
 GPS week: 1213   Day: 4   MJD: 52739                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2771     17    -0.03     0.23     5.33     0.00
 cod |   288     0  24462    344     0.40    -1.53     0.07    20.55
 emr |   288     0  18047    121   792.89    36.70     0.09    15.27
 gfz |   288     0  16402     61     0.69    -1.50     0.07    22.16
 igu |    96     0   2485      0 -3157.94  4931.85  1057.82     0.00
 jpl |   288     0  14445   1093     1.68    -2.69     0.07    21.14
 ngs |    96     0   2771     30 -1520.59  1999.75     4.26     0.00
 usn |   288     0  30010    633   499.53     4.88     0.07    20.88

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   usn |
 -----+-------------------------------------------------+
    1 | -2467    68   -17   -92******   -84 -3021    81 |
    2 | -7400   159  -134  -235******    -6 -7359   193 |
    3 | -2369   123    77  -174******     9 -2304     X |
    4 |   856    18  -204   264******   -77   285  -109 |
    5 |  2316   -52  -231   237******   148  1025   -99 |
    6 | -4031    60  -242   231******   104 -3268  -176 |
    7 |   635   108  -207    17******    87   220   -18 |
    8 | -6932   162  -145  -160******    57 -6674    88 |
    9 | -4639    38  -286   216******   178 -4101  -158 |
   10 | -6398   -67  -282   199******   202 -6351   -52 |
   11 |  1043   -41   363  -136******   -87  1304   -37 |
   13 |  2666    69   197  -160******  -124  2610    22 |
   14 |  6446   108    94   -59******    67  6135  -146 |
   15 |  2500    40  -141    68******    74  1953   -55 |
   16 |  3146   118   264  -252******     X  2960   -53 |
   17 |  1237    41  -192   227     -   111  1399  -198 |
   18 |  3512   -72    84   196******     9  3394  -195 |
   20 |  3740   -25   160  -133******   127  3472   -20 |
   21 |  8715  -308     -   348     -     X  7386    -8 |
   22 |  8600   118  -257  -340******   114 18873   373 |
   23 |  -240  -114  -312   231     -    67  -819    58 |
   24 | -7854    26  -253   191******    73 -7956   -85 |
   25 | -3448   208   -49   -86******   -87 -3268   -33 |
   26 |   531   -32  -339   291******   -62   177     X |
   27 |   302    97  -145   -63******    22  -157    67 |
   28 |   387   101   109  -151******  -104   207    27 |
   29 |   689    69  -325   261******    48   319  -133 |
   30 |  -232    22  -135   230******  -117  -320   -97 |
   31 | -2180    67   -32  -183******   -52 -2071   181 |
 -----+-------------------------------------------------+
 ALBH |     -   -98    21     -     -   214     -  -133 |
 ALGO |     -   -36    55     -     -     -     -    -5 |
 AMC2 |     -  -172   187     -     -     -     -    32 |
 AOML |     -  -212     -     -     -   125     -    83 |
 AREQ |     -     -    67   -37     -    37     -   -44 |
 ARTU |     -   -15     -  -115     -   135     -     - |
 ASC1 |     -   208     -     -     -     X     -  -205 |
 AUCK |     -    75     -     -     -     -     -   -73 |
 BAHR |     -    -2   123   -47     -     1     -   -40 |
 BILI |     -    -3     -     3     -    -1     -     - |
 BJFS |     -     -   123  -163     -     -     -    85 |
 BOGT |     -     X     -     -     -    60     -   -60 |
 BOR1 |     -     -   125     -     -     -     -   -92 |
 BRMU |     -     -     -    47     -     -     -   -50 |
 BRUS |     -     -     6     -     -     X     -    -5 |
 CAS1 |     -    61     -   -67     -    19     -    -8 |
 CEDU |     -   -54     -     -     -  -133     -   188 |
 CHAT |     -     3     -     -     -     -     -    -3 |
 CHUR |     -    58    90     -     -     -     -  -119 |
 COCO |     -   -78     -   155     -  -212     -   127 |
 CRO1 |     -     -   -20     -     -     5     -    10 |
 DAVR |     -    55     -   -35     -     -     -   -17 |
 DRAO |     -   -18    89     -     -     -     -   -47 |
 EISL |     -   -36     -     -     -    13     -    18 |
 FAIR |     -     -   -59  -130     -    58     -   136 |
 FLIN |     -   -43     -     -     -    42     -     - |
 GODE |     -  -112   129     -     -     -     -    17 |
 GOLD |     -     -     -     -     -   -70     -    71 |
 GRAZ |     -  -118    73     -     -     -     -    63 |
 GUAM |     -     -     -     -     -  -215     -   218 |
 HOB2 |     -   -35    51     -     -     -     -    -1 |
 HOFN |     -     -     -   -49     -    52     -     - |
 HRAO |     -     -     -    41     -  -171     -   129 |
 JPLM |     -     -   273  -113     -     -     -   -61 |
 KARR |     -  -121     -   124     -   -13     -     - |
 KERG |     -     -    77   -16     -     -     -   -39 |
 KIRU |     -  -155   150     -     -     -     -    46 |
 KOKB |     -   -35   237     -     -  -232     -   109 |
 KOUR |     -    25     -   -40     -     -     -    18 |
 KUNM |     -   -30     -     -     -  -178     -   211 |
 LPGS |     -     9     -     -     -    29     -   -37 |
 MAC1 |     -   -45     -   -62     -   -63     -   174 |
 MAS1 |     -   -18   118   -88     -     -     -    24 |
 MAW1 |     -    65     -     -     -   -48     -   -16 |
 MCM4 |     -   161     -     -     -     X     -  -158 |
 MDO1 |     -     -    39     -     -     -     -   -28 |
 MEDI |     -     -  -137     -     -     -     -   100 |
 METS |     -   125   267     -     -     -     -  -321 |
 MIZU |     -     -  -179     -     -     -     -   131 |
 MKEA |     -     -     -   -57     -     -     -    61 |
 NLIB |     -     -   226     -     -    52     -  -206 |
 NOT1 |     -     -  -137     -     -     -     -   100 |
 NRC2 |     -   -32   144   -75     -     -     -     5 |
 NRIL |     -    22     -  -112     -    94     -     - |
 NSSP |     -  -171     -     -     -     -     -   168 |
 NYA1 |     -    -2     -     -     -     -     -     2 |
 NYAL |     -     -    93     -     -     -     -   -68 |
 OHI2 |     -   105     -   -45     -   -55     -     - |
 OS0G |     -   -52   139   -10     -     -     -   -40 |
 PETP |     -   -74     -     -     -    72     -     - |
 PIE1 |     -     -   112     -     -    11     -   -89 |
 POL2 |     -   -41     -     -     -   -76     -   117 |
 POTS |     -  -117     -     -     -     -     -   115 |
 RBAY |     -   491     -  -195     -     -     -  -104 |
 REYK |     -   103     -     -     -     -     -  -102 |
 RIOG |     -    54     -   -64     -     -     -    21 |
 SANT |     -   -39     -     -     -     -     -    38 |
 SCH2 |     -  -364   232     -     -     -     -   170 |
 SFER |     -     -  -233     -     -     -     -   171 |
 STJO |     -     -    66     -     -     -     -   -48 |
 SUTH |     -   -38     -     -     -     -     -    37 |
 SUWN |     -    49   -24     -     -     -     -   -31 |
 THTI |     -     -     -   203     -     -     -  -216 |
 TLSE |     -  -258     -     -     -     -     -   254 |
 TRO1 |     -   -23     -   186     -     -     -  -176 |
 TROM |     -     -     -     -     -    37     -   -37 |
 URUM |     -   -52     -     -     -     -     -    51 |
 USNO |     -   -38   163     -     -     -     -   -82 |
 USUD |     -     -     -     -     -    28     -   -28 |
 VILL |     -   -41     -     -     -     -     -    41 |
 WILL |     -    10     -     -     -     -     -   -10 |
 WTZR |     -   -85     -     -     -     -     -    84 |
 WUHN |     -     -     -   150     -     -     -  -159 |
 YAKT |     -   -12   -85     -     -    28     -    46 |
 YELL |     -   263     -  -364     -     -     -   131 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  6780    61    29    31******    75  6649    35 |  288   3.50
    2 |  4656    74   108    43******    91  3877    63 |  288   2.10
    3 |  3819    54    44    53544670    65  3819     X |  267   1.92
    4 |  1264    53    86    41******    96  1347    29 |  288   0.77
    5 |  6368    94    65    53******    77  6340   112 |  288   4.35
    6 | 13481    58    73    47******    76 12910    94 |  288  11.97
    7 |  1324    52   122    54******    81  1321   100 |  288   0.87
    8 |  5964    48    48    45******    65  6495    41 |  288   3.68
    9 |  2125    49    57    69******   100  2684    24 |  288   2.26
   10 |  3881   151    94    96979162   101  3476   104 |  278   2.56
   11 |  1284    74    70    48******   150  1319    45 |  288   0.42
   13 |  1282    56    37    37******    79  1010    41 |  288   0.36
   14 |   797    59    68    42******   100   845    44 |  288   0.23
   15 |  4513    86   127    97******    78  4230   103 |  288   1.97
   16 |  1218   115   118    40******     X   767    39 |  288   0.34
   17 |  4840   156   188   154     -   152  5054   121 |  288   2.79
   18 |   814    41    48    47******   129   874    90 |  288   0.39
   20 |   995    91    60    43******   150   704    34 |  288   0.24
   21 |  4304    79     -   158     -     X  4417   160 |  288   0.77
   22 | 18212    83   147    76******    70  8350    44 |  288   5.77
   23 |  5527   156   225   184     -   197  5330   148 |  280   5.86
   24 |  3614    51    78    66******   104  3336    30 |  288   1.74
   25 |  2986    63    43    52******   116  3540    30 |  288   1.51
   26 |  1457    69    56    63******    58   938     X |  288   0.52
   27 |  1019    55    35    37******    68  1149    50 |  288   0.93
   28 |  2037    72    63    69******   104  1569    50 |  288   0.33
   29 |   774    77    82    55******    79   601   137 |  288   0.72
   30 |   829    65    99   100******    67   876    32 |  288   1.05
   31 |  1982    48    67    36******    93  2203    32 |  288   0.97
 -----+-------------------------------------------------+--------------
 ALBH |     -    24    29     -     -    45     -    37 |  288   0.15
 ALGO |     -    43    21     -     -     -     -    38 |  288   0.05
 AMC2 |     -    35    68     -     -     -     -    26 |  288   0.03
 AOML |     -    60     -     -     -    27     -    47 |  288  25.80
 AREQ |     -     -   126    32     -    32     -    97 |  288  23.18
 ARTU |     -    52     -    34     -    26     -     - |  288  15.56
 ASC1 |     -    29     -     -     -     X     -    29 |  270    >>>
 AUCK |     -    18     -     -     -     -     -    18 |  264  12.88
 BAHR |     -    35    44    26     -    16     -    39 |  288   0.39
 BILI |     -    23     -    17     -    26     -     - |  287   7.70
 BJFS |     -     -   137   101     -     -     -    63 |  288    >>>
 BOGT |     -     X     -     -     -    79     -    80 |  286  22.41
 BOR1 |     -     -    68     -     -     -     -    50 |  284   0.55
 BRMU |     -     -     -    21     -     -     -    22 |  274    >>>
 BRUS |     -     -    60     -     -     X     -    44 |  286   0.04
 CAS1 |     -    65     -    31     -    35     -    69 |  288   8.93
 CEDU |     -    19     -     -     -    42     -    47 |  288  14.96
 CHAT |     -    38     -     -     -     -     -    37 |  285  13.32
 CHUR |     -   100   114     -     -     -     -   145 |  280   1.01
 COCO |     -    42     -    27     -    35     -    75 |  288  10.59
 CRO1 |     -     -    20     -     -    19     -    24 |  288  27.57
 DAVR |     -    48     -    22     -     -     -    43 |  288  22.60
 DRAO |     -    31    32     -     -     -     -    21 |  288   0.03
 EISL |     -    22     -     -     -    39     -    29 |  288  38.73
 FAIR |     -     -    29    29     -    30     -    24 |  285   0.31
 FLIN |     -    34     -     -     -    33     -     - |  288   9.64
 GODE |     -    46    83     -     -     -     -    25 |  288   0.10
 GOLD |     -     -     -     -     -    35     -    35 |  286  16.16
 GRAZ |     -    46    69     -     -     -     -    39 |  288    >>>
 GUAM |     -     -     -     -     -    44     -    45 |  288  15.61
 HOB2 |     -    47    64     -     -     -     -    27 |  179  52.51
 HOFN |     -     -     -    14     -    15     -     - |  287    >>>
 HRAO |     -     -     -    33     -    35     -    54 |  288  24.34
 JPLM |     -     -    67    67     -     -     -    86 |  276    >>>
 KARR |     -    20     -    20     -    28     -     - |  288  13.15
 KERG |     -     -    45   174     -     -     -   206 |  280   1.32
 KIRU |     -    67   100     -     -     -     -    42 |  288  16.23
 KOKB |     -    49   202     -     -    66     -    55 |  288   0.07
 KOUR |     -    20     -    27     -     -     -    30 |  288   1.97
 KUNM |     -    39     -     -     -    25     -    40 |  288  42.89
 LPGS |     -    42     -     -     -    40     -    23 |  288  23.90
 MAC1 |     -    39     -    42     -    35     -    78 |  288  14.12
 MAS1 |     -    45    53    20     -     -     -    16 |  288   2.03
 MAW1 |     -    86     -     -     -    60     -    36 |  288  31.69
 MCM4 |     -    53     -     -     -     X     -    52 |  287  17.64
 MDO1 |     -     -    67     -     -     -     -    49 |  286  29.80
 MEDI |     -     -    55     -     -     -     -    40 |  286   0.08
 METS |     -    28    67     -     -     -     -    32 |  287   0.35
 MIZU |     -     -   128     -     -     -     -    94 |  268   0.52
 MKEA |     -     -     -    31     -     -     -    33 |  288  20.96
 NLIB |     -     -   117     -     -   193     -   213 |  280   0.26
 NOT1 |     -     -    81     -     -     -     -    59 |  286    >>>
 NRC2 |     -    66    32    14     -     -     -    53 |  288   0.05
 NRIL |     -    52     -    48     -    25     -     - |  285  11.77
 NSSP |     -    55     -     -     -     -     -    54 |  286  20.03
 NYA1 |     -   140     -     -     -     -     -   138 |  286   0.09
 NYAL |     -     -    25     -     -     -     -    19 |  288   0.06
 OHI2 |     -    77     -    26     -    59     -     - |  288   8.29
 OS0G |     -    25    91    24     -     -     -    54 |  288   0.13
 PETP |     -    20     -     -     -    20     -     - |  282  11.80
 PIE1 |     -     -   103     -     -    31     -    55 |  288   0.03
 POL2 |     -    34     -     -     -    20     -    40 |  288  18.70
 POTS |     -    30     -     -     -     -     -    30 |  286  12.88
 RBAY |     -   365     -   121     -     -     -   171 |  285  28.48
 REYK |     -    20     -     -     -     -     -    20 |  271  13.03
 RIOG |     -    50     -    81     -     -     -   111 |  240  13.54
 SANT |     -    25     -     -     -     -     -    25 |  287   8.52
 SCH2 |     -    47   115     -     -     -     -    64 |  253   2.13
 SFER |     -     -    47     -     -     -     -    35 |  284   0.58
 STJO |     -     -    20     -     -     -     -    15 |  286  22.05
 SUTH |     -    45     -     -     -     -     -    44 |  288  24.48
 SUWN |     -    94   197     -     -     -     -    65 |  288   1.63
 THTI |     -     -     -    31     -     -     -    33 |  280   4.74
 TLSE |     -    19     -     -     -     -     -    19 |  286   0.49
 TRO1 |     -    73     -    19     -     -     -    81 |  288  22.81
 TROM |     -     -     -     -     -    17     -    17 |  286  30.88
 URUM |     -    36     -     -     -     -     -    36 |  288  20.51
 USNO |     -    51    23     -     -     -     -    48 |  288   0.03
 USUD |     -     -     -     -     -    34     -    34 |  288   9.70
 VILL |     -    31     -     -     -     -     -    30 |  288   2.93
 WILL |     -    21     -     -     -     -     -    21 |  286   0.78
 WTZR |     -    16     -     -     -     -     -    16 |  288   0.10
 WUHN |     -     -     -    47     -     -     -    49 |  287  16.38
 YAKT |     -    40    61     -     -    27     -    34 |  288   0.66
 YELL |     -    14     -    28     -     -     -    35 |  229   0.04
 -----+-------------------------------------------------+--------------
 TOT  |  5332    70    89    65******    69  4262    68 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

