
 GPS week: 1207   Day: 6   MJD: 52699                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  33274     43    -0.14     0.48     0.05    20.52
 emr |   288     0  19554     93    61.45    41.48     0.07    14.14
 esa |   288     0  19952   2505    60.54    41.47     0.08    10.42
 gfz |   288     0  29023    540    -0.14    -0.08     0.03    31.74
 igr |   288     0  23667      0    -0.52     0.77     0.05     0.00
 jpl |   288     0  20522    764    -0.40     0.19     0.05    23.18
 ngs |    96     0   2496      0     0.33    -0.44     3.70     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio |
 -----+-------------------------------------------------+
    1 |    13  -129  -135    95  -104    -3  4180     - |
    3 |   -63   -75    60    29   -23    43  2440     - |
    4 |   160  -195    13   105    24  -208 -4080     - |
    5 |   -49  -191   -28    83   -67    67 -4030     - |
    6 |    49  -242   174   121   -39  -155  1889     - |
    7 |   -39  -264     3   -33   -68   284  2348     - |
    8 |   -16  -316   162    33   -42   106  -896     - |
    9 |    32  -213    90   180   -95  -213 -3251     - |
   10 |  -156  -349   107    55   -37   246 -9725     - |
   11 |   103   117   178  -140   -31   -50  3980     - |
   13 |   168   -77   196    80     4  -337  3750     - |
   14 |   145   -67   120   -23   -74  -129 -5436     - |
   15 |   -57  -170     -    48  -144   100   711     - |
   16 |   -76    60   163   -31   -54     X  5198     - |
   17 |   -17  -203     -   101   -67     -  2866     - |
   18 |    91   -31   160   -70   -43   -43  4008     - |
   20 |   -79   -27   -73   -86   -27   265  6995     - |
   22 |   -82     -  -133    97     6     X     -     - |
   23 |    99  -311  -123   -30   -34   228  2599     - |
   24 |    16  -257    32    83   -18    18 -1204     - |
   25 |    77  -252    72   146   -70  -172 -3272     - |
   26 |   100  -255   299   188   -72  -352 -2364     - |
   27 |   -24  -351   169   101   -74    27 -4472     - |
   28 |    78    30   -28   -51    12    -6  1225     - |
   29 |    69  -271   173   184   -45  -245 -1142     - |
   30 |   155  -153   148   259   -46  -525 -2923     - |
   31 |     5   -92    64  -110   -22   184   607     - |
 -----+-------------------------------------------------+
 ALBH |  -130   143  -133     -    63    90     -     - |
 ALGO |  -109   209     X  -123     -   138     -     - |
 ALIC |    57     -     -     -     -   -50     -     - |
 ALRT |   -35     -     -    23     -     -     -     - |
 AMC2 |  -137   125     -     -    57    45     -     - |
 ANKR |    93     -  -184     -     -     -     -     - |
 AOML |   -23     -     -    15     -     -     -     - |
 AREQ |    42   -38     -    76     8  -112     -     - |
 ARTU |    77     -     -    18     -   -93     -     - |
 ASC1 |   -35     -  -200    81   -13    10     -     - |
 AUCK |    36     -     X     -   -27   -32     -     - |
 BAHR |    20    82  -131    -7     -     -     -     - |
 BILI |   -18     -     -    21     -   -13     -     - |
 BJFS |     -   263     -  -117     -     -     -     - |
 BOGT |    40     -     X   -76     -    74     -     - |
 BOR1 |   -75   109     -     -    18     -     -     - |
 BRUS |   -96   139     -     -     1     -     -     - |
 CAS1 |   -72     -   116   -63  -118    98     -     - |
 CEDU |   -97     -   190     -   124     -     -     - |
 CHAT |    26     -     -   -17   194     -     -     - |
 CHUR |   -57    83     -     -     -     -     -     - |
 COCO |    11     -    79    36   -82   -87     -     - |
 CRO1 |     -   106   -14     -    76   -58     -     - |
 DAVR |    35     -     -   -37   -84    21     -     - |
 DGAR |     -     -   -71    23     -     -     -     - |
 DRAO |    50   185  -252   -32    94     -     -     - |
 DUBO |  -198     -     -     -     -   175     -     - |
 DWH1 |     -   240     -  -107     -     -     -     - |
 FAIR |   -33    47     X     X    25     -     -     - |
 FORT |   175     -     X  -113     -     -     -     - |
 GODE |   -97   141     -     -   191     -     -     - |
 GOLD |    25     -   -75     8    34     -     -     - |
 GRAZ |  -111   185   -35     -  -105     -     -     - |
 GUAM |    94     -     -    18   -56  -108     -     - |
 HARB |    99     -     -   -64     -     -     -     - |
 HOB2 |    35   140     -   -83   -48     -     -     - |
 HRAO |    74     -  -145     -   -41     -     -     - |
 INVK |   -35     -     -    23     -     -     -     - |
 IRKT |    60    49   165  -116     -     -     -     - |
 JPLM |     -  -269     -   120    80     -     -     - |
 KIRU |  -155   195    50     -   143     -     -     - |
 KIT3 |    18     -  -128    22     -     -     -     - |
 KOKB |     -   232  -238     3   -15   -26     -     - |
 KOSG |   -47     -     -    30    57     -     -     - |
 KOUR |  -108     -   -93     2    27   143     -     - |
 MAC1 |     2     -     -  -232  -151   316     -     - |
 MADR |   -51    -1     -    33     -     X     -     - |
 MAS1 |   -43   125     X   -39   -61    15     -     - |
 MATE |    64     -     -  -164     -   168     -     - |
 MCM4 |   178     9     -   -17    32  -141     -     - |
 MDO1 |    55   225  -695    95   205     -     -     - |
 METS |   -80   151     -   -16    68     -     -     - |
 MIZU |     -   128     -   -57     -     -     -     - |
 MKEA |     8     -   -16     -    81     -     -     - |
 NKLG |   -78     -    55    38   -62   -10     -     - |
 NLIB |   -11   269  -143   -63    70     -     -     - |
 NOUM |     -     -     -   148     -  -202     -     - |
 NRC2 |    33    35  -458   113     -     -     -     - |
 NRIL |   130     -     -   -48   -24   -27     -     - |
 NTUS |  -156     -     -    21   -67   110     -     - |
 NYA1 |   113     -     -   -73   204     -     -     - |
 NYAL |     -    34   313     -  -153  -161     -     - |
 OHI2 |    45     -     -   -51   -47    30     -     - |
 OS0G |    92   155  -187   -82   -37    21     -     - |
 PDEL |  -307     -     -   198     -     -     -     - |
 PETP |   -48     -     -   -92     -   168     -     - |
 PIE1 |    -1   120  -161     -    87     -     -     - |
 PIMO |   -66     -     -    -4     -    59     -     - |
 POTS |   -15     -    25     2   -26     -     -     - |
 QAQ1 |    30     -     -   -20     -     -     -     - |
 RAMO |    31     -     -     -     -   -28     -     - |
 RBAY |    64     -     -     -   269   -57     -     - |
 RESO |    48     -     -   -67     -    49     -     - |
 REYK |   237     -   267  -242   368     8     -     - |
 SANT |     -     -   232     X  -157  -104     -     - |
 SCH2 |    42   -36     -     -     -   -16     -     - |
 SCUB |    88     -     -   -57     -     -     -     - |
 SELE |   179     -   -41     -     -  -140     -     - |
 SFER |  -121   175     X     -    89     -     -     - |
 STJO |   -34    28     -   -74     -   115     -     - |
 SUTH |     7     -   -34     7   194     -     -     - |
 SYOG |    77  -112     -    37     -   -72     -     - |
 THTI |     -     -   143   -35    14   -17     -     - |
 THU3 |    12     -     -    -8    -6     -     -     - |
 TIDB |    65   153   195     X    41  -231     -     - |
 TIXI |    90     -     -   -58     -     -     -     - |
 TOW2 |   -61     -     -   -13     -    72     -     - |
 TRO1 |  -113     -     -    73   131     -     -     - |
 TSKB |   -59   -38    11    53     -     -     -     - |
 TWTF |    33   -65     -     6     -     -     -     - |
 URUM |   -15     -     -    10     -     -     -     - |
 USNO |     -   108  -146     -     -     -     -     - |
 USUD |    45  -123     -     6   -25    25     -     - |
 WILL |   -69   100     -     -    18     -     -     - |
 WSRT |  -115   299    13   -63   -93     -     -     - |
 WTZR |  -203   287    38   -58  -196    67     -     - |
 WUHN |   -63   -71     -    29   -35    59     -     - |
 YAR2 |    56     -     -     -   158   -49     -     - |
 YELL |   -72     -     X  -192     -   327     -     - |
 YSSK |   -27     -     -    -8     -    34     -     - |
 ZECK |    19     -     -   -12     -     -     -     - |
 ZWEN |   -75     -    -3    49   -42     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |    58    34    96    20    51    37  6047     - |  288   3.25
    3 |    30    39   148    25    56    43  2237     - |  288   2.12
    4 |    48    59   109    30    76    53  1254     - |  288   0.74
    5 |    45    40    80    35    30    30  6041     - |  288   4.09
    6 |    64    42    56    26    40    42  6466     - |  288   6.16
    7 |    48    93   172    55   101    84  1997     - |  288   0.84
    8 |    69    42    23    19    38    46  3779     - |  288   2.82
    9 |    73    58   175    14    62    64  2587     - |  288   2.15
   10 |    71    55    87    52    47    49  2473     - |  288   2.65
   11 |    45    58   140    29   101    39  1062     - |  288   0.50
   13 |    55    39   107    23    57    37  2173     - |  288   0.34
   14 |    68    48    63    39    57    61  3342     - |  288   0.22
   15 |   119    53     -    38    38    59  5271     - |  288   2.80
   16 |    36    35    82    21    77     X  3824     - |  288   0.50
   17 |    55    59     -    23    63     -  4231     - |  288   1.48
   18 |    64    54    86    24    46    38  1474     - |  288   0.35
   20 |    69    63    69    40    62    30   927     - |  288   0.23
   22 |    44     -    58    29    91     X     -     - |  288   8.29
   23 |    49    54   161    34    38    27  8199     - |  288   7.04
   24 |    55    55    72    42    61    67  1820     - |  288   1.79
   25 |    80    45    56    14    61    54  3977     - |  288   1.65
   26 |    49    31    69    26    33    35   752     - |  288   0.96
   27 |    73    59    67    22    35    60  1833     - |  288   1.16
   28 |    65    28    75    36    45    38   916     - |  288   0.50
   29 |    49    31    81    28    29    31  1510     - |  288   0.79
   30 |    46    64    86    29    80    48  5496     - |  288   0.92
   31 |    32    36   171    31    47    48  1526     - |  288   1.20
 -----+-------------------------------------------------+--------------
 ALBH |    16    67    36     -    21    20     -     - |  288   0.10
 ALGO |    15    13     X    12     -    15     -     - |  288   0.05
 ALIC |    37     -     -     -     -    33     -     - |  288  49.66
 ALRT |    53     -     -    34     -     -     -     - |  288  14.88
 AMC2 |    19    46     -     -    16    23     -     - |  288   0.03
 ANKR |    13     -    25     -     -     -     -     - |  288  13.14
 AOML |    14     -     -     9     -     -     -     - |  288  26.58
 AREQ |    43    39     -    38    19    36     -     - |  288  24.92
 ARTU |    25     -     -    17     -    14     -     - |  288  16.46
 ASC1 |    65     -    57    47    22    38     -     - |  286    >>>
 AUCK |    40     -     X     -    24    35     -     - |  264  12.23
 BAHR |    25    24    33    16     -     -     -     - |  288   0.64
 BILI |    28     -     -    18     -    19     -     - |  287  11.50
 BJFS |     -   148     -    66     -     -     -     - |  280    >>>
 BOGT |    28     -     X    18     -    33     -     - |  285  25.11
 BOR1 |    34    49     -     -    53     -     -     - |  288   0.38
 BRUS |    44    63     -     -    69     -     -     - |  288   0.07
 CAS1 |    77     -    50    28    20    25     -     - |  288   9.28
 CEDU |    27     -    54     -    35     -     -     - |  288  15.00
 CHAT |    39     -     -    25    30     -     -     - |  287  13.01
 CHUR |    48    70     -     -     -     -     -     - |  263   1.03
 COCO |    28     -    27    15    26    31     -     - |  286  12.56
 CRO1 |     -    18    70     -    42    23     -     - |  288  22.57
 DAVR |    63     -     -    17    27    42     -     - |  288  23.31
 DGAR |     -     -    99    32     -     -     -     - |  281  40.34
 DRAO |    14    38    42    24    19     -     -     - |  288   0.06
 DUBO |    12     -     -     -     -    11     -     - |  288  11.73
 DWH1 |     -    99     -    44     -     -     -     - |  264   0.68
 FAIR |    13    18     X     X   142     -     -     - |  266   0.20
 FORT |    37     -     X    24     -     -     -     - |  274   0.13
 GODE |    33    48     -     -    27     -     -     - |  285   0.03
 GOLD |    83     -    57    37    31     -     -     - |  284  20.26
 GRAZ |    48    72    90     -    39     -     -     - |  286    >>>
 GUAM |    13     -     -    14    55    20     -     - |  288  19.32
 HARB |    48     -     -    31     -     -     -     - |  287  33.17
 HOB2 |    53   117     -    26    31     -     -     - |  288  25.61
 HRAO |    20     -    38     -    63     -     -     - |  287  23.60
 INVK |    31     -     -    20     -     -     -     - |  288  14.39
 IRKT |    33    18    45    14     -     -     -     - |  288   0.57
 JPLM |     -    54     -    24    30     -     -     - |  167  43.07
 KIRU |    28    63    34     -    29     -     -     - |  288   1.91
 KIT3 |    72     -    30    47     -     -     -     - |  274    >>>
 KOKB |     -   116    91    32    77    38     -     - |  288   0.07
 KOSG |    42     -     -    27    83     -     -     - |  288  24.60
 KOUR |    33     -    47    24    29    43     -     - |  285   2.29
 MAC1 |   108     -     -    91    25    53     -     - |  285  14.63
 MADR |    39   128     -    35     -     X     -     - |  279  17.41
 MAS1 |    28    23     X    58    33    84     -     - |  288   1.53
 MATE |    17     -     -    11     -    26     -     - |  288   0.10
 MCM4 |    48    98     -    56    48    21     -     - |  288  15.43
 MDO1 |    45   111    29    26    56     -     -     - |  288  52.33
 METS |    48    46     -    35    30     -     -     - |  287   0.47
 MIZU |     -   122     -    54     -     -     -     - |  248   0.71
 MKEA |    23     -    45     -    49     -     -     - |  288  32.86
 NKLG |    30     -    42    48    35    49     -     - |  287  85.66
 NLIB |    44    86    34    16    22     -     -     - |  287   0.02
 NOUM |     -     -     -    21     -    29     -     - |  288    >>>
 NRC2 |    39    12    35    29     -     -     -     - |  288   0.02
 NRIL |    47     -     -    31    32    25     -     - |  288  15.25
 NTUS |    16     -     -    23    22    34     -     - |  288  10.77
 NYA1 |    41     -     -    26    35     -     -     - |  288   0.06
 NYAL |     -    17    31     -    37    12     -     - |  288   0.05
 OHI2 |    98     -     -    53    13    21     -     - |  288  17.37
 OS0G |    22    17    17    16    30    19     -     - |  288   0.10
 PDEL |    38     -     -    24     -     -     -     - |  288  57.07
 PETP |    16     -     -    12     -    21     -     - |  287  13.82
 PIE1 |    75    26   175     -    72     -     -     - |  288 187.23
 PIMO |    21     -     -    33     -    48     -     - |  288  27.39
 POTS |    21     -    28    18    18     -     -     - |  288  11.80
 QAQ1 |    48     -     -    31     -     -     -     - |  288   9.25
 RAMO |    34     -     -     -     -    30     -     - |  287  26.29
 RBAY |   145     -     -     -    47   129     -     - |  278  59.53
 RESO |    23     -     -    22     -    17     -     - |  287  11.53
 REYK |    45     -    62    35    31    26     -     - |  288  13.01
 SANT |     -     -    37     X    22    17     -     - |  105   2.72
 SCH2 |    68    83     -     -     -    35     -     - |  288   7.77
 SCUB |    18     -     -    12     -     -     -     - |  288  20.47
 SELE |    23     -    32     -     -    14     -     - |  288  30.57
 SFER |    44    64     X     -    44     -     -     - |  279 495.66
 STJO |    29    10     -    24     -    12     -     - |  288   0.05
 SUTH |    62     -    55    40    24     -     -     - |  288  23.61
 SYOG |    94    69     -    35     -    38     -     - |  278   1.55
 THTI |     -     -    91    19    35    43     -     - |  287   4.56
 THU3 |    33     -     -    21    12     -     -     - |  288  10.00
 TIDB |    61   100    39     X    29    23     -     - |  169   0.23
 TIXI |    56     -     -    36     -     -     -     - |  287  10.67
 TOW2 |    40     -     -    16     -    41     -     - |  288  14.34
 TRO1 |    72     -     -    47    45     -     -     - |  288  10.22
 TSKB |    33    44    52    29     -     -     -     - |  288   1.22
 TWTF |    43   101     -    35     -     -     -     - |  288   0.48
 URUM |    24     -     -    16     -     -     -     - |  288  32.65
 USNO |     -    11    15     -     -     -     -     - |  216   0.02
 USUD |    37   138     -    31    21    72     -     - |  288  19.10
 WILL |    32    46     -     -    31     -     -     - |  275   1.88
 WSRT |    31   107    34    29    31     -     -     - |  286   0.06
 WTZR |    41    59    31    13    21    22     -     - |  288   0.10
 WUHN |    55   126     -    27    26    38     -     - |  287  21.81
 YAR2 |    35     -     -     -    27    31     -     - |  288   5.05
 YELL |    94     -     X    61     -   162     -     - |  288   0.06
 YSSK |    23     -     -    21     -    18     -     - |  287  12.84
 ZECK |    40     -     -    26     -     -     -     - |  288  21.77
 ZWEN |    19     -    39    16    22     -     -     - |  288  16.94
 -----+-------------------------------------------------+--------------
 TOT  |    50    67    79    32    48    46  3696     - |


 BEST CLOCK FIT: NLIB   287   0.02 (ns) 

