
 GPS week: 1224   Day: 1   MJD: 52813                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2686      0     0.17    -0.21     4.09     0.00
 cod |   288     0  23858     66    -0.65     0.08     0.07    17.06
 emr |   288     0  19647     58    44.30     4.74     0.07    16.37
 esa |   288     0  19101   1282    -1.16    -0.14     0.08    12.28
 igu |    96     0   2686      0     0.19    -0.23     3.39     0.00
 jpl |   288     0  14669    564     0.60     1.93     0.03    34.50
 ngs |    96     0   2686      0     0.16    -0.20     4.02     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  30255    313   625.29    13.76     0.06    19.79

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  6094    52  -119    55 11846   -17  6189     -    43 |
    2 | -8550   -61  -174    26  3233   167 -8284     -   -87 |
    3 |  2378   -33  -103   238   766    24  1036     -   -37 |
    4 | -3521    62    -2  -220 -2674  -118 -3380     -   102 |
    5 |     8   111    94    13  -113    52   176     -  -189 |
    6 | -3091    19   -75   151 -5711   -34 -1964     -   -33 |
    7 | -1153    19  -119   -58  1550    97 -1162     -   -37 |
    8 | -1819   -55  -119   -52 -8029   123 -2241     -   -20 |
    9 |  1257    47   102   -11  4572    -4  1348     -  -112 |
   10 | -3194    56   -12   -81 -3316   101 -3234     -    -3 |
   11 |   875   -74   -99   175     4    27  1374     -    -7 |
   13 |  3892    97   -48   168  1957   -96  3839     -     6 |
   14 |  -648    23    87    -3  -998    47  -409     -   -97 |
   15 |  2303    90   -22     - 12568    75  2071     -   -71 |
   16 |  5531   -56  -214    35  -390   151  5431     -   -38 |
   17 | -6072   131    14     X -1840     8 -5397     -  -139 |
   18 |  3578    39   -42   102  -438    -7  3621     -   -62 |
   20 |  2150   111   -68   150  1370   243  2366     -  -183 |
   21 |  3190   -15   -37   173 -4107     X  3196     -   -64 |
   23 |   558    73  -136    19  3488   105  -129     -  -131 |
   24 | -4694    56     6     X   356   -53 -4720     -   -46 |
   25 |  4838    26   -42   159   893   -53  4268     -   -79 |
   26 |   309   100    83  -229   131   -36   165     -   -39 |
   27 |   563    22  -115    80-10113    55   523     -    18 |
   28 |  2066    11   -78   -39  3029   102  2060     -    64 |
   29 | -2677   -17    61   -77  -545    -1 -2647     -    17 |
   30 | -4351    67   152    82  -673  -147 -4185     -     X |
   31 |   184   -64  -114    94 -6820    64    91     -   -11 |
 -----+-------------------------------------------------------+
 ALBH |     -  -220  -146     -     -   281     -     -  -182 |
 ALGO |     -     -   -82  -132     -    61     -     -    43 |
 AMC2 |     -  -222    97     -     -     X     -     -   112 |
 ANKR |     -   -18     -     -     -     9     -     -     - |
 AREQ |     -   -14   100  -149     -   -42     -     -    95 |
 ARTU |     -  -116     -     -     -    57     -     -     - |
 ASC1 |     -    -5     -     -     -     -     -     -     4 |
 AUCK |     -   -13     -     X     -     -     -     -    12 |
 BAHR |     -    26    76   -28     -    25     -     -  -110 |
 BILI |     -    14     -     -     -    -7     -     -     - |
 BJFS |     -     -   -48     -     -     -     -     -    40 |
 BOGT |     -   183     -     X     -   -61     -     -   -52 |
 BOR1 |     -     -   113     -     -     -     -     -   -93 |
 BREW |     -     -     3     -     -     -     -     -    -2 |
 BRUS |     -     -    52     -     -   -12     -     -   -20 |
 CAS1 |     -   -66     -   282     -    17     -     -  -149 |
 CEDU |     -   -25     -   114     -     -     -     -   -49 |
 CHAT |     -    20     -  -183     -     -     -     -    97 |
 CHUR |     -   149    60     -     -     -     -     -  -169 |
 COCO |     -   146     -   -43     -   -51     -     -   -11 |
 CRO1 |     -  -137   169     -     -   -48     -     -    62 |
 DAV1 |     -   -24     -     -     -     -     -     -    21 |
 DRAO |     -    41   -46     -     -     -     -     -     3 |
 DWH1 |     -     -    80     -     -     -     -     -   -66 |
 EISL |     -   127     -  -210     -   -52     -     -   113 |
 FAIR |     -     -   -78   -36     -     -     -     -    87 |
 FORT |     -     -     -    44     -    40     -     -   -96 |
 GODE |     -     -   115  -192     -     -     -     -    24 |
 GOLD |     -   105     -   -26     -  -104     -     -   108 |
 GRAZ |     -     -    69     -     -     -     -     -   -57 |
 GUAM |     -    45     -   -66     -  -152     -     -   268 |
 GUAT |     -   150     -     -     -  -265     -     -   285 |
 HERS |     -     -  -197     -     -     -     -     -   163 |
 HOB2 |     -    74    64  -117     -     -     -     -   -43 |
 HRAO |     -     -     -     -     -  -218     -     -   380 |
 IISC |     -  -108     -    66     -     -     -     -    52 |
 JAB1 |     -   152     -     -     -   -75     -     -     - |
 JPLM |     -     -    41     -     -     -     -     -   -34 |
 KERG |     -     -    37     -     -     -     -     -   -30 |
 KIRU |     -    -9   -16     -     -     -     -     -    20 |
 KIT3 |     -     -     -    90     -     -     -     -   -56 |
 KOUR |     -    61     -  -494     -   -61     -     -   362 |
 KUNM |     -   -42     -     -     -    17     -     -     7 |
 LPGS |     -     -     -  -183     -    61     -     -     7 |
 MAC1 |     -   -91     -    84     -    24     -     -   -16 |
 MALI |     -   -53     -    74     -     -     -     -     - |
 MAS1 |     -     -    13   108     -   -11     -     -   -58 |
 MDO1 |     -    37    87  -250     -     -     -     -    22 |
 MEDI |     -     -    11     -     -     -     -     -    -9 |
 MIZU |     -     -    26     -     -     8     -     -   -34 |
 MKEA |     -     -     -  -142     -   -18     -     -   121 |
 NKLG |     -   -41     -     -     -    78     -     -  -100 |
 NOT1 |     -   132   -82     -     -     -     -     -   -46 |
 NPLD |     -   -68   153     -     -     -     -     -   -68 |
 NRC1 |     -     -   151  -295     -   -61     -     -   166 |
 NRIL |     -  -108     -     -     -    53     -     -     - |
 NTUS |     -   -86     -     -     -     -     -     -    74 |
 NYA1 |     -    40     -     -     -     -     -     -   -35 |
 NYAL |     -     -  -108   349     -     -     -     -  -127 |
 OHI2 |     -   -52     -     -     -    26     -     -     - |
 ONSA |     -   -60    35    87     -     -     -     -   -31 |
 PENC |     -    65     -     -     -     -     -     -   -56 |
 PETP |     -   -49     -     -     -    24     -     -     - |
 PIE1 |     -     -   161  -314     -     -     -     -    63 |
 POL2 |     -    -7     -     -     -     -     -     -     6 |
 POTS |     -   -12     -    29     -     -     -     -    -8 |
 RBAY |     -   166     -     -     -     -     -     -  -143 |
 SANT |     -   246     -   308     -     -     -     -  -402 |
 SCH2 |     -     -    26     -     -     -     -     -   -22 |
 SELE |     -     -     -   193     -   157     -     -  -396 |
 SFER |     -     -  -216     -     -     -     -     -   179 |
 STJO |     -     -    56     -     -   -41     -     -    26 |
 SUTH |     -   -97     -     -     -     -     -     -    84 |
 THTI |     -     -     -  -100     -   -76     -     -   194 |
 TRO1 |     -  -152     -     -     -     -     -     -   131 |
 TROM |     -     -     -   325     -  -266     -     -   244 |
 TSKB |     -     -    32  -137     -     -     -     -    59 |
 URUM |     -     9     -     -     -     -     -     -    -8 |
 USNO |     -   -73    66     -     -     -     -     -     9 |
 USUD |     -     -  -131    81     -     -     -     -    55 |
 VILL |     -    52     -   -28     -     -     -     -   -27 |
 WILL |     -   -85    72     -     -     -     -     -    14 |
 WSRT |     -   -95   186     -     -     -     -     -   -71 |
 WTZR |     -  -100    39   203     -     -     -     -   -72 |
 WUHN |     -     -    33  -210     -     -     -     -   104 |
 YAKT |     -  -220    66     -     -     1     -     -   133 |
 YAR1 |     -   -94     -     -     -     -     -     -    81 |
 YELL |     -  -234     -   -48     -    51     -     -    95 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 | 10514   101    44   126  8936    62  9061     -    61 |  288   4.27
    2 |  1999    35    29    90  3375    43  1907     -    36 |  288   1.86
    3 |  8057    39    35    81  3457    20  7008     -    48 |  288   2.14
    4 |  1186   103    95   131  2125    80  1058     -    92 |  288   0.88
    5 |   799    33    40    52   645    32   898     -    35 |  288   0.43
    6 |  8843    53    80   169  3738    31 10080     -    96 |  288  10.03
    7 |  1468    62    41    45   808    36  1716     -    78 |  288   0.73
    8 |  4875    68    25    94  4740    30  4847     -    96 |  288   2.57
    9 |  3223    52    32   153  3463    49  3280     -    46 |  288   1.69
   10 |  5058    63    32    57  4384    41  5021     -    80 |  288   3.24
   11 |  1218    83    28    95   412    28  1185     -    85 |  288   0.30
   13 |   885   130    29   122  1391    27   908     -    52 |  288   0.29
   14 |   993    83    40    93   307    49   939     -    60 |  288   0.30
   15 |  4496    94    41     -  6201    66  4613     -   103 |  288   2.01
   16 |  1079    30    37    69   464    32  1173     -    58 |  288   0.21
   17 |  3154    71    33     X  4118    37  2989     -    62 |  288   2.24
   18 |   767    55    63   108   434    38   947     -    57 |  288   0.36
   20 |   784   107    59    96  1078    85   933     -   159 |  288   0.21
   21 |  1245    62    91    94  2944     X  1240     -    80 |  288   0.50
   23 |  9257    64    39    75  5239    29  9664     -    58 |  288   8.16
   24 |  2849    57    43     X  1746    40  2762     -    33 |  288   2.56
   25 |  2732    37    32    65  2018    47  1897     -    38 |  288   1.85
   26 |  1225   100    50   133  1229    35   957     -    66 |  282   0.73
   27 |  1184    79    38    82  5783    38  1376     -    93 |  288   0.93
   28 |   945    89    39    54  1824    56  1097     -    67 |  288   0.48
   29 |   824    79    45   144   959    42   893     -    83 |  288   0.44
   30 |   679    29    41   108   680    36   868     -     X |  288   0.58
   31 |  2781    36    35    78  2515    31  2938     -    73 |  288   1.89
 -----+-------------------------------------------------------+--------------
 ALBH |     -   108    50     -     -    29     -     -    38 |  288   0.07
 ALGO |     -     -    21    35     -    18     -     -    20 |  288   0.04
 AMC2 |     -   103    98     -     -     X     -     -    43 |  288   0.05
 ANKR |     -    45     -     -     -    22     -     -     - |  288  36.22
 AREQ |     -    58    19    53     -    32     -     -    24 |  288  18.29
 ARTU |     -    94     -     -     -    47     -     -     - |  287  10.81
 ASC1 |     -    57     -     -     -     -     -     -    49 |  259    >>>
 AUCK |     -    36     -     X     -     -     -     -    31 |  264  13.49
 BAHR |     -    74    92    40     -    34     -     -    36 |  288   0.53
 BILI |     -    29     -     -     -    15     -     -     - |  287  11.07
 BJFS |     -     -    77     -     -     -     -     -    64 |  142    >>>
 BOGT |     -    99     -     X     -    47     -     -    26 |  288  12.86
 BOR1 |     -     -    91     -     -     -     -     -    75 |  253   0.64
 BREW |     -     -    37     -     -     -     -     -    30 |  284   0.07
 BRUS |     -     -   174     -     -    65     -     -    38 |  288   0.08
 CAS1 |     -    60     -    92     -    60     -     -   133 |  288   8.74
 CEDU |     -    35     -    39     -     -     -     -    21 |  288  16.38
 CHAT |     -    58     -    79     -     -     -     -    19 |  287  13.49
 CHUR |     -   126   103     -     -     -     -     -    81 |  287   7.45
 COCO |     -    31     -    57     -    19     -     -    40 |  288  11.85
 CRO1 |     -    55    18     -     -    22     -     -    17 |  288  18.35
 DAV1 |     -    82     -     -     -     -     -     -    71 |  286  15.38
 DRAO |     -    33    23     -     -     -     -     -    17 |  288   0.11
 DWH1 |     -     -    69     -     -     -     -     -    57 |  216   0.60
 EISL |     -    71     -    64     -    22     -     -    30 |  276  22.09
 FAIR |     -     -    24    43     -     -     -     -    30 |  288   0.09
 FORT |     -     -     -    61     -    17     -     -    36 |  288   0.21
 GODE |     -     -   104    91     -     -     -     -    48 |  288   0.14
 GOLD |     -    70     -    63     -    31     -     -    16 |  288  15.20
 GRAZ |     -     -    94     -     -     -     -     -    78 |  284  80.59
 GUAM |     -    38     -    97     -    30     -     -    78 |  288  17.21
 GUAT |     -    52     -     -     -    33     -     -    36 |  288    >>>
 HERS |     -     -    97     -     -     -     -     -    80 |  239   9.87
 HOB2 |     -    45    78    55     -     -     -     -    42 |  288   0.10
 HRAO |     -     -     -     -     -     8     -     -    13 |  155   9.60
 IISC |     -    51     -    38     -     -     -     -    48 |  288  18.30
 JAB1 |     -    32     -     -     -    16     -     -     - |  228  10.92
 JPLM |     -     -    50     -     -     -     -     -    41 |  284  16.95
 KERG |     -     -    18     -     -     -     -     -    15 |  287   2.68
 KIRU |     -    63    68     -     -     -     -     -    43 |  288   9.56
 KIT3 |     -     -     -    50     -     -     -     -    31 |  274  32.14
 KOUR |     -    27     -    53     -    14     -     -    31 |  288   2.05
 KUNM |     -    30     -     -     -    14     -     -    21 |  288  31.40
 LPGS |     -     -     -   165     -    61     -     -    63 |  276  16.83
 MAC1 |     -    59     -    82     -    28     -     -    36 |  288  13.26
 MALI |     -    31     -    43     -     -     -     -     - |  284   1.80
 MAS1 |     -     -    15    66     -    16     -     -    21 |  288   2.27
 MDO1 |     -    88   108   127     -     -     -     -    84 |  275 660.87
 MEDI |     -     -    81     -     -     -     -     -    67 |  286    >>>
 MIZU |     -     -    98     -     -    28     -     -    95 |  264   0.43
 MKEA |     -     -     -    85     -    35     -     -    34 |  288  27.13
 NKLG |     -    66     -     -     -    18     -     -    52 |  287 141.82
 NOT1 |     -    40    58     -     -     -     -     -    31 |  288    >>>
 NPLD |     -    59   114     -     -     -     -     -    54 |  287   0.09
 NRC1 |     -     -    20    44     -    21     -     -    36 |  288   0.03
 NRIL |     -    23     -     -     -    11     -     -     - |  287  11.14
 NTUS |     -    27     -     -     -     -     -     -    24 |  288   9.19
 NYA1 |     -    48     -     -     -     -     -     -    41 |  286   0.07
 NYAL |     -     -    17    34     -     -     -     -    30 |  288   0.07
 OHI2 |     -    74     -     -     -    37     -     -     - |  288  30.78
 ONSA |     -    27    19    41     -     -     -     -    23 |  288   0.07
 PENC |     -    42     -     -     -     -     -     -    36 |  286    >>>
 PETP |     -    75     -     -     -    37     -     -     - |  287  13.18
 PIE1 |     -     -    67    83     -     -     -     -    36 |  288   0.08
 POL2 |     -    19     -     -     -     -     -     -    17 |  288  10.62
 POTS |     -    65     -    55     -     -     -     -    43 |  288  18.54
 RBAY |     -    77     -     -     -     -     -     -    67 |  252  37.34
 SANT |     -    55     -    36     -     -     -     -    50 |  187   5.48
 SCH2 |     -     -    26     -     -     -     -     -    21 |  286   8.65
 SELE |     -     -     -    49     -    17     -     -    20 |  288  40.12
 SFER |     -     -    76     -     -     -     -     -    63 |  284 142.76
 STJO |     -     -    17     -     -    19     -     -    25 |  288   0.21
 SUTH |     -    56     -     -     -     -     -     -    48 |  286  11.35
 THTI |     -     -     -    70     -    28     -     -    36 |  287   2.25
 TRO1 |     -    37     -     -     -     -     -     -    32 |  284  11.89
 TROM |     -     -     -    61     -    19     -     -    49 |  287  20.11
 TSKB |     -     -    25    49     -     -     -     -    38 |  288   1.16
 URUM |     -    18     -     -     -     -     -     -    15 |  288  14.72
 USNO |     -    17    15     -     -     -     -     -    16 |  288   0.04
 USUD |     -     -    98    66     -     -     -     -    68 |  288  14.41
 VILL |     -    46     -    69     -     -     -     -    37 |  288  11.20
 WILL |     -   180    91     -     -     -     -     -    90 |  288  40.28
 WSRT |     -    47    86     -     -     -     -     -    39 |  288   0.06
 WTZR |     -    57   125    89     -     -     -     -    38 |  288   0.09
 WUHN |     -     -   129    92     -     -     -     -    68 |  287  15.16
 YAKT |     -    64   105     -     -    53     -     -    22 |  288   0.42
 YAR1 |     -    35     -     -     -     -     -     -    30 |  286  70.21
 YELL |     -    27     -    51     -    33     -     -    36 |  288   0.06
 -----+-------------------------------------------------------+--------------
 TOT  |  4089    66    66    83  3389    34  4023     -    56 |


 BEST CLOCK FIT: NRC1   288   0.03 (ns) 

