
 GPS week: 1272   Day: 2   MJD: 53150                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2688     31     0.01    -0.04     2.26     0.00
 cod |   288     0  26745    264     0.09    -0.73     0.04    22.12
 emr |   288     0  11133     72  4070.54    26.31     0.07    11.73
 esa |   288     0  18290   1179  4069.74    26.23     0.07    11.77
 gfz |   288     0  20055    811     0.04    -0.38     0.04    25.96
 iga |    96     0   2688     28    -4.89    27.25     0.10     0.00
 igu |    96     0   2688     47    25.53   -85.76     2.22     0.00
 jpl |   288     0  16808     22    -3.59    -1.73     0.06    15.59
 ngs |    96     0   2688     23    -4.35    20.76     2.15     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  27660   1812  4070.67    26.25     0.07    12.83

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  4078   -48    30   230   -77   -60  3305   224  3274     -   -11 |
    3 | -7662    53   -28    31    63  -113 10909    20 -7364     -  -246 |
    4 | -4542    34   -75    53    -8    12 -1163    11 -4493     -   -35 |
    5 |  2003    64   -56  -121    39   122  5898     9  2082     -   -38 |
    6 |  3530    -5  -154   -17    97    -9 -8263   -45  3606     -     X |
    7 | -4326    67    22   -41   -44   161 -1037    74 -4172     -   -13 |
    8 | -3683   -43   -16    31    43    28   536    40 -3555     -   -74 |
    9 | -1809    14   -71   -85    57   -59    43     X -1954     -     3 |
   10 | -3244    22    -1    72   -72   -32 -4962    45 -2963     -    -9 |
   11 |  2590   -70    -7   170   -54   -15   -35    62  2642     -    10 |
   13 |   710   -56   -14    77     8   -44  -297   -28   742     -    26 |
   14 |  2119    66   -97  -173   -45    42   247   191  2273     -     0 |
   15 | -7224   -28   -21    37    16    68 -1610    24 -6471     -     X |
   16 |  5236    11    37    16    16    19    53    86  5430     -  -106 |
   17 |  1260   -19    57    84    -2    35  3604    16   923     -  -118 |
   18 |  2492   -15  -117     9   105   -52  1264   109  2496     -   -94 |
   19 |  4589   189   124     5  -127  1053  -411   -47  4620     -  -186 |
   20 |  3070    17    45   312  -242    28   835   116  3239     -     X |
   21 |   834  -116  -163   227    35    97   628     2  1066     -    85 |
   22 | -1821   -89   -99  -194   140   -80 -3458    72 -1776     -    56 |
   24 | -9363    22     8     X    -6 -1032 -6953  -113 -9130     -   -28 |
   25 |  2480    11   -58   103   -21  -165   871    72  2046     -  -101 |
   26 |   441   -30    -9   101    57  -176   186    23   484     -  -176 |
   27 | -1616  -106    56   177    -3   -86 -1202    64 -1638     -   -99 |
   28 |  3576   -92    80    51   -55   100  1328    24  3847     -   149 |
   29 |  -407   -92    73     9    67   -97 -4459    77  -561     -   -46 |
   30 | -2578   -66  -159  -100   224   -76 -1820   -15 -2382     -  -100 |
   31 | 10352   126   109  -208   -75   155  1895    99  8480     -   -89 |
 -----+-------------------------------------------------------------------+
 ALGO |     -     -  -145   665     -     -     -  -169     -     -  -273 |
 ALRT |     -   -11     -     -     9     -     -     -     -     -     - |
 AMC2 |     -   -66     -     -     -     -     -   -62     -     -   190 |
 ARTU |     -    86     -    54   -69     -     -   -48     -     -     - |
 ASC1 |     -   -11     -  -272    34     -     -     -     -     -     X |
 AUCK |     -   -14     -     X     -     -     -     -     -     -    24 |
 BILI |     -    47     -  -116     X     -     -    18     -     -     - |
 BOGT |     -    43     -     X    83     -     -  -199     -     -     X |
 BOR1 |     -   100     -     -     -     -     -     -     -     -  -173 |
 BRUS |     -   121     -     -     -     -     -  -113     -     -   -72 |
 CAGZ |     -   -91     -     -     -     -     -     -     -     -   157 |
 CAS1 |     -    29     -   144   -77     -     -    39     -     -   -75 |
 CEDU |     -    12     -   171     -     -     -   -19     -     -  -154 |
 CHAT |     -   -31     -     -     -     -     -     -     -     -    53 |
 CHUR |     -    85     -     -     -     -     -     -     -     -  -146 |
 COCO |     -     7     -     2    47     -     -     7     -     -  -115 |
 CRO1 |     -    42    70   -87   134     -     -     6     -     -  -399 |
 DAKA |     -   -78     -     -    66     -     -     -     -     -     - |
 DAV1 |     -    86     -     -   -88     -     -    34     -     -   -12 |
 DWH1 |     -   224     -     -     -     -     -  -224     -     -  -115 |
 FAIR |     -    -8     -    -8   -74     -     -    33     -     -   131 |
 FLIN |     -    27     -     -     -     -     -   -39     -     -     - |
 GOLD |     -    15     -   -81     -     -     -   -22     -     -    75 |
 GUAM |     -     X     -  -330     X     -     -    20     -     -   241 |
 HOB2 |     -   -60    27     -     -     -     -   124     -     -   -73 |
 HOFN |     -     -     -     -   -12     -     -    20     -     -     - |
 HRAO |     -   -40     -     -   -85     -     -    37     -     -   197 |
 IISC |     -    36     -   -38   -10     -     -     -     -     -    -8 |
 ISPA |     -    93     -     -    -6     -     -  -122     -     -     - |
 JPLM |     -     -     -     -     -     -     -    22     -     -   -27 |
 KARR |     -    63     -  -119     -     -     -     -     -     -     - |
 KOUR |     -   -40     -  -563   286     -     -     -     -     -     - |
 KSTU |     -     -     -   -43     -     -     -     -     -     -    40 |
 LHAS |     -     -     -     8     -     -     -     -     -     -    -8 |
 LPGS |     -  -337     -  -684   648     -     -     -     -     -  -144 |
 MAC1 |     -  -117     -   226  -126     -     -   199     -     -     7 |
 MADR |     -     -     -     -     -     -     -  -251     -     -   305 |
 MAW1 |     -   139     -     -  -106     -     -     -     -     -   -25 |
 MBAR |     -    -8     -     -   -43     -     -   158     -     -   -91 |
 MCM4 |     -   403     -     -  -344     -     -     -     -     -     - |
 MDO1 |     -     -    26     -   -17     -     -     -     -     -    13 |
 METS |     -    18     -     -     -     -     -     -     -     -   -31 |
 MKEA |     -     -     -   -90   -34     -     -    54     -     -    85 |
 NLIB |     -     -     -     -     -     -     -    61     -     -   -74 |
 NPLD |     -     8     -     -     -     -     -     -     -     -   -13 |
 NRC1 |     -    17    91     -   -24     -     -  -121     -     -    83 |
 NRIL |     -    54     -     -   -56     -     -    17     -     -     - |
 NSSP |     -   -62     -     -     -     -     -    60     -     -    34 |
 NTUS |     -  -163     -   142     -     -     -     -     -     -   151 |
 NYA1 |     -   142     -     -  -124     -     -     -     -     -     6 |
 NYAL |     -     -    67   -31     -     -     -     -     -     -   -33 |
 ONSA |     -     9     -   -17     -     -     -     -     -     -     - |
 PDEL |     -    25     -     -   -42     -     -    34     -     -     - |
 PERT |     -     -     -  -757   343     -     -     -     -     -     - |
 PETP |     -   -74     -     -    12     -     -    86     -     -     - |
 PIE1 |     -     -     -    -7     -     -     -    25     -     -   -24 |
 POTS |     -   -74     -     -    52     -     -     -     -     -    23 |
 QAQ1 |     -  -112     -     -     -     -     -     -     -     -   194 |
 RESO |     -   -15     -     -     -     -     -    21     -     -     - |
 REUN |     -   -76     -   143     -     -     -     -     -     -     - |
 REYK |     -   -54     -     -     -     -     -     -     -     -    92 |
 RIOG |     -    13   123     -   -74     -     -     -     -     -    14 |
 SANT |     -    70     -     X     X     -     -     -     -     -  -121 |
 SCH2 |     -    -4     -     -     -     -     -  -135     -     -   171 |
 SFER |     -   -57     -     -     -     -     -     -     -     -    98 |
 SOFI |     -     -     -     -     -     -     -    57     -     -   -69 |
 STJO |     -     -    -2     -     -     -     -   -56     -     -    70 |
 SUTM |     -     -     -     -    68     -     -  -113     -     -     - |
 THTI |     -     -    67   209   -95     -     -     -     -     -   -60 |
 THU3 |     -  -108     -     -     -     -     -     -     -     -   186 |
 TID1 |     -     -     -     -     -     -     -     6     -     -    -8 |
 TIDB |     -   -61     -   266     -     -     -     -     -     -  -140 |
 TIXI |     -    -3     -   -41     -     -     -    35     -     -     - |
 TOW2 |     -    40     -     -  -125     -     -   151     -     -     - |
 UNSA |     -     -     -   -56   105     -     -  -207     -     -    91 |
 URUM |     -    11     -     -   -70     -     -     -     -     -   122 |
 USN1 |     -   226     -     -     -     -     -  -419     -     -   127 |
 USNO |     -   -46    90     -     -     -     -     -     -     -    -4 |
 USUD |     -     -     -     -     -     -     -    92     -     -  -112 |
 VILL |     -     -     -  -300     -     -     -     -     -     -   275 |
 WES2 |     -     -     -     -  -120     -     -     -     -     -   242 |
 WHIT |     -   -59     -     -     -     -     -     -     -     -   101 |
 WSRT |     -    33     -     -    13     -     -     -     -     -   -83 |
 WTZR |     -   -46     -     3     -     -     -     -     -     -    77 |
 WUHN |     -     -     -     -    12     -     -     -     -     -   -25 |
 YAKT |     -  -104     -     -     -     -     -   -19     -     -   208 |
 YAR2 |     -   -77     -   -14     -     -     -    36     -     -   102 |
 YELL |     -   -15    85   212   -99     -     -     -     -     -   -46 |
 ZWEN |     -     -     -   165   -75     -     -     -     -     -     X |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  5827    66   111    53    47   141  4006   173  5268     -   110 |  288   4.93
    3 |  2239    71    62    77    32    49  5548    44  2714     -    55 |  288   2.85
    4 |  1200    51    33    65    42    31   948    58  1143     -   140 |  288   0.86
    5 |  2584    34    51    47    15    92  3838    65  2601     -    53 |  288   1.35
    6 |  2292    65    91    77   119   193  3392   101  2190     -     X |  288 501.53
    7 |   800    47    51    54    34    38   962    43   912     -    51 |  288   0.76
    8 |  1288    35    81    93    28    37  1336    25  1303     -    26 |  288   1.56
    9 |  3905    30    65    61    23    47  2395     X  3879     -    64 |  288   1.51
   10 |  2742    50    47   169    25    90  2547    40  2576     -    88 |  288   1.63
   11 |   818    59    57    69    28    56   566    41   734     -    90 |  288   0.23
   13 |   813    75    89   113    40    65   590    56   816     -    58 |  288   0.26
   14 |   759    81    84    44    48   143   483    35   740     -    60 |  288   0.28
   15 |  2615    36    22    56    23    71  2726    22  2357     -     X |  288   2.43
   16 |   431    20    56    48    20    51   456    72   475     -    86 |  288   0.19
   17 |  2554    33    61   120    26    41  1757    29  2317     -    91 |  288   0.58
   18 |   830    34    51    43    22    76   874    69   815     -    75 |  288   0.40
   19 |   486    53   101    87    72   117  1362   181   612     -    55 |  288   0.40
   20 |   711    39    53    37    21    71   438    32   718     -     X |  288   0.22
   21 |  1289    64    28    40    22    55   581    22  1303     -   115 |  288   0.25
   22 |   608    39    50    38    22    64  2032    37   679     -    36 |  288   0.35
   24 |  2846    75   114     X    57   348  2487    98  2983     -   141 |  288   2.28
   25 |  2432    32    53    41    18    52  1878    38  2017     -    64 |  288   1.50
   26 |  1946   121   111   132    90   151  1098    47  1974     -    32 |  288   0.45
   27 |   510    49    67    95    21    68   632    23   515     -    63 |  288   0.72
   28 |  1004    25    98   183    24    87   885    26   942     -    44 |  288   0.65
   29 |  2061    98   178    90    35    43  3613    58  2128     -    81 |  288   0.59
   30 |   655    40    23    75    43    62  1098    38   578     -    46 |  288   0.34
   31 |  4965    47    65    52    32    79  2821    39  4357     -    51 |  288   2.17
 -----+-------------------------------------------------------------------+--------------
 ALGO |     -     -    19    26     -     -     -    13     -     -    13 |  288   0.04
 ALRT |     -    19     -     -    16     -     -     -     -     -     - |  288   6.88
 AMC2 |     -    21     -     -     -     -     -    17     -     -    27 |  288   0.03
 ARTU |     -    79     -    51    21     -     -   126     -     -     - |  288  10.77
 ASC1 |     -    21     -    77    21     -     -     -     -     -     X |  288    >>>
 AUCK |     -    17     -     X     -     -     -     -     -     -    29 |  264  11.39
 BILI |     -    16     -    29     X     -     -    20     -     -     - |  286   9.02
 BOGT |     -   100     -     X    21     -     -   141     -     -     X |  288   9.43
 BOR1 |     -    17     -     -     -     -     -     -     -     -    30 |  288   0.36
 BRUS |     -    26     -     -     -     -     -    32     -     -    19 |  288   0.02
 CAGZ |     -    22     -     -     -     -     -     -     -     -    37 |  287   0.65
 CAS1 |     -    56     -    66    24     -     -    44     -     -   112 |  288   8.72
 CEDU |     -    17     -    26     -     -     -    34     -     -    29 |  288  10.22
 CHAT |     -    31     -     -     -     -     -     -     -     -    53 |  285  11.59
 CHUR |     -    86     -     -     -     -     -     -     -     -   149 |  288  14.53
 COCO |     -    53     -    55    45     -     -    46     -     -    47 |  288   8.97
 CRO1 |     -    38    37    31    58     -     -    31     -     -    30 |  285  17.82
 DAKA |     -    25     -     -    21     -     -     -     -     -     - |  249  15.55
 DAV1 |     -    28     -     -    19     -     -    34     -     -    38 |  288  15.04
 DWH1 |     -    20     -     -     -     -     -    14     -     -    36 |  288   0.64
 FAIR |     -    17     -    28    23     -     -    30     -     -    29 |  288   0.04
 FLIN |     -    15     -     -     -     -     -    21     -     -     - |  288   9.04
 GOLD |     -    58     -    33     -     -     -    59     -     -    22 |  282  17.76
 GUAM |     -     X     -   129     X     -     -    98     -     -    42 |  259   9.93
 HOB2 |     -    28    49     -     -     -     -    32     -     -    35 |  288   0.04
 HOFN |     -     -     -     -    12     -     -    20     -     -     - |  288    >>>
 HRAO |     -    20     -     -    15     -     -    37     -     -    59 |  288   0.66
 IISC |     -    33     -    52    33     -     -     -     -     -    42 |  288  20.14
 ISPA |     -    35     -     -    19     -     -    39     -     -     - |  235  11.28
 JPLM |     -     -     -     -     -     -     -   158     -     -   192 |  288    >>>
 KARR |     -    14     -    25     -     -     -     -     -     -     - |  288  10.45
 KOUR |     -    34     -    77    50     -     -     -     -     -     - |  288   3.39
 KSTU |     -     -     -   107     -     -     -     -     -     -    98 |  286  11.29
 LHAS |     -     -     -    90     -     -     -     -     -     -    83 |  272    >>>
 LPGS |     -    35     -    72    24     -     -     -     -     -    28 |  288  44.04
 MAC1 |     -    41     -    35    41     -     -    35     -     -    32 |  288  12.24
 MADR |     -     -     -     -     -     -     -   131     -     -   160 |  239  11.20
 MAW1 |     -    50     -     -    13     -     -     -     -     -    72 |  288  31.18
 MBAR |     -    27     -     -    36     -     -    78     -     -   180 |  288  21.65
 MCM4 |     -    27     -     -    23     -     -     -     -     -     - |  263  19.95
 MDO1 |     -     -    29     -    55     -     -     -     -     -   125 |  269 572.94
 METS |     -    16     -     -     -     -     -     -     -     -    28 |  287   9.71
 MKEA |     -     -     -    35    21     -     -    24     -     -    37 |  288  29.38
 NLIB |     -     -     -     -     -     -     -    17     -     -    20 |  288   0.04
 NPLD |     -    21     -     -     -     -     -     -     -     -    37 |  287   0.11
 NRC1 |     -    28    15     -    27     -     -    17     -     -    16 |  288   0.02
 NRIL |     -    24     -     -    22     -     -    22     -     -     - |  288   9.30
 NSSP |     -    22     -     -     -     -     -    36     -     -    20 |  288  11.71
 NTUS |     -    43     -    47     -     -     -     -     -     -    61 |  288  10.38
 NYA1 |     -    21     -     -    25     -     -     -     -     -    29 |  288   0.20
 NYAL |     -     -    14    23     -     -     -     -     -     -    24 |  288   0.16
 ONSA |     -    15     -    29     -     -     -     -     -     -     - |  288   0.10
 PDEL |     -    30     -     -    20     -     -    30     -     -     - |  288  53.36
 PERT |     -     -     -    24    11     -     -     -     -     -     - |  242   3.17
 PETP |     -    28     -     -    26     -     -    24     -     -     - |  286  10.56
 PIE1 |     -     -     -    35     -     -     -    26     -     -    26 |  288   0.06
 POTS |     -    61     -     -    54     -     -     -     -     -    26 |  276  20.40
 QAQ1 |     -    12     -     -     -     -     -     -     -     -    20 |  288  11.08
 RESO |     -    11     -     -     -     -     -    16     -     -     - |  288   8.15
 REUN |     -    32     -    60     -     -     -     -     -     -     - |  261  17.38
 REYK |     -    12     -     -     -     -     -     -     -     -    20 |  288   9.47
 RIOG |     -    40    37     -    24     -     -     -     -     -    57 |  288   9.11
 SANT |     -    16     -     X     X     -     -     -     -     -    28 |  262   7.07
 SCH2 |     -    30     -     -     -     -     -    17     -     -    39 |  288  19.09
 SFER |     -    18     -     -     -     -     -     -     -     -    31 |  287   0.50
 SOFI |     -     -     -     -     -     -     -    17     -     -    20 |  288  67.40
 STJO |     -     -    16     -     -     -     -    15     -     -    24 |  288   0.05
 SUTM |     -     -     -     -    18     -     -    29     -     -     - |  288   0.85
 THTI |     -     -    81    71    29     -     -     -     -     -    47 |  288   6.00
 THU3 |     -     9     -     -     -     -     -     -     -     -    16 |  288   8.19
 TID1 |     -     -     -     -     -     -     -    28     -     -    33 |  288   0.09
 TIDB |     -    29     -    48     -     -     -     -     -     -    21 |  288   0.09
 TIXI |     -    13     -    27     -     -     -    17     -     -     - |  287   8.69
 TOW2 |     -    67     -     -    77     -     -    42     -     -     - |  288   9.55
 UNSA |     -     -     -    66    90     -     -    59     -     -   117 |  276  19.97
 URUM |     -    17     -     -    21     -     -     -     -     -    38 |  288  12.64
 USN1 |     -    40     -     -     -     -     -    31     -     -    41 |  286   0.07
 USNO |     -    22    16     -     -     -     -     -     -     -    29 |  288   0.05
 USUD |     -     -     -     -     -     -     -   160     -     -   194 |  288   9.46
 VILL |     -     -     -    45     -     -     -     -     -     -    42 |  288   6.99
 WES2 |     -     -     -     -    17     -     -     -     -     -    35 |  265   0.07
 WHIT |     -    17     -     -     -     -     -     -     -     -    29 |  288   2.31
 WSRT |     -    24     -     -    27     -     -     -     -     -    39 |  288   0.03
 WTZR |     -    23     -    38     -     -     -     -     -     -    32 |  288   0.09
 WUHN |     -     -     -     -    19     -     -     -     -     -    38 |  287  10.96
 YAKT |     -    25     -     -     -     -     -    60     -     -    44 |  282    >>>
 YAR2 |     -    23     -    39     -     -     -    30     -     -    31 |  288   5.58
 YELL |     -    49    96    50    29     -     -     -     -     -    87 |  288   0.04
 ZWEN |     -     -     -    32    14     -     -     -     -     -     X |  288  17.49
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2261    43    69    70    38   103  2215    55  2149     -    69 |


 BEST CLOCK FIT: NRC1   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288   11.86   | 3.31e-14  4.96e-15  2.75e-15 |
 PIE1 |   288     0     0   288   11.85   | 3.71e-14  5.79e-15  3.66e-15 |
 AMC2 |   288     0     0   288   11.30   | 3.89e-14  9.61e-15  1.75e-15 |
 NPLD |   287     0     0   286    7.33   | 3.78e-14  8.59e-15  7.47e-15 |
 ONSA |   288     0     0   288    6.02   | 3.18e-14  8.27e-15  8.06e-15 |
 NRC1 |   288     0     0   288    5.90   | 2.83e-14  8.48e-15  1.41e-15 |
 USNO |   288     0     0   288    5.52   | 5.51e-14  2.26e-14  2.75e-15 |
 TID1 |   288     0     0   288    5.37   | 4.81e-14  1.16e-14  5.32e-15 |
 FAIR |   288     0     0   288    4.77   | 4.23e-14  9.20e-15  1.54e-15 |
 ALGO |   288     0     0   288    4.29   | 3.18e-14  7.45e-15  3.70e-15 |
 WTZR |   288     0     0   288    3.78   | 3.71e-14  1.18e-14  8.28e-15 |
 WSRT |   288     0     0   288    3.35   | 3.12e-14  8.03e-15  3.31e-15 |
 NLIB |   288     0     0   288    3.16   | 5.88e-14  1.76e-14  2.87e-15 |
 HOB2 |   288     0     0   288    2.63   | 4.36e-14  1.01e-14  3.66e-15 |
 STJO |   288     0     0   288    2.54   | 3.61e-14  1.07e-14  5.90e-15 |
 USN1 |   286     0     0   285    1.99   | 8.49e-14  2.46e-14  5.72e-15 |
 YELL |   288     0     0   288    1.99   | 3.52e-14  7.37e-15  3.13e-15 |
 NYAL |   288     0     0   288    1.72   | 4.22e-14  7.49e-15  8.71e-15 |
 TIDB |   288     0     2   164    1.30   | 1.51e-13  2.05e-14  6.85e-15 |
 NYA1 |   288     1     0   287    1.11   | 2.71e-14  6.56e-15  7.51e-15 |
 WES2 |   265     0     0   120    0.70   | 6.18e-14  1.54e-14  7.74e-15 |
 G26  |   288     0     0   288    0.28   | 3.57e-13  1.00e-13  4.36e-14 |
 G13  |   288     0     2   168    0.19   | 5.05e-13  6.86e-14  2.55e-14 |
 G30  |   288     0     0   288    0.17   | 3.63e-13  9.04e-14  2.80e-14 |
 G19  |   288     0     0   288    0.14   | 5.81e-13  7.86e-14  2.84e-14 |
 SFER |   287     0     0   286    0.11   | 4.04e-13  1.18e-13  3.88e-14 |
 G29  |   288     0     0   288    0.09   | 3.81e-13  1.32e-13  5.26e-14 |
 G17  |   288     0     0   288    0.08   | 3.82e-13  8.04e-14  7.36e-14 |
 BOR1 |   288     0     0   288    0.07   | 5.03e-13  1.40e-13  2.86e-14 |
 DWH1 |   288     0     0   288    0.06   | 5.20e-13  1.56e-13  5.91e-14 |
 G27  |   288     0     0   288    0.06   | 3.48e-13  1.08e-13  5.29e-14 |
 G07  |   288     0     0   288    0.06   | 2.82e-13  8.81e-14  1.02e-13 |
 HRAO |   288     0     0   288    0.04   | 1.34e-13  5.21e-14  6.84e-14 |
 G04  |   288     0     0   288    0.03   | 4.40e-13  1.56e-13  9.90e-14 |
 G31  |   288     0     0   288    0.03   | 2.52e-13  2.12e-13  1.41e-13 |
 YAKT |   282     0     0   280    0.02   | 4.62e-13  1.29e-13  7.91e-14 |
 SUTM |   288     0     0   288    0.01   | 6.58e-13  1.90e-13  5.39e-14 |
 G10  |   288     0     0   288    0.01   | 1.26e-12  3.25e-13  1.92e-13 |
 G08  |   288     0     0   288    0.01   | 1.35e-12  3.82e-13  1.51e-13 |
 G25  |   288     0     0   288    0.01   | 1.30e-12  3.54e-13  1.39e-13 |
 KOUR |   288     0     0   288    0.01   | 1.36e-12  3.71e-13  3.03e-13 |
 G03  |   288     0     0   288    0.01   | 1.26e-12  4.79e-13  1.98e-13 |
 G09  |   288     0     0   191    0.01   | 1.55e-12  4.67e-13  1.79e-13 |
 G05  |   288     0     3    76    0.01   | 1.30e-12  3.26e-13  1.29e-13 |
 WHIT |   288     0     4     1    0.00   | 5.29e-13  3.13e-13  2.90e-13 |
 GPST |   288     0     0     0    0.00   | 1.85e-14  5.12e-15  1.48e-15 |
 MADR |   239     0     0     0    0.00   |        -         -         - |
 ISPA |   235     0     0     0    0.00   |        -         -         - |
 MCM4 |   263     0     1     0    0.00   | 5.91e-13  3.81e-13         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 PETP |   286     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 DAKA |   249     0     0     0    0.00   |        -         -         - |
 CHAT |   285     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     5     0    0.00   | 6.58e-13  6.38e-14  6.14e-14 |
 G24  |   288     0     0     0    0.00   | 1.39e-12  5.21e-13  2.44e-13 |
 G22  |   288     0     6     0    0.00   | 5.11e-13  5.50e-14  2.38e-14 |
 G21  |   288     3     6     0    0.00   | 9.49e-13  1.45e-13  4.47e-14 |
 G20  |   288     0     6     0    0.00   | 5.73e-13  7.12e-14  2.23e-14 |
 G18  |   288     0     6     0    0.00   | 1.34e-12  1.14e-13  4.18e-14 |
 G16  |   288     0     6     0    0.00   | 4.77e-13  5.37e-14  1.85e-14 |
 G15  |   288     0     0     0    0.00   | 1.68e-12  6.71e-13  1.47e-13 |
 G14  |   288     0     5     0    0.00   | 6.79e-13  7.06e-14  2.16e-14 |
 G11  |   288     0     6     0    0.00   | 6.77e-13  6.78e-14  2.72e-14 |
 G06  |   288     0     0     0    0.00   |        -         -         - |
 G01  |   288     0     0     0    0.00   | 1.39e-12  7.83e-13  4.21e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   | 1.15e-12  1.30e-12  7.01e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   276     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 4.20e-13  2.50e-13  4.06e-13 |
 SOFI |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     1     0    0.00   | 7.42e-13  9.70e-13  1.09e-12 |
 SANT |   262     0     0     0    0.00   | 1.99e-12  7.52e-13  7.45e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 REUN |   261     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     2     0     0    0.00   |        -         -         - |
 POTS |   276     0     0     0    0.00   |        -         -         - |
 PERT |   242     0     0     0    0.00   | 1.72e-12  5.00e-13         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   269     1     1     0    0.00   | 7.53e-13  8.25e-13  1.91e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 LHAS |   272     0     0     0    0.00   |        -         -         - |
 KSTU |   286     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     1     0     0    0.00   | 5.37e-13  2.17e-13  5.46e-13 |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   259     0     0     0    0.00   |        -         -         - |
 GOLD |   282     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   285     1     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 CAGZ |   287     0     6     0    0.00   | 1.68e-12  1.70e-13  5.19e-14 |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASC1 |   288     1     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.03e-17  2.44e-16  1.46e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      BRUS      NRC1 |
------------------------------------------+------------------------------+
