
 GPS week: 1270   Day: 6   MJD: 53140                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2672      6     0.01    -0.02     3.26     0.00
 cod |   288     0  23924      0    -0.20     0.22     0.04    29.07
 esa |   288     0  15463    158  3814.01    25.53     1.65     0.00
 gfz |   288     0  19912    517    -0.24     0.74     0.05    22.32
 iga |    96     0   2672     14    -0.05    -0.11     0.07     0.00
 igu |    96     0   2672      0    -0.08    -0.07     3.59     0.00
 jpl |   288     0  14928   1707     0.13    -0.20     0.04    32.23
 ngs |    96     0   2576      0     0.01    -0.18     2.95     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  27115    118  3815.79    24.58     0.08    16.38

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -6312    80 -1716     5    47 -8105  -127 -4388     -    85 |
    3 | -3822    49  1553    51   -81 -2664   -93 -3357     -  -142 |
    4 |   370   -36   239    42   -95  3123  -136  -775     -    28 |
    5 | -2774    -3 -3025    56    63  7349    14 -2274     -   -97 |
    6 |  -860    -3  1035    39   -84-16019   -32 -1636     -   -44 |
    7 | -2796   -52   307    76   -99  -921    18 -3460     -   -41 |
    8 |-15651    47  1847    18     0  2492   -61     -     -     4 |
    9 |   123     7  1173    38  -122  -263     X -1038     -   -63 |
   10 |  4751    22  -640    88    -3  1240   -15  3242     -  -131 |
   11 |   548    39  -759  -147   -86   416     X   719     -   131 |
   13 |  1381    84 -1388   -76  -138   297     X   905     -   -50 |
   14 |  6135    66  8348   -67   -24   841     X  5222     -   -29 |
   15 | -6184    14  3813     0    95 -3229   -40 -5717     -   -19 |
   16 |  4067    37  3744   -35    38  -141     X  3295     -   -19 |
   17 |  1542   -20  -768   102   -19  3068   -53   232     -   -96 |
   18 |  6493    80   351     1   -17   -38     X  5566     -  -144 |
   19 |  5660  -130 -1177   272   928 -1080     X  4718     -  -127 |
   20 |  3045    -3 -2504    34   -25 -1866     X  2816     -   -40 |
   21 | -1276   121  -155  -164    66    43     X -1276     -    10 |
   22 | -1448    23    76   -42  -138 -2105     X -1984     -    16 |
   24 |  3653    -2 -2332    63    -3 17361   -75  1865     -    56 |
   25 |  5382    -5 -1206   106  -143  8781   -94  3108     -  -121 |
   26 |  -127    69  -249    58     1 -2097   -47  -904     -  -115 |
   27 | -2065   -43    47   125   -44  2806   -46 -1948     -   -88 |
   28 |   485   -15 -2419   -45   -60 -1620     X   339     -    88 |
   29 | -2331    66   -95   -34   -26  1207   -99 -2584     -   -60 |
   30 |  -847   -30 -1594   119   -73   780   -12 -1219     -  -108 |
   31 |  1985    50  1383    37   104-10734  -117   100     -    75 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -52     -     -     -     -    48     -     -    -2 |
 ALGO |     -  -135  1290     -     -     -   135     -     -   -26 |
 ALRT |     -   -23     -    29     -     -     -     -     -     - |
 AMC2 |     -   -95     -     -     -     -     2     -     -   166 |
 ARTU |     -    52   187   -89     -     -    15     -     -     - |
 ASC1 |     -   -29     -  -136     -     -     -     -     -   236 |
 ASPA |     -     -     -    30     -     -     -     -     -   -41 |
 AUCK |     -   -40  -347     X     -     -     -     -     -    72 |
 BILI |     -    22     -   -22     -     -    -4     -     -     - |
 BOGT |     -     - -2677    71     -     -   -34     -     -   -30 |
 BOR1 |     -    93     -     -     -     -     -     -     -  -166 |
 BRMU |     -     -     -   -38     -     -     -     -     -    52 |
 BRUS |     -    63     -     -     -     -   -33     -     -   -45 |
 CHAT |     -   -65     -   -50     -     -     -     -     -   183 |
 CRO1 |     -     -    49  -113     -     -   -98     -     -   398 |
 DAKA |     -    55     -   -71     -     -     -     -     -     - |
 DRAO |     -  -114     -     -     -     -   137     -     -   -66 |
 DWH1 |     -   274     -     -     -     -  -201     -     -   -90 |
 FAIR |     -     -  1105  -161     -     -    83     -     -    57 |
 FLIN |     -    -1     -     -     -     -     1     -     -     - |
 FORT |     -   134     -     X     -     -     -     -     -  -238 |
 GODE |     -   -23   -53     -     -     -     -     -     -    42 |
 GOLD |     -   -44  -389     -     -     -    18     -     -    43 |
 GUAM |     -    42  -520    19     -     -  -129     -     -   161 |
 GUAT |     -     -     -   -44     -     -     -     -     -    60 |
 HRAO |     -   -64     -     -     -     -   -14     -     -   142 |
 IISC |     -    37   444    40     -     -     -     -     -  -121 |
 ISPA |     -    21     -   -27     -     -     -     -     -     - |
 KERG |     -    82  -162   -34     -     -     -     -     -  -100 |
 KGN0 |     -   -49     -     -     -     -     -     -     -    88 |
 KIRU |     -    -9 -1107     -     -     -     -     -     -    16 |
 KIT3 |     -     -  -250  -103     -     -   192     -     -  -237 |
 KOKB |     -     -     -   -66     -     -     -     -     -    90 |
 KOSG |     -   -26     -     -     -     -     -     -     -    45 |
 KOUR |     -    15  -384    61     -     -     -     -     -  -109 |
 KSTU |     -     -  -143     -     -     -    22     -     -   -43 |
 KUNM |     -     -     -     -     -     -    37     -     -   -73 |
 LAE1 |     -     -     -  -183     -     -    74     -     -   105 |
 LPGS |     -  -141   532   -17     -     -    59     -     -   112 |
 MADR |     -     -     -     -     -     -   -35     -     -    69 |
 MALI |     -    14   306     -     -     -     -     -     -   -24 |
 MAS1 |     -    -3  -625     3     -     -     -     -     -     3 |
 MDO1 |     -     -     -   -23     -     -     -     -     -    32 |
 METS |     -   -24     -     -     -     -     -     -     -    42 |
 MKEA |     -     -  -541     -     -     -   -99     -     -   195 |
 NLIB |     -     -     -     -     -     -    61     -     -  -120 |
 NRC1 |     -     -     -    10     -     -   -31     -     -    47 |
 NRIL |     -    -2     -   -35     -     -    27     -     -     - |
 NSSP |     -    -5     -     -     -     -    23     -     -   -35 |
 NTUS |     -   -69     -     -     -     -     -     -     -   122 |
 NYA1 |     -    82     -   -64     -     -     -     -     -   -57 |
 PDEL |     -     9     -  -188     -     -   122     -     -     - |
 PERT |     -   -40  -791    92     -     -     -     -     -   -54 |
 PETP |     -     -     -   -73     -     -    51     -     -     - |
 PIE1 |     -   -39  -257     -     -     -    53     -     -   -35 |
 POTS |     -   -42     -   150     -     -     -     -     -  -129 |
 RESO |     -   -44     -     -     -     -    39     -     -     - |
 SANT |     -   -11   300   -42     -     -     -     -     -    76 |
 SCH2 |     -     -     -     -     -     -    -1     -     -     1 |
 SCUB |     -   -21     -     -     -     -    19     -     -     - |
 SEY1 |     -     -     -   333     -     -     -     -     -  -453 |
 SFER |     -   -80     -     -     -     -     -     -     -   142 |
 SPT0 |     -  -100     -     -     -     -     -     -     -   178 |
 STJO |     -     -     -     -     -     -   -27     -     -    53 |
 SUTM |     -     -     -   -35     -     -    24     -     -     - |
 THTI |     -     -  -205   -23     -     -     -     -     -    31 |
 THU3 |     -   -30     -     -     -     -     -     -     -    53 |
 TIDB |     -   -17    33   -55     -     -     -     -     -   105 |
 TIXI |     -   -13     -     -     -     -    11     -     -     - |
 TRO1 |     -   -66     -    19     -     -     -     -     -    91 |
 TSKB |     -   -52     -    62     -     -     -     -     -     8 |
 URUM |     -   -27     -     -     -     -     -     -     -    48 |
 USN1 |     -   206     -     -     -     -  -243     -     -   118 |
 USNO |     -   -40     -     -     -     -     -     -     -    71 |
 USUD |     -     -  1204     -     -     -    31     -     -   -61 |
 WHIT |     -   -42     -     -     -     -     -     -     -    75 |
 WSRT |     -   113     -     3     -     -     -     -     -  -205 |
 WUHN |     -     -     -   123     -     -     -     -     -  -168 |
 YAKT |     -  -142     -     -     -     -    86     -     -    82 |
 YELL |     -    10   501   -63     -     -     -     -     -    70 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7810    44  2646    44    68  7525    28  7695     -    55 |  278   5.78
    3 |  3436    45  1536    53    66  3403    50  2607     -    90 |  288   1.88
    4 |  1520    43  1071    32    55  1445    66  1160     -    71 |  288   0.66
    5 |  5390    30  2634    45    72  5187    72  3925     -    72 |  288   2.71
    6 |  1403    50   712    43    84  8728    35  1717     -    39 |  277   1.13
    7 |   806    68  1255    42   135   710    61   671     -    51 |  288   0.71
    8 |  3950    73  2725   146   116  2797    48     -     -    72 |  288   1.70
    9 |  2266    14   856    20    76  2721     X  2069     -    33 |  288   1.39
   10 |  7794    41   674    33    62  3616    27  7223     -    65 |  288   3.02
   11 |  1600    33   850    33   107   518     X  1798     -    72 |  288   0.38
   13 |  1090    41  1543    44    45   370     X  1205     -    63 |  288   0.28
   14 |   561    45  4283    43    79   439     X   652     -    75 |  288   0.29
   15 |  4216    34  4737    48    73  2947    37  4269     -    90 |  288   3.32
   16 |   364    26  2725    28    79   326     X   507     -    61 |  288   0.18
   17 |  1034    38  1886    28    33  2439    33  1663     -    52 |  288   0.83
   18 |   763    32  1884    29    44   714     X   790     -    34 |  288   0.46
   19 |  1100    74  1000    45    93  1707     X   778     -   135 |  288   0.57
   20 |  1372    43  1578    41    74   754     X   934     -    94 |  288   0.30
   21 |  2938    29  1129    48    40   970     X  2654     -    50 |  288   0.53
   22 |  1535    46   711    40    66  1455     X  1591     -    38 |  288   0.50
   24 |  2466    54  3189    38    48  7856    50  2594     -    65 |  288   1.49
   25 |  6674    33   678    82    76  6071    42  5185     -   135 |  288   2.49
   26 |   644    60   410    66   105  1159    34   732     -   125 |  276   0.36
   27 |  2907    31   740    49    55  1665    40  2530     -   114 |  288   0.35
   28 |  1231    27  2663    31    46  1101     X   722     -    63 |  288   0.60
   29 |   765    66   601    88    41   618    93   862     -   182 |  276   0.55
   30 |  1150    42  1872    30    25   743    62  1262     -    44 |  288   0.91
   31 |  3975    57  1509    53    65  6279    24  3910     -    76 |  288   1.10
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    43     -     -     -     -    21     -     -    49 |  288   0.13
 ALGO |     -    28   396     -     -     -    13     -     -    38 |  288   0.03
 ALRT |     -     5     -     6     -     -     -     -     -     - |  288   6.75
 AMC2 |     -    36     -     -     -     -    19     -     -    42 |  288   0.02
 ARTU |     -    38   470    31     -     -    33     -     -     - |  288  11.38
 ASC1 |     -    34     -    24     -     -     -     -     -    59 |  288    >>>
 ASPA |     -     -     -    68     -     -     -     -     -    93 |  286    >>>
 AUCK |     -    49  1339     X     -     -     -     -     -    87 |  264  15.60
 BILI |     -    27     -    18     -     -    19     -     -     - |  287  10.14
 BOGT |     -     -   910   153     -     -   100     -     -    52 |  288  13.09
 BOR1 |     -    10     -     -     -     -     -     -     -    18 |  287   0.63
 BRMU |     -     -     -    29     -     -     -     -     -    39 |  288    >>>
 BRUS |     -    27     -     -     -     -    27     -     -    23 |  288   0.02
 CHAT |     -    61     -    27     -     -     -     -     -    92 |  287  13.10
 CRO1 |     -     -   672    27     -     -    24     -     -    39 |  286  23.06
 DAKA |     -     9     -    12     -     -     -     -     -     - |  264  20.30
 DRAO |     -    49     -     -     -     -    26     -     -    57 |  288   0.06
 DWH1 |     -    40     -     -     -     -    22     -     -    36 |  288   0.59
 FAIR |     -     -   347    30     -     -    15     -     -    25 |  288   0.07
 FLIN |     -    22     -     -     -     -    20     -     -     - |  288   8.02
 FORT |     -    71     -     X     -     -     -     -     -   126 |  228   0.11
 GODE |     -    11   323     -     -     -     -     -     -    20 |  288   0.23
 GOLD |     -    96   658     -     -     -   102     -     -    40 |  288  18.30
 GUAM |     -    44   759    56     -     -    28     -     -   156 |  288  13.43
 GUAT |     -     -     -    32     -     -     -     -     -    43 |  288    >>>
 HRAO |     -    72     -     -     -     -    79     -     -    59 |  288   0.48
 IISC |     -    43  1149    52     -     -     -     -     -   134 |  288  21.00
 ISPA |     -    22     -    29     -     -     -     -     -     - |  288  17.04
 KERG |     -    47  1072    63     -     -     -     -     -    92 |  288   2.79
 KGN0 |     -     8     -     -     -     -     -     -     -    14 |  287   0.21
 KIRU |     -    13   478     -     -     -     -     -     -    23 |  288   9.51
 KIT3 |     -     -   384   161     -     -    63     -     -   103 |  286  41.64
 KOKB |     -     -     -    60     -     -     -     -     -    82 |  288   0.11
 KOSG |     -    24     -     -     -     -     -     -     -    42 |  288  40.15
 KOUR |     -    36   724    36     -     -     -     -     -    89 |  288   2.20
 KSTU |     -     -  1055     -     -     -    26     -     -    52 |  273   9.87
 KUNM |     -     -     -     -     -     -    23     -     -    45 |  288  23.80
 LAE1 |     -     -     -    52     -     -    41     -     -   135 |  287  13.00
 LPGS |     -    65  1371    76     -     -    26     -     -   169 |  288  68.39
 MADR |     -     -     -     -     -     -    65     -     -   128 |  288  11.72
 MALI |     -    22   785     -     -     -     -     -     -    40 |  287  27.08
 MAS1 |     -    17   492    23     -     -     -     -     -    52 |  288   2.21
 MDO1 |     -     -     -    33     -     -     -     -     -    45 |  263  48.30
 METS |     -    11     -     -     -     -     -     -     -    19 |  287   8.27
 MKEA |     -     -   717     -     -     -    14     -     -    27 |  288  22.98
 NLIB |     -     -     -     -     -     -    13     -     -    25 |  288   0.04
 NRC1 |     -     -     -    28     -     -    14     -     -    31 |  288   0.03
 NRIL |     -    24     -    18     -     -    19     -     -     - |  288   9.32
 NSSP |     -    33     -     -     -     -    27     -     -    26 |  288  13.66
 NTUS |     -    48     -     -     -     -     -     -     -    86 |  288   8.51
 NYA1 |     -    10     -    15     -     -     -     -     -    21 |  288   0.13
 PDEL |     -    20     -    18     -     -    19     -     -     - |  288  52.99
 PERT |     -    32   464    42     -     -     -     -     -    40 |  288   1.98
 PETP |     -     -     -    20     -     -    14     -     -     - |  287  10.42
 PIE1 |     -    40   620     -     -     -    22     -     -    35 |  288   0.05
 POTS |     -    39     -    33     -     -     -     -     -    76 |  288  21.60
 RESO |     -    11     -     -     -     -    10     -     -     - |  288  15.35
 SANT |     -    49   844    32     -     -     -     -     -   115 |  288   7.29
 SCH2 |     -     -     -     -     -     -     9     -     -    18 |  288 216.81
 SCUB |     -    22     -     -     -     -    19     -     -     - |  288  16.34
 SEY1 |     -     -     -    63     -     -     -     -     -    86 |  288  36.18
 SFER |     -   101     -     -     -     -     -     -     -   180 |  239 557.34
 SPT0 |     -    15     -     -     -     -     -     -     -    27 |  288   0.03
 STJO |     -     -     -     -     -     -     8     -     -    16 |  288   0.05
 SUTM |     -     -     -    83     -     -    57     -     -     - |  288   3.20
 THTI |     -     -   803    24     -     -     -     -     -    33 |  288   4.13
 THU3 |     -    24     -     -     -     -     -     -     -    42 |  288   7.82
 TIDB |     -    35   473    22     -     -     -     -     -    55 |  288   0.06
 TIXI |     -    22     -     -     -     -    20     -     -     - |  287   8.20
 TRO1 |     -    17     -    41     -     -     -     -     -    36 |  288   9.18
 TSKB |     -    38     -    62     -     -     -     -     -    45 |  288   0.82
 URUM |     -    20     -     -     -     -     -     -     -    35 |  288  23.25
 USN1 |     -    53     -     -     -     -    65     -     -    54 |  287   0.06
 USNO |     -    19     -     -     -     -     -     -     -    34 |  288   0.04
 USUD |     -     -  5372     -     -     -    62     -     -   121 |  288  12.78
 WHIT |     -    30     -     -     -     -     -     -     -    54 |  288   2.48
 WSRT |     -    27     -    28     -     -     -     -     -    59 |  288   0.03
 WUHN |     -     -     -    57     -     -     -     -     -    78 |  287  17.36
 YAKT |     -    16     -     -     -     -    15     -     -    14 |  288   0.67
 YELL |     -    49   377    37     -     -     -     -     -   128 |  288   0.06
 -----+-------------------------------------------------------------+--------------
 TOT  |  3259    41  1651    53    73  3593    41  2954     -    75 |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USNO |   288     0     0   288   12.45   | 4.77e-14  1.00e-14  3.00e-15 |
 BRUS |   288     0     0   288   12.45   | 3.72e-14  7.42e-15  1.28e-15 |
 AMC2 |   288     0     0   288   10.90   | 3.78e-14  6.74e-15  1.79e-15 |
 NRC1 |   288     0     0   288    9.90   | 4.27e-14  9.54e-15  3.64e-15 |
 YELL |   288     0     0   288    7.04   | 4.25e-14  1.01e-14  2.72e-15 |
 PIE1 |   288     0     0   288    6.97   | 3.84e-14  8.72e-15  3.28e-15 |
 USN1 |   287     0     0   286    4.71   | 8.34e-14  1.30e-14  2.83e-15 |
 ALBH |   288     0     0   288    4.51   | 3.96e-14  1.09e-14  1.11e-14 |
 WSRT |   288     0     0   288    4.22   | 3.31e-14  9.05e-15  1.91e-15 |
 DRAO |   288     0     0   288    4.07   | 5.88e-14  1.58e-14  6.71e-15 |
 NLIB |   288     0     0   288    3.98   | 4.32e-14  7.46e-15  4.40e-15 |
 KOKB |   288     0     0   288    3.66   | 1.62e-13  3.40e-14  8.14e-15 |
 SPT0 |   288     0     0   288    3.19   | 4.49e-14  9.89e-15  2.99e-15 |
 FAIR |   288     0     0   288    3.00   | 4.64e-14  1.08e-14  5.82e-15 |
 ALGO |   288     0     0   288    2.69   | 3.34e-14  1.15e-14  2.52e-15 |
 TIDB |   288     0     0   288    2.43   | 1.61e-13  1.89e-14  5.58e-15 |
 NYA1 |   288     1     0   287    1.28   | 3.06e-14  9.79e-15  7.74e-15 |
 FORT |   228     0     0   217    0.70   | 5.90e-14  1.23e-14         - |
 GODE |   288     0     0   288    0.47   | 6.00e-14  1.39e-14  1.66e-14 |
 KGN0 |   287     0     0   286    0.16   | 3.34e-13  8.31e-14  2.19e-14 |
 G27  |   288     0     0   288    0.16   | 3.46e-13  9.32e-14  3.31e-14 |
 G26  |   276     0     0   274    0.12   | 3.59e-13  9.00e-14  2.26e-14 |
 G29  |   276     0     0   274    0.12   | 3.96e-13  1.36e-13  5.48e-14 |
 G04  |   288     0     0   288    0.11   | 4.30e-13  1.52e-13  7.85e-14 |
 G30  |   288     0     0   288    0.10   | 3.32e-13  1.02e-13  8.63e-14 |
 BOR1 |   287     0     0   286    0.07   | 4.19e-13  1.51e-13  6.13e-14 |
 SFER |   239     0     0   234    0.07   | 3.92e-13  1.12e-13         - |
 G17  |   288     0     0   288    0.06   | 4.13e-13  1.26e-13  8.52e-14 |
 HRAO |   288     0     0   288    0.05   | 1.20e-13  3.18e-14  4.22e-14 |
 DWH1 |   288     0     0   288    0.05   | 4.97e-13  1.47e-13  6.24e-14 |
 G19  |   288     0     0   174    0.05   | 6.50e-13  8.86e-14  3.05e-14 |
 G07  |   288     0     0   288    0.05   | 3.06e-13  1.08e-13  9.59e-14 |
 G06  |   277     0     0   275    0.04   | 3.91e-13  1.35e-13  1.02e-13 |
 YAKT |   288     0     0   288    0.03   | 4.69e-13  1.38e-13  5.02e-14 |
 G31  |   288     0     0   288    0.03   | 2.80e-13  1.44e-13  1.12e-13 |
 TSKB |   288     0     0   288    0.02   | 9.99e-13  2.79e-13  8.12e-14 |
 G03  |   288     0     0   288    0.01   | 1.30e-12  4.19e-13  1.83e-13 |
 G08  |   288     0     4   117    0.01   | 1.31e-12  3.11e-13  1.72e-13 |
 G24  |   288     0     0   288    0.01   | 1.23e-12  3.93e-13  1.59e-13 |
 KOUR |   288     0     0   288    0.01   | 1.57e-12  4.14e-13  1.83e-13 |
 G09  |   288     0     0   288    0.01   | 1.34e-12  3.85e-13  1.49e-13 |
 G25  |   288     0     0   288    0.01   | 1.35e-12  4.65e-13  2.05e-13 |
 G05  |   288     0     0   288    0.01   | 1.30e-12  3.36e-13  3.47e-13 |
 KERG |   288     0     0   288    0.01   | 1.46e-12  3.65e-13  2.84e-13 |
 SUTM |   288     0     0   288    0.01   | 6.58e-13  2.53e-13  1.88e-13 |
 WHIT |   288     0     0   288    0.00   | 4.93e-13  3.73e-13  2.73e-13 |
 STJO |   288     1     2    87    0.00   | 5.68e-14  9.62e-15  3.64e-15 |
 GPST |   288     0     0     0    0.00   | 2.29e-14  5.70e-15  1.44e-15 |
 MDO1 |   263     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 DAKA |   264     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     2     0     0    0.00   |        -         -         - |
 G28  |   288     1     6     0    0.00   | 6.02e-13  7.95e-14  4.93e-14 |
 G22  |   288     0     6     0    0.00   | 5.88e-13  6.37e-14  5.33e-14 |
 G21  |   288     0     6     0    0.00   | 8.75e-13  1.08e-13  3.95e-14 |
 G20  |   288     0     5     0    0.00   | 5.42e-13  6.25e-14  1.79e-14 |
 G18  |   288     1     6     0    0.00   | 1.35e-12  1.46e-13  4.22e-14 |
 G16  |   288     0     5     0    0.00   | 4.70e-13  4.69e-14  2.03e-14 |
 G15  |   288     0     0     0    0.00   | 1.39e-12  4.94e-13  4.36e-13 |
 G14  |   288     1     6     0    0.00   | 7.76e-13  1.04e-13  1.82e-14 |
 G13  |   288     0     5     0    0.00   | 5.46e-13  7.31e-14  2.25e-14 |
 G11  |   288     0     5     0    0.00   | 6.65e-13  6.56e-14  4.56e-14 |
 G10  |   288     0     0     0    0.00   | 1.22e-12  4.48e-13  2.89e-13 |
 G01  |   278     0     0     0    0.00   | 1.56e-12  7.06e-13  5.98e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 4.26e-13  2.11e-13  2.97e-13 |
 SEY1 |   288     1     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   | 2.00e-12  6.54e-13  5.92e-13 |
 RESO |   288     2     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.72e-12  4.35e-13  1.96e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.77e-12  5.62e-13  2.38e-13 |
 MALI |   287     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KSTU |   273     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   286     2     0     0    0.00   |        -         -         - |
 KIRU |   288     2     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   286     1     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   286     0     0     0    0.00   |        -         -         - |
 ASC1 |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.04e-17  2.44e-16  1.47e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      AMC2      BRUS |
------------------------------------------+------------------------------+
