
 GPS week: 1267   Day: 6   MJD: 53119                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2682      0     0.19    -0.23     2.91     0.00
 cod |   288     0  28696    133     0.57    -0.97     0.05    13.66
 emr |   288     0  24328     46    19.04     1.73     0.03    21.68
 esa |   288     0  18004   1561  -306.59     1.76     0.07     8.29
 gfz |   288     0  19628    573    -0.02     0.17     0.03    22.75
 iga |    96     0   2681     89     0.14    -0.26     0.12     0.00
 igu |    96     0   2682      0     0.18    -0.24     2.92     0.00
 jpl |   288     0  15416      0    -5.81    -0.44     0.04    17.62
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  32418    921 30223.05   -34.35     0.04    16.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -4965   -99   -90   -37   143   -53 -4428  -130     -    35 |
    3 | -3604    17   -95     X   100    25  3076    66     -   -97 |
    4 | -2402   -40   -61    70    93    61  2916   -39     -   -13 |
    5 | -4626    97   -17     7    -8    44  9569   162     -  -215 |
    6 |   232    60  -122    77   105  -118-13837   102     -  -179 |
    7 |  -542    51   -45   234   -49    61  1114    39     -   -26 |
    8 | -9424   -12    25   -39   -33    20   536     1     -    44 |
    9 |   851    39   -55   -65   195   -73  5265    97     -  -210 |
   10 | -4202   -92    81   -23    97    38 -2191   -46     -  -110 |
   11 |  5504    48  -105   140  -102    63    62    46     -   169 |
   13 |  3851    79   -91    73    -2    53  1657   -16     -    37 |
   14 |  7619   141   -55   -14  -178   -76  1045   215     -    -3 |
   15 | -4193  -101   -25   -94   197   -42 -5499    -7     -  -111 |
   16 |  5405    89   -37    51   -67   104  2133   184     -    25 |
   17 | -1482    46     8   -69    43    54  4873     9     -   -85 |
   18 |  5286   117   -34   -76    52  -167  1373    48     -   -93 |
   19 |  7045  -119    68  -104    50    22  2960    -6     -     X |
   20 |  4507    46   -21   115  -160    51  3376    86     -    71 |
   21 |  2983    89  -129    84    30  -112  -900   171     -    -2 |
   22 | -4624    83   -66  -101   -31     7  -352   177     -   -63 |
   24 |  3378    -6    -2   -62    32    74   -85   -27     -    -5 |
   25 | -3125    34   -94  -177   160  -143 -6680   112     -  -150 |
   26 |   920    -8   -82   -93   104   -28  2997   136     -  -119 |
   27 |  -386   -11     9    62   -61    -6  1233    60     -    48 |
   28 |  4428     3   -62   -33   -16    30  1862    67     -   116 |
   29 | -1178    -3   -36   -70    61    53 -7621   142     -   -11 |
   30 | -1207   175  -112    77    77    57 -1660   152     -  -195 |
   31 | -6374     2     8     X   -83    21 -2846   104     -     X |
 -----+-------------------------------------------------------------+
 ALBH |     -     -    22     -     -     -     -   -15     -   -13 |
 ALGO |     -     -   -64   340     -     -     -     6     -   -65 |
 AMC2 |     -   -99    65     -     -     -     -  -100     -   107 |
 ARTU |     -   105     -    37    -4     -     -   -94     -     - |
 ASC1 |     -    32     -     -  -145     -     -     -     -   179 |
 AUCK |     -    19     -     X     -     -     -     -     -   -16 |
 BAHR |     -     -    26     -    10     -     -     -     -   -49 |
 BAN2 |     -     -   -20     -     -     -     -     -     -    28 |
 BILI |     -   -19     -     -    12     -     -     -     -     - |
 BOR1 |     -   121   -48     -     -     -     -     -     -   -38 |
 BREW |     -     -    13     -     -     -     -     -     -   -17 |
 BRMU |     -     -     -     -   -80     -     -     -     -   113 |
 BRUS |     -   -30    44     -     -     -     -     -     -   -34 |
 CAS1 |     -    36     -    87   -83     -     -     -     -    43 |
 CEDU |     -   -73     -   252     -     -     -     -     -   -68 |
 CHAT |     -   -47     -     -     2     -     -     -     -    38 |
 CHUR |     -   146   107     -     -     -     -     -     -  -270 |
 COCO |     -   -54     -    43    47     -     -     -     -   -44 |
 CRO1 |     -    27   -22    -2     8     -     -    37     -   -44 |
 DAKA |     -   127     -     -   -77     -     -     -     -     - |
 DARW |     -     -   106     -     -     -     -  -131     -     - |
 DAV1 |     -    29     -     -  -104     -     -   125     -   -14 |
 DRAO |     -    28   -57     -     -     -     -   125     -   -85 |
 DWH1 |     -   212    15     -     -     -     -  -137     -   -50 |
 FAIR |     -     -    61   178     X     -     -  -102     -   -60 |
 FLIN |     -   -23     -     -     -     -     -    18     -     - |
 GODE |     -  -113    37   311     -     -     -     -     -  -114 |
 GOL2 |     -     -    35     -     -     -     -     -     -   -47 |
 GOLD |     -   -10     -  -189     -     -     -    27     -    60 |
 GRAZ |     -     -    66     -     -     -     -     -     -   -89 |
 GUAM |     -     -     -  -414    20     -     -   -29     -   218 |
 HERS |     -     -  -255     -     -     -     -     -     -   346 |
 HOB2 |     -   -16    21     -     -     -     -     -     -   -14 |
 HOLM |     -    57     -     -     -     -     -   -44     -     - |
 HRAO |     -   -66     -     -  -126     -     -    17     -   215 |
 IENG |     -  -130    82     -     -     -     -     -     -     - |
 INVK |     -   -48     -     -     -     -     -    37     -     - |
 ISPA |     -    24     -     -   -15     -     -     -     -     - |
 JAB1 |     -    61     -  -101     -     -     -     -     -     - |
 JPLM |     -     -   -21     -     -     -     -   115     -   -98 |
 KELY |     -    89     -     -     -     -     -   -69     -     - |
 KERG |     -     -   -17    22    59     -     -     -     -   -66 |
 KGN0 |     -   -79    -7     -     -     -     -     -     -    77 |
 KIRU |     -   -66     -   -44     -     -     -     -     -    79 |
 KIT3 |     -   -33     -     4   -68     -     -    52     -    65 |
 KOKB |     -     -     -     -   -11     -     -     -     -    15 |
 KOUR |     -    95     -  -111     -     -     -    38     -   -65 |
 KSTU |     -     -     -     -    14     -     -     -     -   -20 |
 KUNM |     -     -     -     -     -     -     -   -35     -    38 |
 LAE1 |     -  -167     -     -   -32     -     -   170     -     X |
 LPGS |     -    16   121  -350     X     -     -     -     -     5 |
 MAC1 |     -  -103     -    -1   -80     -     -   121     -    68 |
 MADR |     -     -     -     -     -     -     -   -99     -   109 |
 MALI |     -     -     -   -24     -     -     -     -     -    12 |
 MAS1 |     -     -   121  -166     -     -     -     6     -   -86 |
 MATE |     -   175     -     -     -     -     -     -     -  -150 |
 MAW1 |     -    35     -     -   -69     -     -     -     -    71 |
 MCM4 |     -   142  -296     -   152     -     -     -     -     - |
 MDO1 |     -   130   -20     -   -41     -     -     -     -   -24 |
 MEDI |     -     -    16     -     -     -     -   -84     -    42 |
 METS |     -   -30    -9     -     -     -     -     -     -    38 |
 MKEA |     -    45     -  -104     -     -     -   -82     -   106 |
 NKLG |     -     -     -  -171     -     -     -     -     -    89 |
 NLIB |     -     -   -27     -     -     -     -   118     -   -94 |
 NNOR |     -     -    96  -160     -     -     -  -101     -    65 |
 NPLD |     -  -123   135     -     -     -     -   -77     -     8 |
 NRC1 |     -     -    -6     -    24     -     -   -81     -    64 |
 NRIL |     -    35     -     -   -21     -     -     -     -     - |
 NSSP |     -   -21     -     -     -     -     -   -56     -    80 |
 NYA1 |     -    65     -     -   -88     -     -     -     -    70 |
 NYAL |     -     -     6     -     -     -     -     -     -    -7 |
 ONSA |     -   -22    20   -15     -     -     -     -     -     - |
 PDEL |     -    72     -     -   -43     -     -     -     -     - |
 PERT |     -   -95   -37     X   150     -     -     -     -   -82 |
 PETP |     -   -94     -     -    57     -     -     -     -     - |
 PIE1 |     -   -35   -25   584     -     -     -   -72     -  -159 |
 POTS |     -  -129     -     -    12     -     -     -     -    93 |
 PRDS |     -     -   -46     -     -     -     -     -     -    62 |
 QAQ1 |     -     -     3     -     -     -     -     -     -    -4 |
 RBAY |     -   -68     -  -292     -     -     -     -     -   209 |
 REYK |     -   -97     -     -     3     -     -     -     -    79 |
 RIOG |     -   -12    30    76   -51     -     -     -     -     3 |
 SANT |     -   -61     -   174   -18     -     -     -     -   -13 |
 SCH2 |     -    -4    37     -     -     -     -   -36     -    -8 |
 SFER |     -     2    -1     -     -     -     -     -     -     - |
 SPT0 |     -   -26    16     -     -     -     -     -     -     - |
 STJO |     -    22   -61     -     -     -     -   -25     -    92 |
 STR1 |     -     -    23     -     -     -     -     -     -   -31 |
 SUTM |     -     -   176     -  -168     -     -     -     -     - |
 THTI |     -     -     -  -235   -76     -     -     -     -   159 |
 THU3 |     -    56    11     -   -29     -     -     -     -   -21 |
 TIDB |     -    -6   -26   291     -     -     -     -     -  -110 |
 TLSE |     -     -    43     -     -     -     -     -     -   -58 |
 TOW2 |     -   -24     -     -     -     -     -    19     -     - |
 TWTF |     -   -66   111     -     -     -     -  -153     -    68 |
 URUM |     -   -23     -     -     -     -     -     -     -    20 |
 USN1 |     -   172   280     -     -     -     -  -497     -    38 |
 USNO |     -   -85    87     -     -     -     -     -     -   -46 |
 USUD |     -     -   -76    57     -     -     -    77     -   -11 |
 VILL |     -     3     -     X     -     -     -     -     -    -2 |
 WES2 |     -   -21    62     -     -     -     -     -     -   -66 |
 WHIT |     -  -122     -     -     -     -     -     -     -   104 |
 WTZR |     -  -112   137  -175     -     -     -     -     -     - |
 YAKT |     -  -122     -     -     -     -     -     -     -   104 |
 YAR2 |     -  -100    37     -     -     -     -     -     -    36 |
 YELL |     -   -97    12   365   -39     -     -     -     -   -68 |
 ZAMB |     -     -     -     -    42     -     -   -54     -     - |
 ZWEN |     -     -     -  -251    95     -     -     -     -    -5 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  8511    62    20    55    42   143  7115    28     -    82 |  288   3.74
    3 |  3535   119    48     X    20   219  2776    84     -    59 |  278   2.77
    4 |  1106    38    25    72    15    39  1850    40     -    49 |  288   0.67
    5 |  3517    46    33    41    22   129  5689    28     -    23 |  288   2.45
    6 |  1280   117    27   127    48   179  8321    45     -    69 |  288   1.53
    7 |   744   121    37   154    33   167   840    78     -    82 |  288   0.85
    8 |  4445    47    24    33    32   136  2060    28     -    72 |  288   4.15
    9 |  2368    55    23    39    41    60  2283    30     -    30 |  288   1.17
   10 |  1964    66    30    51    24   127  1337    63     -    45 |  288   1.60
   11 |  1316    92    34    62    25    71   376    62     -    95 |  288   0.33
   13 |  1614    59    27    42    33    73  1708    59     -    50 |  288   0.38
   14 |  1045    64    44    82    47    72   795    24     -    50 |  288   0.23
   15 |  6934    30    32    32    32    97  2860    46     -    38 |  288   2.04
   16 |   740    25    28    58    27    65  1294    54     -    45 |  288   0.27
   17 |   439    42    25    39    25    79  2213    24     -    54 |  288   0.53
   18 |   831    43    25    44    29   103  1048    35     -    47 |  288   0.43
   19 |  2378    65    29    66    42    91  1451    37     -     X |  288   0.54
   20 |   681    62    34    47    31    69  1776    49     -    61 |  288   0.25
   21 |   605    48    26    28    20    77   492    48     -    50 |  288   0.25
   22 |  1029    39    28    83    47    94   285    36     -    78 |  288   0.32
   24 |  5001    41    29   131    17    87  1241    25     -    43 |  288   2.48
   25 |  3198    34    20    98    36   116  4731   101     -    33 |  288   2.48
   26 |  1530    44    29    41    37   119  1151    31     -    50 |  288   0.68
   27 |   981    53    37    37    29   149  1297    75     -    39 |  288   0.66
   28 |  1404    43    34    67    38    78   692    33     -    42 |  288   0.29
   29 |  1151    55    25    42    44   146  2661    41     -    60 |  288   0.91
   30 |  1720    47    38    64    32    52  1359    49     -    97 |  288   0.79
   31 |  1453   124    33     X    35   166  1858    72     -     X |  277   1.38
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    24     -     -     -     -    15     -    24 |  288   0.10
 ALGO |     -     -    11    39     -     -     -    18     -    15 |  287   0.03
 AMC2 |     -    23    24     -     -     -     -    23     -    15 |  288   0.02
 ARTU |     -    41     -    32    16     -     -    38     -     - |  288  12.13
 ASC1 |     -    67     -     -    21     -     -     -     -    57 |  288    >>>
 AUCK |     -    20     -     X     -     -     -     -     -    17 |  264  12.30
 BAHR |     -     -    21     -    42     -     -     -     -    48 |  288   0.35
 BAN2 |     -     -    17     -     -     -     -     -     -    23 |  288  16.97
 BILI |     -    21     -     -    12     -     -     -     -     - |  286   7.73
 BOR1 |     -    28    12     -     -     -     -     -     -    19 |  288   0.50
 BREW |     -     -    18     -     -     -     -     -     -    24 |  288   0.05
 BRMU |     -     -     -     -    31     -     -     -     -    44 |  276    >>>
 BRUS |     -    39    12     -     -     -     -     -     -    28 |  288   0.03
 CAS1 |     -    31     -   121    12     -     -     -     -    57 |  288   8.46
 CEDU |     -    35     -    38     -     -     -     -     -    27 |  288  15.03
 CHAT |     -    31     -     -    20     -     -     -     -    22 |  251   7.84
 CHUR |     -    89    22     -     -     -     -     -     -    50 |  287   4.66
 COCO |     -    49     -    75    37     -     -     -     -    45 |  288   8.97
 CRO1 |     -    30    22    56    31     -     -    24     -    38 |  288  15.70
 DAKA |     -    74     -     -    44     -     -     -     -     - |  239  23.61
 DARW |     -     -    20     -     -     -     -    25     -     - |  288   4.48
 DAV1 |     -    21     -     -    25     -     -    26     -    37 |  288  14.95
 DRAO |     -    32    17     -     -     -     -    12     -    19 |  288   0.05
 DWH1 |     -    59    30     -     -     -     -    19     -    27 |  288   0.58
 FAIR |     -     -    10    88     X     -     -    26     -    22 |  288   0.12
 FLIN |     -    49     -     -     -     -     -    38     -     - |  279   8.23
 GODE |     -    35    41    59     -     -     -     -     -    11 |  288   0.17
 GOL2 |     -     -    28     -     -     -     -     -     -    38 |  286   0.23
 GOLD |     -    31     -    38     -     -     -    24     -    24 |  288  17.92
 GRAZ |     -     -    13     -     -     -     -     -     -    17 |  288    >>>
 GUAM |     -     -     -    52    19     -     -    34     -    41 |  288  14.37
 HERS |     -     -    17     -     -     -     -     -     -    23 |  241   8.62
 HOB2 |     -    32    22     -     -     -     -     -     -    21 |  288   0.10
 HOLM |     -    21     -     -     -     -     -    16     -     - |  288   9.40
 HRAO |     -    50     -     -    30     -     -    35     -    44 |  288   0.67
 IENG |     -    32    20     -     -     -     -     -     -     - |  288   0.55
 INVK |     -    33     -     -     -     -     -    26     -     - |  288  10.26
 ISPA |     -    35     -     -    21     -     -     -     -     - |  283  28.01
 JAB1 |     -    19     -    31     -     -     -     -     -     - |  288  19.73
 JPLM |     -     -    64     -     -     -     -    97     -    28 |  288    >>>
 KELY |     -    14     -     -     -     -     -    11     -     - |  284   7.80
 KERG |     -     -    22    35    30     -     -     -     -    27 |  288   1.08
 KGN0 |     -    20    27     -     -     -     -     -     -    33 |  287   0.25
 KIRU |     -    27     -    23     -     -     -     -     -    23 |  288   9.33
 KIT3 |     -    34     -    82    34     -     -    45     -    20 |  288  22.12
 KOKB |     -     -     -     -    30     -     -     -     -    43 |  288   0.06
 KOUR |     -    34     -    62     -     -     -    34     -    29 |  288   2.49
 KSTU |     -     -     -     -    80     -     -     -     -   114 |  212   9.55
 KUNM |     -     -     -     -     -     -     -    20     -    22 |  288  26.41
 LAE1 |     -    30     -     -    32     -     -    37     -     X |  287  12.96
 LPGS |     -    65    64   148     X     -     -     -     -    32 |  288  35.92
 MAC1 |     -    70     -    89    27     -     -    31     -    25 |  288  13.13
 MADR |     -     -     -     -     -     -     -    19     -    21 |  288  14.52
 MALI |     -     -     -   122     -     -     -     -     -    63 |  244  28.74
 MAS1 |     -     -    15    50     -     -     -    34     -    21 |  288   1.65
 MATE |     -    59     -     -     -     -     -     -     -    51 |  176   0.04
 MAW1 |     -    36     -     -    24     -     -     -     -    42 |  288  27.24
 MCM4 |     -    37    28     -    28     -     -     -     -     - |  288  25.31
 MDO1 |     -    42    19     -    15     -     -     -     -    17 |  288  37.64
 MEDI |     -     -    17     -     -     -     -    28     -    24 |  288    >>>
 METS |     -    25    17     -     -     -     -     -     -    24 |  287  10.09
 MKEA |     -    61     -    38     -     -     -    32     -    32 |  288  33.07
 NKLG |     -     -     -    35     -     -     -     -     -    18 |  287 497.99
 NLIB |     -     -   135     -     -     -     -    79     -   100 |  287    >>>
 NNOR |     -     -    33    65     -     -     -    35     -    24 |  288  14.66
 NPLD |     -    42    20     -     -     -     -    20     -    27 |  287   0.07
 NRC1 |     -     -    15     -    23     -     -    19     -    22 |  288   0.03
 NRIL |     -    19     -     -    11     -     -     -     -     - |  288  11.31
 NSSP |     -    40     -     -     -     -     -    33     -    18 |  288  15.76
 NYA1 |     -    12     -     -    18     -     -     -     -    27 |  288   0.10
 NYAL |     -     -    24     -     -     -     -     -     -    33 |  288   0.09
 ONSA |     -    32    28    33     -     -     -     -     -     - |  288   0.03
 PDEL |     -    14     -     -     8     -     -     -     -     - |  288  54.47
 PERT |     -    34    25     X    27     -     -     -     -    22 |  288   1.92
 PETP |     -    36     -     -    21     -     -     -     -     - |  287   9.16
 PIE1 |     -    20    16    29     -     -     -    23     -    18 |  288   0.03
 POTS |     -    19     -     -    14     -     -     -     -    20 |  288  22.64
 PRDS |     -     -    12     -     -     -     -     -     -    16 |  288   2.12
 QAQ1 |     -     -     8     -     -     -     -     -     -    11 |  288   5.74
 RBAY |     -    52     -    55     -     -     -     -     -    49 |  288  72.64
 REYK |     -    20     -     -    20     -     -     -     -    18 |  288   6.92
 RIOG |     -    66    26   115    48     -     -     -     -    37 |  288  13.74
 SANT |     -    72     -    84    18     -     -     -     -    24 |  288   6.85
 SCH2 |     -    25    18     -     -     -     -    17     -    16 |  288 127.72
 SFER |     -    90    57     -     -     -     -     -     -     - |  273   0.39
 SPT0 |     -    26    17     -     -     -     -     -     -     - |  259   0.04
 STJO |     -    20    10     -     -     -     -    15     -    15 |  288   0.07
 STR1 |     -     -    14     -     -     -     -     -     -    19 |  288   1.02
 SUTM |     -     -    34     -    32     -     -     -     -     - |  288   3.01
 THTI |     -     -     -    71    38     -     -     -     -    41 |  288   5.17
 THU3 |     -    25    16     -    19     -     -     -     -    33 |  288   8.12
 TIDB |     -    26    18    36     -     -     -     -     -    26 |  288   0.06
 TLSE |     -     -     9     -     -     -     -     -     -    12 |  287   0.54
 TOW2 |     -    38     -     -     -     -     -    30     -     - |  288  11.90
 TWTF |     -    57    32     -     -     -     -    37     -    20 |  288   0.38
 URUM |     -    33     -     -     -     -     -     -     -    28 |  288  19.95
 USN1 |     -    29    36     -     -     -     -    27     -    22 |  288   0.05
 USNO |     -    17    13     -     -     -     -     -     -    13 |  288   0.04
 USUD |     -     -    35    33     -     -     -    24     -    59 |  288  13.41
 VILL |     -    35     -     X     -     -     -     -     -    30 |  288   5.48
 WES2 |     -    22    14     -     -     -     -     -     -    18 |  288   0.07
 WHIT |     -    25     -     -     -     -     -     -     -    21 |  288   1.22
 WTZR |     -    25    16    23     -     -     -     -     -     - |  288   0.07
 YAKT |     -    36     -     -     -     -     -     -     -    31 |  288   0.40
 YAR2 |     -    21    13     -     -     -     -     -     -    16 |  288   6.24
 YELL |     -   114    82    86    65     -     -     -     -   121 |  288   0.04
 ZAMB |     -     -     -     -    32     -     -    41     -     - |  288  11.26
 ZWEN |     -     -     -    27    35     -     -     -     -    47 |  288  15.73
 -----+-------------------------------------------------------------+--------------
 TOT  |  2910    49    32    69    32   115  2915    40     -    42 |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ONSA |   288     0     0   288    9.95   | 3.76e-14  6.07e-15  1.61e-15 |
 AMC2 |   288     0     0   288    9.84   | 3.20e-14  6.90e-15  1.57e-15 |
 NPLD |   287     0     0   286    9.59   | 3.76e-14  6.61e-15  3.58e-15 |
 PIE1 |   288     0     0   288    9.57   | 3.27e-14  7.84e-15  2.29e-15 |
 BRUS |   288     0     0   288    9.09   | 4.06e-14  4.73e-15  1.69e-15 |
 STJO |   288     0     0   288    5.73   | 3.47e-14  6.37e-15  5.71e-15 |
 ALGO |   287     0     0   286    5.00   | 3.49e-14  1.16e-14  2.41e-15 |
 BREW |   288     0     0   143    4.94   | 4.19e-14  7.91e-15  3.53e-15 |
 USN1 |   288     0     0   288    4.89   | 7.36e-14  1.27e-14  2.65e-15 |
 SPT0 |   259     0     0   114    3.93   | 4.63e-14  6.37e-15  2.23e-15 |
 YELL |   288     1     0   287    3.62   | 3.22e-14  4.90e-15  1.69e-15 |
 KOKB |   288     0     0   287    3.42   | 5.98e-14  1.06e-14  3.48e-15 |
 NRC1 |   288     0     0   288    3.17   | 4.16e-14  1.55e-14  3.19e-15 |
 HOB2 |   288     1     0   287    2.72   | 3.78e-14  8.91e-15  7.13e-15 |
 WTZR |   288     0     0   288    2.55   | 4.01e-14  2.08e-14  5.37e-15 |
 ALBH |   288     0     0   288    2.05   | 4.15e-14  8.15e-15  5.50e-15 |
 USNO |   288     0     0   288    2.03   | 4.25e-14  9.13e-15  1.40e-15 |
 FAIR |   288     0     0   288    1.76   | 5.77e-14  1.89e-14  1.19e-14 |
 TIDB |   288     0     0   288    1.63   | 1.83e-13  1.63e-14  4.74e-15 |
 DRAO |   288     0     0   288    1.27   | 5.99e-14  2.02e-14  5.47e-15 |
 NLIB |   287     1     0   285    0.64   | 4.46e-14  1.03e-14  5.95e-15 |
 GODE |   288     0     0   288    0.29   | 4.54e-14  1.08e-14  1.07e-14 |
 GOL2 |   286     1     0   139    0.25   | 3.52e-14  6.20e-15  4.97e-15 |
 MATE |   176     0     0    29    0.18   | 4.63e-14  9.46e-15         - |
 G16  |   288     0     0   288    0.15   | 5.01e-13  6.33e-14  2.49e-14 |
 BAHR |   288     0     0   288    0.14   | 3.32e-13  9.86e-14  2.14e-14 |
 NYA1 |   288     0     0   288    0.14   | 2.81e-14  8.28e-15  9.21e-15 |
 KGN0 |   287     0     0   286    0.12   | 3.49e-13  7.96e-14  2.52e-14 |
 G17  |   288     0     0   288    0.09   | 4.23e-13  1.05e-13  6.23e-14 |
 SFER |   273     0     0   269    0.09   | 3.94e-13  1.34e-13  4.03e-14 |
 G30  |   288     0     0   288    0.09   | 3.18e-13  1.09e-13  7.95e-14 |
 TWTF |   288     0     0   288    0.08   | 3.99e-13  9.68e-14  3.94e-14 |
 G27  |   288     0     0   288    0.08   | 3.56e-13  8.95e-14  7.20e-14 |
 WES2 |   288     0     0   288    0.08   | 3.93e-14  1.11e-14  6.05e-15 |
 G29  |   288     1     0   287    0.08   | 3.76e-13  1.35e-13  8.60e-14 |
 G26  |   288     0     0   288    0.08   | 3.37e-13  1.18e-13  6.16e-14 |
 G22  |   288     0     4    74    0.07   | 6.11e-13  6.37e-14  3.11e-14 |
 G07  |   288     0     0   288    0.07   | 3.47e-13  9.79e-14  7.09e-14 |
 NYAL |   288     0     0   143    0.06   | 3.77e-14  8.20e-15  8.85e-15 |
 G19  |   288     0     0   251    0.06   | 6.34e-13  9.58e-14  3.10e-14 |
 DWH1 |   288     0     0   288    0.06   | 4.86e-13  1.48e-13  4.64e-14 |
 G04  |   288     0     0   288    0.06   | 4.39e-13  1.05e-13  8.87e-14 |
 BOR1 |   288     0     0   288    0.06   | 4.68e-13  1.32e-13  4.77e-14 |
 YAKT |   288     0     0   287    0.05   | 4.28e-13  1.20e-13  3.95e-14 |
 TLSE |   287     0     0   141    0.03   | 3.83e-13  1.05e-13  6.53e-14 |
 G06  |   288     0     0   288    0.02   | 4.09e-13  1.51e-13  1.45e-13 |
 HRAO |   288     0     0   288    0.02   | 1.17e-13  2.84e-14  6.35e-14 |
 STR1 |   288     0     0   143    0.01   | 7.00e-13  1.69e-13  7.54e-14 |
 G31  |   277     0     0   275    0.01   | 2.26e-13  1.76e-13  1.75e-13 |
 IENG |   288     0     0   143    0.01   | 5.32e-13  1.38e-13  6.70e-14 |
 G09  |   288     0     2   162    0.01   | 1.32e-12  4.30e-13  9.39e-14 |
 G10  |   288     0     0   288    0.01   | 1.21e-12  3.17e-13  1.91e-13 |
 KOUR |   288     0     0   288    0.01   | 1.39e-12  3.54e-13  1.67e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.81e-12  4.45e-13  1.47e-13 |
 G25  |   288     0     0   288    0.00   | 1.37e-12  4.49e-13  1.83e-13 |
 PRDS |   288     0     0   288    0.00   | 1.48e-12  4.49e-13  1.80e-13 |
 KERG |   288     0     0   143    0.00   | 1.33e-12  3.53e-13  1.00e-13 |
 SUTM |   288     0     0   288    0.00   | 6.82e-13  2.00e-13  1.74e-13 |
 GPST |   288     0     0     0    0.00   | 2.54e-14  8.43e-15  1.74e-15 |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 DAKA |   239     0     0     0    0.00   |        -         -         - |
 CHAT |   251     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.47e-13  7.68e-14  2.78e-14 |
 G24  |   288     0     0     0    0.00   | 1.30e-12  4.84e-13  3.18e-13 |
 G21  |   288     1     6     0    0.00   | 9.74e-13  1.11e-13  2.67e-14 |
 G20  |   288     0     6     0    0.00   | 7.06e-13  8.25e-14  2.09e-14 |
 G18  |   288     1     6     0    0.00   | 1.38e-12  1.69e-13  4.12e-14 |
 G15  |   288     0     0     0    0.00   | 1.58e-12  4.68e-13  1.72e-13 |
 G14  |   288     0     6     0    0.00   | 6.44e-13  7.38e-14  1.90e-14 |
 G13  |   288     0     6     0    0.00   | 5.85e-13  6.64e-14  2.33e-14 |
 G11  |   288     0     6     0    0.00   | 6.17e-13  6.11e-14  3.97e-14 |
 G08  |   288     0     0     0    0.00   | 4.61e-13  3.95e-13  4.85e-13 |
 G05  |   288     0     0     0    0.00   | 1.25e-12  4.41e-13  3.05e-13 |
 G03  |   278     0     0     0    0.00   | 1.24e-12  4.73e-13  2.41e-13 |
 G01  |   288     0     0     0    0.00   | 1.40e-12  6.40e-13  2.77e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 ZAMB |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     2     0    0.00   | 1.22e-12  1.32e-12  5.58e-13 |
 WHIT |   288     0     0     0    0.00   | 4.79e-13  1.48e-13  1.21e-13 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     2     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.68e-13  1.50e-13  3.69e-13 |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 RBAY |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.66e-12  4.91e-13  1.57e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MEDI |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     2     0    0.00   | 5.97e-13  5.84e-13  2.20e-12 |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MALI |   244     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KSTU |   212     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 KELY |   284     0     0     0    0.00   |        -         -         - |
 JPLM |   288     1     0     0    0.00   | 5.58e-13  3.04e-13  5.34e-13 |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   283     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 HOLM |   288     1     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   279     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.62e-13  4.79e-13  5.23e-13 |
 CRO1 |   288     1     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   287     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   276     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASC1 |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.67e-17  1.99e-16  1.19e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      BRUS      USNO |
------------------------------------------+------------------------------+
