
 GPS week: 1273   Day: 5   MJD: 53160                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2675      0    -0.14    -0.20     3.20     0.00
 cod |   288     0  25469   1149     0.09    -1.24     0.04    20.43
 emr |   288     0  21214    290  4349.20    30.97     0.04    18.05
 gfz |   288     0  20284      9    -0.33    -0.27     0.04    16.74
 iga |    96     0   2675     25    -0.19    -0.15     0.19     0.00
 igu |    96     0   2675      0    -0.17    -0.18     4.18     0.00
 jpl |   288     0  16670    275    -5.84     1.83     0.03    31.42
 ngs |    96     0   2675      0    -0.14    -0.19     2.99     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  30989    396  4349.21    30.91     0.06    13.36

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -4707     X    15    24   -91-11636   -55  -851     -   -45 |
    3 |   599    -5  -180    78   -53  3926   133   128     -  -144 |
    4 | -3404     5  -127   123   -35   726   -11 -2670     -    12 |
    5 | -5157   -38  -127    40   -24 -6978    78 -5128     -     6 |
    6 | -4457    78  -164   102  -278-21353    22 -3840     -   -28 |
    7 |   166   -17  -193    94    59   611    78   -41     -    -6 |
    8 | -4277    33  -191   108   124  2480    33 -4324     -     X |
    9 | -8145    -7   -32    91  -283 -4863    21 -7322     -   -62 |
   10 |   800    55  -117   -91   -62  4299   112   -18     -   -59 |
   11 |  6954   -29     9   -13    22 -1402    73  6276     -  -126 |
   13 |  5706     6     4    93   -88  2118   -65  5264     -    19 |
   14 |  2266    49   195  -177  -118     1   158  1650     -  -147 |
   15 |  3460     3     X    58   372 11723    74   402     -   -89 |
   16 |  6128    32   118  -131   121  1801    95  6288     -   -56 |
   17 |  1263    21  -138    58  -131  9379    95   849     -  -128 |
   18 |  3051    80  -135     3   -83   583    63  3299     -   -82 |
   19 |  4702    93    48  -189  1639  1349   137  4817     -  -274 |
   20 |  5018    45    35    69    43  1875   102  5521     -  -215 |
   21 |  -724   -41   -89    35   151  3896    49   341     -   132 |
   22 | -1916   -30    67    -9  -127 -1872    -2 -2455     -   -34 |
   24 |  -402   -28   -96   -25  -242 16235    78   176     -    31 |
   25 | -4206   122    33   -43  -324 -1427   189 -4589     -  -201 |
   26 |   656     X  -164    85  -229  1753   114  -120     -  -143 |
   27 |   262    21  -197   232  -197 -3302     X  -283     -   -57 |
   28 | -5938  -140    -7   133   186-11258   -19 -4728     -    58 |
   29 | -2501     X  -103   120  -118 -1916    51 -2143     -   -10 |
   30 |  -176   -19   -46   182  -248   197    48  -254     -  -142 |
   31 |  4744    17   -56  -103    47  2678    63  3617     -    37 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -   -12     -     -     -     4     -     -     6 |
 ALGO |     -     -   -59     -     -     -    61     -     -   -63 |
 ALRT |     -   -54     -    65     -     -     -     -     -     - |
 AMC2 |     -   -62    -5     -     -     -   -64     -     -   253 |
 ARTU |     -    58     -   -27     -     -   -24     -     -     - |
 ASC1 |     -    95     -  -100     -     -     -     -     -   -20 |
 ASPA |     -     -     -   153     -     -     -     -     -  -191 |
 BAHR |     -   -30     0   -54     -     -    45     -     -     6 |
 BILI |     -    11     -   -13     -     -     -     -     -     - |
 BOGT |     -     4     -    60     -     -    25     -     -  -139 |
 BOR1 |     -   -66    81     -     -     -     -     -     -    -9 |
 BREW |     -     -   -13     -     -     -     -     -     -    18 |
 BRMU |     -     -     -    94     -     -     -     -     -  -117 |
 BRUS |     -   -83    99     -     -     -     -     -     -    -8 |
 CAGZ |     -   -90     -     -     -     -     -     -     -   138 |
 CAS1 |     -    76     -   -48     -     -     -     -     -   -56 |
 CEDU |     -    90     -     -     -     -     -     -     -  -138 |
 CHUR |     -    61    64     -     -     -    35     -     -  -263 |
 CRO1 |     -    76   -30  -101     -     -     6     -     -    40 |
 DARW |     -     -   152     -     -     -   -87     -     -     - |
 DGAR |     -   -71     -   -27     -     -    -2     -     -   148 |
 DRAO |     -   -25  -121     -     -     -   134     -     -  -113 |
 DWH1 |     -   304    59     -     -     -  -249     -     -    44 |
 FAIR |     -     -    39   -44     -     -   -21     -     -    51 |
 GODE |     -     -    63     -     -     -     -     -     -   -85 |
 GOL2 |     -     -   -19     -     -     -     -     -     -    26 |
 GOLD |     -    34     -     -     -     -   -52     -     -    69 |
 GUAM |     -     -     -     -     -     -   -53     -     -   125 |
 GUAT |     -   -34     -    -9     -     -     -     -     -    63 |
 HERS |     -     -  -194     -     -     -     -     -     -   262 |
 HOB2 |     -   -78   160     -     -     -     -     -     -   -98 |
 HOFN |     -     -     -   -91     -     -    48     -     -     - |
 HRAO |     -  -103     -     -     -     -    21     -     -   109 |
 IISC |     -    18     -   -71     -     -     -     -     -    61 |
 ISPA |     -    93     -    49     -     -   -44     -     -   -99 |
 JPLM |     -     -   -43     -     -     -     -     -     -    58 |
 KIRU |     -   -45     -     -     -     -    25     -     -    11 |
 KOKB |     -   -46   135  -104     -     -     -     -     -    19 |
 KOSG |     -   -31     -     -     -     -     -     -     -    48 |
 KOUR |     -    98     -  -103     -     -    18     -     -   -62 |
 KUNM |     -     -     -     -     -     -     8     -     -   -18 |
 LHAS |     -     -     -   -18     -     -   -29     -     -    92 |
 LPGS |     -     -   103     -     -     -   -68     -     -    19 |
 MAC1 |     -   -23     -     7     -     -     -     -     -    26 |
 MAS1 |     -   -88     9   -23     -     -    72     -     -   -17 |
 MATE |     -     8     -     -     -     -     -     -     -   -11 |
 MBAR |     -   -22     -   -62     -     -    44     -     -     8 |
 MCM4 |     -    -7     -     8     -     -     -     -     -     - |
 MDO1 |     -     -    26  -105     -     -     -     -     -    97 |
 MEDI |     -     -    57     -     -     -     -     -     -   -77 |
 METS |     -    24     -     -     -     -     -     -     -   -36 |
 MIZU |     -     -    98     -     -     -   -85     -     -    67 |
 MKEA |     -     -     -   -11     -     -    -3     -     -    19 |
 NNOR |     -     -  -248     -     -     -    43     -     -   233 |
 NPLD |     -   -34   226     -     -     -   -98     -     -   -22 |
 NRC1 |     -     -   100    -8     -     -  -130     -     -   181 |
 NSSP |     -   -98     -     -     -     -    49     -     -    34 |
 NTUS |     -  -102     -     -     -     -     -     -     -   156 |
 NYA1 |     -    85     -   -97     -     -     -     -     -    -9 |
 PDEL |     -    19     -    -6     -     -    -9     -     -     - |
 PERT |     -     -  -103   183     -     -     -     -     -   -90 |
 PETP |     -   -19     -   -63     -     -    46     -     -     - |
 PIE1 |     -     -   -45     -     -     -    27     -     -    -2 |
 POTS |     -   -30     -    41     -     -     -     -     -    -5 |
 PRDS |     -     -   -19     -     -     -     -     -     -    26 |
 QAQ1 |     -  -107    69     -     -     -     -     -     -    70 |
 RESO |     -    38     -     -     -     -   -25     -     -     - |
 RIOG |     -     8    55   -49     -     -     -     -     -   -24 |
 SANT |     -   146     -  -178     -     -     -     -     -     - |
 SCH2 |     -     -    98     -     -     -   -97     -     -    97 |
 SFER |     -   -69    72     -     -     -     -     -     -     9 |
 SOFI |     -     -     -     -     -     -    14     -     -   -32 |
 SPT0 |     -  -197   143     -     -     -     -     -     -    96 |
 STJO |     -     -   -29     -     -     -    -4     -     -    48 |
 SUTM |     -     -   136  -128     -     -   -10     -     -     - |
 THU3 |     -   -74    72     -     -     -     -     -     -    15 |
 TIDB |     -   -23   113   -55     -     -     -     -     -   -49 |
 TIXI |     -    10     -     -     -     -    -7     -     -     - |
 TOW2 |     -     9     -   -26     -     -     8     -     -     - |
 TRO1 |     -   -89     -     7     -     -     -     -     -   127 |
 TSKB |     -   -28    27     7     -     -     -     -     -    -2 |
 UNSA |     -     -     -   -50     -     -  -146     -     -   423 |
 USN1 |     -   246   260     -     -     -  -353     -     -   103 |
 USNO |     -   -38    51     -     -     -     -     -     -   -11 |
 USUD |     -     -    29   -33     -     -     -     -     -     2 |
 WHIT |     -   -11     -     -     -     -     -     -     -    17 |
 WSRT |     -    -2     -     -     -     -     -     -     -     3 |
 WTZR |     -   -36     -     -     -     -     -     -     -    55 |
 WUHN |     -     -    -1   303     -     -     -     -     -  -378 |
 YAKT |     -   -63     -     -     -     -     -     -     -    96 |
 YAR2 |     -     7   -95     -     -     -     -     -     -   117 |
 YELL |     -     X    34    -8     -     -     -     -     -   -36 |
 ZAMB |     -    66     -     -     -     -   -43     -     -     - |
 ZWEN |     -     -     -  -187     -     -     -     -     -   234 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5838     X    71   150   335  8038    63  5160     -   114 |  276   3.71
    3 |  3805    41    32    17    51  3425    28  2943     -    73 |  288   1.56
    4 |  2137    41    40    45    62  1782    64  2415     -    55 |  288   0.66
    5 |  4981    34    61    22    92  5660    22  4998     -   101 |  288   2.53
    6 |  1347    50    36    21    94 12651    36   822     -    66 |  288   1.13
    7 |  1439    49    92    31   108   391    45  1323     -    45 |  288   0.84
    8 |  4424    19    34    51   173  5077    32  4090     -     X |  288   1.40
    9 |  1503    47    69    24    46  2074    35  2162     -   109 |  288   1.37
   10 |  3185    32    52    24   101  2309    40  3289     -    38 |  288   2.41
   11 |  1740    54    46    24    63   614    38  1758     -    72 |  288   0.37
   13 |  1103    83    59    42    65  1645    74   828     -    94 |  288   0.22
   14 |  2115    69    46    65    64   492    75  1155     -    64 |  288   0.27
   15 |  8298   106     X   115   435  6086    87  6911     -   134 |  287   4.81
   16 |  1049    52    34    25    58  1062    69   815     -    79 |  288   0.15
   17 |  1772    84    94    50   219  4497    46  1208     -    62 |  288   0.90
   18 |   610    53    73    32   116   751    43   651     -    70 |  288   0.38
   19 |   531    50    58    34   205   536    57   536     -    55 |  288   0.50
   20 |  1478    49    46    42    75  1415    44  1183     -    69 |  288   0.22
   21 |  2063    51    44    38   140  1917    38  2142     -    69 |  288   0.49
   22 |  2314    48    42    32    63  1332    38  1762     -    46 |  288   0.44
   24 |  3754    70    53    42   555  7580    40  3861     -    46 |  288   2.76
   25 |  5120    35    56    56   162  4584    74  4457     -    44 |  288   2.64
   26 |  3201     X    62    37   221  1040    51  2772     -    61 |  276   1.16
   27 |  1785    19    45    71   107   942     X  1668     -    52 |  288   0.58
   28 |  2926    34    45    39   153  3783    49  3745     -   103 |  288   0.77
   29 |   754     X    74   131   235  1489    76   905     -   105 |  276   0.56
   30 |   907    48    29    34   109   538    33   911     -   107 |  288   0.57
   31 |  4332    42    77    23    64  4656    47  5178     -    84 |  288   2.47
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    52     -     -     -    25     -     -    29 |  288   0.04
 ALGO |     -     -    25     -     -     -    14     -     -    11 |  288   0.08
 ALRT |     -    10     -    12     -     -     -     -     -     - |  288   7.26
 AMC2 |     -    42    20     -     -     -    18     -     -    38 |  288   0.04
 ARTU |     -    36     -    25     -     -    28     -     -     - |  288  12.18
 ASC1 |     -    23     -    27     -     -     -     -     -    32 |  288    >>>
 ASPA |     -     -     -    36     -     -     -     -     -    45 |  286    >>>
 BAHR |     -    37    43    19     -     -    44     -     -    25 |  288   0.61
 BILI |     -    15     -    18     -     -     -     -     -     - |  287  10.56
 BOGT |     -    26     -    34     -     -    17     -     -    44 |  288  12.22
 BOR1 |     -    22    26     -     -     -     -     -     -    20 |  288   0.33
 BREW |     -     -    28     -     -     -     -     -     -    38 |  288   0.04
 BRMU |     -     -     -    21     -     -     -     -     -    26 |  276    >>>
 BRUS |     -    21    24     -     -     -     -     -     -    26 |  288   0.06
 CAGZ |     -    20     -     -     -     -     -     -     -    31 |  288   0.53
 CAS1 |     -    15     -    42     -     -     -     -     -    58 |  288   7.07
 CEDU |     -    86     -     -     -     -     -     -     -   132 |  287  17.03
 CHUR |     -    40    49     -     -     -    23     -     -    61 |  288  10.26
 CRO1 |     -    46    33    66     -     -    15     -     -    32 |  283  17.62
 DARW |     -     -    29     -     -     -    17     -     -     - |  288   4.20
 DGAR |     -    23     -    52     -     -    30     -     -    44 |  288  14.56
 DRAO |     -    50    28     -     -     -    21     -     -    29 |  288   0.07
 DWH1 |     -    35    44     -     -     -    29     -     -    50 |  288   0.61
 FAIR |     -     -    21    27     -     -    23     -     -    32 |  288   0.11
 GODE |     -     -     8     -     -     -     -     -     -    11 |  288   0.05
 GOL2 |     -     -    42     -     -     -     -     -     -    57 |  288   0.11
 GOLD |     -    34     -     -     -     -    16     -     -    29 |  288  17.46
 GUAM |     -     -     -     -     -     -    36     -     -    84 |  288  13.46
 GUAT |     -    21     -    24     -     -     -     -     -    46 |  287    >>>
 HERS |     -     -    57     -     -     -     -     -     -    77 |  241  10.41
 HOB2 |     -    30    41     -     -     -     -     -     -    51 |  288   0.09
 HOFN |     -     -     -    19     -     -    10     -     -     - |  288    >>>
 HRAO |     -    22     -     -     -     -    26     -     -    49 |  288   0.95
 IISC |     -    28     -    38     -     -     -     -     -    30 |  288  17.47
 ISPA |     -    33     -    24     -     -    22     -     -    31 |  288  12.92
 JPLM |     -     -    25     -     -     -     -     -     -    33 |  288   4.36
 KIRU |     -    30     -     -     -     -    20     -     -    17 |  288  12.41
 KOKB |     -    46    43    29     -     -     -     -     -    70 |  288   0.06
 KOSG |     -    18     -     -     -     -     -     -     -    27 |  288  48.50
 KOUR |     -    46     -    41     -     -    17     -     -    36 |  288   1.24
 KUNM |     -     -     -     -     -     -    12     -     -    28 |  288  27.74
 LHAS |     -     -     -    24     -     -    17     -     -    21 |  288  13.51
 LPGS |     -     -    43     -     -     -    19     -     -    31 |  288  34.95
 MAC1 |     -    24     -    31     -     -     -     -     -    29 |  288  12.97
 MAS1 |     -    25    33    25     -     -    20     -     -    17 |  288   1.63
 MATE |     -    18     -     -     -     -     -     -     -    27 |  288   0.09
 MBAR |     -    33     -    22     -     -    27     -     -    19 |  288  23.69
 MCM4 |     -    18     -    21     -     -     -     -     -     - |  227   7.74
 MDO1 |     -     -    64    91     -     -     -     -     -   198 |  288 170.35
 MEDI |     -     -    13     -     -     -     -     -     -    18 |  288    >>>
 METS |     -    11     -     -     -     -     -     -     -    17 |  287  14.67
 MIZU |     -     -    38     -     -     -    17     -     -    33 |  288   0.71
 MKEA |     -     -     -    35     -     -    20     -     -    59 |  288  24.89
 NNOR |     -     -    22     -     -     -    24     -     -    52 |  288  12.59
 NPLD |     -    29    25     -     -     -    19     -     -    26 |  287   0.04
 NRC1 |     -     -    26    20     -     -    14     -     -    14 |  288   0.04
 NSSP |     -    38     -     -     -     -    30     -     -    40 |  288  14.76
 NTUS |     -    17     -     -     -     -     -     -     -    25 |  288   9.39
 NYA1 |     -    12     -    14     -     -     -     -     -    13 |  288   0.06
 PDEL |     -    25     -    20     -     -    16     -     -     - |  288  54.71
 PERT |     -     -    48    35     -     -     -     -     -    42 |  288   2.93
 PETP |     -    20     -    23     -     -    12     -     -     - |  287  13.00
 PIE1 |     -     -    48     -     -     -    16     -     -    45 |  288   0.06
 POTS |     -    20     -    20     -     -     -     -     -    21 |  288  25.46
 PRDS |     -     -    22     -     -     -     -     -     -    30 |  288   1.55
 QAQ1 |     -    15    14     -     -     -     -     -     -    16 |  288   7.82
 RESO |     -    31     -     -     -     -    20     -     -     - |  288   8.89
 RIOG |     -    35    43    33     -     -     -     -     -    44 |  288  10.03
 SANT |     -    18     -    22     -     -     -     -     -     - |  288   6.92
 SCH2 |     -     -    16     -     -     -    12     -     -    15 |  288  20.78
 SFER |     -    22    26     -     -     -     -     -     -    29 |  285   0.66
 SOFI |     -     -     -     -     -     -    14     -     -    33 |  288  59.48
 SPT0 |     -    81    33     -     -     -     -     -     -    89 |  288    >>>
 STJO |     -     -    30     -     -     -    15     -     -    21 |  288   0.05
 SUTM |     -     -    31    28     -     -    21     -     -     - |  288   3.08
 THU3 |     -    24    16     -     -     -     -     -     -    35 |  288   7.42
 TIDB |     -    32    33    19     -     -     -     -     -    17 |  288   0.08
 TIXI |     -    16     -     -     -     -    10     -     -     - |  286   9.18
 TOW2 |     -    27     -    45     -     -    25     -     -     - |  288  10.03
 TRO1 |     -    43     -    61     -     -     -     -     -    20 |  287   9.90
 TSKB |     -    26    33    21     -     -     -     -     -    18 |  288   1.86
 UNSA |     -     -     -    21     -     -    16     -     -    56 |  288  17.92
 USN1 |     -    15    16     -     -     -    11     -     -    18 |  288   0.05
 USNO |     -    32    23     -     -     -     -     -     -    32 |  288   0.03
 USUD |     -     -    28    51     -     -     -     -     -    94 |  288  14.20
 WHIT |     -    19     -     -     -     -     -     -     -    29 |  288   4.55
 WSRT |     -    15     -     -     -     -     -     -     -    24 |  288   0.06
 WTZR |     -    20     -     -     -     -     -     -     -    31 |  287   1.62
 WUHN |     -     -    53    43     -     -     -     -     -    29 |  287  17.05
 YAKT |     -    12     -     -     -     -     -     -     -    18 |  288   0.60
 YAR2 |     -    27    23     -     -     -     -     -     -    39 |  288   7.00
 YELL |     -     X    14    19     -     -     -     -     -    18 |  288   0.03
 ZAMB |     -    28     -     -     -     -    18     -     -     - |  282  10.00
 ZWEN |     -     -     -    43     -     -     -     -     -    54 |  288  19.90
 -----+-------------------------------------------------------------+--------------
 TOT  |  3198    39    44    45   186  4184    29  2987     -    56 |


 BEST CLOCK FIT: YELL   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288   10.38   | 4.09e-14  9.02e-15  2.74e-15 |
 BREW |   288     0     0   287   10.34   | 3.82e-14  8.34e-15  2.68e-15 |
 NPLD |   287     0     0   286   10.06   | 4.67e-14  1.80e-14  5.87e-15 |
 AMC2 |   288     0     0   288    8.38   | 3.86e-14  8.81e-15  1.92e-15 |
 YELL |   288     0     0   288    8.23   | 3.77e-14  8.75e-15  1.77e-15 |
 ALGO |   288     0     0   288    5.70   | 3.21e-14  5.40e-15  7.06e-15 |
 MATE |   288     0     0   288    5.61   | 4.11e-14  1.25e-14  3.84e-15 |
 WSRT |   288     0     0   288    5.24   | 3.72e-14  1.47e-14  4.81e-15 |
 GODE |   288     0     0   288    4.68   | 5.21e-14  9.11e-15  3.74e-15 |
 NRC1 |   288     0     0   288    3.95   | 3.15e-14  6.22e-15  2.26e-15 |
 PIE1 |   288     0     0   288    3.86   | 4.80e-14  9.57e-15  2.54e-15 |
 KOKB |   288     0     0   288    3.76   | 4.93e-14  1.15e-14  4.40e-15 |
 FAIR |   288     0     0   288    3.11   | 6.35e-14  1.42e-14  7.53e-15 |
 STJO |   288     0     0   288    2.52   | 4.00e-14  1.48e-14  4.02e-15 |
 USNO |   288     0     0   288    2.38   | 3.75e-14  6.26e-15  1.21e-15 |
 WTZR |   287     0     0   286    2.33   | 3.85e-14  3.13e-14  4.55e-15 |
 SPT0 |   288     1     0   287    1.79   | 7.34e-14  1.33e-14  4.12e-15 |
 USN1 |   288     0     0   288    1.45   | 7.42e-14  1.09e-14  2.94e-15 |
 GOL2 |   288     0     0   143    1.24   | 4.70e-14  1.05e-14  6.21e-15 |
 DRAO |   288     0     0   288    1.08   | 7.04e-14  1.62e-14  9.41e-15 |
 NYA1 |   288     0     0   288    0.97   | 2.76e-14  8.94e-15  4.14e-15 |
 HOB2 |   288     0     0   288    0.79   | 5.90e-14  1.12e-14  1.12e-14 |
 ALBH |   288     0     0   288    0.78   | 5.24e-14  8.95e-15  4.16e-15 |
 TIDB |   288     0     2   133    0.67   | 1.56e-13  1.79e-14  6.76e-15 |
 G30  |   288     0     0   288    0.10   | 3.62e-13  1.03e-13  4.36e-14 |
 SFER |   285     0     0   282    0.06   | 3.82e-13  1.31e-13  6.59e-14 |
 BOR1 |   288     0     0   288    0.05   | 4.85e-13  1.25e-13  2.33e-14 |
 MIZU |   288     0     0   288    0.05   | 3.85e-13  9.82e-14  5.39e-14 |
 G27  |   288     0     0   288    0.05   | 3.24e-13  8.84e-14  6.30e-14 |
 DWH1 |   288     0     0   288    0.04   | 4.71e-13  1.34e-13  4.56e-14 |
 G07  |   288     0     0   288    0.04   | 2.85e-13  8.45e-14  8.51e-14 |
 YAKT |   288     0     0   143    0.03   | 4.26e-13  1.28e-13  4.81e-14 |
 G04  |   288     0     0   288    0.03   | 4.77e-13  1.41e-13  6.68e-14 |
 G17  |   288     0     0   288    0.03   | 3.85e-13  1.14e-13  1.13e-13 |
 G26  |   276     0     0   274    0.03   | 3.47e-13  1.17e-13  9.76e-14 |
 G06  |   288     0     0   239    0.03   | 5.97e-13  1.61e-13  8.88e-14 |
 G29  |   276     0     0   274    0.03   | 4.84e-13  1.50e-13  6.21e-14 |
 G13  |   288     0     4    21    0.02   | 4.89e-13  5.89e-14  2.56e-14 |
 HRAO |   288     0     0   288    0.02   | 1.19e-13  5.38e-14  9.91e-14 |
 BAHR |   288     0     0   288    0.01   | 3.05e-13  1.07e-13  5.42e-14 |
 TSKB |   288     0     0   288    0.01   | 1.10e-12  3.05e-13  1.46e-13 |
 G19  |   288     0     4    22    0.01   | 5.79e-13  6.88e-14  3.15e-14 |
 G31  |   288     0     0   288    0.01   | 2.40e-13  1.68e-13  2.05e-13 |
 G08  |   288     0     0   288    0.01   | 1.35e-12  3.19e-13  1.01e-13 |
 G09  |   288     0     0   288    0.01   | 1.34e-12  4.91e-13  1.35e-13 |
 G03  |   288     0     0   288    0.01   | 1.33e-12  4.16e-13  1.87e-13 |
 G11  |   288     0     4    13    0.00   | 6.57e-13  7.53e-14  4.31e-14 |
 KOUR |   288     0     0   288    0.00   | 1.67e-12  3.71e-13  1.04e-13 |
 G05  |   288     0     0   288    0.00   | 1.42e-12  3.90e-13  2.64e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.90e-12  4.78e-13  1.68e-13 |
 G10  |   288     0     0   288    0.00   | 1.32e-12  3.08e-13  2.56e-13 |
 PRDS |   288     0     0   143    0.00   | 1.45e-12  3.94e-13  1.14e-13 |
 G14  |   288     0     4     2    0.00   | 6.27e-13  7.11e-14  3.32e-14 |
 SUTM |   288     0     0   143    0.00   | 6.61e-13  1.99e-13  2.03e-13 |
 MCM4 |   227     0     1    19    0.00   | 6.26e-13  3.68e-13         - |
 GPST |   288     0     0     0    0.00   | 2.53e-14  4.66e-15  2.76e-15 |
 G15  |   287     0     0     0    0.00   | 1.64e-12  5.34e-13  4.48e-13 |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   286     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     5     0    0.00   | 6.26e-13  6.90e-14  6.53e-14 |
 G25  |   288     0     0     0    0.00   | 1.48e-12  4.37e-13  3.50e-13 |
 G24  |   288     0     0     0    0.00   | 1.28e-12  4.56e-13  2.04e-13 |
 G22  |   288     0     5     0    0.00   | 5.43e-13  5.58e-14  2.72e-14 |
 G21  |   288     1     6     0    0.00   | 8.24e-13  1.22e-13  2.55e-14 |
 G20  |   288     0     5     0    0.00   | 5.99e-13  7.10e-14  2.04e-14 |
 G18  |   288     0     6     0    0.00   | 1.18e-12  1.06e-13  4.52e-14 |
 G16  |   288     0     6     0    0.00   | 4.92e-13  5.60e-14  1.07e-14 |
 G01  |   276     0     0     0    0.00   | 1.46e-12  8.04e-13  1.17e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 ZAMB |   282     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 4.52e-13  3.99e-13  3.22e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   287     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SOFI |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     1     0    0.00   | 6.01e-13  3.48e-13  1.29e-12 |
 SANT |   288     0     1     0    0.00   | 1.98e-12  6.87e-13  7.05e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     1     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.98e-12  5.14e-13  3.17e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MEDI |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     1     1     0    0.00   | 8.10e-13  6.95e-13  1.61e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     1     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 6.77e-13  2.52e-13  5.49e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   287     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.50e-13  4.98e-13  2.91e-13 |
 CRO1 |   283     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   287     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 CAGZ |   288     0     6     0    0.00   | 1.57e-12  1.23e-13  4.74e-14 |
 BRMU |   276     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   286     0     0     0    0.00   |        -         -         - |
 ASC1 |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.95e-17  2.34e-16  1.40e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      ALGO      USNO |
------------------------------------------+------------------------------+
