
 GPS week: 1279   Day: 3   MJD: 53200                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2783      0   -32.12     1.79     3.49     0.00
 cod |   288     0  26974    334   -31.79     0.65     0.04    16.99
 emr |   288     0  15910    167   -38.36     0.46     0.05    13.30
 esa |   288     0  17464    902   -55.10   -12.84     0.05    11.99
 gfz |   288     0  21005    113   -32.63     2.39     0.03    27.28
 iga |    96     0   2687    126   -32.11     1.81     0.11     0.00
 igu |    96     0   2687      0   -32.11     1.83     4.01     0.00
 jpl |   288     0  15606    526   -38.20     0.50     0.05    14.78
 ngs |    96     0   2688      0   -32.12     1.80     3.37     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     1  25007   1361   910.31 -1037.93     0.05    15.66

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  4462    50   -45  -100    85   -29  8061   -10  3034     -   -84 |
    3 |  3237    11   -77     1    53   -34  1117   203  2519     -  -141 |
    4 | -4765    49  -148   -69   122   -86   993   -96 -4713     -   -29 |
    5 |  7242    55    29   -20   -77   160 14742   164  5783     -    -2 |
    6 |  2508   -13   -12   134     4  -239-19411   200  2590     -  -160 |
    7 | -1815    13   -76  -216   164    77  -243  -159 -1716     -    -3 |
    8 | -1355    69   -58  -300    95    97 10283   -71 -1099     -    79 |
    9 | -6618    23   -84    40    99  -225 -6028   -29 -5616     -  -147 |
   10 | -7804   106    42  -138   -50   104 -3992    92 -6978     -     X |
   11 |   371   -54    27    33   -34   -54   369    18   982     -    66 |
   13 |  3522   110   -11   172   -94    93  2238   -47  3542     -   -57 |
   14 |  4256   -12   -89    82    69    80   452     4  4425     -   -96 |
   15 | -9589    40    42    40   -88   -24-12452   124 -8647     -   -27 |
   16 |  3667   -88   -88    87    96   -58   357   151  4014     -  -126 |
   17 | -1285   174   -49    25   -47   -60  7604   -22 -1183     -  -105 |
   18 |  3558   -25   -28   -29    47    61   476    89  3331     -   -50 |
   19 |  1440   -48  -196   303    -4     -  -354   -14  1609     -     X |
   20 |  5908    68    50    -8   -25   117   294   192  5934     -  -169 |
   21 |  4879   -40   -52   235   -21   315   718    55  4833     -   -82 |
   22 |  -262  -114   -78   -85    83    62 -1511     X  -147     -   111 |
   23 |  1651   -85  -219   146   133  -122 -7690     X     -     -  -135 |
   24 | -5944   181   -12  -192   -32  -258  3992     6 -5822     -    12 |
   25 |  5908     9    36  -113    60  -117  6959   165  6162     -  -142 |
   26 | -3037   -23   -87    91    73   -40  1205   -71 -3016     -   -69 |
   27 |  1234   -24  -205    28    78  -231 -4042     X   821     -     X |
   28 |   772   -76   -73   -76    32   -13  1009   -57   958     -   179 |
   29 | -4100   -49  -134    85    75   138     -   -91 -3894     -     8 |
   30 |  1113   -34    79    90   -30   -81  -710   166   969     -  -116 |
   31 | -9131    15   -74  -134   105    11 -4511    23 -8672     -   -47 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -    -7     -     -     -     -    43     -     -   -35 |
 ALGO |     -   -43   -10    35   -72     -     -   154     -     -     8 |
 ALRT |     -   -38     -     -    24     -     -     -     -     -     - |
 AMC2 |     -   -41    95     -     -     -     -  -151     -     -   106 |
 ARTU |     -   -13     -   173   -12     -     -  -104     -     -     - |
 ASC1 |     -  -168     -     -   -49     -     -     -     -     -   268 |
 AUCK |     -   -22     -     X     -     -     -     -     -     -    24 |
 BILI |     -    39     -     -   -17     -     -   -13     -     -     - |
 BOGT |     -    72     -     X   -45     -     -     -     -     -     X |
 BOR1 |     -    10    98     -     -     -     -     -     -     -   -95 |
 BRUS |     -     2    47     -     -     -     -   -49     -     -     4 |
 CAGZ |     -   -55     -     -     -     -     -     -     -     -    59 |
 CAS1 |     -    60     -   111   -54     -     -    30     -     -   -85 |
 CEDU |     -   -10     -    14     -     -     -     -     -     -     - |
 CHAT |     -    -8     -     -   -20     -     -     -     -     -    44 |
 CHUR |     -   111    86     -     -     -     -    60     -     -  -251 |
 COCO |     -   -64     -    82     -     -     -     -     -     -     7 |
 CRO1 |     -    94   -63    96    61     -     -   -47     -     -  -190 |
 DAV1 |     -   100     -     -   -53     -     -    56     -     -   -70 |
 DGAR |     -   -94     -     -   -13     -     -     8     -     -   116 |
 DRAO |     -    56   -32     -     -     -     -    37     -     -   -69 |
 DWH1 |     -   275    76     -     -     -     -  -458     -     -    92 |
 FAIR |     -   -85    36   170   -59     -     -    65     -     -   -28 |
 GLPS |     -    10     -     -    42     -     -   -88     -     -     - |
 GODE |     -   -25    32    38     -     -     -     -     -     -   -31 |
 GOL2 |     -     -    51     -     -     -     -     -     -     -   -44 |
 GOLD |     -     -     -   -53   -14     -     -   -34     -     -    96 |
 GUAT |     -   -77     -     -    -2     -     -     -     -     -    87 |
 HERS |     -     -  -296     -     -     -     -     -     -     -   251 |
 HLFX |     -     -   232     -     -     -     -  -209     -     -     - |
 HOB2 |     -   -37   118   -16     -     -     -     -     -     -   -48 |
 HOFN |     -     -     -     -   -62     -     -   115     -     -     - |
 HRAO |     -   -22     -     -   -75     -     -    37     -     -   120 |
 IISC |     -     -     -   -74    27     -     -     -     -     -    10 |
 ISPA |     -   138     -     -    77     -     -   -79     -     -  -218 |
 JPLM |     -     -    66     -   -15     -     -     -     -     -   -30 |
 KARR |     -    56     -   -79     -     -     -     -     -     -     - |
 KIRU |     -   -14     -     -     -     -     -     -     -     -    15 |
 KOKB |     -   -16    88     -   -88     -     -   -31     -     -   126 |
 KOSG |     -   -32     -     -     -     -     -     -     -     -    35 |
 KOUR |     -     0     -    -2     1     -     -     -     -     -     - |
 KSTU |     -     -     -  -107     -     -     -     -     -     -    82 |
 LAMA |     -  -116     -     -     -     -     -   133     -     -     - |
 LHAS |     -     -     -     -     8     -     -   -83     -     -    65 |
 LPGS |     -     -     -  -186     X     -     -     -     -     -   143 |
 MAC1 |     -   -29     -    77  -121     -     -   231     -     -   -34 |
 MADR |     -     -     -     -     -     -     -  -210     -     -   198 |
 MALI |     -     6     -   -92    37     -     -     -     -     -     - |
 MAS1 |     -   -25     -    35    15     -     -     -     -     -   -26 |
 MATE |     -     8     -  -114     -     -     -     -     -     -    79 |
 MAW1 |     -   194     -     -  -140     -     -     -     -     -    33 |
 MBAR |     -    25     -     -   -19     -     -   -55     -     -    60 |
 METS |     -    66     -     -     -     -     -     -     -     -   -72 |
 MKEA |     -   141     -  -127  -159     -     -     -     -     -   222 |
 NLIB |     -     -  -121     -     -     -     -    94     -     -    14 |
 NPLD |     -   -44   127     -     -     -     -     -     -     -   -60 |
 NRIL |     -   -42     -     -    -1     -     -    49     -     -     - |
 NTUS |     -  -154     -    45     -     -     -     -     -     -   133 |
 NYA1 |     -     X     -     -   -47     -     -     -     -     -    82 |
 OHI2 |     -   149     -    47  -121     -     -    15     -     -     - |
 ONSA |     -   -10     -   -72    38     -     -     -     -     -     - |
 PDEL |     -    -7     -     -    -4     -     -    16     -     -     - |
 PERT |     -   -64     -  -271   159     -     -     -     -     -     - |
 PETP |     -   -57     -     -    22     -     -    24     -     -     - |
 POL2 |     -     -     -     -     -     -     -   -15     -     -    14 |
 POTS |     -   -25     -     -    29     -     -     -     -     -   -22 |
 PRDS |     -     -    30     -     -     -     -     -     -     -   -26 |
 PTBB |     -   -81   130     -     -     -     -     -     -     -   -22 |
 QAQ1 |     -   -93     -     -     -     -     -     -     -     -   101 |
 RESO |     -    18     -     -     -     -     -   -21     -     -     - |
 REYK |     -  -125     -     -     -     -     -     -     -     -   135 |
 SANT |     -  -176     -     X    31     -     -     -     -     -   137 |
 SCH2 |     -     -     8     -     -     -     -   -40     -     -    31 |
 SCUB |     -    40     -     -     -     -     -   -46     -     -     - |
 SPT0 |     -  -141   181     -     -     -     -     -     -     -     - |
 STJO |     -    50   -87     -     -     -     -   -74     -     -    89 |
 SUTH |     -   -81     -     -     -     -     -     -     -     -    88 |
 THU3 |     -    -2     -     -     -     -     -     -     -     -     2 |
 TID1 |     -     -     -     -     -     -     -   -59     -     -    56 |
 TIDB |     -    37   -66    -9     -     -     -     -     -     -    22 |
 TIXI |     -   -43     -     -     -     -     -    50     -     -     - |
 TOW2 |     -    62     -   -20   -30     -     -     -     -     -     - |
 TRO1 |     -     -     -     -   -50     -     -     -     -     -    87 |
 ULAB |     -     -     -     -    32     -     -   -59     -     -     - |
 UNSA |     -     -     -    -9   -67     -     -   -66     -     -   186 |
 URUM |     -    25     -     -   -51     -     -     -     -     -    61 |
 USUD |     -     -    92   -37     -     -     -    71     -     -  -117 |
 VILL |     -    -6     -   -78     -     -     -     -     -     -    66 |
 WES2 |     -     -   109     -   -57     -     -     -     -     -     6 |
 WHIT |     -    -1     -     -     -     -     -     -     -     -     1 |
 WILL |     -   -43     -     -     -     -     -     -     -     -    47 |
 WTZR |     -     -     -   -53     -     -     -     -     -     -    40 |
 YAKT |     -   -84     -     -     -     -     -     4     -     -    87 |
 YAR2 |     -  -132   180     -     -     -     -     -     -     -    -9 |
 YELL |     -   -22    42   242   -65     -     -     -     -     -   -42 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  9120    49    49    90    23    52  5101    51  8525     -    79 |  288   4.32
    3 |  4563    44    51    37    12    35  1594    38  3913     -    60 |  288   1.32
    4 |  1494    66    46    27    32   162  1728    64  1633     -    49 |  288   1.50
    5 |  7274    32    37    64    26    74  5543    37  6933     -    49 |  288   3.03
    6 |  1290    36    46    23    16    82 10339    26  1185     -    39 |  288   0.95
    7 |  1262    35    45    27    31    49   753    62  1346     -    70 |  288   0.49
    8 |  3560    56    26    59    25    83  7042    49  3585     -    75 |  288   1.18
    9 |  5283   128    70    85    54   143  2566    42  5674     -    63 |  288   2.59
   10 |  5543    42    33    63    22   146  3749    52  5382     -     X |  288   3.23
   11 |  3314    74    88    41    28    59   597   144  2934     -    52 |  288   0.30
   13 |   913    44    71    66    29    66  1063   130   959     -    47 |  288   0.30
   14 |   411    56    43    48    27    46   385   103   479     -    41 |  288   0.18
   15 |  6598    69    33    36    37   163  8876    49  5290     -    53 |  288   3.28
   16 |   922    33    38   104    26    73   547    87   911     -    82 |  288   0.32
   17 |  2482    96   109    73    80   124  5859   123  2414     -   131 |  288   1.35
   18 |  1055    43    30    37    49    74   555   125  1104     -    79 |  288   0.38
   19 |   956    39    51    61    29     -   682    75  1072     -     X |  288   0.23
   20 |   516    44    41    55    29   113   493   101   545     -    88 |  288   0.19
   21 |  2592    73    55    34    37   148  2168   111  2583     -    34 |  288   0.56
   22 |   632    76    62    35    23    56  1228     X   587     -    66 |  288   0.32
   23 |  1059    76    94    51    30   327  4506     X     -     -    88 |  287   0.57
   24 |  2709    67    29    72    23   159  1903    45  2777     -    50 |  288   2.42
   25 |  5032    66    91    87    28    93  3976    42  4726     -    61 |  288   3.14
   26 |   504    37    27    36    21    66   738    44   549     -    42 |  288   0.39
   27 |  2240    71   111    54    27   142  2397     X  2400     -     X |  288   0.92
   28 |   794    34    49    37    29    55   996    65   869     -    58 |  288   0.81
   29 |   902    38   101    37    38   146     -    48   723     -    36 |  288   0.77
   30 |  1157    34    36    37    18   101  1013    36  1472     -    37 |  288   0.83
   31 |  3080    31    28    47    21    31  6685    44  3344     -    43 |  288   1.74
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    19     -     -     -     -    31     -     -    27 |  288   0.23
 ALGO |     -    43    35    49    58     -     -    78     -     -    55 |  286 265.08
 ALRT |     -    20     -     -    13     -     -     -     -     -     - |  288   9.52
 AMC2 |     -    15    23     -     -     -     -    17     -     -    17 |  288   0.04
 ARTU |     -    26     -    33    25     -     -    33     -     -     - |  288  10.99
 ASC1 |     -    22     -     -    23     -     -     -     -     -    52 |  223    >>>
 AUCK |     -    29     -     X     -     -     -     -     -     -    31 |  231  12.69
 BILI |     -    19     -     -    14     -     -    14     -     -     - |  287  10.36
 BOGT |     -    28     -     X    18     -     -     -     -     -     X |  287  13.19
 BOR1 |     -    26    38     -     -     -     -     -     -     -    18 |  287   0.60
 BRUS |     -    28    23     -     -     -     -    30     -     -    23 |  288   0.03
 CAGZ |     -    31     -     -     -     -     -     -     -     -    33 |   90    >>>
 CAS1 |     -    30     -    66    25     -     -    25     -     -    26 |  288   8.69
 CEDU |     -    22     -    31     -     -     -     -     -     -     - |  276  19.08
 CHAT |     -    19     -     -    13     -     -     -     -     -    20 |  286  12.38
 CHUR |     -    33    51     -     -     -     -    68     -     -    55 |  288  16.76
 COCO |     -    33     -    60     -     -     -     -     -     -    24 |  287   7.29
 CRO1 |     -    55    50   100    37     -     -    64     -     -    43 |  272  17.55
 DAV1 |     -    23     -     -    28     -     -    17     -     -    33 |  288  19.61
 DGAR |     -    23     -     -    18     -     -    23     -     -    22 |  288  16.27
 DRAO |     -    21    12     -     -     -     -    18     -     -    29 |  288   0.06
 DWH1 |     -    29    29     -     -     -     -    30     -     -    34 |  287   0.49
 FAIR |     -    24    26    36    24     -     -    21     -     -    21 |  288   0.12
 GLPS |     -    16     -     -    18     -     -    21     -     -     - |  288   9.13
 GODE |     -    29    24    43     -     -     -     -     -     -    32 |  288   0.09
 GOL2 |     -     -    81     -     -     -     -     -     -     -    69 |   97  32.44
 GOLD |     -     -     -    66    51     -     -    54     -     -    74 |  288  12.34
 GUAT |     -    25     -     -    20     -     -     -     -     -    26 |  288    >>>
 HERS |     -     -    23     -     -     -     -     -     -     -    20 |   80   9.58
 HLFX |     -     -    26     -     -     -     -    23     -     -     - |  288   3.53
 HOB2 |     -    40    28    34     -     -     -     -     -     -    41 |  288   0.05
 HOFN |     -     -     -     -    18     -     -    34     -     -     - |  288    >>>
 HRAO |     -    44     -     -    19     -     -    35     -     -    30 |  288   1.92
 IISC |     -     -     -    27    20     -     -     -     -     -    28 |  287  15.69
 ISPA |     -    26     -     -    26     -     -    37     -     -    20 |  268  10.41
 JPLM |     -     -    32     -    28     -     -     -     -     -    33 |  288   3.81
 KARR |     -    22     -    32     -     -     -     -     -     -     - |  287  10.84
 KIRU |     -    21     -     -     -     -     -     -     -     -    23 |  102   7.33
 KOKB |     -    26    62     -    42     -     -    31     -     -    29 |  288   0.07
 KOSG |     -    19     -     -     -     -     -     -     -     -    20 |  103   7.64
 KOUR |     -    33     -    28    19     -     -     -     -     -     - |  288   1.30
 KSTU |     -     -     -   140     -     -     -     -     -     -   107 |   93  14.04
 LAMA |     -    16     -     -     -     -     -    18     -     -     - |  287  12.99
 LHAS |     -     -     -     -    15     -     -    35     -     -    20 |  288   9.52
 LPGS |     -     -     -    36     X     -     -     -     -     -    28 |  109  27.78
 MAC1 |     -    35     -    49    25     -     -    26     -     -    31 |  288  21.40
 MADR |     -     -     -     -     -     -     -    88     -     -    84 |   81   9.80
 MALI |     -    37     -    40    21     -     -     -     -     -     - |  288  21.23
 MAS1 |     -    26     -    51    32     -     -     -     -     -    24 |  288   3.44
 MATE |     -    26     -    41     -     -     -     -     -     -    43 |  286   0.11
 MAW1 |     -    20     -     -    16     -     -     -     -     -    22 |  288  31.99
 MBAR |     -    52     -     -    17     -     -    27     -     -    47 |  288  24.10
 METS |     -    21     -     -     -     -     -     -     -     -    23 |  102   7.93
 MKEA |     -    37     -    48    18     -     -     -     -     -    37 |  288  25.19
 NLIB |     -     -    25     -     -     -     -    17     -     -    20 |  287   0.04
 NPLD |     -    20    24     -     -     -     -     -     -     -    17 |  287   0.05
 NRIL |     -    15     -     -    15     -     -    21     -     -     - |  288   9.92
 NTUS |     -    30     -    38     -     -     -     -     -     -    22 |  287   8.71
 NYA1 |     -     X     -     -    11     -     -     -     -     -    19 |  287   0.08
 OHI2 |     -    42     -    91    32     -     -    44     -     -     - |  288   7.15
 ONSA |     -    22     -    31    19     -     -     -     -     -     - |  288   0.05
 PDEL |     -    24     -     -    15     -     -    18     -     -     - |  288  57.36
 PERT |     -    20     -    41    17     -     -     -     -     -     - |  288   1.94
 PETP |     -    19     -     -    15     -     -    14     -     -     - |  287  11.54
 POL2 |     -     -     -     -     -     -     -    16     -     -    15 |  103  12.06
 POTS |     -    22     -     -    26     -     -     -     -     -    28 |  287  33.31
 PRDS |     -     -    17     -     -     -     -     -     -     -    15 |  103   2.07
 PTBB |     -    41    31     -     -     -     -     -     -     -    49 |  288   0.37
 QAQ1 |     -    28     -     -     -     -     -     -     -     -    30 |  103   7.24
 RESO |     -    12     -     -     -     -     -    13     -     -     - |  288   9.43
 REYK |     -    16     -     -     -     -     -     -     -     -    18 |  103   7.45
 SANT |     -    23     -     X    35     -     -     -     -     -    61 |  288   4.49
 SCH2 |     -     -    17     -     -     -     -    14     -     -    15 |  288  70.34
 SCUB |     -    14     -     -     -     -     -    16     -     -     - |  285  11.95
 SPT0 |     -    92   117     -     -     -     -     -     -     -     - |  285   0.05
 STJO |     -    25    24     -     -     -     -    16     -     -    17 |  288   0.09
 SUTH |     -    27     -     -     -     -     -     -     -     -    30 |  102  10.18
 THU3 |     -    17     -     -     -     -     -     -     -     -    18 |  100  10.01
 TID1 |     -     -     -     -     -     -     -    15     -     -    14 |  104   0.04
 TIDB |     -    16    22    23     -     -     -     -     -     -    17 |  288   0.07
 TIXI |     -    14     -     -     -     -     -    16     -     -     - |  287  10.05
 TOW2 |     -    21     -    41    17     -     -     -     -     -     - |  288   9.61
 TRO1 |     -     -     -     -    13     -     -     -     -     -    23 |  103   7.54
 ULAB |     -     -     -     -    14     -     -    26     -     -     - |  288  15.83
 UNSA |     -     -     -    36    25     -     -    31     -     -    49 |  288  16.31
 URUM |     -    26     -     -    23     -     -     -     -     -    27 |  287  54.06
 USUD |     -     -    73    51     -     -     -    22     -     -    51 |  287  12.29
 VILL |     -    21     -    42     -     -     -     -     -     -    23 |  287  14.39
 WES2 |     -     -    19     -    15     -     -     -     -     -    29 |  288   0.09
 WHIT |     -    17     -     -     -     -     -     -     -     -    19 |  102   5.68
 WILL |     -    15     -     -     -     -     -     -     -     -    17 |  102 131.56
 WTZR |     -     -     -    27     -     -     -     -     -     -    21 |   91   0.04
 YAKT |     -    25     -     -     -     -     -    42     -     -    22 |  288   0.51
 YAR2 |     -    23    29     -     -     -     -     -     -     -    14 |  288 174.76
 YELL |     -    91    19    79    59     -     -     -     -     -    22 |  278   0.26
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3491    42    51    54    29   106  4010    47  3367     -    45 |


 BEST CLOCK FIT: BRUS   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288   12.46   | 4.11e-14  8.87e-15  2.66e-15 |
 AMC2 |   288     0     0   288   12.46   | 3.70e-14  7.06e-15  2.55e-15 |
 ALGO |   286     0     0   285   12.33   | 3.98e-14  1.29e-14  2.85e-15 |
 NPLD |   287     0     0   286    9.46   | 4.44e-14  9.18e-15  1.70e-15 |
 YELL |   278     0     0   275    7.52   | 3.42e-14  9.06e-15  3.30e-15 |
 KOKB |   288     0     0   288    6.65   | 5.58e-14  1.48e-14  7.54e-15 |
 GODE |   288     0     0   288    6.08   | 7.30e-14  2.84e-14  5.61e-15 |
 SPT0 |   285     0     0   140    6.06   | 4.23e-14  8.09e-15  2.46e-15 |
 ONSA |   288     0     0   288    5.78   | 3.82e-14  1.13e-14  2.89e-15 |
 NLIB |   287     0     0   286    3.99   | 4.06e-14  8.17e-15  3.14e-15 |
 STJO |   288     0     0   288    3.68   | 3.93e-14  6.51e-15  5.28e-15 |
 FAIR |   288     0     0   288    2.58   | 5.01e-14  1.27e-14  1.09e-14 |
 HOB2 |   288     0     0   288    2.29   | 4.38e-14  1.34e-14  5.95e-15 |
 DRAO |   288     0     0   143    2.02   | 7.17e-14  2.05e-14  3.90e-15 |
 WES2 |   288     0     0   143    1.66   | 3.54e-14  1.03e-14  9.97e-15 |
 NYA1 |   287     0     0   286    1.48   | 3.01e-14  5.51e-15  3.45e-15 |
 TIDB |   288     0     1   127    1.17   | 1.77e-13  1.73e-14  7.19e-15 |
 MATE |   286     0     0   140    0.34   | 5.05e-14  1.22e-14  6.90e-15 |
 G23  |   287     0     3    88    0.24   | 5.47e-13  5.71e-14  3.91e-14 |
 ALBH |   288     0     0   288    0.20   | 4.57e-14  2.05e-14  1.86e-14 |
 G26  |   288     0     0   288    0.18   | 3.41e-13  1.20e-13  3.29e-14 |
 G16  |   288     0     1   143    0.16   | 3.95e-13  5.01e-14  4.01e-14 |
 G07  |   288     0     0   288    0.14   | 2.88e-13  9.03e-14  3.39e-14 |
 PTBB |   288     0     0   143    0.14   | 3.42e-13  6.89e-14  2.84e-14 |
 BOR1 |   287     0     0   286    0.13   | 4.99e-13  1.43e-13  5.13e-14 |
 DWH1 |   287     0     0   286    0.11   | 4.67e-13  1.42e-13  3.18e-14 |
 G06  |   288     0     0   288    0.10   | 3.39e-13  1.13e-13  7.05e-14 |
 TID1 |   104     0     0    28    0.10   | 4.61e-14  1.40e-14         - |
 G04  |   288     0     0   288    0.08   | 4.73e-13  1.38e-13  1.25e-13 |
 G30  |   288     0     0   288    0.08   | 3.12e-13  1.07e-13  8.67e-14 |
 YAKT |   288     0     0   288    0.07   | 4.16e-13  8.72e-14  3.85e-14 |
 G27  |   288     0     0   288    0.07   | 3.44e-13  1.12e-13  1.04e-13 |
 G29  |   288     0     0   288    0.06   | 4.10e-13  1.29e-13  1.04e-13 |
 G17  |   288     0     0   288    0.05   | 4.17e-13  1.72e-13  1.27e-13 |
 G31  |   288     0     0   288    0.02   | 2.12e-13  1.54e-13  1.15e-13 |
 HRAO |   288     0     1   138    0.02   | 1.78e-13  3.02e-13  2.11e-13 |
 G08  |   288     0     0   288    0.02   | 1.34e-12  4.07e-13  8.17e-14 |
 G03  |   288     0     0   288    0.02   | 1.34e-12  4.12e-13  1.16e-13 |
 G25  |   288     0     0   288    0.01   | 1.41e-12  3.91e-13  3.22e-13 |
 KOUR |   288     0     0   288    0.01   | 1.55e-12  4.24e-13  1.01e-13 |
 PERT |   288     0     0   288    0.01   | 2.03e-12  5.28e-13  1.36e-13 |
 PRDS |   103     0     0    17    0.00   | 1.44e-12  4.12e-13         - |
 GPST |   288     0     0     0    0.00   | 2.96e-14  7.13e-15  3.02e-15 |
 MADR |    81     0     0     0    0.00   |        -         -         - |
 WTZR |    91     0     0     0    0.00   |        -         -         - |
 ASC1 |   223     0     0     0    0.00   |        -         -         - |
 KSTU |    93     0     0     0    0.00   |        -         -         - |
 HERS |    80     0     0     0    0.00   |        -         -         - |
 WILL |   102     0     0     0    0.00   |        -         -         - |
 WHIT |   102    23     5     0    0.00   | 6.42e-13  4.65e-13         - |
 TRO1 |   103     0     0     0    0.00   |        -         -         - |
 THU3 |   100     0     0     0    0.00   |        -         -         - |
 SUTH |   102     0     0     0    0.00   |        -         -         - |
 REYK |   103     0     0     0    0.00   |        -         -         - |
 QAQ1 |   103     0     0     0    0.00   |        -         -         - |
 POL2 |   103     0     0     0    0.00   |        -         -         - |
 METS |   102     0     0     0    0.00   |        -         -         - |
 KOSG |   103     0     0     0    0.00   |        -         -         - |
 KIRU |   102     0     0     0    0.00   |        -         -         - |
 GOL2 |    97     0     0     0    0.00   |        -         -         - |
 CAGZ |    90     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 LAMA |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   286     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   231     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     5     0    0.00   | 7.04e-13  9.03e-14  5.41e-14 |
 G24  |   288     0     0     0    0.00   | 1.32e-12  3.75e-13  2.63e-13 |
 G22  |   288     0     5     0    0.00   | 6.90e-13  6.73e-14  3.21e-14 |
 G21  |   288     0     6     0    0.00   | 9.75e-13  1.36e-13  5.11e-14 |
 G20  |   288     0     6     0    0.00   | 5.89e-13  6.90e-14  1.98e-14 |
 G19  |   288     0     6     0    0.00   | 7.38e-13  6.81e-14  1.66e-14 |
 G18  |   288     0     6     0    0.00   | 1.22e-12  1.18e-13  4.06e-14 |
 G15  |   288     0     0     0    0.00   | 1.50e-12  6.18e-13  3.63e-13 |
 G14  |   288     0     6     0    0.00   | 6.07e-13  6.25e-14  1.57e-14 |
 G13  |   288     0     4     0    0.00   | 6.24e-13  6.73e-14  2.44e-14 |
 G11  |   288     0     6     0    0.00   | 7.76e-13  6.78e-14  3.55e-14 |
 G10  |   288     0     0     0    0.00   | 1.25e-12  4.95e-13  2.49e-13 |
 G09  |   288     0     0     0    0.00   | 1.30e-12  4.37e-13  2.46e-13 |
 G05  |   288     0     0     0    0.00   | 1.25e-12  4.97e-13  3.31e-13 |
 G01  |   288     0     0     0    0.00   | 1.43e-12  5.77e-13  5.26e-13 |
 YAR2 |   288     2     0     0    0.00   |        -         -         - |
 VILL |   287     0     0     0    0.00   | 1.01e-12  8.22e-13  8.33e-13 |
 USUD |   287     0     0     0    0.00   |        -         -         - |
 URUM |   287     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 ULAB |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   285     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 POTS |   287     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   287     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.77e-12  5.47e-13  2.30e-13 |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   109     0     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KARR |   287     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     1     0    0.00   | 5.75e-13  2.71e-13  2.28e-13 |
 ISPA |   268     0     0     0    0.00   |        -         -         - |
 IISC |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   288     1     1     0    0.00   | 1.75e-13  2.02e-13  4.13e-13 |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     1     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   272     0     0     0    0.00   |        -         -         - |
 COCO |   287     0     0     0    0.00   | 3.86e-13  1.44e-12  6.60e-13 |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   276     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   287     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     2     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.07e-17  1.26e-16  6.96e-16 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      NYA1      NPLD |
------------------------------------------+------------------------------+
