
 GPS week: 1247   Day: 6   MJD: 52979                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2676      0     0.28    -0.37     3.97     0.00
 cod |   288     0  27320    937     0.37    -0.78     0.04    17.76
 emr |   288     0  21128      0   936.90    15.90     0.03    22.82
 gfz |   288     0  20196    499     0.34    -0.58     0.04    16.64
 iga |    96     0   2676      0     0.27    -0.36     0.11     0.00
 igu |    96     0   2580      0     0.27    -0.35     3.44     0.00
 jpl |   288     0  16116      0     2.66     0.89     0.03    28.11
 ngs |    96     0   2676      0     0.29    -0.38     3.92     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  32430   1068   287.70    14.86     0.05    14.67

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  4422   121  -115    38    99  2817   102  4383     -     X |
    2 | -3543  -140   -43   107   -80-17801    81 -2783     -   -32 |
    3 |  -848   -64   -33   122  -185  -582    12  -902     -   -11 |
    4 | -3132    94  -126    29     2 -1340    81 -2952     -   -95 |
    5 |   -71   -15    58  -112    67  7315    79  -748     -   -87 |
    6 |  5173  -126    37    39   -54  5749    54  5090     -   -47 |
    7 | -2043    -3   -96   146   131 -4059    22 -2350     -   -17 |
    8 | -5056   119   -39  -102   152 -1733   -14 -4773     -    63 |
    9 |  -652   -44    33    51   -47  9572   102 -1204     -   -69 |
   10 | -1754    99   -69    52   140  1344     2 -2044     -   -71 |
   11 |  9096    49  -110   129   -11  3878   -46  8698     -   -29 |
   13 |  3733   193  -268   146    68  2503   106  3623     -    12 |
   14 |  7148   -48    49  -190   -53  1476   149  6947     -   -79 |
   15 | -8887  -114    82   143   -41  1646   -38 -7161     -   -83 |
   16 |  5948   -94    82    31  -314   505   147  5725     -   -67 |
   17 |  2142     4    69   131   159  1054    24  1485     -  -265 |
   18 |  4619   -37   -58   142  -125  1414    41  4348     -   -31 |
   20 |  5402   241  -186   -73   113  2697    82  5422     -   -66 |
   21 |  2017   -23    65  -169   -37 -1551   131  2162     -  -117 |
   23 |-11999   -54   -34   134    16  5495    77-10502     -   -44 |
   24 | -6869    34    13   -94   123 -4034    87 -6311     -  -112 |
   25 | -6394  -122    72   117  -230 -9732    99 -6039     -  -108 |
   26 |  2365     X     6    26    11   116   136  1709     -   -47 |
   27 |   503   109  -139   100   120 -6348    36   180     -   -33 |
   28 |  7862    63   -44  -188   -15  3868   128  7420     -   -26 |
   29 | -2526     X   -44    22    38 -3620    87 -2612     -  -114 |
   30 | -2409   -87   -27   253   -76  -631    44 -2342     -  -218 |
   31 | -3994    42    36     2    29     -   -94 -4246     -    60 |
 -----+-------------------------------------------------------------+
 ALBH |     -   110   -92     -     -     -     0     -     -    11 |
 ALGO |     -   -12   -32   -73     -     -    97     -     -   -39 |
 AMC2 |     -    -7    41     -     -     -  -109     -     -   153 |
 AOML |     -   -76     -     -     -     -     -     -     -    92 |
 AREQ |     -   -33    19   -77     -     -    19     -     -    60 |
 ARTU |     -   -24     -   -64     -     -    53     -     -     - |
 ASC1 |     -   -46     -    40     -     -     -     -     -    10 |
 AUCK |     -   -10     -     X     -     -     3     -     -     5 |
 BAHR |     -     -   -42   151     -     -     8     -     -  -122 |
 BILI |     -    53     -   -56     -     -     -     -     -     - |
 BOR1 |     -     -   -28     -     -     -     -     -     -    44 |
 BREW |     -     -   -39     -     -     -     -     -     -    60 |
 BRMU |     -     -     -   -60     -     -     -     -     -    68 |
 BRUS |     -     -   -18     -     -     -    21     -     -   -11 |
 CAS1 |     -     8     -     9     -     -    11     -     -   -40 |
 CEDU |     -   -71     -     -     -     -     -     -     -    86 |
 CHAT |     -   -54     -     -     -     -     -     -     -    66 |
 CHUR |     -   188    13     -     -     -     -     -     -  -217 |
 COCO |     -   -39     -   141     -     -   -18     -     -   -80 |
 CORD |     -   -43     -    46     -     -     -     -     -     - |
 CRO1 |     -   -34    57   -80     -     -     9     -     -    26 |
 DAKA |     -    77     -   -82     -     -     -     -     -     - |
 DARW |     -    24     -     -     -     -   -15     -     -     - |
 DAV1 |     -    83     -    -2     -     -     -     -     -   -98 |
 DRAO |     -    44   -27     -     -     -     -     -     -   -12 |
 DWH1 |     -     -   -22     -     -     -  -145     -     -   314 |
 FAIR |     -     -    34   -22     -     -   -35     -     -    44 |
 FORT |     -     -   -89   213     -     -   -44     -     -   -16 |
 GLPS |     -    19     -   -20     -     -     -     -     -     - |
 GODE |     -   -50   105     -     -     -     -     -     -  -104 |
 GOLD |     -   177     -     -     -     -  -112     -     -     X |
 GUAM |     -   231     -   -84     -     -  -154     -     -   112 |
 HERS |     -  -270   -81     -     -     -     -     -     -   442 |
 HOB2 |     -   107   161     -     -     -  -141     -     -  -110 |
 HRAO |     -     -     -  -158     -     -     5     -     -   169 |
 IISC |     -    64     -   -53     -     -     -     -     -   -13 |
 JPLM |     -     -   -90     -     -     -     -     -     -   140 |
 KERG |     -   151   173   184     -     -  -341     -     -   -10 |
 KGN0 |     -     -    -4     -     -     -     -     -     -     6 |
 KIRU |     -   -20     -     -     -     -     -     -     -    24 |
 KIT3 |     -     -     -    42     -     -     -     -     -   -47 |
 KOKB |     -    16   165    20     -     -  -155     -     -    -2 |
 KOSG |     -   -50     -     -     -     -     -     -     -    61 |
 KOUR |     -   -25     -     1     -     -     -     -     -    27 |
 KSTU |     -     -     -     -     -     -    31     -     -   -60 |
 KUNM |     -     -     -     -     -     -    18     -     -   -34 |
 LAE1 |     -   -44     -     -     -     -     -     -     -    53 |
 LPGS |     -     -     -     -     -     -    12     -     -   -23 |
 MAC1 |     -   -26     -   -71     -     -     4     -     -   105 |
 MAS1 |     -     -     -   -77     -     -    44     -     -     2 |
 MAW1 |     -   108     -  -146     -     -     -     -     -    35 |
 MDO1 |     -   -22   -20   -27     -     -     -     -     -    88 |
 MEDI |     -    -3   -12     -     -     -     -     -     -    23 |
 METS |     -    -3   -28     -     -     -     -     -     -    46 |
 MKEA |     -   -37     -    23     -     -     -     -     -    18 |
 NKLG |     -     -     -   -72     -     -    69     -     -   -50 |
 NLIB |     -     -   -99     -     -     -    95     -     -   -28 |
 NNOR |     -     -    87     -     -     -     -     -     -  -136 |
 NOT1 |     -     -   -14     -     -     -     -     -     -    21 |
 NRIL |     -   198     -  -212     -     -     -     -     -     - |
 NSSP |     -   -75     -     -     -     -     -     -     -    91 |
 NTUS |     -  -110     -     -     -     -     3     -     -   127 |
 NYA1 |     -    12     -     X     -     -    -8     -     -     X |
 NYAL |     -     -    50     -     -     -     -     -     -   -79 |
 OHI2 |     -   -28     -   -52     -     -    49     -     -     - |
 ONSA |     -   -12    71   -83     -     -     -     -     -     - |
 PERT |     -     -    86   -75     -     -    35     -     -  -113 |
 PIE1 |     -    78   -58     -     -     -     -     -     -    -4 |
 POTS |     -   -20     -   -13     -     -     -     -     -    40 |
 PRDS |     -   -50    -3     -     -     -     -     -     -    65 |
 REYK |     -  -188     -     -     -     -    87     -     -    61 |
 RIOG |     -    63     -  -137     -     -     -     -     -    78 |
 SANT |     -   339     -  -181     -     -     -     -     -  -193 |
 SCH2 |     -   -91    35     -     -     -     -     -     -    55 |
 SELE |     -     -     -     -     -     -    25     -     -   -47 |
 SFER |     -  -129   -34     -     -     -     -     -     -   207 |
 SPT0 |     -     -     9     -     -     -     -     -     -   -15 |
 STJO |     -  -104     0     -     -     -     9     -     -   109 |
 STR1 |     -     -    14     -     -     -     -     -     -   -22 |
 SUTH |     -   -55     -     -     -     -     -     -     -    66 |
 THTI |     -     -     -    22     -     -   -48     -     -    66 |
 THU3 |     -    40     -   -43     -     -     -     -     -     X |
 TIXI |     -    -1     -   -91     -     -    55     -     -     - |
 TLSE |     -    49    -2     -     -     -     -     -     -   -55 |
 TRO1 |     -   -83     -    -7     -     -     -     -     -    98 |
 TWTF |     -   -22    -7     -     -     -     -     -     -    38 |
 USN1 |     -     -   336     -     -     -  -375     -     -   195 |
 USNO |     -  -138    17     -     -     -    74     -     -     0 |
 USUD |     -    38    15     -     -     -     -     -     -   -70 |
 WES2 |     -     -    -1     -     -     -     -     -     -     2 |
 WHIT |     -  -136     -     -     -     -     -     -     -   165 |
 WSRT |     -   -68   102     -     -     -    -2     -     -   -72 |
 WTZR |     -   -17    58     -     -     -    17     -     -  -103 |
 WUHN |     -    80    14   135     -     -     -     -     -  -271 |
 YAKT |     -  -104     -     -     -     -     -     -     -   126 |
 YELL |     -     X     -   -46     -     -     5     -     -    43 |
 YSSK |     -    -5     -     -     -     -     3     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5296   126    50    68    68  4472    23  5395     -     X |  277   3.67
    2 |  6852    38    22    24    47  8755    22  6825     -    54 |  288   2.35
    3 |  3314    41    55    47    55  3095    38  3206     -    43 |  288   2.28
    4 |  1301    52    27    24    39  1165    37  1184     -    70 |  288   0.92
    5 |  3704    36    42    43    29  3997    35  3242     -    64 |  288   2.76
    6 | 12132    42    32    40    79  4906    36 12080     -    35 |  288  11.57
    7 |  2627    59    26    35    71  2949    46  2748     -    86 |  288   0.70
    8 |  3380    39    36    23    45  3891    22  4008     -   114 |  288   2.79
    9 |  4712    38    53    29   119  3995    45  4130     -    39 |  288   3.25
   10 |  4350    35    24    39   103  4243    34  4339     -    64 |  288   3.66
   11 |  1344    66    70    40    54  2601    55  1377     -   113 |  288   0.30
   13 |  1196    62    34    55    93  1518    36  1324     -    88 |  288   0.33
   14 |  1461    75    30    25   116  1048    30  1584     -    70 |  288   0.27
   15 |  7669    59    34    44    71  5217    17  7452     -    76 |  288   2.56
   16 |  1429    40    21    26    66   736    44  1589     -    53 |  288   0.23
   17 |  2176    48    26    59    35   961    13  1889     -    74 |  288   0.98
   18 |   863    33    41    43    51  1022    89   862     -    31 |  288   0.33
   20 |   827    59    59    33    54  1436    25   864     -    74 |  288   0.19
   21 |   861    54    27    31    42  1301    32  1135     -    67 |  288   0.45
   23 |  3413    47    40    29   223  3702    28  3202     -    13 |  288   0.85
   24 |  3744    58    39    26    95  2801    29  3165     -    88 |  288   2.08
   25 |  3279    42    54    64    41  5764    40  3550     -    40 |  288   1.74
   26 |  1388     X    60   104   144   997    70  1398     -   117 |  273   0.80
   27 |  1753    39    28    31   118  2606    20  1772     -    43 |  288   0.73
   28 |  1573    19    34    21    53  1095    40  1538     -    74 |  288   0.36
   29 |  1492     X    23    89   300  3024    44  1577     -    97 |  276   0.77
   30 |  1408    27    28    35    36   545    43  1347     -    58 |  288   0.50
   31 |  3996    49    30    41   222     -    26  3833     -    58 |  288   0.97
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    31    14     -     -     -    20     -     -    35 |  288  10.42
 ALGO |     -    50    31    23     -     -    18     -     -    31 |  288   0.01
 AMC2 |     -    25    17     -     -     -    27     -     -    17 |  288   0.04
 AOML |     -    11     -     -     -     -     -     -     -    13 |  288  28.83
 AREQ |     -    51    25    32     -     -    33     -     -    45 |  288  22.61
 ARTU |     -    59     -    44     -     -    39     -     -     - |  259  12.72
 ASC1 |     -    34     -    30     -     -     -     -     -    64 |  283    >>>
 AUCK |     -    24     -     X     -     -    18     -     -    42 |  264  11.15
 BAHR |     -     -    28    50     -     -    22     -     -    29 |  288   0.45
 BILI |     -    18     -    19     -     -     -     -     -     - |  287   8.32
 BOR1 |     -     -    20     -     -     -     -     -     -    30 |  288   0.57
 BREW |     -     -     9     -     -     -     -     -     -    14 |  288   6.67
 BRMU |     -     -     -    30     -     -     -     -     -    34 |  288    >>>
 BRUS |     -     -    20     -     -     -    12     -     -    39 |  288   0.04
 CAS1 |     -    30     -    21     -     -    23     -     -    15 |  288   8.80
 CEDU |     -    21     -     -     -     -     -     -     -    26 |  288  14.79
 CHAT |     -    25     -     -     -     -     -     -     -    30 |  287   9.83
 CHUR |     -    16    18     -     -     -     -     -     -    27 |  287  12.28
 COCO |     -    36     -    24     -     -    26     -     -    34 |  288  11.79
 CORD |     -    43     -    46     -     -     -     -     -     - |  288  17.13
 CRO1 |     -    32    30    21     -     -    16     -     -    29 |  288  21.21
 DAKA |     -    38     -    41     -     -     -     -     -     - |  223  19.87
 DARW |     -    23     -     -     -     -    15     -     -     - |  286   6.45
 DAV1 |     -    27     -    20     -     -     -     -     -    36 |  288  15.48
 DRAO |     -    42    37     -     -     -     -     -     -    13 |  288   0.15
 DWH1 |     -     -    16     -     -     -    19     -     -    24 |  288   0.59
 FAIR |     -     -    38    35     -     -    42     -     -    72 |  285   0.06
 FORT |     -     -    15    26     -     -    27     -     -    51 |  288   0.15
 GLPS |     -    17     -    18     -     -     -     -     -     - |  283  30.66
 GODE |     -    45    32     -     -     -     -     -     -    15 |  288   0.04
 GOLD |     -    23     -     -     -     -    14     -     -     X |  288  12.99
 GUAM |     -    30     -    59     -     -    27     -     -    57 |  288  21.49
 HERS |     -   113    82     -     -     -     -     -     -    65 |  263  11.35
 HOB2 |     -    25    21     -     -     -    20     -     -    36 |  288   0.09
 HRAO |     -     -     -    30     -     -    25     -     -    32 |  287    >>>
 IISC |     -    30     -    21     -     -     -     -     -    32 |  288  24.07
 JPLM |     -     -    12     -     -     -     -     -     -    18 |  288  13.32
 KERG |     -    68    40    34     -     -    32     -     -    39 |  287   1.49
 KGN0 |     -     -    14     -     -     -     -     -     -    21 |  286   0.36
 KIRU |     -    38     -     -     -     -     -     -     -    46 |  261   9.26
 KIT3 |     -     -     -    28     -     -     -     -     -    32 |  288  12.60
 KOKB |     -    34    30    29     -     -    20     -     -    48 |  288   0.05
 KOSG |     -    14     -     -     -     -     -     -     -    16 |  288  74.07
 KOUR |     -    42     -    42     -     -     -     -     -    23 |  259   1.18
 KSTU |     -     -     -     -     -     -     8     -     -    16 |  288  11.33
 KUNM |     -     -     -     -     -     -    15     -     -    29 |  288  24.33
 LAE1 |     -    70     -     -     -     -     -     -     -    85 |  287  16.77
 LPGS |     -     -     -     -     -     -    38     -     -    73 |  261  25.28
 MAC1 |     -    37     -    21     -     -    19     -     -    31 |  288  15.66
 MAS1 |     -     -     -    70     -     -    52     -     -    54 |  283   3.00
 MAW1 |     -    29     -    54     -     -     -     -     -    89 |  288  33.99
 MDO1 |     -    40    27    24     -     -     -     -     -    24 |  288  13.01
 MEDI |     -    19    14     -     -     -     -     -     -    21 |  288   0.37
 METS |     -    21    15     -     -     -     -     -     -    14 |  287  13.44
 MKEA |     -    27     -    40     -     -     -     -     -    25 |  288  29.09
 NKLG |     -     -     -    31     -     -    16     -     -    18 |  287 278.32
 NLIB |     -     -    25     -     -     -    26     -     -    16 |  288   0.02
 NNOR |     -     -    42     -     -     -     -     -     -    65 |  278  15.86
 NOT1 |     -     -    14     -     -     -     -     -     -    21 |  288    >>>
 NRIL |     -    24     -    25     -     -     -     -     -     - |  184  11.70
 NSSP |     -    12     -     -     -     -     -     -     -    14 |  288  11.92
 NTUS |     -    17     -     -     -     -    14     -     -    20 |  288  10.68
 NYA1 |     -    17     -     X     -     -    11     -     -     X |  136   0.06
 NYAL |     -     -    10     -     -     -     -     -     -    16 |  288   0.15
 OHI2 |     -    68     -    22     -     -    46     -     -     - |  288  10.12
 ONSA |     -    17    17    21     -     -     -     -     -     - |  288   0.04
 PERT |     -     -    68    47     -     -    36     -     -    80 |  261   9.65
 PIE1 |     -    26     9     -     -     -     -     -     -    32 |  288   0.05
 POTS |     -    26     -    38     -     -     -     -     -    18 |  288  18.96
 PRDS |     -    13    15     -     -     -     -     -     -    17 |  288   1.77
 REYK |     -    17     -     -     -     -    18     -     -    20 |  288  10.30
 RIOG |     -    19     -    52     -     -     -     -     -    55 |  288  15.56
 SANT |     -    42     -    50     -     -     -     -     -    26 |  288   5.26
 SCH2 |     -    24    23     -     -     -     -     -     -    32 |  286 122.68
 SELE |     -     -     -     -     -     -    16     -     -    31 |  288  37.62
 SFER |     -    28    25     -     -     -     -     -     -    21 |  286   0.56
 SPT0 |     -     -    14     -     -     -     -     -     -    22 |  288   0.05
 STJO |     -    14    24     -     -     -    13     -     -    30 |  288   0.04
 STR1 |     -     -    23     -     -     -     -     -     -    35 |  288  11.71
 SUTH |     -    31     -     -     -     -     -     -     -    38 |  288  12.55
 THTI |     -     -     -    47     -     -    38     -     -    26 |  287   1.70
 THU3 |     -    13     -    14     -     -     -     -     -     X |  287   8.92
 TIXI |     -    65     -   104     -     -    34     -     -     - |  287   7.67
 TLSE |     -    22    32     -     -     -     -     -     -    31 |  287   0.51
 TRO1 |     -    30     -    75     -     -     -     -     -    88 |  288   9.77
 TWTF |     -    31    41     -     -     -     -     -     -    65 |  288   0.33
 USN1 |     -     -    23     -     -     -    25     -     -    17 |  288   0.02
 USNO |     -    32    27     -     -     -    18     -     -    28 |  288   0.05
 USUD |     -    35    33     -     -     -     -     -     -    30 |  288  14.05
 WES2 |     -     -     9     -     -     -     -     -     -    13 |  288   0.04
 WHIT |     -    41     -     -     -     -     -     -     -    50 |  288   1.81
 WSRT |     -    21    22     -     -     -    10     -     -    20 |  288   0.04
 WTZR |     -    33    16     -     -     -    18     -     -    14 |  288   0.09
 WUHN |     -    30    34    25     -     -     -     -     -    42 |  287  14.62
 YAKT |     -    32     -     -     -     -     -     -     -    39 |  288   0.49
 YELL |     -     X     -    71     -     -    24     -     -    49 |  288   0.06
 YSSK |     -    23     -     -     -     -    14     -     -     - |  287  13.92
 -----+-------------------------------------------------------------+--------------
 TOT  |  3970    41    33    43   108  3438    28  3915     -    49 |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

