
 GPS week: 1250   Day: 2   MJD: 52996                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2682      0    -0.01     0.03     3.61     0.00
 cod |   288     0  27098    536    -0.03    -0.29     0.04    21.73
 emr |   288     0  21718     46   231.35    18.42     0.03    26.65
 esa |   288     0  19912   2238     0.05     1.19     0.07     8.56
 gfz |   288     0  19681    390     0.12    -0.03     0.03    26.71
 iga |    96     0   2587      0    -0.02     0.02     0.11     0.00
 igu |    96     0   2682      0    -0.02     0.03     2.86     0.00
 ngs |    96     0   2682      0    -0.01     0.03     3.52     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  34260   1816   512.01    14.83     0.05    16.36

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  -884   137   -76   104   -86    46 -1855   395     -    17 |
    2 |  1720   -12   -57    -1    38    56   778  1265     -    47 |
    3 |   310   -61    -2    15    -2   -49  5037   304     -    80 |
    4 |  1033     X  -102     X   166   -64 -2202  1021     -  -111 |
    5 | -5046   101    35     X  -102   151-14480 -4704     -   -25 |
    6 | -8041    92     7   157  -110   -94 -6324 -7616     -   -35 |
    7 | -1103   -56   -99   241   207   100 -1414 -1106     -  -229 |
    8 |   173    -6  -118    60    77    19  1476   -46     -    47 |
    9 |  3175  -192  -188   269   462  -382  4865  3021     -  -316 |
   10 |  5692   -28  -188   164   180   125 10648  4789     -   -36 |
   11 |  3334   -18    17   -60    40   -27  1244  3419     -   -34 |
   13 |  3550    62  -157    86    99    30  1085  3513     -   -26 |
   14 |  4381    -7   128  -355    -4   -95  1804  4130     -   -37 |
   15 | -1857   -51    12   -93    64   179  4409 -1615     -     X |
   16 |  6594   -61    48     X    -1   -66   381  6586     -     4 |
   17 | -2384    95   -88   126    34   114 -3983 -2092     -  -114 |
   18 |  3749   -36   -53    65   106   -45  -565  3728     -   -72 |
   20 |  5400   117   -70   228   -40   109  1667  5155     -  -120 |
   21 |  1820  -138   112   -65    65    24   221  1946     -   -66 |
   23 | -8256    32    41  -141   -23     7 -8636 -7271     -     3 |
   24 |  1012    66   -40   338  -153    45  1102   881     -    42 |
   25 | -1316   -30    -5     X    79  -195  7262 -2014     -   -81 |
   26 | -2451   103   -67   -10     3  -139   464 -2419     -   -36 |
   27 |  1063   -22  -250    47   308   -87 -5989   531     -   -90 |
   28 |  2355    39    12   124   -83   115  3883  2127     -     X |
   29 | -2076     9   -90    26    95     -   470 -1916     -   -35 |
   30 | -3983   -18   -42   116    87   -70 -2341 -3920     -  -109 |
   31 | -7932    46   -10    67   -69   190   896 -8054     -    33 |
 -----+-------------------------------------------------------------+
 ALBH |     -    82   -83     -     -     -     -     -     -    27 |
 ALGO |     -   -54   -18     X     -     -     -     -     -   102 |
 AMC2 |     -   -68     4     -     -     -     -     -     -    84 |
 AOML |     -    -6     -     -     -     -     -     -     -     8 |
 AREQ |     -     -    75    26   -96     -     -     -     -    21 |
 ASC1 |     -    70     -     -  -101     -     -     -     -    72 |
 AUCK |     -    19     -     X     X     -     -     -     -   -26 |
 BAHR |     -   -60    35    -5    38     -     -     -     -   -37 |
 BOGT |     -   268     -  -325     -     -     -     -     -  -187 |
 BOR1 |     -     -   150     -     -     -     -     -     -  -245 |
 BREW |     -     -   -11     -     -     -     -     -     -    18 |
 BRMU |     -     -     -     -   -34     -     -     -     -    55 |
 BRUS |     -     -    25     -     -     -     -     -     -   -41 |
 CAS1 |     -   -35     -    70    20     -     -     -     -   -23 |
 CEDU |     -   -80     -   -10     -     -     -     -     -   111 |
 CHAT |     -   -70     -   105     -     -     -     -     -    38 |
 CHUR |     -    76    63     -     -     -     -     -     -  -202 |
 COCO |     -    77     -  -227    82     -     -     -     -  -117 |
 CRO1 |     -     -   139     -  -184     -     -     -     -    75 |
 DAV1 |     -    10     -     -    26     -     -     -     -   -56 |
 DRAO |     -    59   -43     -     -     -     -     -     -    -7 |
 DWH1 |     -     -   -14     -     -     -     -     -     -    23 |
 FAIR |     -   -53   -38    70    16     -     -     -     -    64 |
 FORT |     -   389   -75  -226    50     -     -     -     -  -226 |
 GLPS |     -     1     -     -    -1     -     -     -     -     - |
 GODE |     -  -104   101    68     -     -     -     -     -   -63 |
 GOLD |     -    -1     -     3     -     -     -     -     -     X |
 GUAM |     -    41     -  -293    12     -     -     -     -    78 |
 HERS |     -  -261   -47     -     -     -     -     -     -   417 |
 HOB2 |     -   -19   150  -181     -     -     -     -     -  -125 |
 HRAO |     -     -     -     -   -23     -     -     -     -    38 |
 IISC |     -    48     -   176   -37     -     -     -     -  -117 |
 IRKT |     -     -    13   -42     -     -     -     -     -     - |
 KERG |     -   -51    39     -    21     -     -     -     -   -30 |
 KGN0 |     -     -    13     -     -     -     -     -     -   -21 |
 KIRU |     -   -27     -     -     -     -     -     -     -    36 |
 KIT3 |     -     -     -  -152    14     -     -     -     -    57 |
 KOKB |     -   -31    54     -   -16     -     -     -     -   -21 |
 KOSG |     -   -58     -     -     -     -     -     -     -    78 |
 KOUR |     -    -9     -    40     -     -     -     -     -   -11 |
 LAE1 |     -    -1     -     -     -     -     -     -     -     1 |
 LHAS |     -     -     -  -106    33     -     -     -     -     2 |
 MAC1 |     -    -5     -    -9   -27     -     -     -     -    55 |
 MALI |     -   -83     -   126     -     -     -     -     -    45 |
 MAS1 |     -    -6     -    82    -4     -     -     -     -   -27 |
 MAW1 |     -    84     -     -   -62     -     -     -     -   -10 |
 MCM4 |     -   199     -     -  -162     -     -     -     -     - |
 MDO1 |     -     -    -7     -     7     -     -     -     -     0 |
 MEDI |     -     -   119     -     -     -     -     -     -  -193 |
 MIZU |     -     -   -60     -     -     -     -     -     -    97 |
 MKEA |     -    34     -    13   -31     -     -     -     -     X |
 NKLG |     -    84     -     -    58     -     -     -     -  -206 |
 NLIB |     -     -   -48     -     -     -     -     -     -    78 |
 NNOR |     -     -   -55    55     -     -     -     -     -    62 |
 NOT1 |     -     -     4     -     -     -     -     -     -    -6 |
 NRC1 |     -   -17     0  -147    60     -     -     -     -     2 |
 NRIL |     -   557     -     -  -453     -     -     -     -     - |
 NSSP |     -   -61     -     -     -     -     -     -     -    80 |
 NTUS |     -   -73     -     -     -     -     -     -     -    97 |
 NYA1 |     -  -121     -     -     X     -     -     -     -   161 |
 NYAL |     -     -    -3   128     -     -     -     -     -   -61 |
 OBE2 |     -     -     -     -  -266     -     -     -     -   434 |
 OHI2 |     -   -20     -     -    17     -     -     -     -     - |
 ONSA |     -   -70    72   -25    -7     -     -     -     -     - |
 PERT |     -    -4    81   -70   -96     -     -     -     -    68 |
 PIE1 |     -    85   -63   -73     -     -     -     -     -    27 |
 PIMO |     -     -     -   -51    16     -     -     -     -     X |
 POTS |     -    21     -   -44     3     -     -     -     -    -9 |
 PRDS |     -   -22   -54     -     -     -     -     -     -   117 |
 REYK |     -   -54     -     -     -     -     -     -     -    72 |
 SANT |     -     X     -     X  -218     -     -     -     -   355 |
 SCH2 |     -   -62   -15     -     -     -     -     -     -   106 |
 SELE |     -     -     -   -31     -     -     -     -     -    16 |
 SFER |     -   -63    -9     -     -     -     -     -     -    98 |
 SPT0 |     -     -    34     -     -     -     -     -     -   -56 |
 STJO |     -   -40   -20     -     -     -     -     -     -    86 |
 STR1 |     -     -    60     -     -     -     -     -     -   -98 |
 SUTH |     -   -36     -     -     -     -     -     -     -    47 |
 SUWN |     -     -    37     -     -     -     -     -     -   -61 |
 THTI |     -     -     -   -30     -     -     -     -     -    16 |
 THU3 |     -    12     -     -    -9     -     -     -     -     X |
 TIXI |     -    48     -     -   -39     -     -     -     -     - |
 TLSE |     -     -   109     -     -     -     -     -     -  -177 |
 TRO1 |     -   -73     -     -    -2     -     -     -     -   101 |
 TROM |     -     -     -  -158     -     -     -     -     -    83 |
 TSKB |     -   -67    29     8    30     -     -     -     -   -11 |
 TWTF |     -   -74     5     -     -     -     -     -     -    91 |
 UNSA |     -     -     -     -   -43     -     -     -     -    70 |
 USN1 |     -     -    78     -     -     -     -     -     -  -127 |
 USNO |     -   -75    41     -     -     -     -     -     -    33 |
 USUD |     -   -80    64    11     -     -     -     -     -    -4 |
 VILL |     -   101     -  -590     -     -     -     -     -   107 |
 WES2 |     -     -    66     -     -     -     -     -     -  -108 |
 WHIT |     -    -8     -     -     -     -     -     -     -    10 |
 WSRT |     -   -83   117     -     -     -     -     -     -   -81 |
 WTZR |     -   -84   138   -99     -     -     -     -     -   -62 |
 WUHN |     -     -     -   -47     -     -     -     -     -    25 |
 YAKT |     -   -87     -     -     -     -     -     -     -   116 |
 YAR2 |     -   -42     -     -     -     -     -     -     -    56 |
 YELL |     -   -34     -   357   -82     -     -     -     -    -3 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5166    48    25    81    35    84  2972  4843     -    62 |  288   3.55
    2 |  3749    30    55    83    23    28  1718  4120     -    51 |  288   1.36
    3 |  2861    39    46    59    31    73  3992  2855     -    50 |  288   1.95
    4 |  2333     X    33     X    31   308  2242  2318     -    74 |  276   1.10
    5 |  7024    28    28     X    30    73  5532  6592     -    41 |  288   2.59
    6 |  8595    47    27   143    73    43  4417  9017     -    54 |  288   8.28
    7 |   900    41    38    38    33   112   715   907     -    77 |  288   0.64
    8 |  3431    60    37    88    25    52  1735  3271     -   100 |  288   2.46
    9 |  4230    55    41   139    34    83  3774  4106     -    27 |  288   3.44
   10 |  7468    49    42    49    29   102  7194  6616     -    71 |  288   3.63
   11 |   583    46    21    83    44    51  1205   525     -    69 |  288   0.32
   13 |   557    43    32    48    34    52   597   619     -    42 |  288   0.20
   14 |   731    45    25   129    57    50  1186   677     -   102 |  288   0.35
   15 |  4135    58    36    88    46    70  3044  3601     -     X |  288   3.90
   16 |   636    28    32     X    18   117   585   642     -    30 |  288   0.27
   17 |  1789    60    29    85    42   136  1861  1698     -    86 |  288   0.78
   18 |   669    34    30   122    24   109   393   642     -    45 |  288   0.37
   20 |   449    41    26    58    33    42  1151   445     -   111 |  288   0.14
   21 |  1863    68    29   119    26   109   700  1867     -    61 |  288   0.39
   23 |  3976    39    31    48    36   149  4045  3634     -    44 |  288   0.86
   24 |  3549    55    37    94    24   157  2958  3562     -    79 |  288   3.12
   25 |  4858    46    30     X    33    54  2454  5227     -    61 |  288   2.09
   26 |  1251    79    28   103    33    60  1118  1128     -    93 |  287   0.47
   27 |  2601    55    29    55    25    55  3259  2418     -    67 |  288   0.70
   28 |   498    34    30    58    35   132  2301   573     -     X |  288   0.43
   29 |  2726    81    44   149    32     -  1643  2445     -    77 |  284   1.15
   30 |  1147    27    27    58    23    88  1892  1145     -    55 |  288   0.60
   31 |  2939    36    18    84    27   106  2547  3004     -    49 |  288   0.95
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    20    26     -     -     -     -     -     -    33 |  288   9.58
 ALGO |     -    17    23     X     -     -     -     -     -    35 |  288   0.02
 AMC2 |     -    32    41     -     -     -     -     -     -    38 |  288   0.05
 AOML |     -    17     -     -     -     -     -     -     -    23 |  288  25.79
 AREQ |     -     -    57    60    22     -     -     -     -   131 |  288  19.48
 ASC1 |     -    34     -     -    40     -     -     -     -    33 |  288    >>>
 AUCK |     -    26     -     X     X     -     -     -     -    34 |  264  12.55
 BAHR |     -    46    31    32    27     -     -     -     -    13 |  288   0.38
 BOGT |     -    16     -    42     -     -     -     -     -    23 |  208  26.07
 BOR1 |     -     -    20     -     -     -     -     -     -    33 |  288   0.33
 BREW |     -     -    22     -     -     -     -     -     -    35 |  288    >>>
 BRMU |     -     -     -     -    13     -     -     -     -    20 |  275    >>>
 BRUS |     -     -    13     -     -     -     -     -     -    20 |  288   0.03
 CAS1 |     -    45     -   123    22     -     -     -     -    44 |  288   8.29
 CEDU |     -    28     -    36     -     -     -     -     -    27 |  288  14.11
 CHAT |     -    30     -    47     -     -     -     -     -    32 |  287  10.74
 CHUR |     -    15    24     -     -     -     -     -     -    42 |  288  19.49
 COCO |     -    20     -    72    26     -     -     -     -    25 |  288   9.70
 CRO1 |     -     -    63     -    41     -     -     -     -   114 |  288  18.87
 DAV1 |     -    21     -     -    12     -     -     -     -    29 |  288  16.85
 DRAO |     -    26    26     -     -     -     -     -     -    30 |  288   0.14
 DWH1 |     -     -    29     -     -     -     -     -     -    47 |  288   0.89
 FAIR |     -   106    31    31    35     -     -     -     -    55 |  288   0.04
 FORT |     -    59    37    94    42     -     -     -     -    83 |  282   0.27
 GLPS |     -    12     -     -    10     -     -     -     -     - |  288  28.61
 GODE |     -    45    39    44     -     -     -     -     -    29 |  288   0.11
 GOLD |     -    35     -    90     -     -     -     -     -     X |  288  14.92
 GUAM |     -    24     -    77    20     -     -     -     -    28 |  288  22.99
 HERS |     -    43    50     -     -     -     -     -     -    36 |  264  12.61
 HOB2 |     -    34    18    39     -     -     -     -     -    34 |  288   0.05
 HRAO |     -     -     -     -    22     -     -     -     -    37 |  288   0.85
 IISC |     -    35     -    61    31     -     -     -     -    51 |  288  31.46
 IRKT |     -     -    12    38     -     -     -     -     -     - |  288   0.09
 KERG |     -    57    30     -    17     -     -     -     -    33 |  287   2.02
 KGN0 |     -     -    11     -     -     -     -     -     -    18 |  287   0.28
 KIRU |     -    16     -     -     -     -     -     -     -    21 |  288   9.86
 KIT3 |     -     -     -    60    18     -     -     -     -    22 |  288  16.28
 KOKB |     -    24    36     -    20     -     -     -     -    44 |  288   0.07
 KOSG |     -    16     -     -     -     -     -     -     -    21 |  287  44.36
 KOUR |     -    28     -    50     -     -     -     -     -    36 |  277   2.04
 LAE1 |     -    23     -     -     -     -     -     -     -    30 |  285  21.32
 LHAS |     -     -     -    40    16     -     -     -     -    22 |  288  13.34
 MAC1 |     -    31     -    65    27     -     -     -     -    40 |  288  18.35
 MALI |     -    30     -    63     -     -     -     -     -    27 |  288  19.30
 MAS1 |     -    24     -    31    23     -     -     -     -    28 |  288   1.23
 MAW1 |     -    51     -     -    14     -     -     -     -    59 |  288  22.81
 MCM4 |     -    17     -     -    14     -     -     -     -     - |  288  40.27
 MDO1 |     -     -    12     -    23     -     -     -     -    39 |  288  23.38
 MEDI |     -     -    11     -     -     -     -     -     -    18 |  287    >>>
 MIZU |     -     -    33     -     -     -     -     -     -    54 |  275   0.62
 MKEA |     -    25     -    47    23     -     -     -     -     X |  288  26.71
 NKLG |     -    21     -     -    29     -     -     -     -    53 |  287  73.78
 NLIB |     -     -    58     -     -     -     -     -     -    94 |  286  77.26
 NNOR |     -     -    23    42     -     -     -     -     -    28 |  288  16.53
 NOT1 |     -     -    12     -     -     -     -     -     -    20 |  288    >>>
 NRC1 |     -    24    12    31    19     -     -     -     -    24 |  288   0.03
 NRIL |     -    12     -     -    10     -     -     -     -     - |  288  12.06
 NSSP |     -    15     -     -     -     -     -     -     -    19 |  288  14.31
 NTUS |     -    21     -     -     -     -     -     -     -    27 |  287  42.70
 NYA1 |     -    16     -     -     X     -     -     -     -    21 |  126   0.04
 NYAL |     -     -    11    29     -     -     -     -     -    16 |  288   0.09
 OBE2 |     -     -     -     -    20     -     -     -     -    33 |  251    >>>
 OHI2 |     -    23     -     -    19     -     -     -     -     - |  288   7.90
 ONSA |     -    24    24    24    24     -     -     -     -     - |  288   0.06
 PERT |     -    34    29    61    39     -     -     -     -    36 |  288   9.62
 PIE1 |     -    30    37    95     -     -     -     -     -    61 |  288   0.03
 PIMO |     -     -     -    89    28     -     -     -     -     X |  213  21.24
 POTS |     -    19     -    36    16     -     -     -     -    25 |  288  18.77
 PRDS |     -    26    27     -     -     -     -     -     -    35 |  288   1.50
 REYK |     -    19     -     -     -     -     -     -     -    25 |  286  10.94
 SANT |     -     X     -     X    55     -     -     -     -    89 |  257   4.09
 SCH2 |     -    25    18     -     -     -     -     -     -    25 |  288  89.12
 SELE |     -     -     -    33     -     -     -     -     -    17 |  288  29.54
 SFER |     -    25    19     -     -     -     -     -     -    22 |  287   0.32
 SPT0 |     -     -    15     -     -     -     -     -     -    24 |  288   0.05
 STJO |     -    39    15     -     -     -     -     -     -    49 |  288   0.06
 STR1 |     -     -    14     -     -     -     -     -     -    22 |  288  11.86
 SUTH |     -    36     -     -     -     -     -     -     -    47 |  288  16.49
 SUWN |     -     -    27     -     -     -     -     -     -    44 |  288   1.41
 THTI |     -     -     -    93     -     -     -     -     -    49 |  287   2.67
 THU3 |     -    40     -     -    33     -     -     -     -     X |  288   7.70
 TIXI |     -    27     -     -    22     -     -     -     -     - |  287   8.44
 TLSE |     -     -    19     -     -     -     -     -     -    31 |  287   0.71
 TRO1 |     -    28     -     -    48     -     -     -     -    46 |  288  10.02
 TROM |     -     -     -    22     -     -     -     -     -    11 |  288  14.56
 TSKB |     -    38    24    73    12     -     -     -     -    16 |  288   1.37
 TWTF |     -    28    47     -     -     -     -     -     -    82 |  288   0.63
 UNSA |     -     -     -     -    26     -     -     -     -    43 |  288  20.14
 USN1 |     -     -    23     -     -     -     -     -     -    38 |  288   0.05
 USNO |     -    21    17     -     -     -     -     -     -    37 |  288   0.03
 USUD |     -    21    23    52     -     -     -     -     -    41 |  288  11.67
 VILL |     -    25     -    65     -     -     -     -     -    27 |  288   4.87
 WES2 |     -     -    30     -     -     -     -     -     -    49 |  288   0.04
 WHIT |     -    19     -     -     -     -     -     -     -    26 |  288   2.48
 WSRT |     -    21    17     -     -     -     -     -     -    21 |  288   0.04
 WTZR |     -    24    21    26     -     -     -     -     -    18 |  288   0.05
 WUHN |     -     -     -    36     -     -     -     -     -    19 |  286  18.18
 YAKT |     -    24     -     -     -     -     -     -     -    32 |  288   1.12
 YAR2 |     -    29     -     -     -     -     -     -     -    38 |  288   8.94
 YELL |     -    42     -    80    31     -     -     -     -    47 |  288   0.06
 -----+-------------------------------------------------------------+--------------
 TOT  |  3608    38    31    73    30   106  2863  3516     -    49 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

