
 GPS week: 1241   Day: 1   MJD: 52932                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2680      4     0.03    -0.25     3.67     0.00
 cod |   288     0  25586    869     0.45    -1.59     0.04    21.66
 emr |   288     0  16861     24   418.93     9.50     0.04    18.74
 gfz |   288     0  18207      7     0.29    -0.65     0.03    26.46
 igu |    96     0   2584     16    -0.09     0.08     4.25     0.00
 jpl |   288     0  11965    441    -2.95     1.32     0.05    14.88
 usn |   288     0  27355    478  -108.98    14.88     0.05    18.26

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   usn |
 -----+-------------------------------------------+
    1 | 10748    50   103   -64 30232   -48   -71 |
    2 | -5683   109    74  -166 -4863   190    30 |
    3 | -4220    70   -89   -80  -651   258   -76 |
    4 |  2629    10   -83    12  -185    41    24 |
    5 |    32  -141  -135   270  7367   -33   -85 |
    6 | -1358   -40  -149   140  3455     X    -3 |
    7 |  1042     5     8   118 -1872   -66  -133 |
    8 |-12993     X   185  -140-38015   -56    15 |
    9 | -5247  -143   -28   220  7382   -82   -68 |
   10 | -4758   -14  -119   203  2313  -253    44 |
   11 |  1950   163   -24   -89  1685    80   -42 |
   13 |  6208    65     2    54  1545    27  -158 |
   14 |  7172   115    22   -91  2475   -21   -34 |
   15 |  2398    53   -19  -192   947   110   151 |
   16 |  4982   -72   -15   -68   704   288   -24 |
   17 | -4583   -62   -64   144 -1857   -91    -4 |
   18 |  4385    44  -118   -22   781   233    93 |
   20 |  5402   170   -70  -172  2648   184   -27 |
   21 |  9533   -23  -114   -34  3215    -3   196 |
   23 | -7740   119   107  -195 -9637   429    34 |
   24 | -6844   -21   -14   128  1380     X  -147 |
   25 | -6592   -13    32     6 -4816    73   -84 |
   26 |  -155   -50   -75   187 -1628   -66   -85 |
   27 |  3852   -47   -35   159 -3225   -36  -137 |
   28 |  3005   -59    94   198  3744  -142  -203 |
   29 |  2755   -38    -3    52     -   -41     5 |
   30 | -3717  -114  -204   361 -3453  -117  -174 |
   31 | -3076    43    -2   -24 -3524   111   -18 |
 -----+-------------------------------------------+
 ALBH |     -    83   -26     -     -   -71   -14 |
 ALGO |     -   -25   -40     -     -    80     6 |
 AMC2 |     -  -103    97     -     -  -123   123 |
 AREQ |     -   -13    27   -62     -    16    64 |
 ARTU |     -   -53     -    13     -    54     - |
 ASC1 |     -    42     -   -60     -     -    37 |
 BILI |     -    95     -   -78     -     -     - |
 BOGT |     -    70     -     -     -     -   -83 |
 BOR1 |     -  -117   135     -     -     -     X |
 BREW |     -     -    71     -     -  -153    51 |
 BRUS |     -     -    -6     -     -    12    -3 |
 CAS1 |     -   -17     -   -86     -   100    63 |
 CEDU |     -     4     -     -     -     -    -5 |
 CHAT |     -   -23     -     -     -     -    27 |
 CHUR |     -    93    74     -     -   -50  -172 |
 COCO |     -   129     -    -7     -     -  -143 |
 CORD |     -   -10     -     -     -    14     - |
 CRO1 |     -     -   -27   -18     -   -37   155 |
 DAV1 |     -    47     -   -84     -     -    67 |
 DRAO |     -   -55   -43     -     -     -   109 |
 DWH1 |     -   195    84     -     -  -213  -143 |
 FAIR |     -     -   -30    14     -   -13   101 |
 FORT |     -     -   -70     -     -     -    72 |
 GODE |     -   -77    56     -     -     -    34 |
 GRAZ |     -   -22    38     -     -     -   -14 |
 GUAM |     -   -65     -   -56     -     X   157 |
 GUAT |     -   104     -   -60     -     -   -37 |
 HERS |     -  -255  -137     -     -     -   431 |
 HOB2 |     -   -78   148     -     -     -   -59 |
 IISC |     -    70     -   -59     -     -     2 |
 JPLM |     -     -    -3     -     -    73   -57 |
 KERG |     -    93    22     1     -     -  -134 |
 KIRU |     -     6     -     -     -     -    -7 |
 KIT3 |     -     -     -  -214     -     -   310 |
 KOKB |     -    26    93    74     -  -236   -41 |
 KOSG |     -   -54     -     -     -     -    64 |
 MAC1 |     -   -35     -   -53     -     -   118 |
 MADR |     -     -     -     -     -   102   -83 |
 MAS1 |     -   -11    39   -17     -     -    -1 |
 MAW1 |     -   109     -  -161     -   203   -46 |
 MCM4 |     -   187     -   142     -     -  -491 |
 MDO1 |     -     -   -72   -23     -    84   278 |
 METS |     -  -118    13     -     -     -   126 |
 MKEA |     -   159     -   -52     -   -86   -44 |
 NKLG |     -   -39     -   -11     -     -    60 |
 NLIB |     -     -   -12     -     -     7     7 |
 NOT1 |     -     -    54     -     -     -   -56 |
 NRIL |     -   -28     -   -24     -    79     - |
 NYA1 |     -     X     -   196     -     -  -284 |
 NYAL |     -     -    -7     -     -     -     8 |
 ONSA |     -   -34    30     7     -     -     - |
 PERT |     -     -   123   -87     -     -     - |
 PIE1 |     -    46    43     -     -     -  -100 |
 POL2 |     -   -58     -     -     -     -    68 |
 POTS |     -    24     -   -19     -     -    -1 |
 PTBB |     -    38     -     -     -     -   -45 |
 QAQ1 |     -  -159     -     -     -     -   189 |
 REYK |     -   -79     -     -     -     -    94 |
 SFER |     -   -24     -     -     -     -    28 |
 STJO |     -   -19    22     -     -    40   -33 |
 SUTH |     -    78     -  -100     -   -41    85 |
 THTI |     -     -     -    62     -     -   -89 |
 THU3 |     -  -134     -    26     -     -   121 |
 TIXI |     -   -15     -    13     -     -     - |
 UNSA |     -     -     -    25     -     -   -37 |
 URUM |     -   -68     -     -     -     -    81 |
 USNO |     -   -15    30     -     -     -   -13 |
 USUD |     -     -     -     -     -    30   -24 |
 VILL |     -     1     -     -     -     -    -1 |
 WES2 |     -     -     -   -93     -     -   135 |
 WHIT |     -   -29     -     -     -     -    35 |
 WILL |     -   -15     -     -     -     -    18 |
 WSRT |     -    15     -     -     -     -   -18 |
 WTZR |     -    24     -     -     -     -   -29 |
 WUHN |     -   -77     -    15     -     -    69 |
 YAR1 |     -   -48     -     -     -     -    57 |
 YELL |     -     X     -   -59     -    54    42 |
 YSSK |     -   -17     -     -     -    25     - |
 ZAMB |     -    82     -     3     -  -123     - |
 -----+-------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   usn | NEPO RMS (ns)
 -----+-------------------------------------------+--------------
    1 |  4895    35    36    34 14029    29    37 |  288   3.61
    2 |  2876    54    46    64  1914    72    34 |  288   2.94
    3 |  3816    49    40    23  2505    54    72 |  288   1.26
    4 |  1619    43    50    19   578    48    55 |  288   0.79
    5 |  1968    47    44    36  4061    51    76 |  288   1.55
    6 |  9474    40    37    21  4168     X    64 |  288   9.54
    7 |  1636    48    46    37  2218    30    56 |  288   1.05
    8 |  5748     X    32    45 12780    47    57 |  288   2.55
    9 |  4185    34    25    31  2230    73    78 |  288   1.61
   10 |  3960    74    38    28  2053    96    41 |  278   2.60
   11 |  1762    38    40    51  1184    60    60 |  288   0.41
   13 |   869    43    39    34   757    57    55 |  288   0.22
   14 |   921    27    66    39   877   129   136 |  288   0.35
   15 |  4407    47    77    22  3733    48    70 |  288   3.58
   16 |  1220    45    58    34   461    48    61 |  288   0.42
   17 |  2309    47    39    32  1294    74    50 |  288   0.79
   18 |   776    74    43    37   472    89    35 |  288   0.39
   20 |   545    63    88    52  1419    99    59 |  288   0.21
   21 |  3026    34    51    32  2044    81    66 |  288   1.07
   23 |  8806   127   141    68  4690   209    94 |  276   8.53
   24 |  5113    71    45    29  3050     X    88 |  288   3.49
   25 |  2223    26    25    36  3244    36    50 |  288   1.70
   26 |  2326    34    27    20   611    73    41 |  288   0.42
   27 |  1731    43    19    28  2435    21    32 |  288   0.86
   28 |  2108    57    71    64  2140   120    48 |  288   0.26
   29 |  1724    36    23    15     -    67    79 |  288   0.64
   30 |  1478    50    61    35  2455    64    84 |  288   0.56
   31 |  2506    43    56    35  4013    18    61 |  288   0.80
 -----+-------------------------------------------+--------------
 ALBH |     -    25    19     -     -    20    45 |  288 728.59
 ALGO |     -    25    16     -     -    21    28 |  288   0.04
 AMC2 |     -    13    21     -     -    28    34 |  288   0.02
 AREQ |     -    36    33    26     -    20    29 |  288  21.63
 ARTU |     -    39     -    45     -    50     - |  281  11.03
 ASC1 |     -    29     -    21     -     -    30 |  285    >>>
 BILI |     -    17     -    14     -     -     - |  286   9.48
 BOGT |     -    26     -     -     -     -    30 |  287  30.65
 BOR1 |     -   126   146     -     -     -     X |  264   1.25
 BREW |     -     -    22     -     -    37    32 |  286    >>>
 BRUS |     -     -    14     -     -    26    12 |  288   0.02
 CAS1 |     -    21     -    12     -    21    18 |  288   9.58
 CEDU |     -    51     -     -     -     -    60 |  288  35.93
 CHAT |     -    33     -     -     -     -    39 |  287  11.11
 CHUR |     -    49    18     -     -    39    58 |  282   5.33
 COCO |     -    31     -    26     -     -    43 |  288  10.13
 CORD |     -    13     -     -     -    19     - |  285  14.57
 CRO1 |     -     -    11    22     -    46    29 |  288  25.43
 DAV1 |     -    36     -    26     -     -    67 |  288  18.26
 DRAO |     -    29    25     -     -     -    33 |  288   0.07
 DWH1 |     -    20    21     -     -    31    32 |  288   0.49
 FAIR |     -     -    49    30     -    65    32 |  282   0.16
 FORT |     -     -    25     -     -     -    26 |  288   0.10
 GODE |     -    35    47     -     -     -    19 |  288   0.31
 GRAZ |     -    33    27     -     -     -    20 |  287  67.30
 GUAM |     -    34     -    58     -     X    68 |  288  24.93
 GUAT |     -    23     -    29     -     -    41 |  288    >>>
 HERS |     -    19    11     -     -     -    18 |  264  18.66
 HOB2 |     -    33    34     -     -     -    36 |  288   0.05
 IISC |     -    35     -    29     -     -    37 |  288  29.00
 JPLM |     -     -    23     -     -    50    52 |  288  12.74
 KERG |     -    33    35    31     -     -    25 |  287   2.23
 KIRU |     -    25     -     -     -     -    30 |  287   6.71
 KIT3 |     -     -     -    14     -     -    20 |  288  15.40
 KOKB |     -    30    21    51     -    75    43 |  288   0.03
 KOSG |     -    12     -     -     -     -    14 |  288  19.26
 MAC1 |     -    30     -    34     -     -    52 |  288  17.87
 MADR |     -     -     -     -     -    70    57 |  250 591.60
 MAS1 |     -    19    20    16     -     -    33 |  288   1.56
 MAW1 |     -    31     -    36     -    55    61 |  287  26.31
 MCM4 |     -    24     -    22     -     -    46 |  211   6.42
 MDO1 |     -     -    28    28     -    41    72 |  288  32.91
 METS |     -    14    12     -     -     -    11 |  287   9.36
 MKEA |     -    38     -    41     -    50    54 |  288  30.06
 NKLG |     -    31     -    22     -     -    29 |  287 254.98
 NLIB |     -     -    23     -     -    25    22 |  288 199.58
 NOT1 |     -     -    10     -     -     -    11 |  288    >>>
 NRIL |     -    36     -    38     -    40     - |  236  10.25
 NYA1 |     -     X     -    17     -     -    25 |  288   0.05
 NYAL |     -     -    16     -     -     -    17 |  288   0.04
 ONSA |     -    24    13    14     -     -     - |  288   0.04
 PERT |     -     -    25    18     -     -     - |  285  10.05
 PIE1 |     -    32    32     -     -     -    34 |  288   0.07
 POL2 |     -    28     -     -     -     -    33 |  288  12.84
 POTS |     -    23     -    12     -     -    18 |  288  20.70
 PTBB |     -    24     -     -     -     -    29 |  288   0.28
 QAQ1 |     -    35     -     -     -     -    41 |  268   8.90
 REYK |     -    13     -     -     -     -    16 |  281  10.06
 SFER |     -    21     -     -     -     -    25 |  286   0.36
 STJO |     -    18    17     -     -    28    14 |  288   0.04
 SUTH |     -    31     -    19     -    23    39 |  288  15.89
 THTI |     -     -     -    35     -     -    51 |  287  15.05
 THU3 |     -    14     -    18     -     -    16 |  288   8.37
 TIXI |     -    17     -    14     -     -     - |  286   8.77
 UNSA |     -     -     -    34     -     -    50 |  288  18.64
 URUM |     -    21     -     -     -     -    25 |  278    >>>
 USNO |     -    24    15     -     -     -    24 |  288   0.02
 USUD |     -     -     -     -     -    34    27 |  288  17.44
 VILL |     -    17     -     -     -     -    21 |  288   6.20
 WES2 |     -     -     -    17     -     -    24 |  288   0.44
 WHIT |     -    25     -     -     -     -    29 |  285   3.26
 WILL |     -    21     -     -     -     -    25 |  288  37.26
 WSRT |     -    21     -     -     -     -    24 |  288   0.03
 WTZR |     -    19     -     -     -     -    23 |  288   0.04
 WUHN |     -    28     -    30     -     -    30 |  287  23.57
 YAR1 |     -    41     -     -     -     -    49 |  288   5.84
 YELL |     -     X     -    32     -    49    82 |  288   0.05
 YSSK |     -    16     -     -     -    23     - |  287  12.26
 ZAMB |     -    22     -    27     -    29     - |  288  19.40
 -----+-------------------------------------------+--------------
 TOT  |  3667    40    45    33  4250    53    47 |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

