
 GPS week: 1207   Day: 6   MJD: 52699                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2638      1    -0.40     0.59     4.59     0.00
 cod |   288     0  24348      2     0.34    -0.24     0.06    21.90
 emr |   288     0  13931   1333    62.26    40.48     0.10    10.08
 esa |   288     0  18009    129    -1.07    -0.58     0.50     0.00
 gfz |   288     0  15682     46     0.43    -0.86     0.05    24.84
 igu |    96     0   2446      0    -0.64     1.10     5.02     0.00
 jpl |   288     0  11491   1292     2.45    -3.27     0.05    28.24
 ngs |    96     0   2638      6    -0.29     0.46     4.09     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  25169    559   967.73     9.90     0.08    14.94

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  6299   -27     9   176    98 20975    33  4618     -  -158 |
    2 | -6265     -     X  -104     - -8907     8 -5272     -   -15 |
    3 |  3015   -66     X    23   202  1148  -109  2813     -  -130 |
    4 | -3820   191  -135    93    14  -187  -133 -3745     -   -76 |
    5 | -3349   152  -221    92   -76   753   356 -3597     -  -255 |
    6 |  2987   135  -347   168   161  8189    -1  2281     -  -230 |
    7 |  3267   185  -155     4  -190     -   275  2770     -   -90 |
    8 |  -494    73   -74   210   -12 -2240   205  -502     -  -214 |
    9 | -3167    48   -53   249    67  5166    72 -2795     -  -224 |
   10 |-10105    97  -319   -41    12 -1069   346 -9225     -  -247 |
   11 |  4447    99   320    46  -114   491   -98  4329     -   -67 |
   13 |  3735    46   234    98    53  2589  -273  4098     -   -32 |
   14 | -5919   144    46   140    13 -9957   -40 -5053     -  -227 |
   15 |  1128    96  -164     -    36  3911    94  1213     -  -172 |
   16 |  6275  -122     -  -246   107 -1576     X  5499     -     X |
   17 |  3093    99  -334    -4   172     -     -  3272     -  -206 |
   18 |  4436    87    31   137   -29  1678   -10  4406     -   -92 |
   20 |  7402  -146    92   345    -2  2082   389  7378     -  -181 |
   22 |-11255  -121     X   732   240  2045     X -8451     -  -230 |
   23 |  4124   165  -188   161  -180  4434   373  2999     -  -199 |
   24 |  -761   127  -254    61    13 11479   101  -836     -  -141 |
   25 | -2584    16   -49  -526   279-10602  -197 -2870     -  -286 |
   26 | -1987   129   -74   130   122  -113  -103 -1940     -  -252 |
   27 | -4291     7    44   143     7-21080   201 -4048     -  -257 |
   28 |  1648   139   182  -175  -140  8757   -19  1549     -   -75 |
   29 |  -675   127  -222   -30   164 -2676   -11  -742     -  -297 |
   30 | -1688   179  -353   403   249-12318  -147 -2530     -  -287 |
   31 |  1028    47     X  -277   -24 -7689    73   986     -  -103 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -193   146   261     -     -    -7     -     -   201 |
 AMC2 |     -  -205    30     -     -     -     X     -     -   283 |
 AREQ |     -    39    36   251   -34     -    30     -     -   -79 |
 ASC1 |     -    42     -   -48    49     -     -     -     -  -142 |
 AUCK |     -    83     -    37     -     -     -     -     -  -122 |
 BOR1 |     -  -104     6     -     -     -     -     -     -   150 |
 BRUS |     -   -67    93     -     -     -   -86     -     -   200 |
 CAS1 |     -    49     -   253   -18     -     -     -     -   -42 |
 CEDU |     -  -181     -   -44     -     -     -     -     -   265 |
 CHAT |     -  -136     -    86     -     -     -     -     -   200 |
 COCO |     -    81     -  -291    68     -     -     -     -  -230 |
 CRO1 |     -     -   195   -92   -53     -    44     -     -  -115 |
 DAVR |     -   110     -     -    -4     -     -     -     -  -154 |
 DRAO |     -    -8   157     -     -     -     -     -     -   -94 |
 FAIR |     -     -   231   148   -82     -   -14     -     -     6 |
 GODE |     -  -237    59     -     -     -     -     -     -   308 |
 GOLD |     -    20     -   221     -     -  -153     -     -   263 |
 GOPE |     -   106     -     -     -     -   -82     -     -     - |
 GRAZ |     -    -7   179   203     -     -     -     -     -  -109 |
 GUAM |     -   244     -  -112     -     -  -277     -     -   171 |
 HOB2 |     -   110     X     -   -88     -     -     -     -   -16 |
 HRAO |     -    82     -     -     -     -  -222     -     -   299 |
 IISC |     -    39     -  -367  -147     -     X     -     -   239 |
 JPLM |     -     -  -120     -    13     -     -     -     -    59 |
 KIRU |     -  -209    98  -190     -     -     -     -     -   244 |
 KODK |     -     -     -     -  -153     -   135     -     -     - |
 KOKB |     -   -75   327     -   -58     -     -     -     -   -18 |
 KOSG |     -  -111     -     -     -     -     -     -     -   163 |
 KOUR |     -     -     -   385    32     -     -     -     -   -54 |
 KUNM |     -  -118     -     -     -     -     -     -     -   173 |
 LPGS |     -   -94     - -1257     -     -     -     -     -   138 |
 MAC1 |     -   160     -     -  -136     -     -     -     -    -5 |
 MAG0 |     -    21     -     -     -     -   -16     -     -     - |
 MAS1 |     -     0    90   396    -4     -     -     -     -   -55 |
 MCM4 |     -   185     -     -   -40     -     X     -     -  -206 |
 MDO1 |     -  -129    83  -604     -     -    37     -     -    61 |
 MEDI |     -     -   -51     -     -     -    16     -     -     4 |
 METS |     -  -137     -     -     -     -     -     -     -   201 |
 MKEA |     -   -40     -   107  -175     -   -27     -     -   401 |
 MONP |     -    33     -     -     -     -   -25     -     -     - |
 NANO |     -     4     -     -     -     -    -3     -     -     - |
 NKLG |     -     -     -   132    71     -     -     -     -  -118 |
 NLIB |     -     -   136   102  -157     -   121     -     -   -59 |
 NRIL |     -   104     -     -   -85     -     5     -     -     - |
 NTUS |     -   -19     -     -    47     -     -     -     -   -49 |
 NYA1 |     -   -56     -     -     -     -     -     -     -    82 |
 NYAL |     -     -   151   434     -     -     -     -     -  -102 |
 OHI2 |     -    99     -     -   -87     -     -     -     -     - |
 OS0G |     -   128     -  -371   -85     -     -     -     -   -47 |
 PIE1 |     -   -76   -24    10     -     -   104     -     -   -70 |
 POL2 |     -  -119     -     -     -     -  -109     -     -   378 |
 POTS |     -  -127     -  -144     -     -     -     -     -   186 |
 RBAY |     -     -     -     -  -518     -     -     -     -   861 |
 REYK |     -  -114     -  -340     -     -     -     -     -   167 |
 SANT |     -  -189     - -1533     -     -   153     -     -   -27 |
 SFER |     -  -218   -48   149     -     -     -     -     -   351 |
 SUTH |     -  -229     -  -393     -     -     -     -     -   336 |
 THTI |     -     -     -   228    96     -     -     -     -  -159 |
 THU3 |     -    38     -     -   -33     -     -     -     -     - |
 TIDB |     -    28   111   317   -70     -     X     -     -     X |
 TLSE |     -    13     -     -     -     -     -     -     -   -19 |
 TRO1 |     -  -218     -     -   -61     -     -     -     -   424 |
 USUD |     -   115     -    75     -     -   -29     -     -  -112 |
 WILL |     -  -134   185     -     -     -     -     -     -    73 |
 WSRT |     -    -8     -    51     -     -     -     -     -    12 |
 WTZR |     -   -16     -     6     -     -     -     -     -    23 |
 WUHN |     -    -1     -  -105     -     -     -     -     -     1 |
 YAKT |     -  -146     -     -     -     -  -237     -     -   667 |
 YAR2 |     -   -79     -     -     -     -     -     -     -   115 |
 ZWEN |     -   -46     -   -71    49     -     -     -     -   -15 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5950    64   136   693    40  9048    54  6136     -    80 |  288   3.26
    2 |  5964     -     X  1563     -  2940   100  5053     -   190 |  139   1.93
    3 |  2210    71     X   719    36  2081    71  2340     -   108 |  288   2.13
    4 |  1580    87    53   252    28  1183    57  1378     -    97 |  288   0.76
    5 |  7222    48    64   211    40  4201    48  6377     -    38 |  288   4.08
    6 |  7198    87   159   283    33  6488    48  6403     -    45 |  288   6.14
    7 |  1687    71   117   405    33     -    39  2027     -    48 |  288   0.82
    8 |  3502    61    90   167    45  2752    42  3638     -    46 |  288   2.82
    9 |  2576    69    87   307    36  3446    45  2519     -    85 |  288   2.16
   10 |  2842    53   102   472    33  2886    73  2268     -    58 |  288   2.64
   11 |   971   120   178   391    59   589    68   920     -    71 |  288   0.49
   13 |  1798    60   127   284    85  1342    52  1857     -    88 |  288   0.30
   14 |  3828    81   121   398    33  5416    83  3391     -   138 |  288   0.22
   15 |  4877    80   145     -    54  5085    61  5045     -    56 |  288   2.79
   16 |  4371    55     -  1426    49  2335     X  4047     -     X |  288   0.50
   17 |  4083    61    58   452    35     -     -  3942     -    58 |  288   1.47
   18 |  1542    57    69   327    28   597    62  1497     -    45 |  288   0.35
   20 |   792    91   170   808    77   758    62   807     -   163 |  288   0.23
   22 | 13046    54     X  1232    65 11077     X  9660     -   131 |  288   8.27
   23 |  8233    38    75   455    34  4234    69  8224     -    40 |  288   7.04
   24 |  2088    86    64   254    32  5104    50  1866     -   160 |  288   1.80
   25 |  4366   112   110  1151    85  5272    69  4203     -    68 |  288   1.62
   26 |  1209    31    60   188    50  1455    46  1024     -    72 |  288   0.99
   27 |  1580    64    67   343    45 11275    55  1649     -    48 |  288   1.14
   28 |  1080    52   155   277    28  4037    35   997     -    74 |  288   0.52
   29 |  1876    60    68   174    28  1916    41  1685     -    78 |  288   0.81
   30 |  6285    82   123   273    39  6935    56  5760     -    49 |  288   0.89
   31 |  1302    95     X   927    34  3919    54  1420     -   115 |  288   1.18
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    24   135    94     -     -    32     -     -   116 |  288   0.10
 AMC2 |     -    42    65     -     -     -     X     -     -    88 |  288   0.03
 AREQ |     -    32   112   388    53     -    59     -     -    53 |  288  24.92
 ASC1 |     -    30     -   196    18     -     -     -     -    51 |  286    >>>
 AUCK |     -    19     -   796     -     -     -     -     -    29 |  264  12.23
 BOR1 |     -    35    69     -     -     -     -     -     -    52 |  288   0.38
 BRUS |     -   100    76     -     -     -    62     -     -    54 |  288   0.04
 CAS1 |     -    45     -   121    31     -     -     -     -    46 |  288   9.29
 CEDU |     -    34     -   153     -     -     -     -     -    49 |  288  15.00
 CHAT |     -    22     -   156     -     -     -     -     -    32 |  285  13.05
 COCO |     -    38     -   499    20     -     -     -     -    53 |  286  12.56
 CRO1 |     -     -   154   627    44     -    54     -     -    96 |  288  22.58
 DAVR |     -    65     -     -    26     -     -     -     -    64 |  288  23.32
 DRAO |     -    46    51     -     -     -     -     -     -    89 |  288   0.07
 FAIR |     -     -    56   593   219     -    91     -     -   186 |  288   0.16
 GODE |     -    42    58     -     -     -     -     -     -    43 |  288   0.05
 GOLD |     -    45     -   321     -     -    19     -     -    66 |  284  20.27
 GOPE |     -    50     -     -     -     -    39     -     -     - |  288  18.71
 GRAZ |     -    35    59   294     -     -     -     -     -    39 |  287    >>>
 GUAM |     -    45     -   119     -     -    30     -     -    54 |  288  19.30
 HOB2 |     -    42     X     -    35     -     -     -     -    54 |  288  25.60
 HRAO |     -    55     -     -     -     -    58     -     -    98 |  288  23.55
 IISC |     -    37     -   364    20     -     X     -     -    51 |  282  37.44
 JPLM |     -     -   136     -    23     -     -     -     -    89 |  239  46.79
 KIRU |     -    77   171   193     -     -     -     -     -    44 |  288   1.91
 KODK |     -     -     -     -    26     -    23     -     -     - |  287  13.32
 KOKB |     -    42    82     -    70     -     -     -     -   118 |  288   0.06
 KOSG |     -    97     -     -     -     -     -     -     -   143 |  288  24.56
 KOUR |     -     -     -   595    25     -     -     -     -    42 |  257   2.28
 KUNM |     -    33     -     -     -     -     -     -     -    49 |  258  34.74
 LPGS |     -    27     -   263     -     -     -     -     -    39 |  266  65.53
 MAC1 |     -   112     -     -   106     -     -     -     -    53 |  285  14.62
 MAG0 |     -    28     -     -     -     -    22     -     -     - |  287  11.46
 MAS1 |     -    33    40   569    24     -     -     -     -    48 |  288   1.54
 MCM4 |     -    68     -     -    37     -     X     -     -    67 |  288  15.46
 MDO1 |     -    41    42   186     -     -    37     -     -   132 |  288  52.32
 MEDI |     -     -    63     -     -     -    32     -     -    36 |  288   0.04
 METS |     -    20     -     -     -     -     -     -     -    30 |  284   0.49
 MKEA |     -    49     -   198    64     -    43     -     -   154 |  288  32.89
 MONP |     -    29     -     -     -     -    22     -     -     - |  287  19.80
 NANO |     -    28     -     -     -     -    22     -     -     - |  288  45.91
 NKLG |     -     -     -   322    28     -     -     -     -    47 |  287  85.67
 NLIB |     -     -    56    98    17     -    30     -     -    72 |  288 439.27
 NRIL |     -    82     -     -    58     -    30     -     -     - |  288  15.25
 NTUS |     -    25     -     -    28     -     -     -     -    49 |  288  10.77
 NYA1 |     -    18     -     -     -     -     -     -     -    26 |  286   0.04
 NYAL |     -     -    82   141     -     -     -     -     -    55 |  288   0.04
 OHI2 |     -    25     -     -    22     -     -     -     -     - |  286  17.43
 OS0G |     -    45     -   257    20     -     -     -     -    51 |  288   0.11
 PIE1 |     -    86   182   103     -     -    23     -     -   224 |  288 187.27
 POL2 |     -    36     -     -     -     -    22     -     -    58 |  288  21.04
 POTS |     -    47     -   211     -     -     -     -     -    68 |  285  11.83
 RBAY |     -     -     -     -    47     -     -     -     -    78 |   76  22.82
 REYK |     -    32     -   329     -     -     -     -     -    46 |  259  12.35
 SANT |     -    28     -  1381     -     -    43     -     -    57 |  277   4.89
 SFER |     -    34    91   603     -     -     -     -     -    44 |  285 499.22
 SUTH |     -    28     -   193     -     -     -     -     -    41 |  286  23.49
 THTI |     -     -     -   124    28     -     -     -     -    46 |  287   4.59
 THU3 |     -    14     -     -    12     -     -     -     -     - |  284   9.94
 TIDB |     -    51    98   256    27     -     X     -     -     X |  177   0.24
 TLSE |     -    60     -     -     -     -     -     -     -    88 |  286   0.35
 TRO1 |     -    40     -     -    26     -     -     -     -    82 |  288  10.22
 USUD |     -    56     -   214     -     -    70     -     -    67 |  288  19.09
 WILL |     -    44   108     -     -     -     -     -     -   121 |  288   1.86
 WSRT |     -    24     -   287     -     -     -     -     -    36 |  282   0.05
 WTZR |     -    29     -   208     -     -     -     -     -    43 |  288   0.10
 WUHN |     -    42     -   238     -     -     -     -     -    61 |  287  21.80
 YAKT |     -    21     -     -     -     -    19     -     -    34 |  288   0.43
 YAR2 |     -    25     -     -     -     -     -     -     -    36 |  285   5.06
 ZWEN |     -    24     -   174    31     -     -     -     -    35 |  288  16.94
 -----+-------------------------------------------------------------+--------------
 TOT  |  4588    56   105   497    52  5025    49  4087     -    81 |


 BEST CLOCK FIT: AMC2   288   0.03 (ns) 

