
 GPS week: 1239   Day: 0   MJD: 52917                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2677     34    -0.41     0.78     5.27     0.00
 cod |   288     0  24657    344     0.30    -0.21     0.05    24.35
 emr |   288     0  17846     29   313.45     7.47     0.07    16.29
 gfz |   288     0  19072    266    -0.11     0.62     0.05    24.10
 igu |    96     0   2677      0     1.18    -1.46     6.08     0.00
 jpl |   288     0   4014     18    -0.11     2.05     0.08    14.83
 ngs |    96     0   2677     26    -0.08     0.35     5.20     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  29541    891  -316.86    13.25     0.06    20.43

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  1668    59     6    32 10314    13  1341     -  -122 |
    2 |  6443    15    32   -79  7221   117  6339     -    38 |
    3 |  4485     1    46    20 12326    13  4550     -   -63 |
    4 |  -206    95   -55    36 -2310   -85  -589     -   -54 |
    5 | -9471    23   -95     X  7587   136 -7625     -    21 |
    6 | -8293   -33  -129   232 -1132  -129 -8139     -   -44 |
    7 |  -470     1  -146   194  -861   -79  -711     -   -60 |
    8 |-11700   108   -52    19-24702   -18-10771     -   -98 |
    9 |  1149  -142    25   131  9253  -122  1621     -     X |
   10 | -3167     4   -70   187 -5956  -182 -2967     -  -164 |
   11 |   588   -52   -23   102  -754   -96   889     -   -36 |
   13 |  4191    38   -24   152 -2429   -58  4149     -  -166 |
   14 |  2483    24   -69     5   -56    -8  2575     -    26 |
   15 | -1680   -20   -46    31 12358    42 -1426     -    21 |
   16 |  5282   -74     0   128 -1176     5  5155     -   -60 |
   17 | -4306    38   -14     1 -3460    79 -4443     -   -39 |
   18 |  3976    -2  -159  -119  -735    62  4080     -   222 |
   20 |  3524    80   -95  -188   651   196  3523     -    61 |
   21 | 11894    96    46  -394  5243   229 11670     -   303 |
   23 | -3809   -40    86   -88 -9041    96 -4127     -    11 |
   24 | -2126    31   -12     9  1296   -42 -2290     -   -36 |
   25 | -4180    13    59   -48  5684    37 -3718     -   -32 |
   26 |  -304   -48    22    68 -3301   -59  -658     -     X |
   27 |  1137    -2  -118   190 -5198    26   733     -  -144 |
   28 |  2540    83   -67    26 -2645     X  2441     -   -75 |
   29 | -3226   -37   -63   194 -2002   -98 -3402     -  -130 |
   30 | -3176    47    72   -28 -3178    41 -3135     -   -82 |
   31 |  3106   -51    29    89 -3677  -156  2517     -   -61 |
 -----+-------------------------------------------------------+
 ALBH |     -    -4   -76     -     -     -     -     -    66 |
 ALGO |     -   -36    59     -     -     -     -     -    -4 |
 AMC2 |     -  -132     -     -     -     -     -     -   157 |
 AREQ |     -   -59     -   -65     -     -     -     -   127 |
 ARTU |     -     3     -    -3     -     -     -     -     - |
 AUCK |     -  -121     -   207     -     -     -     -  -100 |
 BAHR |     -    39     -    -1     -     -     -     -   -44 |
 BILI |     -    50     -   -51     -     -     -     -     - |
 BJFS |     -     -  -263     -     -     -     -     -   210 |
 BOGT |     -    86     -     -     -     -     -     -  -102 |
 BOR1 |     -     -   222     -     -     -     -     -  -177 |
 BREW |     -     -   -38     -     -     -     -     -    30 |
 BRMU |     -     -     -    47     -     -     -     -   -56 |
 BRUS |     -     -    34     -     -     -     -     -   -27 |
 CAS1 |     -   -20     -    -9     -     -     -     -    34 |
 CEDU |     -  -233     -     -     -     -     -     -   278 |
 CHAT |     -   -56     -     -     -     -     -     -    67 |
 CHUR |     -   106    44     -     -     -     -     -  -163 |
 COCO |     -    76     -    90     -     -     -     -  -193 |
 CRO1 |     -     -   155  -125     -     -     -     -    23 |
 DAV1 |     -    21     -    19     -     -     -     -   -47 |
 DRAO |     -   -56   -54     -     -     -     -     -   110 |
 DWH1 |     -     -   123     -     -     -     -     -   -98 |
 FAIR |     -   -12   -38     6     -     -     -     -    38 |
 FORT |     -   355  -236  -180     -     -     -     -    30 |
 GODE |     -  -106   114     -     -     -     -     -    36 |
 GOLD |     -   -15     -    15     -     -     -     -     X |
 GUAM |     -     -     -  -259     -     -     -     -   306 |
 GUAT |     -    68     -   -42     -     -     -     -   -30 |
 HERS |     -     -  -271     -     -     -     -     -   216 |
 HOB2 |     -   -51   106     -     -     -     -     -   -24 |
 HRAO |     -    24     -    -7     -     -     -     -   -20 |
 IISC |     -  -126     -   106     -     -     -     -     8 |
 JPLM |     -     -   -24     -     -     -     -     -    19 |
 KERG |     -    89    91     4     -     -     -     -  -183 |
 KIRU |     -   -11     -     -     -     -     -     -    13 |
 KOKB |     -   -81    70    -3     -     -     -     -    43 |
 KOUR |     -     -     -   -63     -     -     -     -    75 |
 LPGS |     -    33     -     -     -     -     -     -   -39 |
 MAC1 |     -   -17     -  -103     -     -     -     -   143 |
 MAS1 |     -     -     -     3     -     -     -     -    -4 |
 MAW1 |     -    73     -   -58     -     -     -     -   -19 |
 MCM4 |     -   494     -  -236     -     -     -     -  -305 |
 MEDI |     -     -    35     -     -     -     -     -   -28 |
 METS |     -    23   157     -     -     -     -     -  -154 |
 MKEA |     -   -12     -   -73     -     -     -     -   101 |
 NKLG |     -     -     -   -15     -     -     -     -    18 |
 NLIB |     -     -  -327     -     -     -     -     -   261 |
 NNOR |     -     -    95     -     -     -     -     -   -76 |
 NOT1 |     -     -    98     -     -     -     -     -   -78 |
 NRIL |     -    30     -   -30     -     -     -     -     - |
 NTUS |     -   -82     -     -     -     -     -     -    98 |
 NYA1 |     -     X     -   128     -     -     -     -  -151 |
 NYAL |     -     -   -13     -     -     -     -     -    11 |
 ONSA |     -     5     -    -5     -     -     -     -     - |
 PERT |     -    77     -   -12     -     -     -     -   -77 |
 PIE1 |     -   -21     -     -     -     -     -     -    25 |
 POTS |     -    10     -    -4     -     -     -     -    -7 |
 REYK |     -   -39     -     -     -     -     -     -    47 |
 RIOG |     -    35     -  -118     -     -     -     -    97 |
 SANT |     -  -170     -   -71     -     -     -     -   244 |
 SCH2 |     -   -42    26     -     -     -     -     -    30 |
 SFER |     -   -57   133     -     -     -     -     -   -42 |
 STJO |     -     7   -92     -     -     -     -     -    67 |
 SUTH |     -  -108     -     -     -     -     -     -   129 |
 THTI |     -     -     -   -36     -     -     -     -    42 |
 THU3 |     -    51     -   -52     -     -     -     -     - |
 TIXI |     -    46     -   -46     -     -     -     -     - |
 TSKB |     -     -    48     -     -     -     -     -   -38 |
 TWTF |     -     -   -53     -     -     -     -     -    42 |
 USNO |     -     -     2     -     -     -     -     -    -1 |
 USUD |     -     -   -49     -     -     -     -     -    39 |
 VILL |     -    -3     -     -     -     -     -     -     4 |
 WES2 |     -     -   291     -     -     -     -     -  -232 |
 WHIT |     -   -27     -     -     -     -     -     -    32 |
 WILL |     -   -98    35     -     -     -     -     -    90 |
 WSRT |     -   -39   155     -     -     -     -     -   -77 |
 WTZR |     -    -1    85     -     -     -     -     -   -66 |
 WUHN |     -    39     -   141     -     -     -     -  -212 |
 YAKT |     -  -130     -     -     -     -     -     -   155 |
 YAR1 |     -   -74     -     -     -     -     -     -    88 |
 YELL |     -   -50     -     4     -     -     -     -    55 |
 YSSK |     -    -1     -     1     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  4818    59    61    26  5776    66  4617     -    89 |  288   4.32
    2 |  5076    49    65    50  6682    50  5016     -    44 |  288   3.35
    3 |  5880    54    99    37  6982    32  5615     -    62 |  288   2.63
    4 |  1787    46    67    30  1527    76  1580     -    42 |  288   1.09
    5 | 18997   104    65     X 20846   169 18911     -   119 |  288  14.26
    6 | 10936    31    94    18  3262    53 10735     -    65 |  288  11.05
    7 |  1417    42    87    49   613    74  1343     -    35 |  288   0.96
    8 |  8514    81    83    28 14483    72  7074     -    42 |  288   1.79
    9 |  6619    50    94    29  7098    65  6324     -     X |  288   1.68
   10 |  6751    92    62    40  4793    60  6083     -    98 |  276   3.27
   11 |   977    31    41    47   714    83  1108     -    60 |  288   0.41
   13 |  1209    47   100    48   807   111  1169     -    80 |  288   0.23
   14 |  1214    44    82    36  1023    68  1196     -    42 |  288   0.28
   15 |  5054    80   169    69  7971    67  5057     -    70 |  288   2.06
   16 |  1060    86    94    35   731    30  1053     -    73 |  288   0.40
   17 |  1218    99    74   136  1215   274  1186     -    75 |  288   1.32
   18 |   684    72    78    35   793    82   571     -    50 |  288   0.39
   20 |   805    65   123    43  1253    80   779     -    51 |  288   0.26
   21 |  7170    32    70    50  7199    81  7274     -    49 |  288   1.87
   23 |  6912   100   153   183  4151   144  7020     -   121 |  277   6.85
   24 |  2413    79    60    35  2683    57  2530     -    80 |  288   1.68
   25 |  4042    39    58    18  3686    43  3842     -    46 |  288   1.39
   26 |  1296    48    89    33  1471    40  1024     -     X |  288   0.97
   27 |  1527    33   110    25  2562    50  1589     -    80 |  288   1.00
   28 |  1248    76    84    75   841     X  1221     -    67 |  288   0.40
   29 |  1553    50    94    45  1489    29  1642     -    56 |  288   0.66
   30 |  1198   142    67    93  1315    60  1084     -    82 |  278   0.33
   31 |  3243    33   135    35  3407    37  3010     -   113 |  288   2.33
 -----+-------------------------------------------------------+--------------
 ALBH |     -    13    43     -     -     -     -     -    33 |  288   1.43
 ALGO |     -    31    21     -     -     -     -     -    41 |  288   0.03
 AMC2 |     -    16     -     -     -     -     -     -    19 |  286   0.02
 AREQ |     -    27     -    15     -     -     -     -    20 |  288  18.13
 ARTU |     -    22     -    23     -     -     -     -     - |  286  13.19
 AUCK |     -    34     -    21     -     -     -     -    44 |  264  13.02
 BAHR |     -    41     -    32     -     -     -     -    28 |  288   0.41
 BILI |     -    21     -    21     -     -     -     -     - |  287  12.36
 BJFS |     -     -    91     -     -     -     -     -    73 |  188    >>>
 BOGT |     -   141     -     -     -     -     -     -   168 |  254  29.61
 BOR1 |     -     -    34     -     -     -     -     -    27 |  286   0.43
 BREW |     -     -    34     -     -     -     -     -    27 |  286   0.12
 BRMU |     -     -     -    77     -     -     -     -    91 |  262    >>>
 BRUS |     -     -    19     -     -     -     -     -    15 |  286   0.03
 CAS1 |     -    33     -    39     -     -     -     -    40 |  288   8.39
 CEDU |     -    17     -     -     -     -     -     -    21 |  284  16.34
 CHAT |     -    35     -     -     -     -     -     -    42 |  285  10.84
 CHUR |     -    16    35     -     -     -     -     -    20 |  288  17.82
 COCO |     -    28     -    27     -     -     -     -    24 |  288  11.28
 CRO1 |     -     -    47    50     -     -     -     -    24 |  288  23.25
 DAV1 |     -    38     -    19     -     -     -     -    33 |  288  16.51
 DRAO |     -    38    18     -     -     -     -     -    42 |  288   0.08
 DWH1 |     -     -    31     -     -     -     -     -    25 |  286   0.47
 FAIR |     -    39    27    29     -     -     -     -    57 |  288   0.06
 FORT |     -   171    42    85     -     -     -     -    77 |  288   0.10
 GODE |     -    31    23     -     -     -     -     -    28 |  288   0.21
 GOLD |     -    35     -    35     -     -     -     -     X |  288  14.61
 GUAM |     -     -     -    50     -     -     -     -    59 |  288  21.82
 GUAT |     -    23     -    25     -     -     -     -    31 |  288    >>>
 HERS |     -     -    81     -     -     -     -     -    65 |  239   8.58
 HOB2 |     -    23    27     -     -     -     -     -    21 |  288   0.04
 HRAO |     -    34     -    23     -     -     -     -    56 |  288   1.80
 IISC |     -    34     -    26     -     -     -     -    36 |  288  28.86
 JPLM |     -     -   231     -     -     -     -     -   184 |  282    >>>
 KERG |     -    39    57    17     -     -     -     -    15 |  287   1.53
 KIRU |     -    19     -     -     -     -     -     -    22 |  286  16.19
 KOKB |     -    43    57    41     -     -     -     -    52 |  288   0.04
 KOUR |     -     -     -    23     -     -     -     -    27 |  288   2.33
 LPGS |     -    52     -     -     -     -     -     -    62 |  238  22.18
 MAC1 |     -    31     -    27     -     -     -     -    52 |  288  13.21
 MAS1 |     -     -     -    27     -     -     -     -    32 |  288   2.95
 MAW1 |     -    30     -    21     -     -     -     -    32 |  288  34.80
 MCM4 |     -    76     -    70     -     -     -     -   169 |  288  16.61
 MEDI |     -     -    52     -     -     -     -     -    41 |  286   0.36
 METS |     -    20    36     -     -     -     -     -    18 |  287  14.84
 MKEA |     -    27     -    65     -     -     -     -    88 |  288  32.89
 NKLG |     -     -     -    41     -     -     -     -    49 |  287 615.54
 NLIB |     -     -    23     -     -     -     -     -    19 |  286   0.04
 NNOR |     -     -    31     -     -     -     -     -    25 |  288   0.55
 NOT1 |     -     -   109     -     -     -     -     -    87 |  279    >>>
 NRIL |     -    20     -    20     -     -     -     -     - |  288  10.48
 NTUS |     -    18     -     -     -     -     -     -    22 |  283  10.18
 NYA1 |     -     X     -   117     -     -     -     -   138 |  284   0.13
 NYAL |     -     -    27     -     -     -     -     -    21 |  288   0.08
 ONSA |     -    21     -    22     -     -     -     -     - |  288   0.03
 PERT |     -    25     -    19     -     -     -     -    24 |  288  10.93
 PIE1 |     -    52     -     -     -     -     -     -    62 |  288   0.04
 POTS |     -    26     -    18     -     -     -     -    17 |  288  22.97
 REYK |     -    16     -     -     -     -     -     -    19 |  286  13.20
 RIOG |     -    66     -   134     -     -     -     -    89 |  287  13.55
 SANT |     -    42     -   100     -     -     -     -   129 |  288   7.31
 SCH2 |     -    16    19     -     -     -     -     -    19 |  288  55.58
 SFER |     -    43    67     -     -     -     -     -   106 |  287   0.41
 STJO |     -    20    28     -     -     -     -     -    33 |  288   0.05
 SUTH |     -    59     -     -     -     -     -     -    71 |  285  21.92
 THTI |     -     -     -    25     -     -     -     -    29 |  287   4.70
 THU3 |     -    16     -    16     -     -     -     -     - |  288   8.15
 TIXI |     -    18     -    18     -     -     -     -     - |  287   8.72
 TSKB |     -     -    23     -     -     -     -     -    18 |  288   1.10
 TWTF |     -     -    27     -     -     -     -     -    22 |  286   0.43
 USNO |     -     -    25     -     -     -     -     -    20 |  288   0.04
 USUD |     -     -    48     -     -     -     -     -    38 |  288  16.13
 VILL |     -    19     -     -     -     -     -     -    23 |  288   5.17
 WES2 |     -     -    15     -     -     -     -     -    12 |  288   0.05
 WHIT |     -    23     -     -     -     -     -     -    27 |  286   1.89
 WILL |     -    26    53     -     -     -     -     -    26 |  288  40.20
 WSRT |     -    18    24     -     -     -     -     -    13 |  288   0.02
 WTZR |     -    25    25     -     -     -     -     -    21 |  288   0.02
 WUHN |     -    31     -    20     -     -     -     -    41 |  287  20.21
 YAKT |     -    74     -     -     -     -     -     -    89 |  287    >>>
 YAR1 |     -    19     -     -     -     -     -     -    23 |  286  14.21
 YELL |     -    25     -    31     -     -     -     -    36 |  288   0.07
 YSSK |     -    28     -    28     -     -     -     -     - |  286  13.40
 -----+-------------------------------------------------------+--------------
 TOT  |  5271    53    75    53  6078    78  5203     -    62 |


 BEST CLOCK FIT: AMC2   286   0.02 (ns) 

