
 GPS week: 1271   Day: 6   MJD: 53147                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2688      0     0.05    -0.01     2.53     0.00
 cod |   288     0  28054     43    -0.16    -0.07     0.04    16.51
 emr |   288     0  11763    584  3990.95    26.67     0.06    10.86
 esa |   288     0  18071   1429  3989.68    26.60     0.06    11.54
 gfz |   288     0  20903    605     0.17    -0.27     0.03    23.25
 iga |    96     0   2592     35     0.04     0.01     0.07     0.00
 igu |    96     0   2592      0     0.05    -0.01     3.13     0.00
 jpl |   288     0  16246     18    -2.02    -0.62     0.04    21.36
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  28993    923  3990.91    26.66     0.04    16.47

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  1254    15     X   -65    26   -33  3258    -9     -     X |
    3 | -3087     4    62   -16    98  -150  1935    -4     -  -170 |
    4 |  -808     4   -92   -32    58   -99 -5963    -5     -     1 |
    5 |  -698    33   -96    58    54   156  6402    46     -  -113 |
    6 | -4132    40  -108   244    -3   -15 -7456    52     -  -172 |
    7 |  1746   -51   -25  -126    97    30 -1629     5     -    16 |
    8 |  2599    62  -103    26   -75   -35  3882    64     -    49 |
    9 | -2793   -47   -80   -45   133    23  -122    39     -   -83 |
   10 |  1497    -6    89   -44   -46   -47 -3514    89     -   -13 |
   11 |  5514     0   -44    28   -21   -27 -4043    -5     -    43 |
   13 |  4053   117   -22   -96   -71    25  1498    49     -    28 |
   14 |  1205    17   -22    62   -81    51 -1294   100     -     X |
   15 | -6719   -29     7   -73    31    22  7419   128     -   -50 |
   16 | -1834    57    89   -22  -136  -156     -   143     -    -2 |
   17 |  -301   -30    28    62   110    59  1438    41     -  -213 |
   18 |  3548     2   -73    12    29    20 -1969   104     -   -73 |
   19 |  3638   155     -    63   -45   623  -908     -     -  -136 |
   20 |  4956    65    35   115  -151    80 -1016   164     -   -61 |
   21 |  2215   -44   -27   -36     X   142 -1880   107     -    17 |
   22 | -6317   -57    32  -123    35    -7 -3400    67     -    28 |
   24 |  2480    14     X     X    -3     - 10800    55     -   -50 |
   25 |  2591    72   107   -85   -23  -178  3242   148     -  -141 |
   26 |  -272    17   -41    42   -52   -43  -307   101     -   -12 |
   27 | -2304   -51   -30   -56   118  -193 -1799    26     -   -72 |
   28 |  2213   -87   -62   156  -109   140 -2154    14     -   165 |
   29 | -5073   -22    22  -118   -78    -1 -5674   118     -   131 |
   30 | -2927    62  -117    -6   132   -47 -4762    40     -  -195 |
   31 | -2241    96    52   -61   -39  -111  8016    -1     -   -31 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -     -     -     -     -     -    29     -   -37 |
 ALGO |     -     -   -46     X     -     -     -    51     -   -36 |
 ALRT |     -   -52     -     -    37     -     -     -     -     - |
 AMC2 |     -   -45     -     -     -     -     -   -62     -   126 |
 ARTU |     -    60     -    46   -17     -     -   -52     -     - |
 ASC1 |     -    98     -     -   -58     -     -     -     -   -17 |
 ASPA |     -     -     -     -   152     -     -     -     -  -215 |
 AUCK |     -   -13     -     X     -     -     -     -     -    13 |
 BILI |     -     9     -     -     5     -     -   -13     -     - |
 BOGT |     -   -81     -   209   133     -     -  -176     -   -16 |
 BOR1 |     -   115     -     -     -     -     -     -     -  -115 |
 BRMU |     -     -     -     -   -83     -     -     -     -   118 |
 BRUS |     -   194     -     -     -     -     -  -117     -   -43 |
 CAGZ |     -   -61     -     -     -     -     -     -     -    61 |
 CAS1 |     -    63     -   173  -113     -     -    41     -   -78 |
 CEDU |     -  -201     -   198     -     -     -    99     -   -64 |
 CHAT |     -   -58     -     -    12     -     -     -     -    41 |
 COCO |     -    81     -  -108   113     -     -   -68     -   -78 |
 CRO1 |     -    12    16     -    65     -     -   -70     -   -24 |
 DAKA |     -    86     -     -   -61     -     -     -     -     - |
 DAV1 |     -    82     -     -  -104     -     -    67     -   -23 |
 DRAO |     -   -50    -1  -116     -     -     -   132     -   -38 |
 DWH1 |     -   232     -     -     -     -     -  -128     -   -67 |
 FAIR |     -   -23     -    14   -78     -     -    21     -    95 |
 FLIN |     -    39     -     -     -     -     -   -30     -     - |
 FORT |     -   326  -148     -   -49     -     -     -     -  -114 |
 GODE |     -   -42     -    56     -     -     -     -     -     3 |
 GOLD |     -     2     -     -     -     -     -     0     -    -2 |
 GUAM |     -    60     -     X    41     -     -  -302     -   273 |
 GUAT |     -   -94     -     -   -10     -     -     -     -   108 |
 HOB2 |     -   -22     -     -     -     -     -     -     -    22 |
 HOFN |     -     -     -     -   -71     -     -    77     -     - |
 HRAO |     -     -     -     -  -155     -     -    61     -   139 |
 IISC |     -   -37     -  -101    48     -     -     -     -    40 |
 ISPA |     -   -26     -     -    46     -     -   -29     -     - |
 JAB1 |     -    22     -   -31     -     -     -     -     -     - |
 KARR |     -    86     -  -123     -     -     -     -     -     - |
 KERG |     -    51     -   -17     6     -     -     -     -   -48 |
 KGN0 |     -   -23     -     -     -     -     -     -     -    23 |
 KIRU |     -   -19     -     X     -     -     -     -     -    19 |
 KIT3 |     -     -     -   -33    17     -     -     -     -     - |
 KOUR |     -     -     -  -252     -     -     -     -     -   177 |
 LPGS |     -   -35     -    49     -     -     -     -     -     - |
 MAC1 |     -   -95     -   126  -106     -     -    73     -    62 |
 MADR |     -     -     -     -     -     -     -   -90     -   116 |
 MALI |     -    51     -   -95     -     -     -     -     -    16 |
 MAS1 |     -     -   129  -114   -44     -     -    47     -    -3 |
 MAW1 |     -     -     -     -    28     -     -     -     -   -40 |
 MBAR |     -    36     -     -   -59     -     -    96     -   -77 |
 MDO1 |     -     -    18     -    -2     -     -     -     -    -9 |
 METS |     -   -11     -     -     -     -     -     -     -    11 |
 MKEA |     -    10     -   -50    35     -     -   -16     -    -3 |
 NLIB |     -     -     -     -     -     -     -   101     -  -132 |
 NNOR |     -     -     -   103     -     -     -   -56     -     X |
 NPLD |     -    34     -     -     -     -     -     -     -   -34 |
 NRC1 |     -     -    52     -   -26     -     -   -60     -    81 |
 NRIL |     -    33     -     -   -31     -     -     9     -     - |
 NSSP |     -  -107     -     -     -     -     -   -26     -   141 |
 NTUS |     -  -128     -     -     -     -     -     -     -   128 |
 NYA1 |     -  -310     -     -   137     -     -     -     -   126 |
 NYAL |     -     -    51     -     -     -     -     -     -   -33 |
 ONSA |     -  -105     -   151     -     -     -     -     -     - |
 PDEL |     -    78     -     -   -25     -     -   -34     -     - |
 PERT |     -   -32    16  -121    96     -     -     -     -   -29 |
 PETP |     -   -99     -     -    67     -     -     4     -     - |
 PIE1 |     -     -     -  -112     -     -     -    97     -   -47 |
 POTS |     -   -55     -     -    39     -     -     -     -     - |
 RESO |     -    16     -     -     -     -     -   -12     -     - |
 REYK |     -   -97     -     -     -     -     -     -     -    98 |
 RIOG |     -    41     -     -   -29     -     -     -     -     - |
 SANT |     -   -56     -    57   -32     -     -     -     -    61 |
 SCH2 |     -     -     -     -     -     -     -   -98     -   127 |
 SFER |     -  -120     -     -     -     -     -     -     -   121 |
 STJO |     -    75   -14     -     -     -     -  -125     -    97 |
 THTI |     -     -   135    55   -87     -     -     -     -    -5 |
 THU3 |     -   -25     -  -139     -     -     -     -     -   123 |
 TID1 |     -     -     -     -     -     -     -   -29     -    38 |
 TIDB |     -   -11     -    29     -     -     -     -     -    -9 |
 TOW2 |     -   -80     -     -    -3     -     -    65     -     - |
 TRO1 |     -   -81     -     -    -9     -     -     -     -    94 |
 TSKB |     -   -78    12     -    48     -     -     -     -     3 |
 TWTF |     -   -42     -     -     -     -     -     -     -    42 |
 USN1 |     -   279     -     -     -     -     -  -369     -   215 |
 USNO |     -   -88   131     -     -     -     -     -     -     2 |
 USUD |     -     -     -    91     -     -     -    -2     -   -61 |
 VILL |     -    -6     -     X     -     -     -     -     -     6 |
 WHIT |     -   -11     -     -     -     -     -     -     -    11 |
 WSRT |     -    75     -     -     -     -     -     -     -   -75 |
 WUHN |     -     -     -     -   237     -     -     -     -  -335 |
 YAKT |     -  -127     -     -     -     -     -    24     -    96 |
 YAR2 |     -     -     -   -58     -     -     -     -     -    40 |
 YELL |     -    13    58    58     X     -     -     -     -   -93 |
 YSSK |     -   -43     -     -     -     -     -    33     -     - |
 ZWEN |     -     -     -   209  -104     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4915    78     X    65    41    78  4719   139     -     X |  288   4.53
    3 |  2037    47    65    47    35    27  1991    80     -    43 |  288   2.27
    4 |  1242    46   106    62    25    73  2446    87     -    55 |  288   0.43
    5 |  3866    38    57    89    21    16  4680    26     -    30 |  288   1.77
    6 |  2406    79    81    67    23    31  5890    48     -    33 |  288   2.03
    7 |  1706    57    51    83    39    52  1081    65     -    99 |  288   0.68
    8 |  1827    18    26    33    32    24  1168    25     -    57 |  288   1.36
    9 |  2358    30    46    67    26    41  1797    33     -    26 |  288   1.89
   10 |  4732    56    52    49    28    38  3533    40     -    60 |  288   2.01
   11 |  1195    69    60   101    31    59  1951    44     -    49 |  288   0.28
   13 |   753    73    28    53    23    51  1142    19     -    35 |  288   0.28
   14 |   830    50    62    50    43    48   600    26     -     X |  288   0.25
   15 |  4067    42    44    47    30    39  5486    47     -    45 |  288   3.99
   16 |  3000    31    51    33    36   165     -    35     -    78 |  288   0.20
   17 |  2010    52    49    51    24    42  1236    29     -    55 |  288   0.67
   18 |   814    43    72    44    35   117  1182    27     -    43 |  288   0.42
   19 |   820    41     -    30    26   122   780     -     -    38 |  288   0.35
   20 |   654    46    41    60    36    38   623    26     -    59 |  288   0.18
   21 |  1957    67    64    36     X    84   821    38     -    54 |  288   0.27
   22 |  1228    63    78    31    26    60  1748    30     -    40 |  288   0.59
   24 |  6124    95     X     X    66     -  8028    92     -    87 |  288   3.22
   25 |  1553    24    31    69    21    51  2506    27     -    52 |  288   1.46
   26 |  2548   123    73    75    77    87  1262    45     -    56 |  288   0.52
   27 |  1116    22    26    40    29    31   967    28     -    42 |  288   0.59
   28 |   873    29   144    87    51    30  1179    41     -    39 |  288   0.77
   29 |  1986    98    76    71    61   117  3208    58     -    90 |  288   0.46
   30 |  1666    40    64    79    20    27  2984    52     -    75 |  288   0.65
   31 |  1455    54    54    36    19    57  4737    36     -    33 |  288   1.56
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -     -     -     -     -     -    10     -    13 |  288   0.08
 ALGO |     -     -    23     X     -     -     -    23     -    20 |  288   0.03
 ALRT |     -    12     -     -     9     -     -     -     -     - |  288   8.35
 AMC2 |     -    19     -     -     -     -     -    13     -    20 |  288   0.02
 ARTU |     -    28     -    33    15     -     -    27     -     - |  288   9.91
 ASC1 |     -    30     -     -    21     -     -     -     -    33 |  287    >>>
 ASPA |     -     -     -     -    22     -     -     -     -    32 |  286    >>>
 AUCK |     -    39     -     X     -     -     -     -     -    39 |  264  11.29
 BILI |     -    45     -     -    27     -     -    17     -     - |  286   9.97
 BOGT |     -    40     -    87    36     -     -    34     -    56 |  288   8.27
 BOR1 |     -    18     -     -     -     -     -     -     -    18 |  287   0.84
 BRMU |     -     -     -     -    22     -     -     -     -    31 |  288    >>>
 BRUS |     -    29     -     -     -     -     -    25     -    27 |  288   0.02
 CAGZ |     -    35     -     -     -     -     -     -     -    35 |  288   0.42
 CAS1 |     -    48     -    58    30     -     -    36     -   104 |  288   8.03
 CEDU |     -    47     -    54     -     -     -    40     -    22 |  288  11.35
 CHAT |     -    29     -     -    22     -     -     -     -    14 |  287  12.85
 COCO |     -    26     -    64    41     -     -    32     -    36 |  288   8.85
 CRO1 |     -    27    28     -    30     -     -    32     -    59 |  288  19.47
 DAKA |     -    20     -     -    14     -     -     -     -     - |  264  18.91
 DAV1 |     -    33     -     -    21     -     -    38     -    55 |  288  14.43
 DRAO |     -    37    17    30     -     -     -    27     -    19 |  288   0.09
 DWH1 |     -    57     -     -     -     -     -    46     -   102 |  288   0.61
 FAIR |     -    29     -    26    30     -     -    18     -    28 |  288   0.03
 FLIN |     -    19     -     -     -     -     -    15     -     - |  287   8.85
 FORT |     -    69    70     -    58     -     -     -     -    38 |  288   0.10
 GODE |     -    53     -    47     -     -     -     -     -    32 |  288   0.12
 GOLD |     -    88     -     -     -     -     -    19     -    76 |  288  18.98
 GUAM |     -    25     -     X    47     -     -    29     -    44 |  288   8.86
 GUAT |     -    30     -     -    29     -     -     -     -    38 |  288    >>>
 HOB2 |     -    36     -     -     -     -     -     -     -    36 |  288   0.04
 HOFN |     -     -     -     -    17     -     -    19     -     - |  288    >>>
 HRAO |     -     -     -     -    35     -     -    48     -    23 |  288   0.69
 IISC |     -    36     -    64    29     -     -     -     -    31 |  288  19.64
 ISPA |     -    54     -     -    33     -     -    39     -     - |  288  16.74
 JAB1 |     -    26     -    37     -     -     -     -     -     - |  288  14.98
 KARR |     -    32     -    45     -     -     -     -     -     - |  288  11.17
 KERG |     -    37     -    57    38     -     -     -     -    54 |  288   2.23
 KGN0 |     -    14     -     -     -     -     -     -     -    14 |  287   0.21
 KIRU |     -    21     -     X     -     -     -     -     -    21 |  276   7.39
 KIT3 |     -     -     -    55    27     -     -     -     -     - |  272  19.49
 KOUR |     -     -     -    25     -     -     -     -     -    18 |  288   1.34
 LPGS |     -    54     -    77     -     -     -     -     -     - |  260  30.35
 MAC1 |     -    63     -    45    30     -     -    47     -    35 |  288  11.54
 MADR |     -     -     -     -     -     -     -    13     -    17 |  288  12.02
 MALI |     -    26     -    53     -     -     -     -     -    33 |  288  22.28
 MAS1 |     -     -    49    37    20     -     -    18     -    26 |  288   2.06
 MAW1 |     -     -     -     -    21     -     -     -     -    30 |  288 188.78
 MBAR |     -    21     -     -    35     -     -    39     -    57 |  288  23.97
 MDO1 |     -     -    34     -    28     -     -     -     -    27 |  288 242.07
 METS |     -    19     -     -     -     -     -     -     -    19 |  287   9.68
 MKEA |     -    36     -    76    20     -     -    28     -    36 |  288  30.49
 NLIB |     -     -     -     -     -     -     -    34     -    44 |  288   0.06
 NNOR |     -     -     -    37     -     -     -    20     -     X |  288  10.80
 NPLD |     -    22     -     -     -     -     -     -     -    22 |  287   0.04
 NRC1 |     -     -    35     -    21     -     -    19     -    19 |  288   0.02
 NRIL |     -    28     -     -    11     -     -    23     -     - |  288   8.65
 NSSP |     -    29     -     -     -     -     -    29     -    19 |  288  13.34
 NTUS |     -    23     -     -     -     -     -     -     -    23 |  288   9.77
 NYA1 |     -    67     -     -    69     -     -     -     -   137 |  288  11.68
 NYAL |     -     -    48     -     -     -     -     -     -    32 |  288   0.06
 ONSA |     -    21     -    31     -     -     -     -     -     - |  288   0.02
 PDEL |     -    21     -     -    11     -     -    18     -     - |  288  55.77
 PERT |     -    26    29    51    15     -     -     -     -    20 |  288   2.17
 PETP |     -    23     -     -    25     -     -    20     -     - |  287  11.17
 PIE1 |     -     -     -    46     -     -     -    29     -    19 |  288   0.03
 POTS |     -    28     -     -    20     -     -     -     -     - |  288  23.57
 RESO |     -    13     -     -     -     -     -    10     -     - |  288   8.10
 REYK |     -    23     -     -     -     -     -     -     -    23 |  288   7.66
 RIOG |     -    40     -     -    28     -     -     -     -     - |  288  11.07
 SANT |     -    57     -    76    28     -     -     -     -    30 |  288  10.83
 SCH2 |     -     -     -     -     -     -     -    20     -    25 |  288  44.74
 SFER |     -    18     -     -     -     -     -     -     -    18 |  286   0.57
 STJO |     -    26    46     -     -     -     -    17     -    24 |  288   0.04
 THTI |     -     -    48    40    16     -     -     -     -    22 |  288   5.95
 THU3 |     -    26     -    58     -     -     -     -     -    61 |  288   7.61
 TID1 |     -     -     -     -     -     -     -    14     -    19 |  288   0.03
 TIDB |     -    23     -    35     -     -     -     -     -    26 |  288   0.05
 TOW2 |     -    42     -     -    30     -     -    28     -     - |  288   8.02
 TRO1 |     -    12     -     -    33     -     -     -     -    44 |  288   8.49
 TSKB |     -    64    28     -    39     -     -     -     -    24 |  288   1.58
 TWTF |     -    31     -     -     -     -     -     -     -    31 |  288   0.31
 USN1 |     -    31     -     -     -     -     -    25     -    37 |  285   0.07
 USNO |     -    23    24     -     -     -     -     -     -    20 |  288   0.06
 USUD |     -     -     -    78     -     -     -    28     -    27 |  288  12.25
 VILL |     -    25     -     X     -     -     -     -     -    25 |  288   4.53
 WHIT |     -    12     -     -     -     -     -     -     -    12 |  288   2.48
 WSRT |     -    10     -     -     -     -     -     -     -    10 |  288   0.04
 WUHN |     -     -     -     -    17     -     -     -     -    23 |  287  15.19
 YAKT |     -    25     -     -     -     -     -    35     -    34 |  288   0.85
 YAR2 |     -     -     -    34     -     -     -     -     -    24 |  288   6.97
 YELL |     -    36    39    48     X     -     -     -     -    40 |  288   0.04
 YSSK |     -    42     -     -     -     -     -    32     -     - |  287  10.20
 ZWEN |     -     -     -    25    12     -     -     -     -     - |  276  20.57
 -----+-------------------------------------------------------------+--------------
 TOT  |  2532    44    57    56    32    68  3126    35     -    44 |


 BEST CLOCK FIT: BRUS   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 PIE1 |   288     0     0   288   10.86   | 3.79e-14  5.76e-15  2.30e-15 |
 BRUS |   288     0     0   288   10.86   | 3.68e-14  7.08e-15  2.47e-15 |
 AMC2 |   288     0     0   288   10.86   | 3.22e-14  7.14e-15  1.21e-15 |
 ONSA |   288     0     0   288    8.96   | 3.25e-14  6.76e-15  3.31e-15 |
 NPLD |   287     0     0   286    6.48   | 3.74e-14  6.73e-15  2.73e-15 |
 USNO |   288     1     0   287    6.12   | 4.64e-14  1.91e-14  5.13e-15 |
 NRC1 |   288     0     0   288    4.91   | 3.23e-14  8.70e-15  2.31e-15 |
 FAIR |   288     0     0   288    4.28   | 3.99e-14  1.13e-14  2.54e-15 |
 ALGO |   288     0     0   288    3.77   | 2.88e-14  6.43e-15  2.32e-15 |
 TID1 |   288     0     0   288    3.73   | 5.00e-14  8.50e-15  1.97e-15 |
 NLIB |   288     0     0   288    3.71   | 8.02e-14  2.47e-14  5.95e-15 |
 ALBH |   288     0     0   288    3.50   | 4.67e-14  8.94e-15  6.54e-15 |
 STJO |   288     0     0   288    3.20   | 3.55e-14  1.03e-14  4.32e-15 |
 HOB2 |   288     0     0   288    3.06   | 4.24e-14  1.47e-14  2.54e-15 |
 WSRT |   288     0     0   288    2.28   | 3.92e-14  8.74e-15  2.61e-15 |
 TIDB |   288     0     0   288    2.23   | 1.64e-13  1.62e-14  4.64e-15 |
 YELL |   288     0     0   288    1.95   | 3.24e-14  7.15e-15  2.56e-15 |
 DRAO |   288     1     0   287    1.82   | 6.64e-14  2.29e-14  1.03e-14 |
 USN1 |   285     0     0   283    1.75   | 9.72e-14  2.25e-14  5.40e-15 |
 NYAL |   288     0     0   288    1.29   | 3.54e-14  1.09e-14  4.99e-15 |
 GODE |   288     0     0   288    1.15   | 5.42e-14  1.96e-14  9.04e-15 |
 NYA1 |   288     1     0   287    1.13   | 4.97e-14  1.23e-14  6.23e-15 |
 FORT |   288     0     0   288    0.60   | 7.16e-14  2.41e-14  9.11e-15 |
 KGN0 |   287     0     0   286    0.16   | 3.34e-13  7.34e-14  1.41e-14 |
 G04  |   288     0     0   288    0.14   | 4.58e-13  1.15e-13  3.47e-14 |
 G26  |   288     0     0   287    0.13   | 3.67e-13  9.34e-14  3.68e-14 |
 TWTF |   288     0     0   288    0.11   | 3.78e-13  1.00e-13  2.65e-14 |
 G27  |   288     0     0   288    0.10   | 3.32e-13  9.73e-14  6.50e-14 |
 SFER |   286     0     0   284    0.10   | 3.90e-13  1.39e-13  6.05e-14 |
 G29  |   288     0     0   288    0.09   | 4.26e-13  1.16e-13  4.56e-14 |
 G11  |   288     0     5    90    0.09   | 6.78e-13  6.79e-14  3.53e-14 |
 G07  |   288     0     0   288    0.08   | 2.88e-13  9.10e-14  9.23e-14 |
 G17  |   288     0     0   288    0.08   | 3.94e-13  1.19e-13  5.46e-14 |
 BOR1 |   287     0     0   286    0.08   | 4.37e-13  1.05e-13  8.17e-14 |
 DWH1 |   288     0     0   288    0.07   | 5.12e-13  1.46e-13  6.29e-14 |
 G30  |   288     0     0   288    0.06   | 3.43e-13  9.46e-14  4.75e-14 |
 G06  |   288     0     0   288    0.05   | 4.47e-13  1.25e-13  1.60e-13 |
 HRAO |   288     0     0   288    0.04   | 1.12e-13  2.85e-14  6.90e-14 |
 G31  |   288     0     0   288    0.02   | 2.70e-13  1.64e-13  1.22e-13 |
 G19  |   288     0     4    48    0.02   | 6.52e-13  7.57e-14  1.73e-14 |
 YAKT |   288     0     0   143    0.01   | 4.49e-13  1.27e-13  8.05e-14 |
 TSKB |   288     0     0   288    0.01   | 9.41e-13  2.52e-13  1.39e-13 |
 G08  |   288     0     0   288    0.01   | 1.26e-12  3.81e-13  1.28e-13 |
 KERG |   288     0     0   288    0.01   | 1.20e-12  4.10e-13  1.33e-13 |
 G05  |   288     0     0   288    0.01   | 1.42e-12  3.65e-13  2.34e-13 |
 KOUR |   288     0     0   288    0.01   | 1.43e-12  4.21e-13  1.29e-13 |
 G09  |   288     0     0   288    0.01   | 1.35e-12  3.78e-13  2.02e-13 |
 G25  |   288     0     1   143    0.01   | 1.50e-12  4.19e-13  1.54e-13 |
 GPST |   288     0     0     0    0.00   | 1.72e-14  5.30e-15  1.31e-15 |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 DAKA |   264     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     5     0    0.00   | 5.94e-13  6.35e-14  4.91e-14 |
 G24  |   288     0     0     0    0.00   | 1.49e-12  4.16e-13  3.94e-13 |
 G22  |   288     0     6     0    0.00   | 5.39e-13  5.68e-14  3.66e-14 |
 G21  |   288     1     6     0    0.00   | 9.63e-13  1.25e-13  3.16e-14 |
 G20  |   288     0     6     0    0.00   | 6.25e-13  6.74e-14  1.46e-14 |
 G18  |   288     3     6     0    0.00   | 1.26e-12  1.47e-13  3.75e-14 |
 G16  |   288     0     5     0    0.00   | 4.92e-13  5.43e-14  1.59e-14 |
 G15  |   288     0     0     0    0.00   | 1.63e-12  6.44e-13  3.93e-13 |
 G14  |   288     0     6     0    0.00   | 6.57e-13  7.50e-14  2.85e-14 |
 G13  |   288     0     6     0    0.00   | 6.22e-13  6.98e-14  2.14e-14 |
 G10  |   288     0     0     0    0.00   | 1.14e-12  3.77e-13  2.68e-13 |
 G03  |   288     0     0     0    0.00   | 1.41e-12  3.90e-13  1.75e-13 |
 G01  |   288     0     0     0    0.00   | 1.51e-12  8.14e-13  3.98e-13 |
 ZWEN |   276     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.14e-13  2.90e-13  2.55e-13 |
 VILL |   288     1     0     0    0.00   | 1.15e-12  1.19e-12  3.17e-13 |
 USUD |   288     2     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 4.04e-13  2.24e-13  4.56e-13 |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.78e-12  5.54e-13  2.27e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     2     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     2     1     0    0.00   | 7.68e-13  8.22e-13  1.38e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     2     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.80e-12  5.48e-13  1.37e-13 |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   260     0     0     0    0.00   |        -         -         - |
 KIT3 |   272     0     0     0    0.00   |        -         -         - |
 KIRU |   276     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   287     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     2     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 CAGZ |   288     0     6     0    0.00   | 1.68e-12  1.58e-13  3.38e-14 |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   286     0     0     0    0.00   |        -         -         - |
 ASC1 |   287     1     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.24e-17  2.69e-16  1.62e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      PIE1      AMC2 |
------------------------------------------+------------------------------+
