
 GPS week: 1272   Day: 1   MJD: 53149                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2684      0    -0.07    -0.04     2.48     0.00
 cod |   288     0  26230     92     0.07    -0.59     0.05    13.55
 emr |   288     0  20774     12  4044.62    25.78     0.04    20.35
 esa |   288     0  18242   1607  4043.46    25.92     0.07     9.04
 gfz |   288     0  20834    320    -0.13     0.07     0.04    19.20
 iga |    96     0   2684     10    -0.09    -0.06     0.10     0.00
 igu |    96     0   2588      0    -0.09    -0.03     2.84     0.00
 jpl |   288     0  17215    279    -2.29    -1.74     0.03    24.13
 ngs |    96     0   2684      0    -0.06    -0.07     2.43     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  33566   1272  4044.65    25.75     0.05    13.72

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  8446    21  -112   138    35   -55  -983   -19  6939     -    14 |
    3 | -9159    89    24   117    32  -249 -9354   -16 -7399     -  -243 |
    4 | -2969    67   -58    62   -38   -56  -545     6 -2770     -    32 |
    5 |   924   -83    17   -25    76    84 -1860    69    71     -  -174 |
    6 | -1649    36   -68    23   109  -183-13709    69 -1562     -  -109 |
    7 | -3573   -60   -35   -64    79   -14 -2231   -22 -3161     -    79 |
    8 | -8700    26   -51   110   -44    82  5220    67 -8535     -    31 |
    9 | -3419   -77   -90   -73   123  -201 -1965    52 -2709     -     X |
   10 |  4072    16    10  -105   -20   -91  1623   118  2111     -  -127 |
   11 |  4943   -17   -85   323   -55   -70  1105     4  4518     -     X |
   13 |  2561   100  -190    44    55   -71   851   -18  2710     -    83 |
   14 |  2846   120    -7    23   -66     1  1425   161  2331     -   -51 |
   15 | -4509    -7    66    30    39    61 10025   105 -4218     -  -177 |
   16 |  4764    57   -18   107   -77   -13    97   118  4933     -    -5 |
   17 | -2661   -42    43   -52   105    30  4905    42 -1551     -  -208 |
   18 |  3216    98  -107    65   -20  -201   846   109  2847     -  -130 |
   19 |  6617   175     3   281  -150  1786  1489   138  6086     -  -168 |
   20 |  2449    15   -36    14   -34  -114  1915   104  3101     -  -106 |
   21 |  1250    41  -113   154   -38   133  1671   132  1482     -    65 |
   22 | -1900    41  -112    56    56   -55 -2197    86 -1223     -     1 |
   24 | -4272  -111   -12     X   101    20     -   -66 -2872     -    -7 |
   25 |  1255   177   -19   -86    62  -267  2109    88  -196     -  -186 |
   26 |  -841   114   -97     X   106  -209 -2152    45  -738     -  -190 |
   27 | -2033   -66  -105   107   107  -184 -1861    85 -1987     -  -140 |
   28 |  3450  -157   -72   197   -80   134 -1424    14  3498     -   220 |
   29 |  1850   -15    -4  -106    53  -104  4083    68  1042     -    14 |
   30 | -3153    33  -131   -30   149  -131   244    79 -2876     -  -165 |
   31 |   154    20    86    56  -168   -53   573    64    83     -   -54 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -    24     -     -     -     -    -5     -     -   -26 |
 ALGO |     -   -40   -33     X     -     -     -    90     -     -   -70 |
 ALRT |     -   -35     -     -    24     -     -     -     -     -     - |
 AMC2 |     -   -66   125     -     -     -     -  -111     -     -    76 |
 ARTU |     -    66     -    84   -10     -     -   -60     -     -     - |
 ASC1 |     -   -39     -   -11   -46     -     -     -     -     -   107 |
 BAHR |     -     -   -86   103    42     -     -     -     -     -     1 |
 BAN2 |     -     -   -28     -     -     -     -     -     -     -    41 |
 BILI |     -   -72     -     -   147     -     -   -77     -     -     - |
 BOGT |     -  -117     -  -318    38     -     -    54     -     -   115 |
 BOR1 |     -     7    51     -     -     -     -     -     -     -   -82 |
 BREW |     -     -    51     -     -     -     -     -     -     -   -75 |
 BRMU |     -     -     -     -   -90     -     -     -     -     -   126 |
 BRUS |     -   135    99     -     -     -     -  -144     -     -   -27 |
 CAGZ |     -   -46     -     -     -     -     -     -     -     -    45 |
 CAS1 |     -    35     -    -2   -75     -     -    71     -     -   -53 |
 CHUR |     -   -82   173     -     -     -     -     -     -     -  -193 |
 COCO |     -    12     -    77    91     -     -   -42     -     -  -117 |
 CRO1 |     -    18   -58   112   121     -     -   -51     -     -   -58 |
 DAKA |     -    69     -     -   -48     -     -     -     -     -     - |
 DARW |     -     -    53     -     -     -     -   -44     -     -     - |
 DAV1 |     -    46     -     -   -82     -     -    65     -     -   -46 |
 DRAO |     -     -   -79     -     -     -     -   109     -     -   -75 |
 DWH1 |     -   190   198     -     -     -     -  -244     -     -   -53 |
 FAIR |     -     -    -1   108  -140     -     -    56     -     -    28 |
 FORT |     -   455  -161  -434    95     -     -     -     -     -     X |
 GODE |     -     -    89   -91     -     -     -     -     -     -   -77 |
 GOL2 |     -     -    91     -     -     -     -     -     -     -  -136 |
 GOLD |     -    73     -   -58     -     -     -   -23     -     -     0 |
 GUAM |     -     -     -     X   -63     -     -     X     -     -    88 |
 GUAT |     -   -50     -     -   -70     -     -     -     -     -   148 |
 HERS |     -     -  -237     -     -     -     -     -     -     -   351 |
 HOB2 |     -   -63    62     -     -     -     -     -     -     -   -29 |
 HOFN |     -     -     -     -   -44     -     -    35     -     -     - |
 HRAO |     -     -     -     -     -     -     -   -39     -     -    69 |
 IISC |     -    -3     -     9    12     -     -     -     -     -   -20 |
 IRKT |     -     -    35   -79     -     -     -     -     -     -     - |
 JAB1 |     -    26     -   -39     -     -     -     -     -     -     - |
 JPLM |     -     -     1     -     -     -     -     -     -     -    -1 |
 KERG |     -     -     5   139   -18     -     -     -     -     -   -73 |
 KGN0 |     -   -51    13     -     -     -     -     -     -     -    32 |
 KIRU |     -   -25     -     -     -     -     -     -     -     -    24 |
 KIT3 |     -     -     -   -53   -51     -     -   -13     -     -   131 |
 KOUR |     -     -     -  -374   151     -     -     -     -     -    16 |
 KSTU |     -     -     -     -     -     -     -   -58     -     -   102 |
 KUNM |     -     -     -     -     -     -     -   -27     -     -    48 |
 LHAS |     -     -     -  -157     -     -     -     -     -     -   103 |
 LPGS |     -   -71   123  -342     -     -     -     6     -     -    90 |
 MAC1 |     -  -144     -   148   -68     -     -   106     -     -   -47 |
 MADR |     -     -     -     -     -     -     -   -90     -     -   158 |
 MAS1 |     -   -89    48    19   -10     -     -    43     -     -   -60 |
 MATE |     -    48     -     -     -     -     -     -     -     -   -48 |
 MAW1 |     -    13     -     -     X     -     -     -     -     -   -13 |
 MBAR |     -     4     -     -   -93     -     -   102     -     -   -56 |
 MCM4 |     -   168     -     -  -118     -     -     -     -     -     - |
 MDO1 |     -     -    13     -   -52     -     -     -     -     -    52 |
 MEDI |     -     -    62     -     -     -     -     -     -     -   -91 |
 METS |     -   -49    25     -     -     -     -     -     -     -    12 |
 MIZU |     -     -   -12     -     -     -     -   -32     -     -    74 |
 MKEA |     -     -     -    -7   -73     -     -    31     -     -    53 |
 NLIB |     -     -   -32     -     -     -     -    82     -     -   -96 |
 NNOR |     -     -   263   -38     -     -     -  -227     -     -    33 |
 NPLD |     -   -53   112     -     -     -     -     -     -     -  -114 |
 NRC1 |     -     -   -14     -   -40     -     -   -12     -     -    98 |
 NRIL |     -    18     -     -     6     -     -   -15     -     -     - |
 NSSP |     -  -105     -     -     -     -     -     -     -     -   104 |
 NTUS |     -  -130     -    79     -     -     -     -     -     -    76 |
 NYA1 |     -   130     -     -   -92     -     -     -     -     -     0 |
 NYAL |     -     -    24     -     -     -     -     -     -     -   -35 |
 ONSA |     -  -149    50   113     -     -     -     -     -     -     - |
 OPMT |     -   -57    38     -     -     -     -     -     -     -     - |
 PDEL |     -     1     -     -   -40     -     -    31     -     -     - |
 PERT |     -     -   -53     X   129     -     -     -     -     -  -101 |
 PETP |     -   -60     -     -    29     -     -    10     -     -     - |
 PIE1 |     -     -    36  -124     -     -     -    53     -     -   -64 |
 POTS |     -   -28     -     -   -51     -     -     -     -     -    99 |
 PRDS |     -     -     2     -     -     -     -     -     -     -    -3 |
 QAQ1 |     -     -   -28     -     -     -     -     -     -     -    42 |
 REYK |     -  -180     -     -     -     -     -     -     -     -   178 |
 RIOG |     -   -30    41     -   -44     -     -     -     -     -    30 |
 SANT |     -   -73     -   -54     6     -     -     -     -     -   100 |
 SCH2 |     -   -66     -     -     -     -     -     -     -     -    65 |
 SFER |     -  -114     -     -     -     -     -     -     -     -   113 |
 SOFI |     -     -     -     -     -     -     -    -4     -     -     8 |
 STJO |     -    63   -77     -     -     -     -   -44     -     -   131 |
 SUTM |     -     -     -     -   -50     -     -    40     -     -     - |
 THTI |     -     -     -    54    -3     -     -   -39     -     -    37 |
 THU3 |     -   -71     -     -     -     -     -     -     -     -    70 |
 TID1 |     -     -     -     -     -     -     -     6     -     -   -11 |
 TIDB |     -    10     -   133     -     -     -     -     -     -   -98 |
 TOW2 |     -    -9     -     -    -3     -     -     8     -     -     - |
 TSKB |     -   -77    56   -75    19     -     -     -     -     -    17 |
 TWTF |     -   -35     -     -     -     -     -     5     -     -    21 |
 UNSA |     -     -     -     -     -     -     -   -75     -     -   131 |
 URUM |     -   -30     -     -     -     -     -     -     -     -    30 |
 USN1 |     -   347     -     -     -     -     -  -264     -     -   135 |
 USNO |     -   -68    70     -     -     -     -     -     -     -   -37 |
 VILL |     -    91     -  -391     -     -     -     -     -     -   158 |
 WHIT |     -   -59     -     -     -     -     -     -     -     -    58 |
 WSRT |     -    69     -     -    24     -     -     -     -     -  -102 |
 WTZR |     -     -     -  -149     -     -     -     -     -     -    98 |
 WUHN |     -    17     -     -   173     -     -     -     -     -  -258 |
 YAKT |     -   -68     -     -     -     -     -   -35     -     -   128 |
 YAR2 |     -  -115     -     -     -     -     -     -     -     -   114 |
 YELL |     -     7    70   126  -119     -     -     -     -     -   -31 |
 ZWEN |     -     -     -     1     0     -     -     -     -     -     X |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  4367   160    92    73   105   256  3091    94  5096     -   131 |  288   4.66
    3 |  5357    65    34    35    49    71  7209    43  4383     -    50 |  288   1.98
    4 |  1219    81    38    75    36   148   759    29  1144     -    65 |  288   0.46
    5 |  3789    28    34    38    29    65  2428    27  3030     -    72 |  288   2.22
    6 |  1120    60    43    29    18    47  7512    25  1206     -    41 |  288   0.91
    7 |   865    71    57    67    23    66   644    41  1017     -    38 |  288   0.77
    8 |  1696    28    30    74    20    46  4360    30  2358     -    43 |  288   1.49
    9 |  3445    28    26    65    13    60  3033    22  3430     -     X |  288   2.23
   10 |  3892    58    36    85    34    90  2433    30  4372     -    80 |  288   2.25
   11 |  1305    37    78    41    48    32   582    39  1151     -     X |  288   0.33
   13 |  1235    81    36   112    28    74   580    27  1000     -   109 |  288   0.26
   14 |  1635    79    50    83    39    56   803    46  1152     -    88 |  288   0.31
   15 |  1935    58    39    53    26    65  4843    34  1715     -    47 |  288   1.63
   16 |   562    45    32    45    31    34   372    56   580     -    48 |  288   0.17
   17 |  4119    53    32    87    32    99  3435    49  3989     -   104 |  288   0.96
   18 |  1169    47    52    51    41    93   515    18  1060     -    46 |  288   0.46
   19 |   947    56    32    55    68   124   371    70   973     -    77 |  288   0.37
   20 |  1139    44    66    45    26    63  1395    36  1087     -   123 |  288   0.35
   21 |   794    70    36    46    35   110   935    57   782     -    48 |  288   0.27
   22 |  1783    52    48    55    26    59  1179    25  1432     -    35 |  288   0.47
   24 |  4080    46    31     X    31   108     -    41  4100     -    52 |  288   2.79
   25 |  2798    32    24    66    22    72  1439    39  2424     -    42 |  288   1.42
   26 |   741   156    36     X    86   138  1370    43   695     -    34 |  277   0.72
   27 |   697    33    54    69    29    43   923    36   677     -    61 |  288   0.57
   28 |   480    31    37    62    28   101   626    49   498     -    89 |  288   0.40
   29 |  1800   117    67    88    38   133  2118    80  1421     -    87 |  288   0.75
   30 |   742    34    31    34    15    35   660    31   902     -    79 |  288   0.59
   31 |  3826    80    29    46    31   134  3132    31  4029     -    53 |  288   1.41
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    22     -     -     -     -    16     -     -    20 |  288   0.09
 ALGO |     -    22    19     X     -     -     -    13     -     -    15 |  288   0.07
 ALRT |     -    11     -     -     8     -     -     -     -     -     - |  288   8.25
 AMC2 |     -    30    15     -     -     -     -    11     -     -    19 |  288   0.03
 ARTU |     -    35     -    80    28     -     -    38     -     -     - |  288  13.10
 ASC1 |     -    24     -    33    24     -     -     -     -     -    25 |  287    >>>
 BAHR |     -     -    31    83    21     -     -     -     -     -    22 |  288   2.34
 BAN2 |     -     -    28     -     -     -     -     -     -     -    42 |  280  16.56
 BILI |     -    36     -     -    14     -     -    15     -     -     - |  287  11.13
 BOGT |     -    38     -    36    23     -     -    17     -     -    38 |  288   9.44
 BOR1 |     -    29    15     -     -     -     -     -     -     -    30 |  288   0.54
 BREW |     -     -    12     -     -     -     -     -     -     -    18 |  288   0.03
 BRMU |     -     -     -     -    18     -     -     -     -     -    25 |  288    >>>
 BRUS |     -    23    19     -     -     -     -    22     -     -    26 |  288   0.03
 CAGZ |     -    46     -     -     -     -     -     -     -     -    46 |  279   0.75
 CAS1 |     -    38     -    35    30     -     -    21     -     -    38 |  288   9.23
 CHUR |     -    82    59     -     -     -     -     -     -     -    36 |  288   4.98
 COCO |     -    22     -    49    21     -     -    32     -     -    49 |  288   8.18
 CRO1 |     -    66    28    65    36     -     -    20     -     -   107 |  283  14.56
 DAKA |     -    23     -     -    16     -     -     -     -     -     - |  264  18.85
 DARW |     -     -    42     -     -     -     -    35     -     -     - |  288   4.00
 DAV1 |     -    70     -     -    84     -     -    57     -     -    89 |  288  14.29
 DRAO |     -     -    16     -     -     -     -    11     -     -    18 |  288   0.06
 DWH1 |     -    36    20     -     -     -     -    15     -     -    34 |  288   0.65
 FAIR |     -     -    17    46    25     -     -    15     -     -    18 |  288   0.04
 FORT |     -    32    49    44    36     -     -     -     -     -     X |  288   0.17
 GODE |     -     -    26    80     -     -     -     -     -     -    22 |  266   0.23
 GOL2 |     -     -    21     -     -     -     -     -     -     -    31 |  269 118.13
 GOLD |     -    43     -    94     -     -     -    30     -     -    42 |  288  19.66
 GUAM |     -     -     -     X    25     -     -     X     -     -    35 |  279   9.79
 GUAT |     -    19     -     -    12     -     -     -     -     -    20 |  288    >>>
 HERS |     -     -    16     -     -     -     -     -     -     -    24 |  233  12.84
 HOB2 |     -    36    27     -     -     -     -     -     -     -    21 |  288   0.07
 HOFN |     -     -     -     -    24     -     -    19     -     -     - |  288    >>>
 HRAO |     -     -     -     -     -     -     -    28     -     -    49 |  288   0.73
 IISC |     -    64     -    47    49     -     -     -     -     -   122 |  288  21.08
 IRKT |     -     -    76   172     -     -     -     -     -     -     - |  231   0.24
 JAB1 |     -    23     -    34     -     -     -     -     -     -     - |  288  14.76
 JPLM |     -     -    18     -     -     -     -     -     -     -    27 |  287   6.57
 KERG |     -     -    40    74    71     -     -     -     -     -    38 |  277    >>>
 KGN0 |     -    42    20     -     -     -     -     -     -     -    32 |  287   0.41
 KIRU |     -    61     -     -     -     -     -     -     -     -    60 |  283  10.70
 KIT3 |     -     -     -    63    27     -     -    31     -     -    38 |  288  26.25
 KOUR |     -     -     -    68    34     -     -     -     -     -    23 |  288   1.79
 KSTU |     -     -     -     -     -     -     -    11     -     -    20 |  288  10.65
 KUNM |     -     -     -     -     -     -     -    15     -     -    26 |  288  28.31
 LHAS |     -     -     -   125     -     -     -     -     -     -    82 |  258    >>>
 LPGS |     -    38    28    91     -     -     -    21     -     -    29 |  288  39.13
 MAC1 |     -    51     -    53    38     -     -    39     -     -    40 |  288  11.98
 MADR |     -     -     -     -     -     -     -    17     -     -    30 |  288  12.50
 MAS1 |     -    28    31    45    54     -     -    25     -     -    45 |  288   3.40
 MATE |     -    18     -     -     -     -     -     -     -     -    18 |  288   0.08
 MAW1 |     -    40     -     -     X     -     -     -     -     -    40 |  251  61.97
 MBAR |     -    46     -     -    58     -     -    37     -     -   133 |  288  23.82
 MCM4 |     -    37     -     -    26     -     -     -     -     -     - |  263   5.88
 MDO1 |     -     -    17     -    21     -     -     -     -     -    17 |  288  15.78
 MEDI |     -     -    15     -     -     -     -     -     -     -    23 |  288    >>>
 METS |     -    26    17     -     -     -     -     -     -     -    30 |  287  11.66
 MIZU |     -     -    13     -     -     -     -    18     -     -    33 |  288   0.51
 MKEA |     -     -     -    83   119     -     -    92     -     -    65 |  288  30.88
 NLIB |     -     -    15     -     -     -     -    15     -     -    14 |  288   0.04
 NNOR |     -     -    37    57     -     -     -    31     -     -    39 |  288  11.35
 NPLD |     -    24    15     -     -     -     -     -     -     -    30 |  287   0.03
 NRC1 |     -     -    22     -    22     -     -    18     -     -    20 |  288   0.04
 NRIL |     -    31     -     -    10     -     -    19     -     -     - |  288  10.23
 NSSP |     -    23     -     -     -     -     -     -     -     -    23 |  288  13.87
 NTUS |     -    30     -    41     -     -     -     -     -     -    34 |  288   9.34
 NYA1 |     -    26     -     -    12     -     -     -     -     -    22 |  288   0.08
 NYAL |     -     -    16     -     -     -     -     -     -     -    24 |  288   0.08
 ONSA |     -    16    31    63     -     -     -     -     -     -     - |  288   0.11
 OPMT |     -    19    13     -     -     -     -     -     -     -     - |  287   0.06
 PDEL |     -    19     -     -    19     -     -    17     -     -     - |  288  56.90
 PERT |     -     -    34     X    36     -     -     -     -     -    27 |  286   3.09
 PETP |     -    46     -     -    19     -     -    19     -     -     - |  286  11.42
 PIE1 |     -     -    22    34     -     -     -    15     -     -    24 |  288   0.08
 POTS |     -    32     -     -    33     -     -     -     -     -    29 |  288  21.88
 PRDS |     -     -    13     -     -     -     -     -     -     -    19 |  288   2.21
 QAQ1 |     -     -    18     -     -     -     -     -     -     -    27 |  288   7.50
 REYK |     -    15     -     -     -     -     -     -     -     -    15 |  288   7.38
 RIOG |     -    46    25     -    62     -     -     -     -     -    69 |  288   9.67
 SANT |     -    38     -    68    30     -     -     -     -     -    43 |  288   8.32
 SCH2 |     -    29     -     -     -     -     -     -     -     -    29 |  288  90.35
 SFER |     -    37     -     -     -     -     -     -     -     -    36 |  283 287.29
 SOFI |     -     -     -     -     -     -     -    13     -     -    22 |  287  71.46
 STJO |     -    26    22     -     -     -     -    16     -     -    31 |  288   0.03
 SUTM |     -     -     -     -    30     -     -    24     -     -     - |  288   1.66
 THTI |     -     -     -    90    56     -     -    37     -     -    39 |  288   5.90
 THU3 |     -    25     -     -     -     -     -     -     -     -    25 |  288   7.56
 TID1 |     -     -     -     -     -     -     -    22     -     -    39 |  288   0.08
 TIDB |     -    30     -    38     -     -     -     -     -     -    37 |  288   0.09
 TOW2 |     -    33     -     -    23     -     -    25     -     -     - |  288   9.65
 TSKB |     -    67    30    42    31     -     -     -     -     -    38 |  288   1.27
 TWTF |     -    44     -     -     -     -     -    23     -     -    32 |  288   0.35
 UNSA |     -     -     -     -     -     -     -    25     -     -    44 |  264  16.93
 URUM |     -    30     -     -     -     -     -     -     -     -    30 |  288  14.41
 USN1 |     -    25     -     -     -     -     -    13     -     -    23 |  286   0.07
 USNO |     -    36    20     -     -     -     -     -     -     -    17 |  288   0.05
 VILL |     -    22     -    38     -     -     -     -     -     -    30 |  288   4.23
 WHIT |     -    23     -     -     -     -     -     -     -     -    23 |  288   5.42
 WSRT |     -    37     -     -    17     -     -     -     -     -    33 |  288   0.04
 WTZR |     -     -     -    38     -     -     -     -     -     -    25 |  173   0.15
 WUHN |     -    87     -     -    49     -     -     -     -     -    39 |  287  14.14
 YAKT |     -    64     -     -     -     -     -    37     -     -    30 |  287    >>>
 YAR2 |     -    25     -     -     -     -     -     -     -     -    24 |  288   4.76
 YELL |     -    62    41   102    34     -     -     -     -     -    38 |  286   0.14
 ZWEN |     -     -     -    29    14     -     -     -     -     -     X |  278  18.59
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2481    51    36    67    40    98  2843    32  2426     -    49 |


 BEST CLOCK FIT: BRUS   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.94   | 3.81e-14  5.60e-15  1.81e-15 |
 OPMT |   287     0     0   286    9.83   | 4.44e-14  7.03e-15  4.48e-15 |
 PIE1 |   288     0     0   288    9.49   | 3.82e-14  5.83e-15  2.85e-15 |
 AMC2 |   288     0     0   288    9.39   | 3.66e-14  7.91e-15  1.48e-15 |
 ONSA |   288     0     0   288    7.37   | 3.91e-14  1.12e-14  6.17e-15 |
 NPLD |   287     0     0   286    5.90   | 4.90e-14  5.61e-15  1.71e-15 |
 BREW |   288     0     0   288    5.21   | 4.06e-14  8.72e-15  2.96e-15 |
 USNO |   288     0     0   288    4.67   | 4.99e-14  1.21e-14  2.50e-15 |
 ALBH |   288     0     0   288    4.56   | 4.32e-14  1.03e-14  8.70e-15 |
 TID1 |   288     0     0   288    4.27   | 4.88e-14  1.14e-14  5.94e-15 |
 NRC1 |   288     0     0   288    3.66   | 3.18e-14  1.17e-14  3.23e-15 |
 ALGO |   288     0     0   288    3.36   | 2.94e-14  8.47e-15  5.50e-15 |
 FAIR |   288     0     0   288    3.34   | 4.83e-14  9.79e-15  3.73e-15 |
 NLIB |   288     0     0   288    2.37   | 4.07e-14  7.98e-15  1.53e-15 |
 WSRT |   288     0     0   288    2.28   | 3.48e-14  7.40e-15  2.44e-15 |
 HOB2 |   288     0     0   288    1.85   | 4.34e-14  1.26e-14  3.72e-15 |
 STJO |   288     0     0   288    1.69   | 3.83e-14  6.17e-15  3.49e-15 |
 DRAO |   288     0     0   288    1.53   | 7.68e-14  1.69e-14  3.71e-15 |
 MATE |   288     0     0   288    1.42   | 4.65e-14  1.18e-14  9.22e-15 |
 YELL |   286     1     0   283    1.29   | 5.11e-14  7.06e-15  1.52e-15 |
 USN1 |   286     0     0   285    1.29   | 7.43e-14  1.72e-14  4.77e-15 |
 GOL2 |   269     0     0   123    1.07   | 4.62e-14  1.05e-14  2.29e-15 |
 TIDB |   288     0     0   191    1.04   | 1.50e-13  1.98e-14  7.98e-15 |
 NYAL |   288     0     0   143    0.55   | 3.87e-14  8.81e-15  8.08e-15 |
 FORT |   288     0     0   288    0.53   | 8.19e-14  3.13e-14  1.28e-14 |
 NYA1 |   288     0     0   143    0.37   | 3.04e-14  7.13e-15  8.49e-15 |
 GODE |   266     0     0   265    0.28   | 6.56e-14  1.79e-14  1.52e-14 |
 WTZR |   173     0     0    28    0.21   | 5.20e-14  1.75e-14         - |
 G13  |   288     0     0   204    0.17   | 5.28e-13  5.95e-14  3.33e-14 |
 IRKT |   231     0     0    88    0.12   | 1.27e-13  1.70e-14         - |
 G30  |   288     0     0   288    0.11   | 3.37e-13  7.50e-14  4.55e-14 |
 KGN0 |   287     0     0   286    0.10   | 3.34e-13  1.11e-13  4.48e-14 |
 TWTF |   288     0     0   288    0.09   | 3.63e-13  1.04e-13  2.96e-14 |
 SFER |   283     0     0   278    0.07   | 3.79e-13  1.19e-13  6.48e-14 |
 G16  |   288     0     5    44    0.07   | 4.68e-13  5.01e-14  1.32e-14 |
 DWH1 |   288     0     0   288    0.05   | 4.74e-13  1.43e-13  7.69e-14 |
 G27  |   288     0     0   288    0.05   | 3.22e-13  9.30e-14  5.53e-14 |
 BOR1 |   288     0     0   288    0.04   | 4.74e-13  1.39e-13  5.31e-14 |
 G04  |   288     0     0   288    0.04   | 4.23e-13  1.17e-13  3.32e-14 |
 G26  |   277     0     0   275    0.04   | 3.58e-13  1.15e-13  7.97e-14 |
 G19  |   288     0     0   174    0.04   | 7.09e-13  8.32e-14  2.58e-14 |
 MIZU |   288     0     0   143    0.04   | 3.64e-13  1.21e-13  4.36e-14 |
 G29  |   288     0     0   288    0.04   | 4.71e-13  1.24e-13  9.65e-14 |
 HRAO |   288     0     0   288    0.03   | 1.35e-13  5.25e-14  7.68e-14 |
 G07  |   288     0     0   288    0.03   | 2.87e-13  1.13e-13  9.23e-14 |
 G31  |   288     0     0   288    0.02   | 2.93e-13  1.53e-13  8.90e-14 |
 G17  |   288     0     0   288    0.02   | 3.86e-13  1.32e-13  1.16e-13 |
 G06  |   288     0     0   288    0.02   | 5.07e-13  1.83e-13  8.67e-14 |
 YAKT |   287     0     0   286    0.02   | 5.48e-13  1.27e-13  5.18e-14 |
 TSKB |   288     0     0   288    0.01   | 9.83e-13  2.46e-13  1.57e-13 |
 G09  |   288     0     2   194    0.01   | 1.31e-12  4.24e-13  1.86e-13 |
 G05  |   288     0     0   288    0.01   | 1.42e-12  4.11e-13  1.95e-13 |
 KERG |   277     0     0   276    0.01   | 1.20e-12  3.51e-13  2.31e-13 |
 KOUR |   288     0     0   288    0.01   | 1.56e-12  4.62e-13  1.37e-13 |
 G10  |   288     0     0   288    0.01   | 1.27e-12  3.05e-13  2.58e-13 |
 PRDS |   288     0     0   288    0.00   | 1.40e-12  4.70e-13  2.27e-13 |
 G08  |   288     0     0   288    0.00   | 1.28e-12  5.00e-13  8.26e-14 |
 SUTM |   288     0     0   143    0.00   | 6.90e-13  1.80e-13  1.22e-13 |
 G25  |   288     0     0   157    0.00   | 1.43e-12  4.59e-13  1.61e-13 |
 BAHR |   288     0     0   143    0.00   | 3.58e-13  2.93e-13  1.73e-13 |
 WHIT |   288     0     1    62    0.00   | 4.73e-13  2.75e-13  5.68e-13 |
 MCM4 |   263     0     0   251    0.00   | 6.38e-13  2.31e-13         - |
 GPST |   288     0     0     0    0.00   | 2.17e-14  5.07e-15  1.81e-15 |
 LHAS |   258     0     0     0    0.00   |        -         -         - |
 MAW1 |   251     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 PETP |   286     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HERS |   233     0     0     0    0.00   |        -         -         - |
 DAKA |   264     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 ASC1 |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 7.43e-13  7.30e-14  4.36e-14 |
 G24  |   288     0     0     0    0.00   | 1.32e-12  3.58e-13  3.71e-13 |
 G22  |   288     0     6     0    0.00   | 6.40e-13  6.69e-14  2.88e-14 |
 G21  |   288     3     6     0    0.00   | 9.49e-13  1.67e-13  4.77e-14 |
 G20  |   288     0     5     0    0.00   | 5.75e-13  6.14e-14  3.17e-14 |
 G18  |   288     1     6     0    0.00   | 1.11e-12  1.04e-13  2.78e-14 |
 G15  |   288     0     0     0    0.00   | 1.49e-12  5.56e-13  1.49e-13 |
 G14  |   288     0     6     0    0.00   | 7.50e-13  8.06e-14  2.86e-14 |
 G11  |   288     0     6     0    0.00   | 7.36e-13  6.63e-14  3.77e-14 |
 G03  |   288     0     0     0    0.00   | 1.22e-12  4.46e-13  1.33e-13 |
 G01  |   288     0     0     0    0.00   | 1.56e-12  8.09e-13  4.80e-13 |
 ZWEN |   278     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   | 1.02e-12  1.34e-12  3.40e-13 |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   264     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 4.20e-13  2.22e-13  4.40e-13 |
 SOFI |   287     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     1     0    0.00   | 1.91e-12  7.11e-13  9.09e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     1     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   286     0     0     0    0.00   | 1.93e-12  6.80e-13  3.33e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MEDI |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     1     0    0.00   | 7.82e-13  1.01e-12  8.54e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.81e-12  5.43e-13  2.57e-13 |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KSTU |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   283     0     0     0    0.00   |        -         -         - |
 JPLM |   287     0     0     0    0.00   | 6.24e-13  2.27e-13  6.22e-13 |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   279     0     0     0    0.00   |        -         -         - |
 GOLD |   288     1     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.29e-13  4.33e-13  2.84e-13 |
 CRO1 |   283     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 CAGZ |   279     0     6     0    0.00   | 1.64e-12  1.40e-13  7.36e-14 |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   280     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.18e-17  2.62e-16  1.57e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      BRUS      AMC2 |
------------------------------------------+------------------------------+
