
 GPS week: 1207   Day: 4   MJD: 52697                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  30612    261     0.42    -0.67     0.06    21.68
 emr |   288     0  19023     28  -962.87    -6.79     0.08    16.15
 esa |   288     0  19739   1876   226.29     7.57     0.11    10.80
 gfz |   288     0  29185    482    -0.11     0.00     0.06    24.04
 igr |   288     0  23664     57    -0.18     0.31     0.06     0.00
 jpl |   288     0  20749    894    -3.03     1.39     0.05    27.34
 ngs |    96     0   2496      0    -0.23     0.32     4.53     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio |
 -----+-------------------------------------------------+
    1 |   -21  -166  -144   125   188    84-10687     - |
    2 |  -139  -266   -53    61    19   257 -4166     - |
    3 |   -15  -214     3    50   -27   103  4802     - |
    4 |   125    58   173    75    70  -306  1395     - |
    5 |    -4  -131    11    54  -119    31  2565     - |
    6 |   100  -203   221   147   -61  -181  3258     - |
    8 |  -159  -196   123    84    24   119 -8621     - |
    9 |   162  -167  -115   171   -26  -150 -5126     - |
   10 |  -127  -141    15    -3   -45   206 -4547     - |
   11 |    22    72    92   -89   119   -22  2598     - |
   13 |   150   128   128    77   100  -331  3126     - |
   14 |   208   -90    82  -102   -49   -66  3413     - |
   15 |    18  -204     -    12     -   119 -2166     - |
   16 |    -2   108   -17   -63    29     X  4118     - |
   18 |    83  -169   277   -94    43    10  3924     - |
   20 |  -168   -89  -203   -25   -10   294  3696     - |
   22 |   -47  -122  -116   116   167   197  4695     - |
   23 |    50  -278   -13   -41   -26   196 -1275     - |
   24 |   -38   -53    66   177    20  -139 -3495     - |
   25 |   125  -262    -5   146    -7   -84  1077     - |
   26 |   192  -132   236   103    57  -280 -3675     - |
   27 |   -81  -175   169    65    24    44 -1121     - |
   28 |     9   130   217  -132   -53   -58  6248     - |
   29 |   169  -159    96   129    22  -204 -1629     - |
   30 |   258   -30   180   288    -1  -534  -244     - |
   31 |   -43  -161    91   -50    69   154  1832     - |
 -----+-------------------------------------------------+
 ALBH |  -226    96     -     -   183   125     -     - |
 ALGO |     7   210     X  -148  -291     X     -     - |
 ALIC |   101     -     -     -    91   -80     -     - |
 AMC2 |   -55    72     -     -  -153     2     -     - |
 ANKR |    68     -   -12     -     -   -50     -     - |
 AOML |   -79     -     -    52   -36    17     -     - |
 AREQ |   139   -47     -    50    19  -124     -     - |
 ARTU |    71     -     -     X     -   -56     -     - |
 ASC1 |    36     -  -447   158    29    10     -     - |
 AUCK |     -     -   -96     -     -    38     -     - |
 BAHR |   -27   -18    46    13   -53     2     -     - |
 BILI |    71     -     -   -86    -8    19     -     - |
 BJFS |     -   196     -  -132   211     -     -     - |
 BOGT |     -     -  -655   294     -     -     -     - |
 BOR1 |   -22    29     -     -     -     -     -     - |
 BRAZ |     -     -     -   -80     -    71     -     - |
 BRUS |   -94   126     -     -   167     -     -     - |
 CAS1 |   -38     -   -22   -88   -12   118     -     - |
 CEDU |    10     -   -20     -    90     -     -     - |
 CHUR |  -121   163     -     -   -60     -     -     - |
 COCO |    88     -  -430   216   -99   -90     -     - |
 CRO1 |     -    64     -     -    -8   -38     -     - |
 DAVR |     4     -     -   -44   -18    36     -     - |
 DRAO |     4    77     X   -55    37     -     -     - |
 DUBO |    -1     -     -     -     -     0     -     - |
 DWH1 |     -    79     -   -53     -     -     -     - |
 FAIR |     -    63     X   -42    59     -     -     - |
 FORT |     X     -     X  -275  -243   242     -     - |
 GODE |   -43   164  -151     -   -73     -     -     - |
 GOLD |   415     -  -269  -194  -338     -     -     - |
 GRAZ |  -187   185   108     -   -53     -     -     - |
 GUAM |   -13     -     -  -166   -35   159     -     - |
 HARB |    62     -     -   -56     -     -     -     - |
 HOB2 |     -   -47     -    32    -3     -     -     - |
 HRAO |   114     -   -57     -   126   -68     -     - |
 INVK |    -2     -     -     2     -     -     -     - |
 IRKT |    89    61  -120   -18     -   -43     -     - |
 JPLM |     -    51     -   -34    81     -     -     - |
 KIRU |  -132   275   -26     -    60     -     -     - |
 KIT3 |    10     -   126   -15     -   -45     -     - |
 KOKB |     -    80   116  -114  -189     8     -     - |
 KOSG |    -7     -     X     6    89     -     -     - |
 KOUR |     0     -   296   -62    84   -62     -     - |
 KSTU |    19     -     -   -17     -     -     -     - |
 LHAS |   -11     -  -135    -6     -    67     -     - |
 MAC1 |   -44     -     -  -176   -74   193     -     - |
 MADR |   -10   -86     -    63     -     -     -     - |
 MAS1 |   -77    79   143   -45     -     -     -     - |
 MATE |   107     -     -   -97  -233     -     -     - |
 MCM4 |   156   -15     -    63    72  -188     -     - |
 MDO1 |   175  -172  -415   133   -52     -     -     - |
 METS |  -126   206     -   -20    73     -     -     - |
 MIZU |     -   -62     -    42     -     -     -     - |
 MKEA |    26     -   -51     -    -1     -     -     - |
 NKLG |   -29     -  -157   132  -125   -31     -     - |
 NLIB |   -94   142     -    -1    98     -     -     - |
 NOT1 |     -  -192     -     -     -   114     -     - |
 NOUM |     -     -     -   203     -  -179     -     - |
 NRC2 |    65   124  -443    57    -8     -     -     - |
 NRIL |    26     -     -   -75    72    51     -     - |
 NTUS |  -168     -     -    32   -91   105     -     - |
 NYA1 |   118     -     -  -106   145     -     -     - |
 NYAL |     -    37    44     -  -199   -39     -     - |
 OHI2 |    69     -     -   -45    50     5     -     - |
 OS0G |   -70    77    -5    37   -82   -21     -     - |
 PDEL |  -212     -     -   191     -     -     -     - |
 PERT |     -   172    30     -     -  -114     -     - |
 PETP |   -60     -     -   -48     -    89     -     - |
 PIE1 |   -65   140   -79     -    53     -     -     - |
 PIMO |    -5     -    35   -50  -311    34     -     - |
 POTS |    13     -   -71    20    39     -     -     - |
 QAQ1 |    34     -     -   -30     -     -     -     - |
 RESO |    50     -     -   -67     -    19     -     - |
 REYK |    66     -     -  -159   116    89     -     - |
 RIOG |    71     -     -   -64     -     -     -     - |
 SANT |    43     -  -116   -45    51    44     -     - |
 SCUB |    45     -     -   -40     -     -     -     - |
 SFER |   -96   163     X     -     -   -19     -     - |
 STJO |   -89    91     -   -90    71    96     -     - |
 SUTH |   -68     -   225   -40    68     -     -     - |
 SUWN |   -61    82     -     -     -     -     -     - |
 SYOG |   -40     -     -    26     -     7     -     - |
 THTI |     -     -   299  -164   -16    26     -     - |
 THU3 |    24     -     -   -22     -     -     -     - |
 TIDB |     -     -   362     X     -  -143     -     - |
 TIXI |     7     -     -    -6     -     -     -     - |
 TOW2 |   -60     -     -   -23   -89    67     -     - |
 TRO1 |  -138     -     -   124   126     -     -     - |
 TSKB |   -73    59   -20   -10     -    39     -     - |
 TWTF |   -19   -79     -    69     -     -     -     - |
 URUM |     -     -     -   -68     -    60     -     - |
 USNO |   -61   119   -55     -     -     -     -     - |
 USUD |    14   -23     -     3    54     -     -     - |
 VILL |     6     -     -    -5  -416     -     -     - |
 WES2 |    22    82   264  -192     -     -     -     - |
 WILL |   -55    74     -     -     -     -     -     - |
 WSRT |  -135   201    37   -29  -134     -     -     - |
 WTZR |     -   192   -81   -98   167     -     -     - |
 WUHN |  -206     -     -   186   143     X     -     - |
 YELL |    16     -   130  -115    -7    37     -     - |
 YSSK |    61     -     -   -55     -     -     -     - |
 ZECK |   -23     -     -    21     -     -     -     - |
 ZWEN |   -99     -   263   -29   -90     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |    59    45   211    37    43    44  5105     - |  288   4.24
    2 |    48   113   174    41    66    59  8931     - |  288   3.32
    3 |    54   117   168    70    72    37  2917     - |  288   1.67
    4 |    78    93    93    42    46    39  2092     - |  288   0.67
    5 |    55    54   101    40    69    36  7407     - |  288   3.21
    6 |    72    98   119    35    64    40  6816     - |  288   4.95
    8 |    71    77    80    16    33    44  5119     - |  288   2.29
    9 |    76    50   181    49    46    60  3290     - |  288   2.83
   10 |    70    85   186    41    55    60  2491     - |  288   2.07
   11 |    57    36   211    71    57    44   716     - |  288   0.35
   13 |    60    90   107    58    40    41   570     - |  288   0.33
   14 |    60    43    70    41    42    66  1076     - |  288   0.23
   15 |    94   151     -    37     -    33  4147     - |  288   3.24
   16 |    46    91   137    39    68     X   694     - |  288   0.37
   18 |    63    66    77    33    79    35   492     - |  288   0.30
   20 |    52    43    71    37    51    28   589     - |  288   0.34
   22 |    60    81   151    41    95    86 10364     - |  288   8.24
   23 |    54    92    88    38    73    44  8320     - |  288   6.47
   24 |    61   117    68    51    62    43  4933     - |  288   2.14
   25 |    76    99   139    33    72    73  1996     - |  288   1.21
   26 |    48    77   145    42    39    81  1081     - |  288   0.81
   27 |    69   110   193    27    44    41  2395     - |  288   0.99
   28 |    67    63    50    25    36    32  5800     - |  288   3.04
   29 |    63    59   147    40    33    75  1197     - |  288   0.72
   30 |    45   107    46    37    49    38  1740     - |  288   0.66
   31 |    53    41   192    54    74    39  2421     - |  288   1.47
 -----+-------------------------------------------------+--------------
 ALBH |    66    76     -     -    25    36     -     - |  288   0.26
 ALGO |    73    59     X    31    50     X     -     - |  288 367.88
 ALIC |    39     -     -     -    16    31     -     - |  288  50.80
 AMC2 |    37    71     -     -    53    32     -     - |  288   0.03
 ANKR |    39     -    24     -     -    29     -     - |  288    >>>
 AOML |    28     -     -    26    45    35     -     - |  288  56.67
 AREQ |    54    26     -    26    16    24     -     - |  288  23.27
 ARTU |    29     -     -     X     -    23     -     - |  278  19.84
 ASC1 |    20     -    43    20    46    27     -     - |  286    >>>
 AUCK |     -     -   235     -     -    93     -     - |  173  16.37
 BAHR |    19    24    30    23    43    17     -     - |  288   0.51
 BILI |    42     -     -    59    26    43     -     - |  286  11.49
 BJFS |     -    76     -    51   127     -     -     - |  282    >>>
 BOGT |     -     -    82    37     -     -     -     - |  288  26.02
 BOR1 |   121   163     -     -     -     -     -     - |  225   0.59
 BRAZ |     -     -     -    29     -    25     -     - |  274    >>>
 BRUS |    38    51     -     -    53     -     -     - |  286   0.25
 CAS1 |    62     -    72   104    56   141     -     - |  288  10.07
 CEDU |    19     -    38     -    42     -     -     - |  288  17.64
 CHUR |    77   103     -     -    64     -     -     - |  135   0.60
 COCO |    37     -    43    21    18    21     -     - |  288  11.38
 CRO1 |     -    33     -     -    40    19     -     - |  288  22.40
 DAVR |    39     -     -    40    24    24     -     - |  288  21.23
 DRAO |    50    57     X    11    34     -     -     - |  287  79.46
 DUBO |    36     -     -     -     -    29     -     - |  256  12.79
 DWH1 |     -    75     -    50     -     -     -     - |  249   0.59
 FAIR |     -    69     X    47    39     -     -     - |  255   0.05
 FORT |     X     -     X    62   136    54     -     - |  283   0.27
 GODE |    39    85    66     -    83     -     -     - |  288   0.07
 GOLD |    33     -    46    17    52     -     -     - |  288  23.28
 GRAZ |    47    57   130     -    52     -     -     - |  287  83.97
 GUAM |    25     -     -    28    27    19     -     - |  288  17.55
 HARB |    34     -     -    31     -     -     -     - |  286  35.88
 HOB2 |     -   122     -    82   188     -     -     - |  139 151.49
 HRAO |    29     -    28     -    51    23     -     - |  288  20.54
 INVK |    22     -     -    20     -     -     -     - |  288  11.86
 IRKT |    32    28    31    22     -    19     -     - |  288   0.42
 JPLM |     -   126     -    85   117     -     -     - |  268  30.91
 KIRU |    57   107    44     -    51     -     -     - |  266   2.11
 KIT3 |    56     -    93    37     -    46     -     - |  277    >>>
 KOKB |     -   129   103    37    35    36     -     - |  288   0.04
 KOSG |    17     -     X    15    32     -     -     - |  288  61.72
 KOUR |    32     -   111    23    18    41     -     - |  192   1.01
 KSTU |    37     -     -    33     -     -     -     - |  285  11.78
 LHAS |    21     -    51    33     -    28     -     - |  288  10.92
 MAC1 |    63     -     -    79    45    79     -     - |  288  13.73
 MADR |    72    96     -    66     -     -     -     - |  280  15.14
 MAS1 |    37    36   196    37     -     -     -     - |  286   1.81
 MATE |    27     -     -    25    47     -     -     - |  288   0.18
 MCM4 |   133   119     -   176    59   116     -     - |  288    >>>
 MDO1 |   142   144   165   150   162     -     -     - |  288  15.79
 METS |    52    57     -    52    24     -     -     - |  287   0.26
 MIZU |     -   111     -    74     -     -     -     - |  277   0.70
 MKEA |    45     -    90     -    37     -     -     - |  288  33.32
 NKLG |    20     -    49    31    13    23     -     - |  287 227.61
 NLIB |   192   144     -   155    40     -     -     - |  261    >>>
 NOT1 |     -    80     -     -     -    47     -     - |  282    >>>
 NOUM |     -     -     -    20     -    18     -     - |  287    >>>
 NRC2 |    61    28    39    34    17     -     -     - |  288   0.05
 NRIL |    84     -     -    88    96   117     -     - |  259  14.96
 NTUS |    22     -     -    24    42    28     -     - |  288   9.33
 NYA1 |    45     -     -    41    49     -     -     - |  288   0.08
 NYAL |     -    21    34     -    43    20     -     - |  288   0.07
 OHI2 |    24     -     -    36    36    31     -     - |  264  10.06
 OS0G |    56    19    31    18    32    27     -     - |  288   0.25
 PDEL |    24     -     -    21     -     -     -     - |  288  59.77
 PERT |     -    38    46     -     -    29     -     - |  192    >>>
 PETP |    54     -     -    33     -    21     -     - |  287  15.82
 PIE1 |    33    29    28     -    32     -     -     - |  288   0.05
 PIMO |    56     -    77   106    41   111     -     - |  276  27.51
 POTS |   105     -    71    64    40     -     -     - |  277  12.82
 QAQ1 |    25     -     -    23     -     -     -     - |  288  19.67
 RESO |    69     -     -    32     -    31     -     - |  287  10.71
 REYK |    40     -     -    25    49    30     -     - |  190  18.25
 RIOG |    38     -     -    34     -     -     -     - |  285  10.76
 SANT |    44     -    53    17    23    28     -     - |  288   7.55
 SCUB |    33     -     -    30     -     -     -     - |  283  21.31
 SFER |    42    79     X     -     -    45     -     - |  287   0.47
 STJO |    65    32     -    33    14    39     -     - |  288   0.09
 SUTH |    22     -    66    28    35     -     -     - |  288  17.23
 SUWN |    63    85     -     -     -     -     -     - |  284   1.23
 SYOG |   121     -     -    84     -    45     -     - |  267   1.36
 THTI |     -     -    87    20    46    33     -     - |  287   3.75
 THU3 |    18     -     -    16     -     -     -     - |  288  12.05
 TIDB |     -     -    63     X     -    25     -     - |  173   0.11
 TIXI |   302     -     -   272     -     -     -     - |  287  11.12
 TOW2 |    47     -     -    26    22    32     -     - |  288  16.07
 TRO1 |    77     -     -    69    30     -     -     - |  288  12.14
 TSKB |    39    41    64    28     -    29     -     - |  288   0.99
 TWTF |    49    97     -    32     -     -     -     - |  288   0.60
 URUM |     -     -     -    22     -    19     -     - |  286  29.31
 USNO |    19    73   110     -     -     -     -     - |  283   0.08
 USUD |    27    71     -    30    35     -     -     - |  287  17.13
 VILL |    21     -     -    18    19     -     -     - |  192   2.65
 WES2 |    36   110    48    51     -     -     -     - |  288   0.09
 WILL |    51    69     -     -     -     -     -     - |  252   3.52
 WSRT |    32    69    41    36    38     -     -     - |  288   0.04
 WTZR |     -    47    32    22    38     -     -     - |  117   0.17
 WUHN |    33     -     -    30    33     X     -     - |  287  20.57
 YELL |    93     -   170   128    37   167     -     - |  288   0.05
 YSSK |    23     -     -    21     -     -     -     - |  287  18.07
 ZECK |    24     -     -    21     -     -     -     - |  288  22.48
 ZWEN |    16     -    31    20    10     -     -     - |  288  19.73
 -----+-------------------------------------------------+--------------
 TOT  |    65    82   108    58    56    52  4531     - |


 BEST CLOCK FIT: AMC2   288   0.03 (ns) 

