
 GPS week: 1216   Day: 6   MJD: 52762                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  33039     56    -0.05    -0.08     0.06    18.41
 emr |   288     0  21066    130  1594.93    31.29     0.07    15.68
 esa |   288     0  21170   1270  1594.75    31.24     0.07    13.69
 gfz |   288     0  29433    283    -0.05     0.14     0.04    25.59
 igr |   288     0  30819     40    -0.10     0.10     0.05     0.00
 jpl |   288     0  24741    290    -6.21    -2.67     0.04    26.63
 ngs |    96     0   2780      0     0.17    -0.23     4.70     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio |
 -----+-------------------------------------------------+
    1 |   -80  -114   253    -3    28    -5 -3133     - |
    2 |   -60  -235   108   -35  -101   170 -3759     - |
    3 |   -27  -114   273   -19     2   -42  -964     - |
    4 |   240    82   -67   114   191  -310 -5012     - |
    5 |    13  -254   -81    53  -145   131  3420     - |
    6 |    85  -197    57   148   -68  -117 -4944     - |
    7 |    68  -145     X   -85   -55   129   163     - |
    8 |     1   -37    10   -30    39    45  6190     - |
    9 |   160  -118  -114   131   -28  -111 -6065     - |
   10 |   -93   -85  -137  -194   -30   406  -471     - |
   11 |    39     6   165    47    47  -163  6503     - |
   13 |   226    83   168   170   180  -452  6850     - |
   14 |   106  -121   -85   120   -39   -78  3983     - |
   15 |  -119  -121     -     7  -145   148 -1580     - |
   16 |   -92  -223   197   -36    20   140  4978     - |
   17 |     4  -156  -250    34  -109   200  3197     - |
   18 |    39   -57   -60    86   -54   -46  4352     - |
   20 |   -61  -162   101   -87   -38   170  3475     - |
   21 |   -14  -156   161    47   -95   -12  1275     - |
   22 |   -21  -244   251   -43    20    81 -2910     - |
   23 |    62  -203   -80   -29   -61   159   -92     - |
   24 |   207   -31  -156    45    68   -93 -3635     - |
   25 |   -23   -66   155   126   -66  -156 -1196     - |
   26 |   202   -39    -2   173    57  -304 -2191     - |
   27 |    23   -27    72    -5    29   -36 -3028     - |
   28 |   131    16  -144     2    47   -32  -396     - |
   29 |   170   -34     -   137   102  -238  -984     - |
   30 |   275   -30   142   260    41  -514   354     - |
   31 |   -67  -232   308   -19   -21    43 -4474     - |
 -----+-------------------------------------------------+
 AOML |    38     -     -   -76    99    47     -     - |
 ARTU |    82     -     -    13    52   -69     -     - |
 ASC1 |   -40     -  -431  -134     5   378     -     - |
 AUCK |   -59     -    79     -  -559     -     -     - |
 BAHR |    42   106    35  -110   -17    -3     -     - |
 BILI |   -26     -     -    20     0    -1     -     - |
 BJFS |     -   102     -   -62   191     -     -     - |
 BOGT |   163     -     X    93     -  -202     -     - |
 BOR1 |   -47    55     -     -   -55     -     -     - |
 BRMU |  -185     -     -   -70   -82   195     -     - |
 BRUS |   -72    85     -     -   -26     -     -     - |
 CAS1 |    46     -    43   -22    24   -33     -     - |
 CEDU |  -221     -    80     -  -124   112     -     - |
 CHAT |    27     -     -    79     -   -94     -     - |
 CHUR |   -56    66     -     -   -90     -     -     - |
 COCO |    62     -  -180   102   -47   -49     -     - |
 CORD |   -30     -     -    22     -     -     -     - |
 CRO1 |     -     7     -     -    44    -4     -     - |
 DAVR |   -50     -     -   -63   -52    89     -     - |
 DRAO |    45    36   -44   -31    41     -     -     - |
 EISL |   100     -    23    -9   114   -73     -     - |
 FAIR |    18   -66    11   -91    83   109     -     - |
 FORT |     -     -     X  -272   -69   261     -     - |
 GODZ |    20    41   -73     -    92     -     -     - |
 GOLD |  -116     -   -58   113   -91     -     -     - |
 GRAZ |  -131   184   -39     -    10     -     -     - |
 GUAM |   -23     -     -    55  -102   -38     -     - |
 HARB |   119     -     -   -86     -     -     -     - |
 HERS |  -112   132     -     -   191     -     -     - |
 HOB2 |   -46    -3    12   -63   -41    87     -     - |
 HRAO |   -22     -    30     -   -22     -     -     - |
 IISC |   121     -   -61   -54   115     X     -     - |
 INVK |   -23     -     -    17     -     -     -     - |
 IRKT |     -     8   204   -21     -   -89     -     - |
 JAB1 |   -85     -     -     -     -    59     -     - |
 JPLM |     -   225     -  -138    43     -     -     - |
 KARR |  -282     -     -     -     -   195     -     - |
 KERG |    42  -180   -20    28   -32    61     -     - |
 KGN0 |     -    75     -     -    93   -44     -     - |
 KIRU |   -11    53   -45     -   -10     -     -     - |
 KIT3 |    29     -     -   -49    55    28     -     - |
 KOKB |     -   222  -208    67   126   -81     -     - |
 KOSG |   -48     -     -    35    40     -     -     - |
 KOUR |   -48     -  -204    40   -38   100     -     - |
 KSTU |   -89     -     -    64   -77     -     -     - |
 MAC1 |   -96     -     -  -181   -58   240     -     - |
 MADR |    67  -125     -    28     -     -     -     - |
 MAG0 |    31     -     -     -     -   -22     -     - |
 MAS1 |   -34    53   123   -80   -66     5     -     - |
 MDO1 |    82    40    16   -92   -97     -     -     - |
 MEDI |   -54    63     -     -   -34     -     -     - |
 METS |   -29   164     -   -79   -13     -     -     - |
 MIZU |     -   120     -   -74    41     -     -     - |
 MKEA |   -12     -    16     -    36     -     -     - |
 NKLG |    18     -  -203   -83   -28   172     -     - |
 NLIB |     -   546   -86  -223  -111     -     -     - |
 NOT1 |   -51   -85     -     -  -246    85     -     - |
 NOUM |     -     -     -   167     -  -160     -     - |
 NPLD |  -177   208     -     -    -8     -     -     - |
 NRC2 |   -16    46   -19    -7    50     -     -     - |
 NRIL |    12     -     -   -52   -30    41     -     - |
 NSSP |   -89     -     -     -     -    61     -     - |
 NTUS |  -184     -     -    80   -95    51     -     - |
 NYA1 |   137     -     -   -98    11     -     -     - |
 NYAL |     -    35   -20     -   -38   -11     -     - |
 OHI2 |    91     -     -   -12    55   -52     -     - |
 OS0G |   -44    10    38     1   -28     4     -     - |
 PERT |    -4    25   -19     -   -53    -2     -     - |
 PETP |   -32     -     -    23    20     -     -     - |
 PIE1 |     -    96  -110     -   107     -     -     - |
 PIMO |     -     -     -   -43     -    41     -     - |
 POTS |    35     -   -10   -20   -42     -     -     - |
 QAQ1 |   177     -     -    67     -  -187     -     - |
 RBAY |    82     -     -     -   267   -57     -     - |
 RESO |    70     -     -   -51     -     -     -     - |
 REYK |    21     -    88    16    45   -75     -     - |
 RIOG |    31     -   129   -53   -55   -36     -     - |
 SANT |    -2     -     X    58    12   -55     -     - |
 SCH2 |  -145    92     -     -   -21    47     -     - |
 SFER |   -63   131    37     -   308   -52     -     - |
 STJO |  -118   -15     -    13    34    78     -     - |
 SUTH |   -18     -   225  -108    39     -     -     - |
 SYOG |    13   -52     -     -     -    20     -     - |
 THTI |     -     -  -151   -53   -98   128     -     - |
 THU3 |   119     -     -    16    88   -98     -     - |
 TIDB |   -42   -41   104     X   -74     -     -     - |
 TIXI |    22     -     -   -32     -    15     -     - |
 TOW2 |   -27     -     -   -11     -    29     -     - |
 TRO1 |   -43     -     -    31    56     -     -     - |
 TSKB |   -46    17   -27    25    20    12     -     - |
 TWTF |    30    60     -   -72    65    15     -     - |
 USNO |    27    53   -97     -    41     -     -     - |
 USUD |    -4    76     -   -43     5     -     -     - |
 VESL |     -     -     -   401     -  -385     -     - |
 VILL |    90     -  -266    78   119     -     -     - |
 WES2 |     -   220   -54   -85     -     -     -     - |
 WSRT |  -131   161   125   -72   -15     -     -     - |
 WTZR |   -69   160  -150   -27   -37    56     -     - |
 WUHN |  -200     -     -   144     -     -     -     - |
 YAKT |     5    -5     -     -    -6     -     -     - |
 YELL |   -56     -   -63     0    31    71     -     - |
 YSSK |    98     -     -   -70     -     -     -     - |
 ZAMB |   -45     -     -    32     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |    61    26    39    15    44    37 13184     - |  288   5.14
    2 |    74    39    30    41    56    26  2954     - |  288   2.67
    3 |    98    52   169    72    60    61  3601     - |  286   3.97
    4 |    73    57    79    17    21    45  3205     - |  288   0.59
    5 |    77    28    40    34    51    31  4013     - |  288   3.76
    6 |   107    45   105    61    67    54 11729     - |  286  10.27
    7 |   141    24     X    32    64    86  3346     - |  280   0.59
    8 |    38    35    67    26    48    31  7109     - |  288   5.17
    9 |    47    41    31    21    31    32  4694     - |  288   1.26
   10 |    69    36    85    27    60    28  4344     - |  288   1.97
   11 |    85    78   123    41    67    45  2246     - |  288   0.22
   13 |    56    47   145    26    52    42  1521     - |  288   0.36
   14 |    58    39    36    22    50    42   804     - |  288   0.22
   15 |    54    25     -    32    36    26  3081     - |  288   3.01
   16 |    41    35    72    27    64    34  1092     - |  288   0.31
   17 |   138    36   145    54    45    51  3504     - |  288   2.98
   18 |    59    36   108    37    60    32   635     - |  288   0.40
   20 |    66    43    67    34    58    23  1137     - |  288   0.25
   21 |    61    39   166    34    73    36   908     - |  288   0.37
   22 |    91    60    86    54    39    58  6374     - |  287   6.03
   23 |    83   122    77   145    65    65  6274     - |  288   5.88
   24 |    58    26    57    43    32    33  3173     - |  288   2.74
   25 |    42    59    25    28    50    35  4071     - |  288   2.00
   26 |    52    38    35    22    75    32  1019     - |  288   0.65
   27 |    46    33   102    33    58    28  3105     - |  288   0.64
   28 |    62    47   115    24    71    48  3383     - |  288   0.40
   29 |    74    65     -   119   147    61  2405     - |  288   0.81
   30 |    77    29    42    48    49    32  3052     - |  288   0.92
   31 |    95    52   136    70    33    62  3058     - |  287   2.11
 -----+-------------------------------------------------+--------------
 AOML |    33     -     -    37    18    20     -     - |  288  38.06
 ARTU |    31     -     -    14    14    16     -     - |  288    >>>
 ASC1 |    37     -    45    34    16    24     -     - |  286    >>>
 AUCK |   116     -   156     -    93     -     -     - |  209  12.64
 BAHR |    35    19    53    18    44    33     -     - |  288   0.60
 BILI |    42     -     -    22    11    16     -     - |  287   9.48
 BJFS |     -   111     -    68    38     -     -     - |  288    >>>
 BOGT |   105     -     X   114     -   178     -     - |  288  18.46
 BOR1 |    59    70     -     -    69     -     -     - |  286   0.39
 BRMU |    34     -     -    62    12    45     -     - |  287    >>>
 BRUS |    61    72     -     -    42     -     -     - |  288   0.05
 CAS1 |    58     -    42    29    29    19     -     - |  288   7.90
 CEDU |    20     -    46     -    26    23     -     - |  288  14.19
 CHAT |    35     -     -    29     -    25     -     - |  287  14.32
 CHUR |    80    94     -     -    60     -     -     - |  251   0.64
 COCO |    20     -    74    45    26    34     -     - |  288  10.22
 CORD |    64     -     -    46     -     -     -     - |  288  19.16
 CRO1 |     -    13     -     -    20     8     -     - |  288  24.03
 DAVR |    79     -     -    38    51    23     -     - |  276  16.61
 DRAO |    32    32    54    23    35     -     -     - |  288   0.04
 EISL |    60     -    80    30    18    24     -     - |  288  33.99
 FAIR |    45    23    35    49    39    25     -     - |  288   0.03
 FORT |     -     -     X    23    26    22     -     - |  288   0.06
 GODZ |    53    81    35     -    29     -     -     - |  288   0.08
 GOLD |    40     -    66    61    43     -     -     - |  288  17.33
 GRAZ |   119   121   134     -   113     -     -     - |  286    >>>
 GUAM |    55     -     -    26    43    20     -     - |  288  16.76
 HARB |    60     -     -    43     -     -     -     - |  287  35.79
 HERS |    45    52     -     -    54     -     -     - |  241  11.40
 HOB2 |    29    21    40    35    45    31     -     - |  288   0.06
 HRAO |    18     -    25     -    77     -     -     - |  288  21.01
 IISC |    19     -    55    27    21     X     -     - |  288  30.87
 INVK |    20     -     -    15     -     -     -     - |  287  11.10
 IRKT |     -    29    33    12     -    17     -     - |  288   0.16
 JAB1 |    23     -     -     -     -    16     -     - |  276   9.40
 JPLM |     -   121     -    74    41     -     -     - |  270    >>>
 KARR |    22     -     -     -     -    15     -     - |  288  12.87
 KERG |    72    25    53    42    18    27     -     - |  287   1.66
 KGN0 |     -    49     -     -    41    29     -     - |  286   0.66
 KIRU |    61    90    28     -    19     -     -     - |  288  11.68
 KIT3 |    41     -     -    46    34    61     -     - |  264    >>>
 KOKB |     -   162    48    61    84    48     -     - |  288   0.06
 KOSG |    33     -     -    24    33     -     -     - |  288 102.98
 KOUR |    28     -    37    33    12    20     -     - |  288   2.55
 KSTU |   109     -     -    78    84     -     -     - |  259  11.05
 MAC1 |    24     -     -    32    34    38     -     - |  288  16.01
 MADR |    42    58     -    32     -     -     -     - |  288  18.72
 MAG0 |    14     -     -     -     -    10     -     - |  287   9.70
 MAS1 |    20    47    36    30    12    22     -     - |  288   2.44
 MDO1 |    58    76    27    25    27     -     -     - |  288  18.33
 MEDI |    41    48     -     -    43     -     -     - |  288   0.14
 METS |    45    84     -    28    18     -     -     - |  287   0.79
 MIZU |     -   101     -    62    45     -     -     - |  282   0.85
 MKEA |    39     -    52     -    81     -     -     - |  287  34.25
 NKLG |    39     -    42    23    21    25     -     - |  287 293.25
 NLIB |     -   113   129    73    66     -     -     - |  269   0.25
 NOT1 |    42    48     -     -    57    31     -     - |  288    >>>
 NOUM |     -     -     -    25     -    24     -     - |  288    >>>
 NPLD |    41    48     -     -    27     -     -     - |  287   0.08
 NRC2 |    20    14    20     9    11     -     -     - |  288   0.03
 NRIL |    48     -     -    16    12    20     -     - |  288  11.32
 NSSP |    47     -     -     -     -    32     -     - |  288  17.79
 NTUS |    23     -     -    34    23    23     -     - |  288  10.82
 NYA1 |    35     -     -    25    11     -     -     - |  288   0.07
 NYAL |     -    13    25     -    18     8     -     - |  288   0.06
 OHI2 |   101     -     -    70    12    18     -     - |  288   8.45
 OS0G |    46    17    23    25    22    20     -     - |  288   0.35
 PERT |    26    28    63     -    19    17     -     - |  288  11.12
 PETP |    25     -     -    18    36     -     -     - |  287  12.56
 PIE1 |     -    20    23     -    66     -     -     - |  288   0.06
 PIMO |     -     -     -    61     -    59     -     - |  282  26.08
 POTS |    51     -    65    17    14     -     -     - |  276  10.44
 QAQ1 |    41     -     -    27     -     9     -     - |  288   9.36
 RBAY |   205     -     -     -    45   142     -     - |  284  49.66
 RESO |    18     -     -    13     -     -     -     - |  287  11.93
 REYK |    35     -    15    18    13    18     -     - |  288  10.76
 RIOG |    81     -    40    24    21    61     -     - |  287  15.08
 SANT |    73     -     X    47    32    81     -     - |  288   4.20
 SCH2 |    39    68     -     -    29    22     -     - |  288   2.67
 SFER |    30   137   103     -    71    43     -     - |  286   0.56
 STJO |    19    17     -    26    22    16     -     - |  288  13.12
 SUTH |    38     -    44    29    21     -     -     - |  288  18.03
 SYOG |    75    92     -     -     -    25     -     - |  288   0.55
 THTI |     -     -    52    58    85    42     -     - |  287   2.34
 THU3 |    30     -     -    19    14    13     -     - |  288  11.43
 TIDB |    55    74    37     X    22     -     -     - |  283   0.12
 TIXI |    29     -     -    13     -    17     -     - |  287   9.45
 TOW2 |    20     -     -    31     -    36     -     - |  288  13.68
 TRO1 |    70     -     -    50    15     -     -     - |  288  11.70
 TSKB |    37    18    80    27    13    19     -     - |  288   1.50
 TWTF |    26    87     -    42    59    29     -     - |  288   0.43
 USNO |    14    12    19     -    27     -     -     - |  288   0.02
 USUD |    52   136     -    48    67     -     -     - |  288  15.86
 VESL |     -     -     -    14     -    13     -     - |  288    >>>
 VILL |    26     -    23    22    26     -     -     - |  288   6.71
 WES2 |     -   141    47    65     -     -     -     - |  288   0.19
 WSRT |    53    78    33    22    24     -     -     - |  288   0.04
 WTZR |    50    75    41    24    22    29     -     - |  288   0.11
 WUHN |    19     -     -    13     -     -     -     - |  287  24.15
 YAKT |    65    76     -     -    89     -     -     - |  284   0.70
 YELL |    18     -    18     9    25    14     -     - |  288   0.04
 YSSK |    25     -     -    18     -     -     -     - |  287  13.00
 ZAMB |    28     -     -    20     -     -     -     - |  288  17.48
 -----+-------------------------------------------------+--------------
 TOT  |    60    66    73    43    48    43  4697     - |


 BEST CLOCK FIT: USNO   288   0.02 (ns) 

