAIR |     -     -     X    49     -     -     -    58 |  262   0.14
 GODE |     -    23    26     -     -     -     -    15 |  288   0.04
 GOLD |     -    65    69     -     -     -     -    56 |  288  22.95
 GRAZ |     -    22   116     -     -     -     -   109 |  287    >>>
 GUAM |     -     -   146     -     -     -     -   132 |  220  22.48
 HRAO |     -   106     -     -     -     -     -   142 |  288  20.54
 IISC |     -    52    49    43     -     -     -    86 |  288  38.48
 JPLM |     -     -     -   230     -     -     -   271 |  286    >>>
 KERG |     -    31    35    45     -     -     -    45 |  287   3.09
 KIRU |     -    41   114     -     -     -     -    63 |  286 134.56
 KOKB |     -    70     -    27     -     -     -    80 |  288   0.09
 KOSG |     -    65     -     -     -     -     -    87 |  288  23.15
 KUNM |     -    63     -     -     -     -     -    84 |  274  39.43
 MAC1 |     -    36     -    26     -     -     -    59 |  288  16.40
 MALI |     -     -   234     X     -     -     -   211 |  178    >>>
 MAS1 |     -     -    62    32     -     -     -    28 |  288   2.29
 MATE |     -    26    25     -     -     -     -    32 |  288   0.07
 MAW1 |     -    22     -    37     -     -     -    47 |  288  41.66
 MDO1 |     -    28     X     -     -     -     -    37 |  286  17.75
 MEDI |     -    23     -     -     -     -     -    31 |  286   0.06
 MKEA |     -    58    43    71     -     -     -   122 |  288  36.72
 NLIB |     -   178   173     -     -     -     -    85 |  288 193.55
 NRC2 |     -    30    52    17     -     -     -    30 |  288   0.04
 NYA1 |     -    38     -    21     -     -     -    40 |  288   0.05
 NYAL |     -     -    31     -     -     -     -    28 |  286   0.06
 OS0G |     -    24    23     -     -     -     -    23 |  288   0.22
 PERT |     -     -    31    24     -     -     -     - |  288    >>>
 PIE1 |     -     -    21     -     -     -     -    18 |  288   0.08
 PIMO |     -     -     -    42     -     -     -    50 |  125  21.23
 POL2 |     -    41     -     -     -     -     -    55 |  284  23.29
 POTS |     -    18    27     -     -     -     -    20 |  288  14.25
 PRDS |     -    15     -     -     -     -     -    20 |  286   1.82
 RBAY |     -     -     -    38     -     -     -    44 |  123 121.32
 SANT |     -    28     X     -     -     -     -    37 |  276   9.19
 SCH2 |     -    23     -     -     -     -     -    31 |  286  29.39
 SELE |     -     -    36     -     -     -     -    32 |  176  33.98
 SFER |     -    17     -     -     -     -     -    23 |  280   0.52
 STJO |     -    16     -    22     -     -     -    18 |  288   0.06
 SUTH |     -    46    77     -     -     -     -    84 |  288  20.52
 THTI |     -     -    65    35     -     -     -    78 |  287   1.32
 THU3 |     -    17     -    19     -     -     -     - |  288   9.86
 TRO1 |     -    24     -    35     -     -     -    61 |  288  13.38
 TROM |     -     -    35     -     -     -     -    32 |  286  14.03
 TSKB |     -    23    40     -     -     -     -    29 |  288   0.83
 TWTF |     -    60     -     -     -     -     -    80 |  284   0.47
 USNO |     -    22    26     -     -     -     -    25 |  288   0.06
 VILL |     -    41    91     -     -     -     -    44 |  288   5.65
 WES2 |     -    34    51     -     -     -     -     - |  288   0.27
 WILL |     -    21     -     -     -     -     -    28 |  286   1.72
 WSRT |     -    23    19     -     -     -     -    26 |  288   0.02
 WUHN |     -    33    23    33     -     -     -    46 |  287  23.18
 YAR2 |     -    37     -     -     -     -     -    49 |  286   4.89
 YELL |     -   151    89     -     -     -     -   264 |  288   0.09
 ZWEN |     -   130   155    33     -     -     -     X |  277  40.32
 -----+-------------------------------------------------+--------------
 TOT  |  3810    62    92    70  4367  3750     -    85 |


 BEST CLOCK FIT: BRUS   286   0.02 (ns) 

