
 GPS week: 1268   Day: 1   MJD: 53121                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2681      6     0.09    -0.34     3.25     0.00
 cod |   288     0  26976    280     0.08    -0.51     0.05    17.45
 emr |   288     0  24226    575  3298.37    33.02     0.06    15.57
 esa |   288     0  17883   1697  3297.33    33.13     0.07    12.77
 gfz |   288     0  21141    321    -0.31     0.24     0.04    21.86
 iga |    96     0   2584    141     0.05    -0.30     0.10     0.00
 igu |    96     0   2681      0     0.12    -0.38     2.72     0.00
 jpl |   288     0  16370    537    -8.22     3.76     0.05    19.92
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  33719   3114 -1802.26   -27.55     0.07    12.43

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -1064  -131  -201   283    -9   -65   960  -181     -   186 |
    3 | -2633   -68  -189   248   163  -136 -5012   -81     -  -153 |
    4 | -1548   -86  -187   226    58    34  1223    20     -    -8 |
    5 | -8322    91    83    82  -104   137 -5480   133     -  -152 |
    6 | -2509    61   -69    74     2   -97-13323    63     -  -178 |
    7 | -1263    21   -81   -41    -7   149   630   113     -   -49 |
    8 | -2684    39   -98   264   -94    20 -8745   -50     -   -30 |
    9 |  -895    53    35    19    86   -89  2487   132     -  -305 |
   10 | -1827   -92    -6     2   108    77  3146    57     -   -63 |
   11 |  3532   -98  -172   259    24    -9   347  -100     -   191 |
   13 |  6070   113  -128    73   -52  -108  1755  -111     -    34 |
   14 |  3715   179     1  -309   -45   -96  -101   137     -   -57 |
   15 |-12186    26   -70   -58    82   134   979   121     -   -49 |
   16 |  4757    19    71   -60    18   286   947   121     -  -101 |
   17 |  -660    21   -51  -137    86    93  4040    83     -   -99 |
   18 |  3454   103   -64   -77   -14   -87  1125   144     -  -173 |
   19 |  4879  -159  -151   309    74  -132   917   -38     -   -31 |
   20 |  2613  -122  -155   407   -31   -60  1579    -5     -    10 |
   21 |  3278    89   -45    73  -102    31   316    65     -   -60 |
   22 |  4037   101   -39  -173    33   114  9374    71     -    18 |
   24 |  1508    16   -37    24   -11    41  2578    85     -     6 |
   25 |  5754    97   -13  -238   130  -160  1399    58     -  -112 |
   26 |  2428   -59   -31  -137   120    80  -497    95     -   -88 |
   27 | -1526   -80  -269   383    57  -125  4546   -77     -   -33 |
   28 |   516     5    37   -62     2   182 -2620   -32     -    54 |
   29 |  -403   -63   -35     X    69     -  1694    19     -   -17 |
   30 | -5206   144     X  -392   108  -275  -211     X     -     X |
   31 | -4165   -54  -113   325    87   -11 -4029  -101     -   -47 |
 -----+-------------------------------------------------------------+
 ALBH |     -     3    45     -     -     -     -    23     -   -99 |
 ALGO |     -     -    46     X     -     -     -    22     -   -93 |
 AMC2 |     -   -55   160     -     -     -     -   -76     -     X |
 ARTU |     -    89     -    72    39     -     -  -167     -     - |
 ASC1 |     -    -9     -     -   -29     -     -     -     -    64 |
 AUCK |     -    10     -     X     -     -     -     -     -   -15 |
 BAN2 |     -     -   -15     -     -     -     -     -     -    19 |
 BILI |     -    41     -     -   -38     -     -     5     -     - |
 BOGT |     -     7     -    -9     -     -     -     -     -     X |
 BOR1 |     -    14    45     -     -     -     -     -     -   -76 |
 BREW |     -     -   -38     -     -     -     -     -     -    48 |
 BRUS |     -    39    62     -     -     -     -   -87     -     6 |
 CAS1 |     -    14     -    56   -70     -     -    48     -   -32 |
 CEDU |     -     3     -   239     -     -     -   -36     -  -192 |
 CHUR |     -     -   -42     -     -     -     -     -     -    52 |
 COCO |     -   -66     -   116    59     -     -   -34     -   -76 |
 CRO1 |     -    29   -50   -16   100     -     -    18     -  -183 |
 DAEJ |     -    40   -45     -     -     -     -     -     -     X |
 DARW |     -     -    33     -     -     -     -   -26     -     - |
 DAV1 |     -    54     -     -   -30     -     -     -     -   -24 |
 DRAO |     -    32  -119     -     -     -     -   119     -   -87 |
 DWH1 |     -   337    14     -     -     -     -  -274     -   -51 |
 FAIR |     -    36   118  -249    59     -     -   -55     -    42 |
 FORT |     -   234   -54     -   -12     -     -     -     -  -226 |
 GODE |     -  -136    75   152     -     -     -     -     -   -59 |
 GOL2 |     -     -   -25     -     -     -     -     -     -    32 |
 GOLD |     -    29     -  -105     -     -     -   -36     -   126 |
 GUAM |     -   -45     -     X   -25     -     -     X     -   108 |
 GUAT |     -   122     -     -   -97     -     -     -     -     X |
 HERS |     -     -   125     -     -     -     -     -     -  -156 |
 HOB2 |     -    64   -98     -     -     -     -     -     -    33 |
 HOFN |     -     -     -     -  -103     -     -   113     -     - |
 HRAO |     -  -109     -     -   -61     -     -     0     -   260 |
 IENG |     -  -142   159     -     -     -     -     -     -     - |
 ISPA |     -    39     -     -   -31     -     -     -     -     - |
 JAB1 |     -   -40     -    54     -     -     -     -     -     - |
 JPLM |     -     -    34     -     -     -     -     -     -   -43 |
 KGN0 |     -     4    -4     -     -     -     -     -     -     X |
 KIRU |     -   -55     -    81     -     -     -     0     -    -7 |
 KIT3 |     -     -     -   -13    50     -     -   -67     -    32 |
 KOKB |     -     -     -     -    58     -     -     -     -  -103 |
 KOUR |     -   157     -  -609   181     -     -     -     -    69 |
 KSTU |     -     -     -   -43     -     -     -     0     -    51 |
 KUNM |     -     -     -     -     -     -     -   -12     -    19 |
 LAE1 |     -     -     -     -   -80     -     -   114     -   -50 |
 LHAS |     -     -     -  -168   -10     -     -     -     -   190 |
 LPGS |     -    25    58   -61     X     -     -   -27     -     1 |
 MAC1 |     -   -80     -   169   -42     -     -     -     -    13 |
 MAS1 |     -     1   227  -406   -55     -     -   140     -     3 |
 MAW1 |     -     -     -     -   -44     -     -    30     -    30 |
 MCM4 |     -     -     -     -   -19     -     -     -     -    34 |
 MDO1 |     -    75   -58     -   -31     -     -     -     -    21 |
 METS |     -   -58    31     -     -     -     -     -     -    43 |
 MIZU |     -     -    77  -448     -     -     -     -     -   255 |
 MKEA |     -     -     -    -7    45     -     -   -44     -     X |
 NLIB |     -     -    63     -     -     -     -    11     -   -97 |
 NNOR |     -     -   122   124     -     -     -  -184     -    14 |
 NPLD |     -   -99   111     -     -     -     -     -     -     X |
 NRC1 |     -    48    10     -    27     -     -   -79     -     X |
 NRIL |     -    30     -     -   -98     -     -    -8     -   142 |
 NSSP |     -     -     -     -     -     -     -   -26     -    41 |
 NYA1 |     -    68     -     -   -55     -     -     -     -     X |
 NYAL |     -     -    52     -     -     -     -     -     -   -65 |
 OHI2 |     -    70     -     -   -63     -     -     8     -     - |
 ONSA |     -     -    53   -65     -     -     -     -     -     - |
 PDEL |     -     3     -     -  -196     -     -   213     -     - |
 PERT |     -     -   -23  -414   235     -     -     -     -    40 |
 PETP |     -   -31     -     -    31     -     -    -7     -     - |
 PIE1 |     -    98    13  -143     -     -     -    43     -   -75 |
 POTS |     -   -88     -     -    18     -     -     -     -    93 |
 PRDS |     -  -165    22     -     -     -     -     -     -   204 |
 PTBB |     -   -41    46     -     -     -     -     -     -     0 |
 QAQ1 |     -     -   -26     -     -     -     -     -     -    33 |
 RIOG |     -     7   -28   206   -77     -     -     -     -   -52 |
 SANT |     -     X     -   258  -330     -     -     -     -   250 |
 SCH2 |     -     -    62     -     -     -     -     -     -   -78 |
 SEY1 |     -   -31     -     -   -41     -     -     -     -   115 |
 SFER |     -   -92   -24     -     -     -     -     -     -   160 |
 SPT0 |     -  -178    60     -     -     -     -     -     -   207 |
 STJO |     -     -   -78     -     -     -     -     -     -    97 |
 STR1 |     -     -    98     -     -     -     -     -     -  -122 |
 SUTM |     -     -   204     -  -146     -     -     -     -     - |
 THU3 |     -   -66   -16     -   -16     -     -     -     -   141 |
 TID1 |     -     -     -     -     -     -     -   -28     -    45 |
 TIDB |     -   -15     8    99   -38     -     -     -     -   -24 |
 TOW2 |     -    -4     -     -     -     -     -   -32     -    57 |
 TRO1 |     -  -121     X     -    97     -     -     -     -     X |
 TSKB |     -   -56    41     -    22     -     -     -     -   -12 |
 UNSA |     -     -     -     -     -     -     -    54     -   -86 |
 URUM |     -  -102     -     -     -     -     -     -     -   144 |
 USN1 |     -   194   269     -     -     -     -  -412     -    52 |
 USNO |     -     -   -41     -     -     -     -     -     -    51 |
 USUD |     -     -   -83   175     -     -     -  -110     -   100 |
 VILL |     -    52     -  -190     -     -     -     -     -   123 |
 WES2 |     -     -    67     -     -     -     -     -     -   -84 |
 WHIT |     -   -97     -     -     -     -     -     -     -   137 |
 WTZA |     -   -58     -     -     -     -     -     -     -    81 |
 WTZR |     -   -40   248  -201     -     -     -     -     -   -49 |
 WUHN |     -     -   -95     -   194     -     -     -     -  -223 |
 YAKT |     -  -111     -     -     -     -     -     0     -   156 |
 YAR2 |     -    17    -1     -     -     -     -     -     -   -22 |
 YELL |     -    38    62   -53   -15     -     -     -     -   -50 |
 ZAMB |     -   -63     -     -    50     -     -     -     -     - |
 ZWEN |     -     -     -     X  -282     -     -   387     -  -124 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  9372    47    33    38    21    74  5026    64     -    47 |  288   5.78
    3 |  3768   160   103   149   131   140  2907   114     -   109 |  288   3.11
    4 |  1305    35    39    38    22    61  1163    43     -    50 |  288   0.95
    5 |  2558    67   125    60    56    48  2039    69     -    62 |  288   1.47
    6 |  1986   137    52    98    98    55  7760    65     -    68 |  288   1.45
    7 |  3113   162    77   138   103   183  1027    98     -    96 |  282   0.72
    8 |  3848    36    49    33    22    86  3695    25     -    65 |  288   3.92
    9 |  1742    59    61    55    61    51  1641    39     -   131 |  288   1.44
   10 |  3633    52    58    89    35    58  3158    78     -    61 |  288   2.08
   11 |  1413    87   122   102    66    67  1401    53     -    87 |  288   0.67
   13 |  1802    51    23    48    15   101  1987    47     -    61 |  288   0.36
   14 |   839    76    82   103    47    68   672    64     -   104 |  288   0.18
   15 |  2231    34    49    65    42    81  1782    49     -    59 |  288   2.09
   16 |   912    38    94    78    32   159  1096    50     -    55 |  288   0.25
   17 |  1048    36    50    48    22    94  2789    33     -    58 |  288   0.78
   18 |  1203    42    38    58    28    52   998    27     -    72 |  288   0.40
   19 |   810   114   153    71    60    89   883    60     -    77 |  288   0.52
   20 |   650    54    30    46    32    53  1450    36     -    74 |  288   0.18
   21 |   776    53    85    42    33    63   675    26     -    69 |  288   0.28
   22 |  4819    40    55    74    30    53  4513    75     -    67 |  288   0.25
   24 |  7829    30    25    37    34    42  3485    42     -    42 |  288   1.53
   25 |  3514    41   100   116    71    43  1772   115     -    67 |  288   2.02
   26 |  2860    56    29   100    52    30  1170    55     -    67 |  288   0.71
   27 |  3237    40    47    44    27    77  3449    34     -    57 |  288   0.56
   28 |  2879    44    38    86    44   105  2449    31     -    71 |  288   0.39
   29 |  1084    82    60     X    77     -   648    49     -    57 |  288   0.96
   30 |  2440    23     X    50    25   290   576     X     -     X |  273   0.75
   31 |  1375   154   136   106    53    86  2013    80     -    46 |  288   0.61
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    37    47     -     -     -     -    36     -   120 |  288   0.11
 ALGO |     -     -    16     X     -     -     -    19     -    20 |  288   0.03
 AMC2 |     -    33    39     -     -     -     -    40     -     X |  288   0.05
 ARTU |     -    25     -    23    37     -     -    33     -     - |  288  13.79
 ASC1 |     -    30     -     -    16     -     -     -     -    42 |  288    >>>
 AUCK |     -    21     -     X     -     -     -     -     -    30 |  264  11.10
 BAN2 |     -     -    29     -     -     -     -     -     -    36 |  287  18.55
 BILI |     -    28     -     -    22     -     -    13     -     - |  286   8.20
 BOGT |     -    31     -    42     -     -     -     -     -     X |   79   5.63
 BOR1 |     -    36    90     -     -     -     -     -     -   120 |  288   4.43
 BREW |     -     -    22     -     -     -     -     -     -    28 |  288   0.05
 BRUS |     -    70    67     -     -     -     -    43     -   177 |  288   0.05
 CAS1 |     -    25     -    67    31     -     -    22     -    84 |  288   7.97
 CEDU |     -    35     -    41     -     -     -    25     -    33 |  288  13.32
 CHUR |     -     -    51     -     -     -     -     -     -    64 |  288   2.43
 COCO |     -    29     -    87    26     -     -    25     -    92 |  288   9.21
 CRO1 |     -    48    23    61    50     -     -    32     -    98 |  288  14.76
 DAEJ |     -    47    53     -     -     -     -     -     -     X |  284   2.27
 DARW |     -     -    35     -     -     -     -    27     -     - |  288   3.23
 DAV1 |     -    22     -     -    20     -     -     -     -    51 |  288  13.68
 DRAO |     -    16    16     -     -     -     -    28     -    34 |  288   0.07
 DWH1 |     -    20    53     -     -     -     -    36     -    23 |  288   0.48
 FAIR |     -    44    29    53    22     -     -    21     -    41 |  288   0.13
 FORT |     -    61    81     -    64     -     -     -     -    65 |  288   0.39
 GODE |     -    50    45    38     -     -     -     -     -    27 |  288   0.12
 GOL2 |     -     -    16     -     -     -     -     -     -    20 |  288   0.31
 GOLD |     -    32     -   112     -     -     -    54     -    31 |  288  17.14
 GUAM |     -    48     -     X    53     -     -     X     -    41 |  288  11.18
 GUAT |     -    78     -     -    62     -     -     -     -     X |  281    >>>
 HERS |     -     -   103     -     -     -     -     -     -   129 |  235   7.69
 HOB2 |     -    20    50     -     -     -     -     -     -    73 |  288   0.09
 HOFN |     -     -     -     -    17     -     -    19     -     - |  288    >>>
 HRAO |     -    64     -     -    16     -     -    49     -    35 |  288   0.66
 IENG |     -    35    39     -     -     -     -     -     -     - |  288   0.69
 ISPA |     -    67     -     -    54     -     -     -     -     - |  283  17.26
 JAB1 |     -    16     -    22     -     -     -     -     -     - |  288  18.49
 JPLM |     -     -    95     -     -     -     -     -     -   119 |  288   3.24
 KGN0 |     -    39    44     -     -     -     -     -     -     X |  287   0.60
 KIRU |     -    47     -    34     -     -     -    27     -    72 |  288  11.33
 KIT3 |     -     -     -    37    45     -     -    39     -    39 |  288  24.53
 KOKB |     -     -     -     -    25     -     -     -     -    43 |  288   0.08
 KOUR |     -    29     -    41    19     -     -     -     -    36 |  288   2.09
 KSTU |     -     -     -   106     -     -     -    33     -   110 |  286  11.90
 KUNM |     -     -     -     -     -     -     -   104     -   166 |  288  45.88
 LAE1 |     -     -     -     -    43     -     -    45     -   150 |  287  12.54
 LHAS |     -     -     -    22    18     -     -     -     -    26 |  288  12.95
 LPGS |     -    85    42    51     X     -     -    40     -    20 |  288  42.32
 MAC1 |     -    44     -    70    28     -     -     -     -    48 |  288  12.03
 MAS1 |     -    43    55    27    21     -     -    68     -    26 |  288   2.07
 MAW1 |     -     -     -     -    43     -     -    69     -    42 |  288  27.10
 MCM4 |     -     -     -     -    26     -     -     -     -    45 |  224  40.11
 MDO1 |     -    22    39     -    25     -     -     -     -    16 |  288  23.14
 METS |     -    64    78     -     -     -     -     -     -   172 |  287  10.08
 MIZU |     -     -    41    69     -     -     -     -     -    22 |  288   0.37
 MKEA |     -     -     -   110    31     -     -    58     -     X |  288  33.89
 NLIB |     -     -    34     -     -     -     -    25     -    30 |  288    >>>
 NNOR |     -     -    46    58     -     -     -    23     -    38 |  288  16.03
 NPLD |     -    28    32     -     -     -     -     -     -     X |  287   0.04
 NRC1 |     -    47    16     -    35     -     -    20     -     X |  288   0.05
 NRIL |     -    48     -     -    46     -     -    20     -    31 |  288  12.97
 NSSP |     -     -     -     -     -     -     -   120     -   192 |  287  15.56
 NYA1 |     -    27     -     -    21     -     -     -     -     X |  288   0.06
 NYAL |     -     -    26     -     -     -     -     -     -    32 |  288  22.67
 OHI2 |     -    46     -     -    17     -     -    39     -     - |  288   7.42
 ONSA |     -     -    24    29     -     -     -     -     -     - |  286   0.05
 PDEL |     -    24     -     -    24     -     -    27     -     - |  288  55.31
 PERT |     -     -    35    59    29     -     -     -     -    76 |  288   1.53
 PETP |     -    36     -     -    24     -     -    17     -     - |  287   8.63
 PIE1 |     -    33    43    37     -     -     -    35     -    36 |  288   0.05
 POTS |     -    43     -     -    61     -     -     -     -    77 |  288  23.01
 PRDS |     -    29    34     -     -     -     -     -     -    70 |  288   1.50
 PTBB |     -    66    67     -     -     -     -     -     -   172 |  288   0.46
 QAQ1 |     -     -    21     -     -     -     -     -     -    27 |  288   5.71
 RIOG |     -    59    22    71    27     -     -     -     -    37 |  288  14.43
 SANT |     -     X     -    38    25     -     -     -     -    25 |  287   8.21
 SCH2 |     -     -    29     -     -     -     -     -     -    37 |  288  37.47
 SEY1 |     -    39     -     -    19     -     -     -     -    62 |  288  24.39
 SFER |     -    34    84     -     -     -     -     -     -   135 |  287   0.50
 SPT0 |     -    50    61     -     -     -     -     -     -    49 |  288   0.09
 STJO |     -     -    41     -     -     -     -     -     -    52 |  288   0.08
 STR1 |     -     -    34     -     -     -     -     -     -    43 |  288   0.94
 SUTM |     -     -    47     -    33     -     -     -     -     - |  288   2.56
 THU3 |     -    27    35     -    18     -     -     -     -    34 |  288   7.32
 TID1 |     -     -     -     -     -     -     -    18     -    28 |  288   0.05
 TIDB |     -    39    41    45    37     -     -     -     -    44 |  288   0.06
 TOW2 |     -    22     -     -     -     -     -    29     -    50 |  288  11.64
 TRO1 |     -    30     X     -    24     -     -     -     -     X |  287   8.73
 TSKB |     -    62    41     -    46     -     -     -     -    59 |  288  12.67
 UNSA |     -     -     -     -     -     -     -    14     -    22 |  288  20.77
 URUM |     -    13     -     -     -     -     -     -     -    18 |  288  14.53
 USN1 |     -    34    41     -     -     -     -    39     -    32 |  288   0.05
 USNO |     -     -    12     -     -     -     -     -     -    15 |  175   0.08
 USUD |     -     -    58    85     -     -     -    28     -    25 |  288  18.33
 VILL |     -    26     -    21     -     -     -     -     -    33 |  288   6.50
 WES2 |     -     -    17     -     -     -     -     -     -    21 |  288   0.05
 WHIT |     -    18     -     -     -     -     -     -     -    25 |  288   2.88
 WTZA |     -    21     -     -     -     -     -     -     -    30 |  286   0.57
 WTZR |     -    32    38    44     -     -     -     -     -    33 |  288   0.08
 WUHN |     -     -    66     -    50     -     -     -     -    58 |  287  18.12
 YAKT |     -    25     -     -     -     -     -    24     -    35 |  288   0.52
 YAR2 |     -    19    26     -     -     -     -     -     -    20 |  288   6.76
 YELL |     -    24    17    38    56     -     -     -     -    70 |  288   0.10
 ZAMB |     -    54     -     -    43     -     -     -     -     - |  274  11.25
 ZWEN |     -     -     -     X    64     -     -    28     -   100 |  288  17.12
 -----+-------------------------------------------------------------+--------------
 TOT  |  3252    54    58    68    45    97  2724    45     -    71 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288    9.98   | 3.36e-14  5.38e-15  1.57e-15 |
 ONSA |   286     0     0   285    9.87   | 3.84e-14  4.99e-15  4.15e-15 |
 BRUS |   288     0     0   288    9.84   | 4.01e-14  7.01e-15  2.44e-15 |
 PIE1 |   288     0     0   288    8.49   | 3.36e-14  6.26e-15  2.28e-15 |
 NPLD |   287     0     0   286    6.98   | 4.12e-14  7.54e-15  2.27e-15 |
 STJO |   288     0     0   288    5.57   | 3.88e-14  5.30e-15  2.99e-15 |
 USN1 |   288     0     0   288    5.05   | 7.47e-14  1.64e-14  3.25e-15 |
 SPT0 |   288     0     0   143    4.94   | 4.22e-14  1.13e-14  6.52e-15 |
 BREW |   288     0     0   143    4.94   | 4.14e-14  7.37e-15  2.49e-15 |
 ALGO |   288     0     0   288    3.81   | 3.61e-14  8.00e-15  3.47e-15 |
 KOKB |   288     0     0   288    3.75   | 8.90e-14  1.72e-14  6.46e-15 |
 TID1 |   288     0     0   288    3.48   | 4.88e-14  6.69e-15  1.76e-15 |
 NRC1 |   288     0     0   288    3.21   | 3.76e-14  1.31e-14  3.49e-15 |
 YELL |   288     0     0   288    3.20   | 3.44e-14  6.64e-15  5.06e-15 |
 ALBH |   288     0     0   288    2.86   | 4.41e-14  6.75e-15  5.70e-15 |
 WTZR |   288     0     0   288    2.41   | 4.32e-14  2.22e-14  9.44e-15 |
 HOB2 |   288     0     0   288    2.28   | 4.26e-14  1.75e-14  8.68e-15 |
 FAIR |   288     0     0   288    1.63   | 5.21e-14  1.44e-14  7.60e-15 |
 DRAO |   288     0     0   288    1.56   | 6.42e-14  2.00e-14  7.69e-15 |
 TIDB |   288     0     0   288    1.56   | 1.71e-13  1.53e-14  3.19e-15 |
 USNO |   175     0     0   175    0.69   | 5.28e-14  1.45e-14         - |
 NLIB |   288     1     0   287    0.66   | 4.20e-14  8.35e-15  5.37e-15 |
 FORT |   288     0     0   288    0.42   | 5.02e-14  3.32e-14  4.35e-14 |
 GODE |   288     0     0   288    0.41   | 5.37e-14  1.45e-14  6.42e-15 |
 GOL2 |   288     2     0   142    0.25   | 3.43e-14  6.68e-15  3.38e-15 |
 NYA1 |   288     0     0   288    0.23   | 3.16e-14  1.11e-14  7.57e-15 |
 PTBB |   288     0     0   288    0.18   | 3.49e-13  7.08e-14  3.76e-14 |
 G14  |   288     0     2   114    0.15   | 6.15e-13  7.84e-14  1.41e-14 |
 G16  |   288     0     0   237    0.15   | 4.46e-13  5.45e-14  2.43e-14 |
 MIZU |   288     0     0   288    0.13   | 3.44e-13  1.05e-13  4.31e-14 |
 KGN0 |   287     0     0   286    0.12   | 3.67e-13  8.39e-14  6.31e-14 |
 SFER |   287     0     0   286    0.10   | 3.66e-13  1.06e-13  4.73e-14 |
 NYAL |   288     1     0   142    0.10   | 3.70e-14  9.80e-15  5.28e-15 |
 G27  |   288     0     0   288    0.09   | 3.00e-13  9.66e-14  3.87e-14 |
 G13  |   288     0     6    46    0.09   | 5.00e-13  5.12e-14  3.86e-14 |
 G29  |   288     0     0   288    0.08   | 3.69e-13  1.02e-13  8.04e-14 |
 G19  |   288     0     0   288    0.07   | 6.15e-13  9.34e-14  3.64e-14 |
 G22  |   288     0     3    75    0.07   | 5.73e-13  6.00e-14  2.46e-14 |
 BOR1 |   288     1     0   287    0.06   | 4.59e-13  1.31e-13  3.30e-14 |
 DWH1 |   288     0     0   288    0.05   | 4.83e-13  1.45e-13  3.98e-14 |
 G30  |   273     0     0   271    0.05   | 3.35e-13  1.37e-13  9.08e-14 |
 G17  |   288     0     0   288    0.05   | 4.25e-13  1.24e-13  9.82e-14 |
 G31  |   288     0     0   288    0.05   | 2.13e-13  1.38e-13  5.19e-14 |
 YAKT |   288     0     0   288    0.05   | 4.43e-13  1.09e-13  5.71e-14 |
 G07  |   282     0     0   281    0.04   | 2.87e-13  1.14e-13  8.43e-14 |
 G04  |   288     0     0   288    0.04   | 4.57e-13  1.19e-13  1.12e-13 |
 G26  |   288     0     0   288    0.04   | 3.77e-13  1.12e-13  7.15e-14 |
 WES2 |   288     0     0   143    0.03   | 4.58e-14  1.25e-14  2.24e-15 |
 WTZA |   286     0     0   141    0.03   | 3.98e-13  8.75e-14  5.48e-14 |
 G06  |   288     0     0   288    0.03   | 4.07e-13  1.78e-13  1.32e-13 |
 HRAO |   288     0     0   288    0.03   | 1.18e-13  3.44e-14  7.07e-14 |
 STR1 |   288     0     0   143    0.02   | 6.31e-13  1.76e-13  6.81e-14 |
 IENG |   288     0     0   143    0.01   | 5.14e-13  1.44e-13  5.93e-14 |
 G24  |   288     0     0   288    0.01   | 1.40e-12  3.75e-13  1.19e-13 |
 TSKB |   288     1     0   143    0.01   | 9.68e-13  2.49e-13  8.56e-14 |
 G25  |   288     0     0   288    0.01   | 1.41e-12  4.26e-13  1.99e-13 |
 G05  |   288     0     0   288    0.01   | 1.37e-12  4.56e-13  1.50e-13 |
 KOUR |   288     0     0   288    0.01   | 1.33e-12  3.78e-13  1.83e-13 |
 G09  |   288     0     0   194    0.01   | 1.26e-12  4.95e-13  1.61e-13 |
 G10  |   288     0     0   288    0.01   | 1.23e-12  4.04e-13  2.56e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.94e-12  4.84e-13  1.38e-13 |
 PRDS |   288     0     0   143    0.00   | 1.42e-12  3.98e-13  1.18e-13 |
 DAEJ |   284     0     2    79    0.00   | 1.49e-12  4.31e-13  1.78e-13 |
 SUTM |   288     0     0   288    0.00   | 6.73e-13  2.23e-13  1.33e-13 |
 WHIT |   288     0     0   288    0.00   | 4.40e-13  2.21e-13  1.50e-13 |
 GPST |   288     0     0     0    0.00   | 2.05e-14  6.16e-15  2.43e-15 |
 BOGT |    79     0     0     0    0.00   |        -         -         - |
 MCM4 |   224     0     1     0    0.00   | 6.37e-13  8.00e-13         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HERS |   235     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     5     0    0.00   | 5.49e-13  6.97e-14  3.15e-14 |
 G21  |   288     2     6     0    0.00   | 9.32e-13  1.73e-13  6.62e-14 |
 G20  |   288     0     6     0    0.00   | 6.11e-13  7.23e-14  1.35e-14 |
 G18  |   288     0     6     0    0.00   | 1.44e-12  1.32e-13  4.05e-14 |
 G15  |   288     0     0     0    0.00   | 1.64e-12  5.79e-13  2.32e-13 |
 G11  |   288     0     3     0    0.00   | 6.34e-13  6.55e-14  7.01e-14 |
 G08  |   288     0     0     0    0.00   | 4.23e-13  3.24e-13  4.38e-13 |
 G03  |   288     0     0     0    0.00   | 1.33e-12  4.88e-13  3.80e-13 |
 G01  |   288     0     0     0    0.00   | 1.49e-12  6.12e-13  6.55e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 ZAMB |   274     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     2     0    0.00   | 1.04e-12  1.48e-12  5.80e-13 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     2     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   287     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   287     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.88e-12  4.17e-13  1.08e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   287     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KSTU |   286     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     2     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.75e-13  2.35e-13  1.52e-13 |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   283     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   281     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.40e-13  4.04e-13  3.79e-13 |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   287     0     0     0    0.00   |        -         -         - |
 ASC1 |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.30e-17  2.76e-16  1.65e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      ONSA      AMC2 |
------------------------------------------+------------------------------+
