
 GPS week: 1219   Day: 6   MJD: 52783                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  30146     22     0.48    -1.26     0.06    19.37
 emr |   288     0  20306    105  2323.04    39.00     0.07    15.65
 esa |   288     0  21468    976  2322.35    39.01     0.06    17.02
 gfz |   278     0  25984    654    -0.15     1.34     0.05    23.99
 igr |   288     0  26036     63     0.04     0.13     0.06     0.00
 jpl |   288     0  25421   1126    -9.31     3.96     0.05    23.98
 ngs |    96     0   2687     23     0.18    -0.62     4.28     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio |
 -----+-------------------------------------------------+
    1 |    75  -378   145     3   120    81  4601     - |
    2 |    58  -302   176    26   -23     -  -839     - |
    3 |    51  -250   149    80    -4   -64 -3389     - |
    4 |   160   -87    -6    88   149  -154 -1374     - |
    5 |    67  -395     2    78     9   126  1687     - |
    6 |   110  -257    49    73   -73   -30 -8799     - |
    7 |    11  -304    85    27     9   116 -3350     - |
    8 |   119  -381    67    51   154    55  1041     - |
    9 |   118  -252   -92   202    49   -60  -160     - |
   10 |   -68  -257   -39   -64    66   312 -7130     - |
   11 |   129  -201    75    67   139   -91  3343     - |
   13 |   188  -180   -47   237   161  -229  3669     - |
   14 |   175  -277  -196   145    15    38  5138     - |
   15 |   -27  -316     -    21    28   207    15     - |
   16 |    45  -374   195    48    74    23  5122     - |
   18 |    65  -269   -30    93   -38    54  2544     - |
   20 |    -8  -349   100   -52   -35   214  3514     - |
   21 |    50  -400   216     5    -8    62  3750     - |
   22 |     4  -465   200   -71    82   222 15006     - |
   23 |    65  -246  -145    12    44   199 -5760     - |
   24 |    77  -210   119    39    57   -47-10139     - |
   25 |    36  -281   113   117   -78   -40 -7703     - |
   26 |   149   -86    81   144   109  -261  -379     - |
   27 |    46  -342   163    14   112    56   261     - |
   28 |   140  -308     8   135   156   -49  8967     - |
   29 |   101   -41     -     -     3   -53 -1782     - |
   30 |   269  -187    57   133    68  -263 -3136     - |
   31 |    87  -363   113    78    70     8 -1181     - |
 -----+-------------------------------------------------+
 ALBH |  -133     -   152     -     -     -     -     - |
 ALGO |   -94  -182   411  -247     -    90     -     - |
 ALRT |    -3     -     -     2     -     -     -     - |
 AMC2 |  -254   413     -     -     -   -65     -     - |
 AOML |     -     -     -     1     -    -1     -     - |
 AREQ |   116  -206     -   159     -  -112     -     - |
 ASC1 |   223     -  -346   -86    53   149     -     - |
 AUCK |   -26     -     X     -   -14    21     -     - |
 BAHR |   -93   417   -67     -     -  -146     -     - |
 BILI |   -29     -     -    -1   -18    24     -     - |
 BJFS |     -   516     -  -337  -202     -     -     - |
 BOGT |   117     -     X   149   -39  -237     -     - |
 BOR1 |  -101   272  -125     -  -133     -     -     - |
 BREW |     -   334     -     -     -  -218     -     - |
 BRUS |  -191   236     -     -  -148     -     -     - |
 CAS1 |     3     -   132   -48    21   -50     -     - |
 CEDU |    82     -  -192     -    -3    70     -     - |
 CHAT |   -28     -     -    45    34   -21     -     - |
 CHUR |   -81   347     -     -  -171  -127     -     - |
 COCO |    41     -   -65    68    -1   -53     -     - |
 CORD |   -79     -     -    63     -     -     -     - |
 CRO1 |    10   176     -     -    70  -113     -     - |
 DARW |    24     -     -     -     -   -19     -     - |
 DAVR |    31     -     -    18    32   -43     -     - |
 DRAO |   145   -42     3  -121   174     -     -     - |
 DUBO |   -55     -     -     -     -    44     -     - |
 DWH1 |  -130   597     -  -253  -170     -     -     - |
 EISL |    22     -  -112   126   -48   -60     -     - |
 FAIR |     -  -208    52    93   126     -     -     - |
 GODZ |  -134   422  -229     -    74     -     -     - |
 GOLD |   110     -  -189    47   -26     -     -     - |
 GRAZ |  -158   389  -176     -   -48     -     -     - |
 HOB2 |   -38  -162   133    44    37     -     -     - |
 HRAO |   -19     -    21     -    -4     -     -     - |
 IISC |    15     -   -62    33    63     X     -     - |
 JPLM |     -   489     -  -319  -142     -     -     - |
 KERG |     -  -283   108     -     -   108     -     - |
 KIRU |  -170   382  -144     -     -     -     -     - |
 KIT3 |     -     -    96     -     -   -68     -     - |
 KOKB |    69     -  -142   108   108   -70     -     - |
 KOSG |  -486     -   962  -300  -355     -     -     - |
 KOUR |     -     -  -183    61     -    71     -     - |
 KSTU |     4     -     -   -72    11    66     -     - |
 LPGS |   106     -     -     X   125   -85     -     - |
 MAC1 |  -133     -     -   -47  -123   153     -     - |
 MADR |   -27   235     -  -136     -     X     -     - |
 MAS1 |    26  -156   -63   -14     -   139     -     - |
 MBAR |    36     -     -    18     -   -46     -     - |
 MCM4 |   111     -     -   -89  -103     X     -     - |
 MDO1 |  -182   401     X  -115  -168     -     -     - |
 MEDI |  -190   235     -     -  -144     -     -     - |
 METS |  -145   313     -   -90    -3     -     -     - |
 MIZU |     -   344     -  -224  -209     -     -     - |
 MKEA |    63     -   -71     -   -28     -     -     - |
 NICO |    19     -     -     -     -   -15     -     - |
 NKLG |     -     -  -239     -     -   170     -     - |
 NLIB |     -   312   -98   -94    28   -11     -     - |
 NOT1 |     -    79     -     -     -   -51     -     - |
 NPLD |  -132   491     -     -   -23  -214     -     - |
 NRC2 |   130    11  -582   311   249     -     -     - |
 NRIL |    83     -     -    74    93  -141     -     - |
 NTUS |  -119     -     -   -19   -55   114     -     - |
 NYA1 |   157     -     -  -188   -58    55     -     - |
 NYAL |     -  -340   313     -   -83     -     -     - |
 OS0G |    28   -89     -   -17    55    53     -     - |
 OUS2 |     -     -     -    -2     -     2     -     - |
 PETP |     -     -     -   -96     -    96     -     - |
 PIE1 |     -   -28    26     -     -     -     -     - |
 PIMO |     -     -  -101    74    -3   -12     -     - |
 POTS |    25     -   -23    -4    29     -     -     - |
 QAQ1 |    26     -     -   -21     -     -     -     - |
 RBAY |    96     -     -     -     -   -77     -     - |
 REYK |    67     -   -88    20     -   -11     -     - |
 RIOG |    42     -    52   -57    26   -16     -     - |
 SANT |    -2     -   156    41     5  -136     -     - |
 SCH2 |  -299   420     -     -   -76   -32     -     - |
 SCUB |     7     -     -    -5     -     -     -     - |
 SFER |     -   293  -270     -     -     -     -     - |
 STJO |    25  -155     -    -9   153    90     -     - |
 SUTH |    68     -   121  -146   103     -     -     - |
 SYOG |    81  -255     -    52     -    48     -     - |
 THTI |     -     -   163     -     -  -116     -     - |
 TIDB |  -203   391  -126     X     -     X     -     - |
 TIXI |    23     -     -  -112     -    90     -     - |
 TOW2 |   -26     -     -   -18     -    39     -     - |
 TRO1 |  -177     -     -   143    13     -     -     - |
 TSKB |   -33  -136   -11     2    42   122     -     - |
 ULAB |     -     -     -  -154     -   154     -     - |
 UNSA |     -     -     -   -20  -120    20     -     - |
 USNO |   140   -98   -69     -   210     -     -     - |
 USUD |   -98   427     -  -201  -212     -     -     - |
 VILL |    89     -  -258   115     -     -     -     - |
 WES2 |     -   465  -433     5    87     -     -     - |
 WILL |  -285   353     -     -  -235     -     -     - |
 WSRT |   -41     -    44     2    -2     -     -     - |
 WTZR |  -149   372   -30   -92   -41   -12     -     - |
 WUHN |     -     -     -    68  -178   -68     -     - |
 YAKT |  -153   307     -     -   -56   -75     -     - |
 YELL |   -51     -   -42    27   -35    45     -     - |
 YSSK |   -36     -     -   -45   -56    72     -     - |
 ZECK |    27     -     -   -22     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |    52    32    34    23    69    26  5597     - |  288   2.70
    2 |    60    44    98    19   106     - 11104     - |  288   1.69
    3 |    79    42    48    70    52    40  2913     - |  284   1.43
    4 |    50    57    50    44    44    37  2193     - |  288   0.87
    5 |    66    40    32    28    52    30  6866     - |  288   2.57
    6 |   120    84    52    48    74    76  8609     - |  286   9.76
    7 |   145    53    77    77    68    77  1895     - |  286   0.82
    8 |    30    34    57    15    38    28  5626     - |  288   4.62
    9 |    44    26    67    42    67    44  2397     - |  288   0.93
   10 |    75    38    42    42    41    31  4451     - |  288   1.47
   11 |    93    40    67    31    62    28  1771     - |  288   0.31
   13 |    51    36    62    26    63    31   641     - |  288   0.27
   14 |    69    35    74    13    56    32  1283     - |  288   0.22
   15 |    67    55     -    40    43    53  4797     - |  288   3.74
   16 |    47    33    52    30    86    40   704     - |  288   0.24
   18 |    64    36    86    24    92    28  1171     - |  288   0.47
   20 |    76    28    49    34    80    27   804     - |  288   0.25
   21 |    68    38    47    26    71    22  1157     - |  288   0.51
   22 |    43   101    83    33   107    39  5294     - |  288  12.71
   23 |    64    44    82    43    92    25  7234     - |  288   7.64
   24 |    60    27   107    69    86    23  3633     - |  288   2.78
   25 |    56    27    33    14    46    30  3180     - |  288   1.55
   26 |    76    32    79    44    61    35  1477     - |  288   0.45
   27 |    37    25    38    32    31    23  3011     - |  288   2.18
   28 |    45    32    27    13    39    30  3443     - |  288   0.69
   29 |    99    53     -     -   154    54  1294     - |  288   0.77
   30 |    69    29    42    30    52    22  2610     - |  288   0.53
   31 |    64    47    87    73    37    34  1648     - |  285   1.46
 -----+-------------------------------------------------+--------------
 ALBH |    12     -    14     -     -     -     -     - |  288   0.06
 ALGO |    31    20    20    26     -    13     -     - |  288   0.03
 ALRT |    26     -     -    21     -     -     -     - |  278   8.58
 AMC2 |    29    79     -     -     -    35     -     - |  288   0.04
 AOML |     -     -     -   118     -   118     -     - |  270  33.89
 AREQ |    44    36     -    27     -    21     -     - |  288  25.68
 ASC1 |    18     -    24    24    22    31     -     - |  286    >>>
 AUCK |    23     -     X     -    46    18     -     - |  264  13.20
 BAHR |    61   141    50     -     -    39     -     - |  288   0.36
 BILI |    44     -     -    31    32    23     -     - |  286   9.40
 BJFS |     -    74     -    49    49     -     -     - |  276    >>>
 BOGT |   116     -     X    93    38   179     -     - |  286  19.70
 BOR1 |    49    82    35     -    56     -     -     - |  288   0.55
 BREW |     -    75     -     -     -    49     -     - |  285   0.08
 BRUS |    75    93     -     -    41     -     -     - |  288   0.04
 CAS1 |    46     -    51    21    36    39     -     - |  288   9.22
 CEDU |    99     -   167     -    24    43     -     - |  287  45.59
 CHAT |    37     -     -    38    26    21     -     - |  287  14.83
 CHUR |    64   138     -     -    56    40     -     - |  288   9.20
 COCO |    19     -    32    38    29    30     -     - |  288  12.36
 CORD |    34     -     -    27     -     -     -     - |  278  20.79
 CRO1 |    39    92     -     -    36    30     -     - |  288  22.68
 DARW |    24     -     -     -     -    19     -     - |  288  23.61
 DAVR |    52     -     -   116    73   136     -     - |  286  17.89
 DRAO |    30    26    27    29    36     -     -     - |  288   0.06
 DUBO |    18     -     -     -     -    14     -     - |  288  12.70
 DWH1 |    32    92     -    45    85     -     -     - |  288   0.57
 EISL |    87     -    72    20    48    51     -     - |  287  44.35
 FAIR |     -    79   196   101    46     -     -     - |  278   0.18
 GODZ |    41    99    51     -    46     -     -     - |  288   0.05
 GOLD |    44     -   112    52    37     -     -     - |  288  17.93
 GRAZ |    63    79    64     -    33     -     -     - |  287  55.55
 HOB2 |    41    27    46    25    28     -     -     - |  288   0.06
 HRAO |    23     -    26     -    25     -     -     - |  287  21.19
 IISC |    36     -    56    38    39     X     -     - |  288  26.44
 JPLM |     -   156     -   101   109     -     -     - |  248   9.89
 KERG |     -    28    31     -     -    16     -     - |  287    >>>
 KIRU |    38    72    49     -     -     -     -     - |  288  11.50
 KIT3 |     -     -    32     -     -    23     -     - |  287  20.35
 KOKB |    87     -    48    29    32    63     -     - |  284   0.05
 KOSG |    27     -    16    24    25     -     -     - |  288  21.77
 KOUR |     -     -    41    29     -    35     -     - |  288   1.92
 KSTU |    69     -     -    98   152    92     -     - |  282   9.57
 LPGS |    53     -     -     X    54    43     -     - |  268  20.64
 MAC1 |    33     -     -    32    29    24     -     - |  288  11.61
 MADR |    70   114     -    29     -     X     -     - |  288  14.72
 MAS1 |    17    17    21    23     -    25     -     - |  288   2.67
 MBAR |    28     -     -    31     -    34     -     - |  288  29.67
 MCM4 |    49     -     -    40    99     X     -     - |  278  12.52
 MDO1 |    64   111     X    37    65     -     -     - |  288   5.01
 MEDI |    77    95     -     -    66     -     -     - |  288   4.01
 METS |    58    71     -    23    59     -     -     - |  287   0.25
 MIZU |     -    62     -    40    90     -     -     - |  274   0.31
 MKEA |    35     -    40     -    38     -     -     - |  288  23.66
 NICO |    45     -     -     -     -    36     -     - |  288  16.41
 NKLG |     -     -    33     -     -    23     -     - |  287 135.81
 NLIB |     -   134   128   156   104    95     -     - |  280 444.45
 NOT1 |     -    70     -     -     -    45     -     - |  288    >>>
 NPLD |    46    64     -     -    35    22     -     - |  287   0.04
 NRC2 |    43    23    31    18    35     -     -     - |  288   0.02
 NRIL |    34     -     -    71    80    73     -     - |  265   9.18
 NTUS |    27     -     -    42    22    25     -     - |  288   8.61
 NYA1 |    39     -     -    27    29    20     -     - |  288   0.49
 NYAL |     -    23    21     -    59     -     -     - |  288   0.50
 OS0G |    43    21     -    24    45    29     -     - |  240   0.04
 OUS2 |     -     -     -    31     -    31     -     - |  278  11.31
 PETP |     -     -     -    68     -    68     -     - |  257  12.39
 PIE1 |     -    25    23     -     -     -     -     - |  288   0.07
 PIMO |     -     -   121    96   102    75     -     - |  278  25.32
 POTS |    33     -    21    32    21     -     -     - |  288  10.60
 QAQ1 |    47     -     -    38     -     -     -     - |  278  12.31
 RBAY |    77     -     -     -     -    62     -     - |  244  63.07
 REYK |    48     -    26    30     -    21     -     - |  288  11.28
 RIOG |    72     -    40    27    33    50     -     - |  288  15.51
 SANT |    93     -   116    41    51    50     -     - |  288   6.31
 SCH2 |    18    16     -     -    31    16     -     - |  288  13.36
 SCUB |    32     -     -    25     -     -     -     - |  278  19.02
 SFER |     -    81    75     -     -     -     -     - |  287   0.41
 STJO |    32    19     -    28    30    17     -     - |  288  11.84
 SUTH |    58     -    48    44    45     -     -     - |  288  18.99
 SYOG |   115    97     -    28     -    44     -     - |  280   0.59
 THTI |     -     -    35     -     -    25     -     - |  287  25.25
 TIDB |    39    73    38     X     -     X     -     - |  243   0.17
 TIXI |    29     -     -    23     -    33     -     - |  287   8.99
 TOW2 |    20     -     -    24     -    27     -     - |  288  16.56
 TRO1 |    54     -     -    43    19     -     -     - |  278  12.76
 TSKB |    39    25    39    34    16    17     -     - |  288   1.58
 ULAB |     -     -     -    56     -    56     -     - |  276  16.73
 UNSA |     -     -     -    52    25    52     -     - |  263  15.54
 USNO |    19    15    18     -    28     -     -     - |  288   0.02
 USUD |    61   140     -    51    60     -     -     - |  288  20.31
 VILL |    54     -    41    50     -     -     -     - |  288   2.83
 WES2 |     -    83    43    28    39     -     -     - |  288   0.08
 WILL |    39    48     -     -    53     -     -     - |  286  37.24
 WSRT |    39     -    29    40    20     -     -     - |  287   0.03
 WTZR |    55    71    26    22    32    34     -     - |  288   0.19
 WUHN |     -     -     -    55    88    55     -     - |  273  24.97
 YAKT |    34   100     -     -    59    53     -     - |  288   0.46
 YELL |    35     -    44    23    25    67     -     - |  288   0.05
 YSSK |    32     -     -    28    16    24     -     - |  287  14.16
 ZECK |    32     -     -    26     -     -     -     - |  278  15.69
 -----+-------------------------------------------------+--------------
 TOT  |    56    67    63    48    59    48  4278     - |


 BEST CLOCK FIT: NRC2   288   0.02 (ns) 

