
 GPS week: 1223   Day: 5   MJD: 52810                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  32336    418    -0.84     0.58     0.06    17.29
 emr |   288     0  20862    392    28.80     6.13     0.07    13.04
 esa |   288     0  20201   1359    28.47     6.06     0.07    13.79
 gfz |   288     0  26747   1094     0.28    -1.16     0.04    23.99
 igr |   288     0  28667     37     0.00    -0.25     0.04     0.00
 jpl |   288     0  25645    504    -6.27     0.16     0.03    31.88
 ngs |    96     0   2687     14     0.39    -1.04     3.47     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio |
 -----+-------------------------------------------------+
    1 |    18  -375   240   -33    24    70  9255     - |
    2 |  -127  -453   197   -74   -76   225 -7381     - |
    3 |    22  -312   297    15    16   -24 -5785     - |
    4 |   212  -220   -42   220   127  -173  3397     - |
    5 |    34  -402   141    -4   -29    88  1452     - |
    6 |   126  -311   119   154    61  -108 -6058     - |
    7 |   -12  -410    -8   105   134    99 -1369     - |
    8 |    25  -354   -39    17    66   136 -5557     - |
    9 |   112  -276    33    98    63   -37 -5736     - |
   10 |   -13  -375  -105   -76    13   263 -5459     - |
   11 |    54  -277   214   122    75   -97  6187     - |
   13 |   240  -194   194   162   143  -239  3966     - |
   14 |   169  -186  -138   187    23   -90  2745     - |
   15 |    63  -316     -   -35   -16   121  1867     - |
   16 |   -42  -431   123    -6    41   150  4648     - |
   17 |    81  -241  -120     X    48   105 -8614     - |
   18 |    70  -264   108   130   110   -74  4002     - |
   20 |   -17  -405   260  -100   102   138  4251     - |
   21 |   108  -330   151   -10   -10    19  8012     - |
   23 |   106  -308  -193    35     8   117 -1428     - |
   24 |   126  -228     -    63   161   -24  3251     - |
   25 |    80  -279   143   153    89  -106 -2883     - |
   26 |   233  -164    45   198    68  -211   582     - |
   27 |    53  -296    44    22   103    57  2095     - |
   28 |    -9  -390    35   151    44    36  3802     - |
   29 |   192  -196    17   181    78  -171  -414     - |
   30 |   199   -93   200   282   135  -370 -1263     - |
   31 |     2  -357    74    68    46    67 -8495     - |
 -----+-------------------------------------------------+
 ALBH |   -29   331  -174     -    82   -43     -     - |
 ALGO |   -25  -195   112   -66    16    94     -     - |
 AMC2 |  -203   469     -     -  -117   -82     -     - |
 ANKR |    32     -   -40     -     -     -     -     - |
 AREQ |    92  -284     -    42    82    35     -     - |
 ARTU |    98     -     -    55    69   -94     -     - |
 ASC1 |  -220     -     -  -135   -78   216     -     - |
 AUCK |    -2     -     X     -  -297     1     -     - |
 BAHR |   -15   542   -50   -68    -2  -139     -     - |
 BILI |    73     -     -   -27    47   -19     -     - |
 BOGT |     X     -   434     X     -  -188     -     - |
 BOR1 |  -233   309     -     -  -220     -     -     - |
 BRAZ |     -     -     -    68     -   -52     -     - |
 BRUS |  -227   300     -     -  -140     -     -     - |
 CAS1 |   -11     -   126   -66    -6     1     -     - |
 CEDU |   -50     -   -60     -   -47    53     -     - |
 CHAT |   -65     -     -    47     6     -     -     - |
 CHUR |  -139   184     -     -  -320     -     -     - |
 COCO |   110     -  -103   118    20  -104     -     - |
 CORD |    -7     -     -     5     -     -     -     - |
 CRO1 |    28   360     -     -   -26  -146     -     - |
 DARW |   -91     -     -     -     -    49     -     - |
 DAV1 |  -120     -     -    -8   -22    62     -     - |
 DRAO |   143  -162     X   -14   145     -     -     - |
 DUBO |   159     -     -     -     -   -86     -     - |
 DWH1 |     -   392     -  -213  -383     -     -     - |
 EISL |     -     -     -    35    75   -27     -     - |
 FAIR |   186  -143     X   -12   152   -29     -     - |
 FORT |     -     X  -406    67  -117   125     -     - |
 GODE |  -204   524  -221     -   -36     -     -     - |
 GOLD |    78     -  -207    64  -387     -     -     - |
 GOUG |     -     -     -  -111     -    84     -     - |
 GRAZ |  -219   290     X     -  -138     -     -     - |
 GUAM |    60     -     -   -43   126     0     -     - |
 GUAT |   116     -     -     -    59   -63     -     - |
 HARB |    95     -     -   -68     -     -     -     - |
 HERS |  -233   309     -     -   139     -     -     - |
 HOB2 |   -86   398   -10  -146   -97     -     -     - |
 HRAO |     6     -    -7     -    27     -     -     - |
 IISC |     9     -   -87    44    66     -     -     - |
 INVK |   149     -     -  -108     -     -     -     - |
 JPLM |     -   576     -  -313   -54     -     -     - |
 KARR |   -50     -     -     -     -    27     -     - |
 KERG |   116  -224    21   -67   -12    70     -     - |
 KGN0 |     -   233     -     -  -157   -95     -     - |
 KIRU |   -82   419   -89     -   -56   -88     -     - |
 KIT3 |     -     -     -    74    96   -55     -     - |
 KOKB |     -   739  -125   -24    90  -215     -     - |
 KOUR |   -49     -  -238     0   -61   129     -     - |
 KSTU |   111     -     -   -66     -   -11     -     - |
 LHAS |    95     -  -152    85     -   -50     -     - |
 LPGS |     -     -     -  -520     -   391     -     - |
 MAC1 |  -133     -     -  -196   -43   220     -     - |
 MADR |   -54   380     -  -158     -     -     -     - |
 MAS1 |    31  -125     7   -43    -1    64     -     - |
 MDO1 |     -   350  -156   -97   -48     -     -     - |
 METS |  -123   332     -   -92     -     -     -     - |
 MKEA |    65     -   -81     -    15     -     -     - |
 NKLG |   -55     -     -    65    34   -18     -     - |
 NLIB |     -     -   210  -121   168     -     -     - |
 NOT1 |     -    89     -     -  -274   -37     -     - |
 NPLD |  -272   360     -     -  -156     -     -     - |
 NRC1 |    59  -131    35     9    66     -     -     - |
 NRIL |   -19     -     -  -100   -63    86     -     - |
 NYA1 |    80     -     -   -58    22     -     -     - |
 NYAL |     -  -112    69     -    73    16     -     - |
 OHI2 |    67     -     -     -     -   -36     -     - |
 ONSA |    32  -119    70   -17    30    13     -     - |
 PDEL |  -411     -     -     7     -   217     -     - |
 PERT |    12  -144    10     -    11    48     -     - |
 PETP |  -109     -     -  -121     -   150     -     - |
 PIE1 |   107  -112   -29     -    49     -     -     - |
 PIMO |    61     -  -173   -70   -70    81     -     - |
 POTS |    36     -   -28   -10     5     -     -     - |
 QAQ1 |   171     -     -   126     -  -187     -     - |
 RBAY |  -941     -     -     -  -751   511     -     - |
 RIOG |   -47     -     7     -     -    23     -     - |
 SANT |   -22     -    59    -8    54    -8     -     - |
 SCH2 |  -261   421     -     -    32   -30     -     - |
 SEY1 |    67     -   -85     -     -     X     -     - |
 SFER |   -73   514   -77     -   193  -138     -     - |
 STJO |     9  -316     -   140    74    19     -     - |
 SUTH |    24     -    23   -31   155     -     -     - |
 SYOG |    48   412     -  -165     -   -69     -     - |
 THTI |     -     -   -24   160   -65  -110     -     - |
 THU3 |   200     -     -     X   -62  -108     -     - |
 TIDB |     5  -204   187     X     -     X     -     - |
 TIXI |    45     -     -   -33    64     -     -     - |
 TLSE |  -252   334     -     -    28     -     -     - |
 TOW2 |   -90     -     -    78     -   -10     -     - |
 TRO1 |   -54     -     -    39   149     -     -     - |
 TSKB |   -15  -164     7    12     -    63     -     - |
 USNO |   131  -174     -     -   102     -     -     - |
 USUD |     -   408     -  -222  -143     -     -     - |
 VILL |    60     -  -155    46   -31     -     -     - |
 WES2 |   -57   497  -196  -116     -     -     -     - |
 WILL |  -205   271     -     -  -190     -     -     - |
 WTZR |  -171   352   -68   -62   -86    25     -     - |
 YAKT |   -12   285     -     -   -49  -104     -     - |
 YELL |    65     -   -63  -112   -15    77     -     - |
 YSSK |   -29     -     -    21     1     -     -     - |
 ZAMB |  -158     -     -   114     -     -     -     - |
 ZECK |    21     -     -   -38     -    17     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |   146   150   134    89   108    81  8492     - |  287   4.34
    2 |    35    48    58    29    46    30  2068     - |  288   1.87
    3 |    30    44   164    50    51    49  2419     - |  288   2.11
    4 |   155    33   143    23    23    37  4186     - |  288   0.51
    5 |    63    42    30    35    21    24  1967     - |  288   0.40
    6 |    54    45    42    23    54    24  9519     - |  288  10.12
    7 |    46    27    37    29    36    19  1841     - |  288   0.79
    8 |    56    36    34    29    36    25  3070     - |  288   2.06
    9 |    74    53    47    32    26    28  2994     - |  288   2.23
   10 |    61    64    55    31    25    29  3051     - |  288   1.54
   11 |   108    49    52    18    53    33   998     - |  288   0.25
   13 |    82    35   107    33    37    27  1038     - |  288   0.28
   14 |    88    59   108    46    45    17   822     - |  288   0.22
   15 |    75    61     -    42    61    32  3548     - |  288   3.98
   16 |    42    46    61    24    31    44  1013     - |  288   0.41
   17 |    95    41   147     X    42    42  3265     - |  288   3.47
   18 |    65    84    64    22    50    44   851     - |  288   0.45
   20 |    92    47    89    29    46    36  1063     - |  288   0.25
   21 |    72    85    74    33    60    37  1715     - |  288   0.27
   23 |    57    85   104    45    37    24  7229     - |  288   7.80
   24 |    85    86     -    41    71    41  5180     - |  288   1.76
   25 |    61    58    60    27    24    37  1698     - |  288   1.32
   26 |   155    58   137   154    61    49  1563     - |  286   0.56
   27 |    63    35    35    31    36    23  1397     - |  288   1.28
   28 |    41    37    38    16    29    23  1157     - |  288   0.39
   29 |   151    82   114    46    68    65  1484     - |  288   0.64
   30 |    63    47    82    20    28    21  1544     - |  288   0.80
   31 |    29    67   170    38    59    37  1879     - |  288   1.51
 -----+-------------------------------------------------+--------------
 ALBH |    26    69    31     -    14    28     -     - |  288   0.04
 ALGO |    33    22    31    21    11    15     -     - |  288   0.04
 AMC2 |    24    94     -     -    25    31     -     - |  288   0.05
 ANKR |    17     -    22     -     -     -     -     - |  288  31.32
 AREQ |    46    29     -    21    11    29     -     - |  288  18.11
 ARTU |    33     -     -    19    21    20     -     - |  287  10.05
 ASC1 |    48     -     -    25    19    21     -     - |  288    >>>
 AUCK |    35     -     X     -    35    19     -     - |  264  13.96
 BAHR |    46    81    36    17    15    26     -     - |  288   0.35
 BILI |    50     -     -    27    13    20     -     - |  287   9.24
 BOGT |     X     -    30     X     -    13     -     - |  267  14.95
 BOR1 |   103   137     -     -    65     -     -     - |  285   0.53
 BRAZ |     -     -     -    21     -    16     -     - |  287    >>>
 BRUS |    60    79     -     -    31     -     -     - |  267   0.06
 CAS1 |    70     -    72    25    27    16     -     - |  288   9.10
 CEDU |    19     -    28     -    17    17     -     - |  288  18.56
 CHAT |    27     -     -    20    33     -     -     - |  287  12.60
 CHUR |    67    89     -     -    30     -     -     - |  284   8.77
 COCO |    15     -    48    34    12    37     -     - |  288   8.99
 CORD |    34     -     -    24     -     -     -     - |  288  13.10
 CRO1 |    62   160     -     -    33    35     -     - |  288  17.61
 DARW |    21     -     -     -     -    11     -     - |  287  14.06
 DAV1 |    58     -     -    48    53    14     -     - |  288  16.71
 DRAO |    18    30     X    14    31     -     -     - |  288   0.08
 DUBO |    25     -     -     -     -    13     -     - |  288  12.42
 DWH1 |     -    78     -    43    37     -     -     - |  277   0.41
 EISL |     -     -     -    62    33    47     -     - |  273  26.05
 FAIR |    37    68     X   152    84   111     -     - |  285   0.41
 FORT |     -     X    52    22    18    21     -     - |  288   0.17
 GODE |    65   104    56     -    35     -     -     - |  288   0.07
 GOLD |    29     -    38    33    28     -     -     - |  288  13.46
 GOUG |     -     -     -    21     -    16     -     - |  287    >>>
 GRAZ |    55    73     X     -    24     -     -     - |  286  76.08
 GUAM |    26     -     -    34    23    22     -     - |  288  17.30
 GUAT |    25     -     -     -    30    14     -     - |  288    >>>
 HARB |    38     -     -    27     -     -     -     - |  279  30.61
 HERS |    51    68     -     -    28     -     -     - |  241   7.33
 HOB2 |    50    92    50    24    17     -     -     - |  288   0.08
 HRAO |    16     -    20     -    24     -     -     - |  288  16.15
 IISC |    36     -    33    27    20     -     -     - |  288  18.95
 INVK |    16     -     -    12     -     -     -     - |  288   9.16
 JPLM |     -   176     -    96   138     -     -     - |  164   6.67
 KARR |    23     -     -     -     -    13     -     - |  288   8.92
 KERG |    56    31    42    44    20    20     -     - |  287   2.20
 KGN0 |     -    89     -     -    40    36     -     - |  287   0.49
 KIRU |    55    62    61     -    28    17     -     - |  288  10.24
 KIT3 |     -     -     -    34    38    26     -     - |  263  29.78
 KOKB |     -   119    67    44    47    45     -     - |  288   0.06
 KOUR |    26     -    44    32    18    31     -     - |  288   2.18
 KSTU |   133     -     -    76     -    23     -     - |  274  12.43
 LHAS |    20     -    34    21     -    24     -     - |  288  12.10
 LPGS |     -     -     -    29     -    22     -     - |  156  16.11
 MAC1 |    29     -     -    52    17    33     -     - |  288  12.78
 MADR |   120    86     -    60     -     -     -     - |  284   9.90
 MAS1 |    14    17    30    13    16    14     -     - |  288   2.15
 MDO1 |     -    99    94    86    55     -     -     - |  276    >>>
 METS |    41    47     -    23     -     -     -     - |  287   0.31
 MKEA |    28     -    35     -    59     -     -     - |  288  21.04
 NKLG |    36     -     -    31    21    17     -     - |  287 361.36
 NLIB |     -     -   121    69    34     -     -     - |   96   0.05
 NOT1 |     -   110     -     -    47    45     -     - |  284    >>>
 NPLD |    44    58     -     -    34     -     -     - |  287   0.07
 NRC1 |    30    22    24    16    21     -     -     - |  288   0.04
 NRIL |    34     -     -    58    58    49     -     - |  288  11.01
 NYA1 |    42     -     -    30     9     -     -     - |  288   0.08
 NYAL |     -    20    26     -    20    15     -     - |  288   0.08
 OHI2 |    43     -     -     -     -    24     -     - |  196   7.54
 ONSA |    44    19    41    14    11    16     -     - |  252   0.08
 PDEL |    28     -     -    39     -    27     -     - |  288  54.10
 PERT |    24    29    36     -    15    13     -     - |  288   8.18
 PETP |    35     -     -    18     -    18     -     - |  287  11.82
 PIE1 |    16    25    26     -    47     -     -     - |  288   0.05
 PIMO |    78     -   130    32    31    61     -     - |  267  19.71
 POTS |    56     -    45    34    28     -     -     - |  288  12.72
 QAQ1 |    41     -     -    34     -    13     -     - |  288   8.17
 RBAY |    29     -     -     -    48    16     -     - |   88  67.43
 RIOG |    52     -    65     -     -    50     -     - |  156  12.14
 SANT |    77     -    60    27    18    50     -     - |  288   5.91
 SCH2 |    29    94     -     -    33    34     -     - |  288   6.12
 SEY1 |    53     -    66     -     -     X     -     - |  286  23.61
 SFER |    41    98    36     -    45    28     -     - |  287   0.45
 STJO |    53    37     -    85    23    29     -     - |  288   0.09
 SUTH |    54     -    33    43    31     -     -     - |  288  11.13
 SYOG |    70    95     -    34     -    18     -     - |  288   0.71
 THTI |     -     -    32    38    17    28     -     - |  287   8.13
 THU3 |    40     -     -     X    16    22     -     - |  287   8.94
 TIDB |    30    32    21     X     -     X     -     - |  216   0.15
 TIXI |    31     -     -    23    14     -     -     - |  287  10.99
 TLSE |    61    81     -     -    23     -     -     - |  285   0.53
 TOW2 |    22     -     -    48     -    36     -     - |  288  14.07
 TRO1 |   103     -     -    74    20     -     -     - |  288  12.08
 TSKB |    31    31    45    37     -    19     -     - |  288   0.80
 USNO |    19    25     -     -    15     -     -     - |  288   0.04
 USUD |     -    99     -    54    50     -     -     - |  279  14.83
 VILL |    34     -    47    15    19     -     -     - |  288   3.50
 WES2 |    38   112    42    34     -     -     -     - |  288   0.05
 WILL |    31    41     -     -    28     -     -     - |  286  41.75
 WTZR |    50    87    59    30    22    27     -     - |  288   0.10
 YAKT |    42   125     -     -    27    48     -     - |  288   0.47
 YELL |    38     -    72    52    21    87     -     - |  288   0.03
 YSSK |    17     -     -    12    27     -     -     - |  287  12.70
 ZAMB |    28     -     -    20     -     -     -     - |  280  13.59
 ZECK |    39     -     -    18     -    19     -     - |  288  12.68
 -----+-------------------------------------------------+--------------
 TOT  |    58    73    70    44    38    34  3470     - |


 BEST CLOCK FIT: YELL   288   0.03 (ns) 

