
 GPS week: 1270   Day: 5   MJD: 53139                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2682      0    -0.24     0.27     3.06     0.00
 cod |   288     0  27958    323    -0.33     0.05     0.04    19.43
 esa |   288     0  18605   3120    34.05    17.35     0.08     6.91
 gfz |   288     0  20600    264    -0.42     0.44     0.04    22.41
 iga |    96     0   2682    105    -0.27     0.20     0.06     0.00
 igu |    96     0   2682      3    -0.30     0.40     3.37     0.00
 jpl |   288     0  16879      0    -1.11     2.24     0.03    30.41
 ngs |    96     0   2682      0    -0.23     0.26     2.95     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     1  30919    585  3789.15    27.05     0.04    20.84

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  4374   -40   -37    58   -42  1985   -47  4067     -    52 |
    3 | -6860    99     X    34  -138  6804   -18 -6087     -  -124 |
    4 |   809    11    20  -149    23 -3534    49   523     -   136 |
    5 |-10284     8   -25    66    99 -2702   104 -9636     -  -206 |
    6 | -7245   117   160   -21   -55-12198    85 -6477     -  -158 |
    7 | -1570  -122    49    97    29  -290    82 -1534     -  -110 |
    8 | -8702    50   142  -122   145 -1206    28 -7921     -     2 |
    9 |  3182   -40  -238    37   -85 10633    93  2298     -   -62 |
   10 |   487    22   -87    37    28 -1079    37   -30     -   -80 |
   11 |  3682    48     X    -8   -69   891    21  3556     -   -64 |
   13 |  3760    18     2    40    -7   -12   -46  3582     -     - |
   14 |  6544   113    96  -109    32  1234   178  6098     -   -54 |
   15 | -3832    28    95   -40   151  2396   103 -3498     -   -32 |
   16 |  4292    11   102   -69   -74  2206    88  4124     -   -85 |
   17 |   305   -57     8    80    87  7173    56   467     -  -109 |
   18 |  5056    12    62   -58   -10  3183   101  4900     -  -100 |
   19 |  5045  -153     X   405     X  3505  -178  5110     -  -248 |
   20 |  4020     8     X    -5   157  4158    77  3836     -   -14 |
   21 | -1729   -15    13  -126    68  -804   105 -1049     -     8 |
   22 | -1296    19   119   -18   -12 -2349    64  -836     -   -48 |
   24 | -3762   -84     X    81   -86-24060    -9 -3155     -    -7 |
   25 | -5366   119    88   -16  -195 -4226    15 -5416     -  -126 |
   26 |  5297   -18     X   156   -96  3370   -32  4221     -  -110 |
   27 | -2321   -37   121    79  -115 -3916     9 -2487     -   -91 |
   28 |  6642   -11    49   -70   107  3141   109  6093     -    51 |
   29 | -2797    34  -161   -53    18 -1711    84 -2746     -    58 |
   30 | -1983    48   -34    93    -2  -626    71 -1845     -  -146 |
   31 |  4392    67  -138     1    38  7370   -15  3930     -     X |
 -----+-------------------------------------------------------------+
 ALBH |     -   -20     -     -     -     -    28     -     -   -22 |
 ALGO |     -     -     X     -     -     -    44     -     -   -64 |
 ALRT |     -   -22     -    19     -     -     -     -     -     - |
 AMC2 |     -   -74     -     -     -     -   -74     -     -   178 |
 ARTU |     -    42    45   -27     -     -   -17     -     -     - |
 ASC1 |     -   -70     -    61     -     -     -     -     -     X |
 AUCK |     -     2     X     -     -     -     -     -     -    -2 |
 BAHR |     -    23     -   -66     -     -     -     -     -    49 |
 BILI |     -    44     -   -38     -     -     -     -     -     - |
 BOGT |     -     X     X     X     -     -    39     -     -   -56 |
 BOR1 |     -   123     -     -     -     -     -     -     -  -114 |
 BRMU |     -     -     -   -78     -     -     -     -     -    84 |
 BRUS |     -   125     -     -     -     -   -64     -     -   -23 |
 CAS1 |     -    67   264   -78     -     -    67     -     -  -165 |
 CEDU |     -    11   234     -     -     -    42     -     -  -149 |
 CHAT |     -   -93     -    78     -     -     -     -     -     3 |
 COCO |     -   -67    42   115     -     -     -     -     -   -75 |
 CRO1 |     -   -76   102    92     -     -    -6     -     -   -69 |
 DARW |     -    63     -     -     -     -   -40     -     -     - |
 DAV1 |     -    39     -  -111     -     -    97     -     -   -59 |
 DRAO |     -   -51     -     -     -     -   114     -     -  -119 |
 DWH1 |     -   350     -     -     -     -  -246     -     -    34 |
 FAIR |     -     -    85  -152     -     -    57     -     -    52 |
 FORT |     -   161     -   -67     -     -     -     -     -   -65 |
 GODE |     -   -21     X     -     -     -     -     -     -    19 |
 GOLD |     -    82   -30     -     -     -   -49     -     -     4 |
 GUAM |     -   124  -320    76     -     -  -175     -     -   164 |
 GUAT |     -    45     -     6     -     -     -     -     -   -47 |
 HOFN |     -     -     -  -110     -     -    81     -     -     - |
 HRAO |     -     -     -     -     -     -  -116     -     -   169 |
 IISC |     -   -59    95    -8     -     -     -     -     -    32 |
 ISPA |     -    32     -    39     -     -   -49     -     -     - |
 JAB1 |     -    -1     1     -     -     -     -     -     -     - |
 KARR |     -   -13    36     -     -     -     -     -     -     - |
 KERG |     -   130  -219   -39     -     -     -     -     -    -7 |
 KGN0 |     -     6     -     -     -     -     -     -     -    -6 |
 KIRU |     -   -16  -146     -     -     -     -     -     -    63 |
 KIT3 |     -     -   192  -261     -     -   197     -     -   -67 |
 KOKB |     -   -79     -     -     -     -     -     -     -    74 |
 KOSG |     -   -70     -     -     -     -     -     -     -    65 |
 KOUR |     -   -20  -347     -     -     -     -     -     -   112 |
 KSTU |     -     -   -37     -     -     -   -82     -     -   133 |
 KUNM |     -     -     -     -     -     -    -6     -     -     8 |
 LAE1 |     -  -152     -   -35     -     -   158     -     -   -52 |
 LHAS |     -     -   -51     -     -     -   -53     -     -    94 |
 LPGS |     -    -9     -     -     -     -   -55     -     -    88 |
 MAC1 |     -  -179   201   -51     -     -    46     -     -    89 |
 MADR |     -     -     -     -     -     -   -36     -     -    52 |
 MAG0 |     -   -79     -     -     -     -    51     -     -     - |
 MALI |     -    61   -84     -     -     -     -     -     -   -29 |
 MAS1 |     -     -  -417    47     -     -     -     -     -    71 |
 MAW1 |     -     -     -   603     -     -     -     -     -  -648 |
 MCM4 |     -     4     -    -3     -     -     -     -     -     - |
 MDO1 |     -     -     -  -110     -     -     -     -     -   118 |
 METS |     -    57     -     -     -     -     -     -     -   -53 |
 MIZU |     -     -  -468     -     -     -    -5     -     -   163 |
 MKEA |     -   -16   -50   -10     -     -   -26     -     -    81 |
 NLIB |     -     -     -     -     -     -   104     -     -  -152 |
 NNOR |     -     -   -83     -     -     -     -     -     -    28 |
 NRC1 |     -     -     -    -3     -     -   -43     -     -    66 |
 NRIL |     -    24     -   -19     -     -    -1     -     -     - |
 NYA1 |     -   114     -   -25     -     -     -     -     -   -80 |
 ONSA |     -     -   294   -91     -     -     -     -     -     - |
 PDEL |     -    48     -  -120     -     -    57     -     -     - |
 PERT |     -    16  -281   129     -     -     -     -     -   -60 |
 PIE1 |     -     -  -195     -     -     -    70     -     -   -38 |
 POTS |     -   -20     -    30     -     -     -     -     -   -14 |
 PTBB |     -    45     -     -     -     -     -     -     -   -42 |
 REYK |     -  -104     -     -     -     -     -     -     -    97 |
 RIOG |     -   -18     -    46     -     -     -     -     -   -32 |
 SANT |     -     4    83   -51     -     -     -     -     -    23 |
 SCH2 |     -     -     -     -     -     -  -143     -     -   209 |
 SEY1 |     -     -     -  -439     -     -     -     -     -   472 |
 SFER |     -  -127     -     -     -     -     -     -     -   119 |
 SOFI |     -     -     -     -     -     -    38     -     -   -56 |
 SPT0 |     -  -135     -     -     -     -     -     -     -   126 |
 STJO |     -     -     -     -     -     -  -108     -     -   158 |
 SUTM |     -     -     -   -26     -     -    19     -     -     - |
 THTI |     -     -   -49   154     -     -     -     -     -  -149 |
 THU3 |     -   -53     -     -     -     -     -     -     -    49 |
 TID1 |     -     -     -     -     -     -   -42     -     -    61 |
 TIDB |     -   -54   243     -     -     -     -     -     -   -30 |
 TIXI |     -   -15     -     -     -     -     9     -     -     - |
 TOW2 |     -     5     -     -     -     -    -3     -     -     - |
 TRO1 |     -  -149     -     4     -     -     -     -     -   136 |
 TSKB |     -   -77     -    66     -     -     -     -     -     1 |
 TWTF |     -   -89     -     -     -     -   -84     -     -   207 |
 UNSA |     -     -   -21     -     -     -   -61     -     -    96 |
 URUM |     -   -60     -     -     -     -     -     -     -    56 |
 USN1 |     -   313     -     -     -     -  -300     -     -   151 |
 USNO |     -   -27     -     -     -     -     -     -     -    25 |
 USUD |     -     -    21     -     -     -     -     -     -    -7 |
 WHIT |     -   -82     -     -     -     -     -     -     -    76 |
 WSRT |     -    44     -     -     -     -     -     -     -   -41 |
 WTZR |     -   -15    39     -     -     -     -     -     -     1 |
 WUHN |     -     -     -   256     -     -     -     -     -  -275 |
 YAKT |     -   -80     -     -     -     -     -     -     -    75 |
 YELL |     -   -34   172   -54     -     -     -     -     -    34 |
 YKRO |     -  -164     -   142     -     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5199    48   112    42    69  4324    17  5081     -    38 |  288   5.38
    3 |  5995    57     X    42    68  6582    21  5745     -    29 |  287   1.94
    4 |  1565    60    80    29    21  1543    46  1612     -    58 |  287   0.95
    5 |  3547    45    77    21    55  2659    23  3146     -    33 |  288   2.87
    6 |  3330    64    67    38    54  6504    37  3559     -    29 |  287   1.16
    7 |  1253    80   113    70    68   617    30  1171     -    73 |  288   0.72
    8 |  3510    28    95    36    72  2226    42  2812     -    32 |  288   1.09
    9 |  5890    21    97    23    47  3922    37  5718     -    43 |  288   2.28
   10 |  4139    67   100    25    52  2029    24  4109     -    28 |  288   2.39
   11 |  1172    46     X    48    86   640    27  1306     -    39 |  288   0.35
   13 |   924    45   116    48    32   526    28   934     -     - |  288   0.28
   14 |  1875    52    36    45    39   732    59  1669     -    41 |  287   0.19
   15 |  2561    31   107    35   110  2035    37  2528     -    57 |  288   2.54
   16 |   719    34    95    36    23  1256    57   682     -    42 |  288   0.24
   17 |  2341    42    69    31    59  4024    19  2246     -    63 |  288   0.77
   18 |  1208    46    59    36    85  1776    56  1156     -    44 |  288   0.50
   19 |  1734    61     X    43     X  1450    61  1632     -    22 |  288   0.39
   20 |   849    55     X    28    62  2010    35   827     -    33 |  287   0.17
   21 |  2136    45   107    29    28  1212    21  2046     -    37 |  288   0.38
   22 |  2368    34    88    29    51  1427    33  2132     -    31 |  287   0.32
   24 |  4211    59     X    19    80  9989    47  4229     -    56 |  287   3.37
   25 |  3941    26    80    20    76  4234    79  3949     -    37 |  288   3.41
   26 |  4661    53     X    28    48  1267    32  4605     -    32 |  276   0.69
   27 |  1929    31    82    38    77  2302    40  2037     -    54 |  287   0.57
   28 |  3632    41    64    37    40  1578    39  2893     -    62 |  287   1.24
   29 |  1099    45   121    34    66  1576    58  1242     -    34 |  282   0.50
   30 |   929    21    71    35    47  1004    43  1092     -    58 |  287   0.58
   31 |  1863    83   117    38    76  4345    28  1985     -     X |  288   1.35
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    51     -     -     -     -    17     -     -    35 |  288   0.14
 ALGO |     -     -     X     -     -     -     8     -     -    12 |  286   0.06
 ALRT |     -    13     -    11     -     -     -     -     -     - |  288   7.00
 AMC2 |     -    39     -     -     -     -    22     -     -    17 |  288   0.03
 ARTU |     -    29    72    26     -     -    32     -     -     - |  288  12.13
 ASC1 |     -    42     -    36     -     -     -     -     -     X |  287    >>>
 AUCK |     -    26     X     -     -     -     -     -     -    24 |  263  12.89
 BAHR |     -    52     -    26     -     -     -     -     -    31 |  287   0.58
 BILI |     -    29     -    25     -     -     -     -     -     - |  287  10.78
 BOGT |     -     X     X     X     -     -    43     -     -    62 |  264  11.53
 BOR1 |     -    15     -     -     -     -     -     -     -    14 |  286   0.67
 BRMU |     -     -     -    22     -     -     -     -     -    24 |  286    >>>
 BRUS |     -    34     -     -     -     -    23     -     -    22 |  288   0.04
 CAS1 |     -    41    60    28     -     -    12     -     -    15 |  288   9.01
 CEDU |     -    30    51     -     -     -    24     -     -    13 |  288  11.69
 CHAT |     -    23     -    16     -     -     -     -     -    23 |  250   8.39
 COCO |     -    26    28    21     -     -     -     -     -    21 |  287   9.50
 CRO1 |     -    74   106    48     -     -    47     -     -    70 |  288  17.61
 DARW |     -    21     -     -     -     -    13     -     -     - |  288   3.35
 DAV1 |     -    45     -    41     -     -    20     -     -    24 |  287  15.02
 DRAO |     -    36     -     -     -     -    16     -     -    18 |  287   0.08
 DWH1 |     -    50     -     -     -     -    26     -     -    19 |  288   0.66
 FAIR |     -     -    35    16     -     -    11     -     -    23 |  287   0.04
 FORT |     -    70     -    92     -     -     -     -     -   148 |  287   0.19
 GODE |     -    23     X     -     -     -     -     -     -    22 |  287   0.28
 GOLD |     -    39    78     -     -     -    25     -     -    44 |  288  16.26
 GUAM |     -    44    55    30     -     -    25     -     -    21 |  288  11.83
 GUAT |     -    24     -    22     -     -     -     -     -    16 |  287    >>>
 HOFN |     -     -     -    29     -     -    21     -     -     - |  288    >>>
 HRAO |     -     -     -     -     -     -    23     -     -    34 |  287   0.64
 IISC |     -    24    88    22     -     -     -     -     -    38 |  287  22.36
 ISPA |     -    21     -    26     -     -    20     -     -     - |  288  14.31
 JAB1 |     -    13    36     -     -     -     -     -     -     - |  288  15.91
 KARR |     -    14    40     -     -     -     -     -     -     - |  288  12.82
 KERG |     -    28    44    26     -     -     -     -     -    14 |  287   2.63
 KGN0 |     -    28     -     -     -     -     -     -     -    26 |  285   0.25
 KIRU |     -    25    47     -     -     -     -     -     -    15 |  288   9.34
 KIT3 |     -     -    58   139     -     -    73     -     -    68 |  272  78.03
 KOKB |     -    42     -     -     -     -     -     -     -    40 |  284   0.09
 KOSG |     -    15     -     -     -     -     -     -     -    14 |  286  29.66
 KOUR |     -    39   111     -     -     -     -     -     -    26 |  288   1.43
 KSTU |     -     -    79     -     -     -    16     -     -    35 |  288   8.66
 KUNM |     -     -     -     -     -     -    29     -     -    43 |  286  24.17
 LAE1 |     -    20     -    26     -     -    21     -     -    34 |  287  13.19
 LHAS |     -     -    59     -     -     -    19     -     -    32 |  288    >>>
 LPGS |     -    47     -     -     -     -    21     -     -    32 |  288 102.34
 MAC1 |     -    68    45    52     -     -    36     -     -    42 |  288  13.21
 MADR |     -     -     -     -     -     -    17     -     -    25 |  286  12.81
 MAG0 |     -    23     -     -     -     -    15     -     -     - |  287   9.08
 MALI |     -    38    66     -     -     -     -     -     -    39 |  287  23.05
 MAS1 |     -     -   122    59     -     -     -     -     -    88 |  287   2.36
 MAW1 |     -     -     -    31     -     -     -     -     -    33 |  157  73.42
 MCM4 |     -    24     -    20     -     -     -     -     -     - |  285  65.91
 MDO1 |     -     -     -    27     -     -     -     -     -    29 |  261  17.44
 METS |     -    18     -     -     -     -     -     -     -    17 |  285   9.84
 MIZU |     -     -    48     -     -     -    12     -     -    14 |  288   0.45
 MKEA |     -    57    87    20     -     -    31     -     -    26 |  288  25.84
 NLIB |     -     -     -     -     -     -     9     -     -    14 |  287   0.02
 NNOR |     -     -    47     -     -     -     -     -     -    16 |  287  13.07
 NRC1 |     -     -     -    14     -     -     9     -     -    19 |  288   0.03
 NRIL |     -    26     -    18     -     -    16     -     -     - |  288   9.64
 NYA1 |     -    10     -    14     -     -     -     -     -    18 |  288   0.07
 ONSA |     -     -    62    19     -     -     -     -     -     - |  288   0.07
 PDEL |     -    22     -    24     -     -    20     -     -     - |  288  52.48
 PERT |     -    28    45    18     -     -     -     -     -    16 |  287   4.77
 PIE1 |     -     -    63     -     -     -    12     -     -    19 |  287   0.03
 POTS |     -    28     -    11     -     -     -     -     -    30 |  287  20.94
 PTBB |     -    37     -     -     -     -     -     -     -    35 |  285   0.33
 REYK |     -    23     -     -     -     -     -     -     -    21 |  286   7.41
 RIOG |     -    26     -    29     -     -     -     -     -    33 |  287  12.46
 SANT |     -    65    91    16     -     -     -     -     -    45 |  287   7.61
 SCH2 |     -     -     -     -     -     -    10     -     -    15 |  286  14.83
 SEY1 |     -     -     -    21     -     -     -     -     -    22 |  287  65.68
 SFER |     -    25     -     -     -     -     -     -     -    23 |  285   0.48
 SOFI |     -     -     -     -     -     -    13     -     -    20 |  286  95.10
 SPT0 |     -    23     -     -     -     -     -     -     -    22 |  286   0.03
 STJO |     -     -     -     -     -     -     8     -     -    11 |  286   0.05
 SUTM |     -     -     -    41     -     -    30     -     -     - |  278 971.41
 THTI |     -     -    80    22     -     -     -     -     -    33 |  287   4.34
 THU3 |     -    17     -     -     -     -     -     -     -    16 |  286   6.63
 TID1 |     -     -     -     -     -     -    17     -     -    25 |  286   0.02
 TIDB |     -    20    43     -     -     -     -     -     -    15 |  288   0.04
 TIXI |     -    16     -     -     -     -    10     -     -     - |  287   8.91
 TOW2 |     -    20     -     -     -     -    13     -     -     - |  287  12.09
 TRO1 |     -    21     -    46     -     -     -     -     -    34 |  288   8.26
 TSKB |     -    50     -    43     -     -     -     -     -    39 |  287   1.52
 TWTF |     -    39     -     -     -     -    20     -     -    43 |  288   0.40
 UNSA |     -     -    93     -     -     -    24     -     -    31 |  288  25.00
 URUM |     -    20     -     -     -     -     -     -     -    18 |  287  23.71
 USN1 |     -    29     -     -     -     -    23     -     -    25 |  287   0.03
 USNO |     -    15     -     -     -     -     -     -     -    14 |  287   0.05
 USUD |     -     -    51     -     -     -     -     -     -    17 |  286  17.10
 WHIT |     -    28     -     -     -     -     -     -     -    26 |  287   3.90
 WSRT |     -    34     -     -     -     -     -     -     -    32 |  282   0.02
 WTZR |     -    44    90     -     -     -     -     -     -    26 |  287   0.06
 WUHN |     -     -     -    31     -     -     -     -     -    33 |  286  14.78
 YAKT |     -    14     -     -     -     -     -     -     -    13 |  287   0.39
 YELL |     -    78    87    35     -     -     -     -     -    61 |  286   0.03
 YKRO |     -    78     -    68     -     -     -     -     -     - |  265  51.74
 -----+-------------------------------------------------------------+--------------
 TOT  |  3064    41    78    38    62  3373    27  2955     -    37 |


 BEST CLOCK FIT: WSRT   282   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288   10.83   | 3.95e-14  6.92e-15  1.59e-15 |
 USNO |   287     0     0   286   10.75   | 4.05e-14  7.20e-15  2.08e-15 |
 AMC2 |   288     0     0   288   10.25   | 3.68e-14  7.14e-15  1.85e-15 |
 ONSA |   288     0     0   288    9.15   | 5.27e-14  1.75e-14  3.84e-15 |
 NRC1 |   288     0     0   288    8.47   | 3.30e-14  1.07e-14  2.57e-15 |
 PIE1 |   287     0     0   286    7.08   | 4.34e-14  7.51e-15  3.80e-15 |
 YELL |   286     0     0   284    5.45   | 3.08e-14  4.48e-15  1.72e-15 |
 ALBH |   288     0     0   288    5.05   | 4.04e-14  7.91e-15  1.05e-14 |
 USN1 |   287     0     0   285    4.39   | 7.04e-14  1.01e-14  3.00e-15 |
 DRAO |   287     0     0   286    3.51   | 7.13e-14  1.94e-14  7.12e-15 |
 NLIB |   287     0     0   286    3.50   | 3.67e-14  7.02e-15  3.24e-15 |
 KOKB |   284     0     0   280    2.86   | 7.67e-14  1.65e-14  5.18e-15 |
 SPT0 |   286     0     0   284    2.73   | 4.05e-14  7.96e-15  3.32e-15 |
 FAIR |   287     0     0   286    2.70   | 4.64e-14  8.86e-15  4.02e-15 |
 TID1 |   286     0     0   143    2.26   | 4.64e-14  6.17e-15  2.28e-15 |
 TIDB |   288     0     0   288    2.21   | 1.50e-13  1.57e-14  4.52e-15 |
 ALGO |   286     0     0   285    2.20   | 4.67e-14  1.24e-14  5.35e-15 |
 WSRT |   282     0     0   138    1.60   | 2.56e-14  8.88e-15  1.86e-15 |
 WTZR |   287     0     0   143    1.15   | 3.83e-14  2.87e-14  6.44e-15 |
 NYA1 |   288     0     0   288    0.88   | 2.90e-14  7.62e-15  6.93e-15 |
 FORT |   287     0     0   286    0.76   | 9.89e-14  2.41e-14  2.32e-14 |
 GODE |   287     0     0   286    0.44   | 4.73e-14  9.28e-15  1.60e-14 |
 PTBB |   285     0     0   283    0.27   | 3.44e-13  7.09e-14  3.81e-14 |
 MIZU |   288     0     0   288    0.16   | 3.29e-13  1.08e-13  2.88e-14 |
 G13  |   288     0     3   123    0.15   | 5.24e-13  5.77e-14  2.75e-14 |
 G29  |   282     0     0   281    0.12   | 4.08e-13  1.15e-13  4.91e-14 |
 G19  |   288     0     1   248    0.12   | 6.08e-13  7.60e-14  3.28e-14 |
 KGN0 |   285     0     0   283    0.12   | 3.36e-13  8.58e-14  2.48e-14 |
 G30  |   287     0     0   286    0.10   | 3.01e-13  9.07e-14  4.89e-14 |
 SFER |   285     0     0   283    0.09   | 4.11e-13  1.12e-13  5.16e-14 |
 G04  |   287     0     0   286    0.07   | 4.37e-13  1.29e-13  8.01e-14 |
 G26  |   276     0     0   274    0.07   | 3.40e-13  9.37e-14  6.83e-14 |
 G17  |   288     0     0   288    0.07   | 4.58e-13  1.47e-13  9.54e-14 |
 BOR1 |   286     0     0   285    0.07   | 4.28e-13  1.28e-13  8.95e-14 |
 G27  |   287     0     0   286    0.06   | 3.60e-13  1.30e-13  6.70e-14 |
 DWH1 |   288     0     0   288    0.05   | 5.15e-13  1.30e-13  6.51e-14 |
 G07  |   288     0     0   288    0.05   | 3.04e-13  8.79e-14  8.83e-14 |
 TWTF |   288     0     0   288    0.05   | 3.70e-13  9.38e-14  4.06e-14 |
 HRAO |   287     0     0   286    0.05   | 1.10e-13  3.72e-14  6.99e-14 |
 YAKT |   287     0     0   286    0.02   | 4.28e-13  1.15e-13  2.65e-14 |
 G06  |   287     0     0   286    0.02   | 4.03e-13  1.62e-13  1.18e-13 |
 G31  |   288     0     0   288    0.02   | 2.89e-13  1.73e-13  1.54e-13 |
 G08  |   288     0     0   288    0.01   | 1.22e-12  4.15e-13  1.19e-13 |
 TSKB |   287     0     0   286    0.01   | 9.97e-13  2.73e-13  1.58e-13 |
 G05  |   288     0     0   288    0.01   | 1.37e-12  3.95e-13  1.89e-13 |
 G25  |   288     0     0   288    0.01   | 1.40e-12  4.04e-13  3.41e-13 |
 KOUR |   288     0     0   288    0.01   | 1.48e-12  4.72e-13  1.70e-13 |
 KERG |   287     0     0   286    0.01   | 1.43e-12  4.36e-13  2.39e-13 |
 G03  |   287     0     0   286    0.01   | 1.28e-12  5.12e-13  1.75e-13 |
 G09  |   288     0     0   186    0.00   | 1.32e-12  4.45e-13  2.80e-13 |
 SUTM |   278     0     0   132    0.00   | 7.19e-13  2.19e-13  5.40e-14 |
 BAHR |   287     0     0   143    0.00   | 3.53e-13  1.78e-13  5.13e-14 |
 GPST |   288     0     0     0    0.00   | 2.28e-14  5.24e-15  1.54e-15 |
 MAW1 |   157     0     0     0    0.00   |        -         -         - |
 MDO1 |   261     0     0     0    0.00   |        -         -         - |
 WUHN |   286     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 METS |   285     0     0     0    0.00   |        -         -         - |
 MAG0 |   287     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   250     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   263     2     0     0    0.00   |        -         -         - |
 G28  |   287     0     6     0    0.00   | 6.33e-13  7.25e-14  8.51e-14 |
 G24  |   287     0     0     0    0.00   | 1.32e-12  4.59e-13  2.94e-13 |
 G22  |   287     0     5     0    0.00   | 5.42e-13  6.89e-14  4.14e-14 |
 G21  |   288     1     6     0    0.00   | 9.42e-13  1.29e-13  2.68e-14 |
 G20  |   287     0     6     0    0.00   | 5.82e-13  6.83e-14  1.43e-14 |
 G18  |   288     4     6     0    0.00   | 1.64e-12  2.02e-13  5.19e-14 |
 G16  |   288     0     4     0    0.00   | 4.44e-13  5.85e-14  2.55e-14 |
 G15  |   288     0     0     0    0.00   | 1.57e-12  5.24e-13  3.08e-13 |
 G14  |   287     0     5     0    0.00   | 6.12e-13  7.23e-14  1.39e-14 |
 G11  |   288     0     6     0    0.00   | 6.39e-13  6.78e-14  4.42e-14 |
 G10  |   288     0     0     0    0.00   | 1.26e-12  4.48e-13  1.58e-13 |
 G01  |   288     0     0     0    0.00   | 1.65e-12  7.33e-13  4.28e-13 |
 YKRO |   265     0     0     0    0.00   |        -         -         - |
 WHIT |   287     0     0     0    0.00   | 5.22e-13  3.85e-13  2.70e-13 |
 USUD |   286     2     0     0    0.00   |        -         -         - |
 URUM |   287     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   287     0     0     0    0.00   |        -         -         - |
 THU3 |   286     0     0     0    0.00   |        -         -         - |
 THTI |   287     0     0     0    0.00   | 4.08e-13  1.83e-13  2.84e-13 |
 STJO |   286     0     0     0    0.00   | 4.71e-14  6.69e-15  5.49e-15 |
 SOFI |   286     0     0     0    0.00   |        -         -         - |
 SEY1 |   287     2     0     0    0.00   |        -         -         - |
 SCH2 |   286     0     0     0    0.00   | 6.70e-13  3.80e-13  1.04e-12 |
 SANT |   287     0     1     0    0.00   | 1.85e-12  6.77e-13  6.29e-13 |
 RIOG |   287     0     0     0    0.00   |        -         -         - |
 REYK |   286     0     0     0    0.00   |        -         -         - |
 POTS |   287     0     0     0    0.00   |        -         -         - |
 PERT |   287     0     0     0    0.00   | 1.87e-12  5.00e-13  3.34e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   287     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   285     0     0     0    0.00   |        -         -         - |
 MAS1 |   287     0     0     0    0.00   | 1.72e-12  5.20e-13  2.25e-13 |
 MALI |   287     0     0     0    0.00   |        -         -         - |
 MADR |   286     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     3     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   286     0     0     0    0.00   |        -         -         - |
 KSTU |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   286     0     1     0    0.00   | 7.32e-13  7.70e-13  1.89e-12 |
 KIT3 |   272     0     0     0    0.00   |        -         -         - |
 KIRU |   288     1     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   287     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   287     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.20e-13  3.68e-13  2.58e-13 |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   287     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   286     0     0     0    0.00   |        -         -         - |
 BOGT |   264     0     0     0    0.00   |        -         -         - |
 ASC1 |   287     1     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.80e-17  2.15e-16  1.29e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      YELL      BRUS |
------------------------------------------+------------------------------+
