
 GPS week: 1276   Day: 3   MJD: 53179                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2577      0     0.04    -0.18     3.08     0.00
 cod |   288     0  26796    337     0.15    -1.12     0.05    16.52
 emr |   288     0  16981     41   208.69    35.21     0.05    14.12
 esa |   288     0  17932    657   208.05    35.15     0.06    10.61
 gfz |   288     0  20587    274     0.28    -0.82     0.03    30.05
 iga |    96     0   2577     12    -0.03    -0.28     0.11     0.00
 igu |    96     0   2518      0     0.00    -0.40     3.50     0.00
 jpl |   287     0  15295      2     7.15     2.05     0.05    16.54
 ngs |    96     0   2577      0     0.05    -0.29     2.64     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  31212   1141   208.75    35.20     0.06    12.16

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  -844    22    15   -34   -11     9 -5335     1  -602     -     7 |
    3 |  2717    20    37   -83    56  -105 13388     -  1756     -  -136 |
    4 | -1091     X   -75     X    28  -313  1260     - -1186     -    24 |
    5 |  1297   -35   -44   -32   135    71 12122     -   495     -  -207 |
    6 | -3168   103  -165    11    71  -239 -2267   111 -3099     -  -272 |
    7 | -4612   -89   -93  -153    89    28  -135    91 -4443     -    28 |
    8 | -9846    -7   -61    -2     2    47 -7681     - -7859     -    77 |
    9 | -4784   -40   -67   108    69  -102 -9183     - -4110     -  -133 |
   10 |  -629   -32   -59   -29    25    90    89   105  -727     -   -55 |
   11 |  5699   -63   -68   123   -12   -73 -2351    14  4834     -    67 |
   13 |  4952    59  -104  -232   120   -70  1796  -139  4752     -   117 |
   14 |  1687   118  -114   215   -47    43  2262     -  2222     -  -100 |
   15 | -3899    16   -57   383   -65    61-12932     - -3556     -  -126 |
   16 |  4042    34     8   147   -79  -125  1188   112  4194     -  -127 |
   17 | -2203    31   -76    66    43    79  2587     - -2139     -  -135 |
   18 |  2871    68  -143   101     4   -48   669    74  2880     -  -117 |
   19 |  4862    83     8   265   -82  1365  1783    26  4973     -  -181 |
   20 |  3035    78    -2   154   -42   101   -84     -  3181     -  -141 |
   21 |  8420    65   -22   -17     7   174  7164     -  8494     -   -80 |
   22 | -3024   157   -99   -54    21  -144 -1149   -22 -2787     -   -74 |
   24 | -2410     4   -63  -133    69  -212    31    81 -1113     -   -86 |
   25 |  9205   139   -18   -84    38  -238   781     -  5304     -  -189 |
   26 | -2290   -29  -217   138   100   -86 -2414     - -2353     -   -63 |
   27 |-15158   -14   -39  -107    70  -156  1880     --11538     -   -14 |
   28 |  -855   -20   -45   -76   -31    24 -2972     -    68     -   223 |
   29 | -1405   -42  -151   -12    63  -114   305    83 -1602     -   -17 |
   30 |  2498   -15   -28   -54   132   -72 -1430    45  1790     -  -283 |
   31 |  2897   -33     1    34   -25   -12  1727    -9   602     -    86 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     2    53     -     -     -     -    -4     -     -   -59 |
 ALGO |     -     -  -152   540     -     -     -   -54     -     -  -221 |
 AMC2 |     -   -74   178     -     -     -     -  -136     -     -    82 |
 ARTU |     -    48     -   101   -41     -     -   -39     -     -     - |
 ASC1 |     -  -144     -     -    79     -     -     -     -     -     X |
 ASPA |     -     -     -     -    31     -     -     -     -     -   -78 |
 BAHR |     -    22    20     -   -41     -     -     -     -     -    49 |
 BAN2 |     -     -    -5     -     -     -     -     -     -     -     6 |
 BOGT |     -     -     -   238     X     -     -     -     -     -  -208 |
 BOR1 |     -     8    55     -     -     -     -     -     -     -   -75 |
 BREW |     -     -    62     -     -     -     -     -     -     -   -72 |
 BRMU |     -     -     -     -    82     -     -     -     -     -  -202 |
 BRUS |     -    79    13     -     -     -     -     -     -     -  -123 |
 CAGZ |     -   -32     -     -     -     -     -     -     -     -    43 |
 CAS1 |     -    53     -   129   -64     -     -     -     -     -   -27 |
 CEDU |     -     7     -   -17     -     -     -     -     -     -     5 |
 CHUR |     -    51   155     -     -     -     -    -7     -     -  -240 |
 CRO1 |     -    87   113   -25    12     -     -    28     -     -  -382 |
 DAKA |     -   -95     -     -    52     -     -     -     -     -     - |
 DARW |     -   -45    53     -     -     -     -     -     -     -     - |
 DAV1 |     -    48     -     -   -32     -     -    67     -     -   -76 |
 DGAR |     -  -105     -     -   -92     -     -    68     -     -   278 |
 DRAO |     -     -   -59     -     -     -     -    97     -     -   -66 |
 DWH1 |     -   307   209     -     -     -     -  -306     -     -  -246 |
 FAIR |     -   -56    64   -35    -9     -     -    60     -     -   -26 |
 GLPS |     -    -9     -   202   -18     -     -   -89     -     -     - |
 GODE |     -  -125    78   169     -     -     -     -     -     -   -69 |
 GOL2 |     -     -   105     -     -     -     -     -     -     -  -121 |
 GOLD |     -    37     -   -73     -     -     -   -16     -     -    33 |
 GUAM |     -     -     -    42  -129     -     -   189     -     -    25 |
 GUAT |     -     -     -     -   -24     -     -     -     -     -    58 |
 HERS |     -     -  -256     -     -     -     -     -     -     -   298 |
 HRAO |     -  -115     -     -     -     -     -   -14     -     -   174 |
 IENG |     -   -93   109     -     -     -     -     -     -     -     - |
 IISC |     -    -6     -  -211    23     -     -     -     -     -   136 |
 IRKT |     -     -   134  -178     -     -     -     -     -     -     - |
 ISPA |     -    96     -     -    45     -     -   -29     -     -  -201 |
 JAB1 |     -    19     -   -30     -     -     -     -     -     -     - |
 JPLM |     -     -   173     -  -104     -     -     -     -     -    57 |
 KARR |     -     1     -    -2     -     -     -     -     -     -     - |
 KGN0 |     -    -8    -3     -     -     -     -     -     -     -    15 |
 KIRU |     -   -27     -     -     -     -     -    10     -     -    23 |
 KIT3 |     -     -     -     4   -95     -     -    61     -     -   150 |
 KOKB |     -     7     -     -   -86     -     -   117     -     -    44 |
 KOSG |     -    -9     -     -     -     -     -     -     -     -    12 |
 KOUR |     -     -     -  -277    33     -     -   106     -     -    16 |
 KUNM |     -     -     -     -     -     -     -  -109     -     -   148 |
 LAE1 |     -   -39     -     -   -33     -     -     -     -     -   134 |
 LHAS |     -   -55     -     -   -90     -     -     9     -     -   286 |
 LPGS |     -   -47   101  -301     -     -     -     0     -     -   203 |
 MAC1 |     -   -70     -   168   -85     -     -   145     -     -   -39 |
 MADR |     -     -     -     -     -     -     -   -91     -     -   123 |
 MAS1 |     -   -33    68   -68   -26     -     -    76     -     -   -13 |
 MATE |     -     -     -   -25     -     -     -     -     -     -    22 |
 MAW1 |     -   122     -     -  -119     -     -     -     -     -   138 |
 MBAR |     -    34     -     -    13     -     -   -58     -     -     X |
 MDO1 |     -    52   102     -   -60     -     -     -     -     -   -41 |
 METS |     -    10     -     -     -     -     -     -     -     -   -13 |
 MIZU |     -     -     -  -518     -     -     -   118     -     -   292 |
 MKEA |     -     -     -   -91     -     -     -     -     -     -    80 |
 NLIB |     -     -     -     -     -     -     -    74     -     -  -100 |
 NNOR |     -     -     -    96     -     -     -  -118     -     -    76 |
 NOT1 |     -    10     -     -     -     -     -     -     -     -   -14 |
 NPLD |     -    37     -     -     -     -     -   -25     -     -   -17 |
 NRC1 |     -     -    64     -   -50     -     -     0     -     -    48 |
 NSSP |     -     -     -     -     -     -     -   -64     -     -    86 |
 NTUS |     -  -121     -   -32     -     -     -     -     -     -   193 |
 NYA1 |     -    89     -     -   -93     -     -     -     -     -   111 |
 OHI2 |     -    94     -    49   -69     -     -     -     -     -     - |
 PDEL |     -   -30     -     -    45     -     -   -52     -     -     - |
 PERT |     -   -85   -60     X    91     -     -     -     -     -   -40 |
 PIE1 |     -     -     -  -191     -     -     -    94     -     -    39 |
 POTS |     -    -9     -     -    10     -     -     -     -     -   -13 |
 RESO |     -    14     -     -     -     -     -   -14     -     -     - |
 RIOG |     -    21    62     -   -14     -     -     -     -     -   -66 |
 SANT |     -  -218     -   241    36     -     -     -     -     -     X |
 SCH2 |     -     8     -     -     -     -     -   -75     -     -    91 |
 SCUB |     -   158     -     -     -     -     -  -158     -     -     - |
 SFER |     -  -117     -     -     -     -     -     -     -     -   159 |
 SPT0 |     -   -93     -     -     -     -     -     -     -     -   126 |
 STJO |     -     -    36     -     -     -     -   -66     -     -    46 |
 SUTM |     -     -     -     -    30     -     -   -55     -     -     - |
 THU3 |     -   -27     -     -    15     -     -     -     -     -     0 |
 TIDB |     -    36   -91   142   -53     -     -     -     -     -    63 |
 TOW2 |     -   -47     -    73     -     -     -     -     -     -     - |
 TRO1 |     -  -160     -     -    39     -     -     -     -     -   121 |
 TSKB |     -   -65   -34    12    47     -     -     -     -     -     1 |
 TWTF |     -  -198   115     -     -     -     -  -152     -     -   258 |
 UNSA |     -     -     -     -   -36     -     -     -     -     -    90 |
 USNO |     -    -7    80     -     -     -     -     -     -     -   -84 |
 USUD |     -     -     -   -87    15     -     -     -     -     -    46 |
 VILL |     -   219     -  -599     -     -     -     -     -     -   226 |
 WHIT |     -   -50     -     -     -     -     -     -     -     -    68 |
 WILL |     -     5     -     -     -     -     -     -     -     -    -7 |
 WTZR |     -   -25     -   -20     -     -     -     -     -     -    52 |
 WUHN |     -     -     -     -    42     -     -     -     -     -  -104 |
 YELL |     -    14    95   114   -78     -     -     -     -     -   -36 |
 ZWEN |     -     -     -  -149    54     -     -     -     -     -    -4 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  3340    62    59    65    26   118  4689    43  3014     -    57 |  288   2.81
    3 |  4278    38    26    90    30    51  8584     -  3039     -    40 |  264   2.14
    4 |  1055     X    49     X    41   338  1460     -   894     -   106 |  256   0.67
    5 |  1854    29    22    39    16    58  6788     -  2047     -    32 |  264   1.41
    6 |   877    47    23    56    27    50  2715    53   743     -    96 |  288   1.84
    7 |  1061    36    58    36    34    46   798    39   790     -    93 |  288   0.63
    8 |  3573    50    29    47    23    74  4776     -  3471     -    31 |  264   1.64
    9 |  3516    35    27    45    19    35  5277     -  3246     -    51 |  264   1.19
   10 |  1615    38    38   111    32   157  1836    61  1540     -    69 |  288   1.39
   11 |  1692    74    38    55    32    58   827    63  1966     -    42 |  288   0.40
   13 |   811    53    51    57    32    65  1500    64   865     -    84 |  288   0.23
   14 |   722    63    60    69    26    91  1805     -  1534     -   122 |  264   0.26
   15 |  4237   160   198   168    50   138  8392     -  4187     -    92 |  270   3.13
   16 |   878    19    51    55    26    73  1296    59   836     -    56 |  288   0.26
   17 |  1141   173   192   111    43   177  1959     -   774     -   158 |  270   1.19
   18 |   866    48    32    44    21    60   795    70   788     -   126 |  288   0.39
   19 |  1014    56    49    80    25   177   686    42   950     -    37 |  288   0.19
   20 |   479    51    58    37    28   105   349     -   414     -    78 |  264   0.31
   21 |  5247    80    38    71    42   103  4769     -  4835     -   179 |  264   0.33
   22 |   675    74    53    37    32    75   616    44   564     -    56 |  288   0.40
   24 |  8995   139    56   101    37    85  1577    93  5779     -    79 |  288   3.56
   25 |  5289    49    40    42    17    35  3498     -  4313     -    50 |  264   3.15
   26 |   855    32    36    59    29   117  1218     -   971     -    72 |  264   0.29
   27 |  2886    46    29    57    19    58  2992     -  4242     -    73 |  264   1.16
   28 |  1998    28    68    99    17    56  1346     -  1891     -   148 |  264   0.51
   29 |  1289    45    25    55    26    84   755    32  1256     -    41 |  288   0.53
   30 |  1304    25    18    75    19    62   634    63   971     -    67 |  288   0.47
   31 |  5115    25    34    30    25    43  3143    40  4683     -    41 |  288   3.16
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    32    26     -     -     -     -    26     -     -    21 |  288   0.06
 ALGO |     -     -    21    27     -     -     -    28     -     -    14 |  288   0.05
 AMC2 |     -    45    93     -     -     -     -    75     -     -    67 |  287   0.23
 ARTU |     -    19     -    61    25     -     -    49     -     -     - |  288  11.78
 ASC1 |     -    64     -     -    35     -     -     -     -     -     X |  287    >>>
 ASPA |     -     -     -     -    15     -     -     -     -     -    37 |  286    >>>
 BAHR |     -    47    27     -    28     -     -     -     -     -    29 |  288   1.55
 BAN2 |     -     -    67     -     -     -     -     -     -     -    78 |  279  17.32
 BOGT |     -     -     -   104     X     -     -     -     -     -    91 |  270  11.74
 BOR1 |     -    23    30     -     -     -     -     -     -     -    33 |  288   0.99
 BREW |     -     -    16     -     -     -     -     -     -     -    18 |  288   0.05
 BRMU |     -     -     -     -    12     -     -     -     -     -    28 |  288    >>>
 BRUS |     -    31    22     -     -     -     -     -     -     -    40 |  288   0.05
 CAGZ |     -    33     -     -     -     -     -     -     -     -    45 |  276   0.77
 CAS1 |     -    27     -    44    20     -     -     -     -     -    37 |  287   8.05
 CEDU |     -    25     -    37     -     -     -     -     -     -    43 |  288  12.37
 CHUR |     -    20    16     -     -     -     -    27     -     -    17 |  288  10.71
 CRO1 |     -    89    19    57    46     -     -    31     -     -    27 |  272  16.83
 DAKA |     -    38     -     -    21     -     -     -     -     -     - |  288  17.07
 DARW |     -    15    17     -     -     -     -     -     -     -     - |  240   2.70
 DAV1 |     -    17     -     -    24     -     -    40     -     -    43 |  288  19.07
 DGAR |     -    20     -     -    33     -     -    57     -     -    35 |  288  14.01
 DRAO |     -     -    79     -     -     -     -    43     -     -   117 |  284    >>>
 DWH1 |     -    63    20     -     -     -     -    28     -     -    83 |  288   0.61
 FAIR |     -    48    23    28    35     -     -    43     -     -   178 |  288   0.09
 GLPS |     -    28     -    59    21     -     -    28     -     -     - |  288  10.70
 GODE |     -    38    30    42     -     -     -     -     -     -    25 |  288   0.07
 GOL2 |     -     -    79     -     -     -     -     -     -     -    91 |  261    >>>
 GOLD |     -    37     -   108     -     -     -    49     -     -    29 |  288  17.49
 GUAM |     -     -     -    59    31     -     -    60     -     -    54 |  229  13.64
 GUAT |     -     -     -     -     9     -     -     -     -     -    23 |  288    >>>
 HERS |     -     -    22     -     -     -     -     -     -     -    25 |  241  13.98
 HRAO |     -    26     -     -     -     -     -    46     -     -    53 |  288   0.65
 IENG |     -    26    30     -     -     -     -     -     -     -     - |  279   0.97
 IISC |     -    34     -    75    19     -     -     -     -     -    31 |  288  14.15
 IRKT |     -     -    24    32     -     -     -     -     -     -     - |  233   0.13
 ISPA |     -    22     -     -    17     -     -    24     -     -    26 |  288  11.47
 JAB1 |     -    17     -    27     -     -     -     -     -     -     - |  288  12.27
 JPLM |     -     -    29     -    12     -     -     -     -     -    46 |  288   2.36
 KARR |     -    16     -    26     -     -     -     -     -     -     - |  288   9.22
 KGN0 |     -    42    38     -     -     -     -     -     -     -    29 |  287   0.29
 KIRU |     -    43     -     -     -     -     -    40     -     -    16 |  288   8.16
 KIT3 |     -     -     -    99    65     -     -   128     -     -    97 |  262  38.61
 KOKB |     -    29     -     -    27     -     -    35     -     -    56 |  288   0.06
 KOSG |     -    31     -     -     -     -     -     -     -     -    42 |  288  13.49
 KOUR |     -     -     -   145    44     -     -    46     -     -    33 |  288   2.24
 KUNM |     -     -     -     -     -     -     -    28     -     -    38 |  287  27.32
 LAE1 |     -    32     -     -    32     -     -     -     -     -    65 |  287  11.25
 LHAS |     -    35     -     -    19     -     -    57     -     -    24 |  288  10.08
 LPGS |     -    29    38    50     -     -     -    33     -     -    43 |  288  62.94
 MAC1 |     -    32     -    33    23     -     -    50     -     -    48 |  288  13.05
 MADR |     -     -     -     -     -     -     -    33     -     -    45 |  287  15.64
 MAS1 |     -    24    20    29    23     -     -    45     -     -    23 |  288   1.17
 MATE |     -     -     -    17     -     -     -     -     -     -    15 |  100    >>>
 MAW1 |     -    27     -     -    16     -     -     -     -     -    27 |  288  18.62
 MBAR |     -    40     -     -    28     -     -    53     -     -     X |  288  20.47
 MDO1 |     -    29    26     -    15     -     -     -     -     -    22 |  288   4.03
 METS |     -    22     -     -     -     -     -     -     -     -    30 |  287  11.19
 MIZU |     -     -     -    39     -     -     -    30     -     -    24 |  288   0.50
 MKEA |     -     -     -    17     -     -     -     -     -     -    14 |  288  23.19
 NLIB |     -     -     -     -     -     -     -    33     -     -    44 |  287   0.04
 NNOR |     -     -     -    29     -     -     -    44     -     -    40 |  288  15.99
 NOT1 |     -    18     -     -     -     -     -     -     -     -    24 |  288   0.09
 NPLD |     -    51     -     -     -     -     -    47     -     -    27 |  287   0.06
 NRC1 |     -     -    27     -    19     -     -    31     -     -    21 |  288   0.04
 NSSP |     -     -     -     -     -     -     -    33     -     -    45 |  287   9.97
 NTUS |     -    24     -    45     -     -     -     -     -     -    39 |  288  10.52
 NYA1 |     -    25     -     -    22     -     -     -     -     -    33 |  288   0.06
 OHI2 |     -    39     -    54    14     -     -     -     -     -     - |  288   6.56
 PDEL |     -    26     -     -    28     -     -    47     -     -     - |  288  56.44
 PERT |     -    25    30     X    21     -     -     -     -     -    31 |  288   2.68
 PIE1 |     -     -     -    52     -     -     -    30     -     -    16 |  245 237.25
 POTS |     -    36     -     -    29     -     -     -     -     -    41 |  288  21.42
 RESO |     -    19     -     -     -     -     -    19     -     -     - |  287   9.08
 RIOG |     -    98    49     -    30     -     -     -     -     -    61 |  287   9.95
 SANT |     -    56     -    52    27     -     -     -     -     -     X |  262   9.33
 SCH2 |     -    32     -     -     -     -     -    29     -     -    17 |  288   6.35
 SCUB |     -    23     -     -     -     -     -    23     -     -     - |  287  12.97
 SFER |     -    15     -     -     -     -     -     -     -     -    21 |  283   0.32
 SPT0 |     -    27     -     -     -     -     -     -     -     -    36 |  288   0.06
 STJO |     -     -    23     -     -     -     -    23     -     -    19 |  288   0.05
 SUTM |     -     -     -     -    24     -     -    43     -     -     - |  287   2.62
 THU3 |     -    17     -     -    12     -     -     -     -     -    32 |  288   8.93
 TIDB |     -    37    38    24    21     -     -     -     -     -    30 |  288   0.08
 TOW2 |     -    18     -    29     -     -     -     -     -     -     - |  288   9.01
 TRO1 |     -    42     -     -    48     -     -     -     -     -    67 |  288   8.74
 TSKB |     -    57    42    50    22     -     -     -     -     -    36 |  288   1.44
 TWTF |     -    28    31     -     -     -     -    36     -     -    23 |  288   0.63
 UNSA |     -     -     -     -    15     -     -     -     -     -    38 |  132  13.29
 USNO |     -    18     9     -     -     -     -     -     -     -    22 |  288   0.03
 USUD |     -     -     -    42    42     -     -     -     -     -   127 |  288  10.26
 VILL |     -    39     -    34     -     -     -     -     -     -    31 |  288  14.95
 WHIT |     -    16     -     -     -     -     -     -     -     -    21 |  288  25.22
 WILL |     -    20     -     -     -     -     -     -     -     -    27 |  288  28.64
 WTZR |     -    37     -    38     -     -     -     -     -     -    31 |  288   0.08
 WUHN |     -     -     -     -    27     -     -     -     -     -    66 |  287  13.26
 YELL |     -    29    11    22    16     -     -     -     -     -    25 |  288   0.04
 ZWEN |     -     -     -    38    22     -     -     -     -     -    33 |  266  16.82
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3084    48    51    63    28   109  3502    47  2644     -    60 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 SPT0 |   288     0     0   288    9.54   | 3.96e-14  1.07e-14  3.17e-15 |
 BREW |   288     0     0   288    8.49   | 4.16e-14  8.04e-15  1.91e-15 |
 NPLD |   287     0     0   286    8.07   | 4.44e-14  1.45e-14  2.50e-15 |
 YELL |   288     0     0   288    7.38   | 3.18e-14  5.15e-15  2.05e-15 |
 ALGO |   288     0     0   288    6.76   | 3.52e-14  8.32e-15  3.97e-15 |
 BRUS |   288     0     0   288    6.75   | 6.50e-14  1.94e-14  3.38e-15 |
 STJO |   288     0     0   288    5.91   | 3.44e-14  1.08e-14  5.15e-15 |
 USNO |   288     0     0   288    5.56   | 4.19e-14  1.02e-14  2.66e-15 |
 NLIB |   287     1     0   285    5.51   | 4.34e-14  1.06e-14  1.82e-15 |
 PIE1 |   245     0     0   243    4.88   | 4.31e-14  1.70e-14         - |
 AMC2 |   287     1     0   285    4.86   | 6.07e-14  1.27e-14  1.04e-14 |
 KOKB |   288     0     0   288    4.14   | 4.81e-14  1.60e-14  6.15e-15 |
 GODE |   288     0     0   288    3.05   | 5.51e-14  1.21e-14  5.25e-15 |
 GOL2 |   261     0     0   257    3.02   | 5.15e-14  1.50e-14  5.43e-15 |
 ALBH |   288     0     0   288    2.97   | 5.22e-14  1.03e-14  2.89e-15 |
 WTZR |   288     0     0   288    2.95   | 5.91e-14  4.22e-14  4.85e-15 |
 NRC1 |   288     0     0   288    1.89   | 3.94e-14  1.29e-14  2.07e-15 |
 TIDB |   288     0     0   288    1.75   | 1.64e-13  1.51e-14  6.38e-15 |
 DRAO |   284     1     0   282    1.72   | 7.49e-14  2.59e-14  1.21e-14 |
 NYA1 |   288     0     0   288    1.55   | 3.48e-14  1.14e-14  4.08e-15 |
 FAIR |   288     0     0   288    1.13   | 6.47e-14  1.42e-14  6.82e-15 |
 NOT1 |   288     0     0   143    0.67   | 4.72e-14  1.37e-14  6.07e-15 |
 G26  |   264     0     0   240    0.24   | 3.31e-13  1.03e-13         - |
 IRKT |   233     0     0    84    0.15   | 6.74e-14  1.89e-14         - |
 G29  |   288     0     0   288    0.13   | 4.09e-13  1.22e-13  4.86e-14 |
 MIZU |   288     0     0   288    0.09   | 3.46e-13  1.20e-13  5.22e-14 |
 G07  |   288     0     0   288    0.08   | 2.86e-13  1.02e-13  8.13e-14 |
 SFER |   283     0     0   278    0.08   | 4.14e-13  9.69e-14  3.78e-14 |
 TWTF |   288     0     0   288    0.07   | 4.09e-13  1.11e-13  5.84e-14 |
 G16  |   288     0     4    41    0.06   | 4.72e-13  5.05e-14  3.21e-14 |
 G30  |   288     0     0   288    0.06   | 3.21e-13  1.24e-13  4.67e-14 |
 DWH1 |   288     0     0   288    0.05   | 5.00e-13  1.28e-13  5.45e-14 |
 BOR1 |   288     0     0   288    0.05   | 4.84e-13  1.73e-13  1.05e-13 |
 KGN0 |   287     0     2   104    0.05   | 4.16e-13  1.22e-13  2.17e-14 |
 IENG |   279     0     0   277    0.04   | 5.73e-13  1.58e-13  8.01e-14 |
 G04  |   256     0     0   234    0.04   | 4.71e-13  1.31e-13         - |
 HRAO |   288     0     0   288    0.03   | 1.32e-13  3.49e-14  6.01e-14 |
 G06  |   288     0     0   288    0.03   | 4.76e-13  2.03e-13  1.16e-13 |
 G31  |   288     0     0   288    0.02   | 2.36e-13  1.57e-13  2.05e-13 |
 G17  |   270     0     0   252    0.02   | 5.10e-13  1.33e-13         - |
 G14  |   264     0     4     8    0.02   | 5.94e-13  5.98e-14         - |
 G27  |   264     0     0   240    0.02   | 3.71e-13  1.67e-13         - |
 BAHR |   288     0     0   288    0.01   | 3.25e-13  9.34e-14  1.06e-13 |
 TSKB |   288     0     0   288    0.01   | 1.01e-12  3.15e-13  1.11e-13 |
 G28  |   264     0     2    12    0.01   | 6.32e-13  7.30e-14         - |
 G05  |   264     0     0   240    0.01   | 1.36e-12  3.74e-13         - |
 G10  |   288     0     0   288    0.01   | 1.24e-12  4.08e-13  7.03e-14 |
 G03  |   264     0     0   240    0.01   | 1.26e-12  3.09e-13         - |
 KOUR |   288     0     0   288    0.01   | 1.54e-12  3.41e-13  2.37e-13 |
 G25  |   264     0     0   240    0.01   | 1.36e-12  3.97e-13         - |
 G09  |   264     0     0   240    0.01   | 1.36e-12  3.11e-13         - |
 MAS1 |   288     0     0   288    0.00   | 1.89e-12  4.36e-13  1.00e-13 |
 G15  |   270     0     0   252    0.00   | 1.66e-12  4.75e-13         - |
 G08  |   264     0     0   240    0.00   | 1.37e-12  3.81e-13         - |
 SUTM |   287     0     0   286    0.00   | 6.67e-13  2.25e-13  2.40e-13 |
 GPST |   288     0     0     0    0.00   | 2.40e-14  8.56e-15  2.94e-15 |
 BOGT |   270     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 MATE |   100     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 G24  |   288     0     0     0    0.00   | 1.31e-12  4.90e-13  4.23e-13 |
 G22  |   288     1     6     0    0.00   | 6.42e-13  7.72e-14  3.99e-14 |
 G21  |   264     0     6     0    0.00   | 1.14e-12  1.34e-13         - |
 G20  |   264     0     6     0    0.00   | 6.03e-13  7.90e-14         - |
 G19  |   288     0     5     0    0.00   | 6.47e-13  7.02e-14  1.59e-14 |
 G18  |   288     0     6     0    0.00   | 1.25e-12  1.21e-13  4.40e-14 |
 G13  |   288     0     5     0    0.00   | 6.26e-13  6.41e-14  2.20e-14 |
 G11  |   288     0     5     0    0.00   | 6.68e-13  7.02e-14  5.29e-14 |
 G01  |   288     0     0     0    0.00   | 1.55e-12  5.54e-13  3.01e-13 |
 ZWEN |   266     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     2     0    0.00   | 4.75e-13  6.75e-13  1.90e-12 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   132     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   287     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     1     0    0.00   | 6.62e-13  2.61e-13  5.97e-13 |
 SANT |   262     0     0     0    0.00   |        -         -         - |
 RIOG |   287     0     0     0    0.00   |        -         -         - |
 RESO |   287     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.62e-12  5.26e-13  1.85e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   287     0     0     0    0.00   |        -         -         - |
 NNOR |   288     2     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     1     0    0.00   | 7.75e-13  8.10e-13  2.45e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MADR |   287     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     1     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   287     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   262     1     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.93e-13  2.15e-13  2.15e-13 |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   229     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   240     0     0     0    0.00   | 2.62e-13  4.44e-13         - |
 DAKA |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   272     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   287     0     0     0    0.00   |        -         -         - |
 CAGZ |   276     0     6     0    0.00   | 9.18e-13  1.09e-13  5.64e-14 |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   279     0     0     0    0.00   |        -         -         - |
 ASPA |   286     0     0     0    0.00   |        -         -         - |
 ASC1 |   287     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.05e-17  3.67e-16  2.20e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     YELL      YELL      NLIB |
------------------------------------------+------------------------------+
