
 GPS week: 1279   Day: 5   MJD: 53202                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2688      0    -0.03    -0.05     2.42     0.00
 cod |   288     0  26949     48    -0.08    -0.67     0.05    21.14
 emr |   288     0  17870      0    54.49    32.43     0.06    17.24
 esa |   288     0  18218    317    54.32    33.53     0.08    11.57
 gfz |   288     0  20720      2    -0.08    -0.32     0.05    19.29
 iga |    96     0   2688      2    -0.02    -0.06     0.07     0.00
 igu |    96     0   2592      0    -0.01    -0.05     3.30     0.00
 jpl |   288     0  15644    255    -6.45    -1.20     0.06    16.32
 ngs |    96     0   2688      1    -0.04    -0.04     2.29     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  32694   2040    54.34    32.54     0.07    14.44

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -1633    27   -80    57    48    36  5118   -17 -2930     -   -51 |
    3 | -3635    -3  -102   154   -76   -32  -652   208 -3269     -  -105 |
    4 | -2107    20  -104   -37   214   -58  -451  -128 -1729     -   -34 |
    5 |  2155    22   -79    14    99   125 -6850    90  1749     -   -93 |
    6 | -5570    79   -52    57   -23  -379     -    70 -4391     -   -77 |
    7 |  -306   -57    61    20    79   256 -1883   -67  -791     -   -44 |
    8 | -4078   -15   -56   176    -4    43-14257   -70 -3602     -   -44 |
    9 |   169    19   -62   239   -73  -165  8533    -6  1152     -   -56 |
   10 |  3697    51    24    80   -86   142  4631    46  2459     -   -99 |
   11 |  1026   -84   -94    79     8    76 -1525    70  1561     -    92 |
   13 |  4006    85   -63    -6    24     3   628    13  4414     -   -78 |
   14 |  4595    28  -130    40    96   -41  -623    34  4859     -   -79 |
   15 |  1712    90   -57   -93   -62   157 18872    96   104     -    -6 |
   16 |  2837    17   -94   226    23   -17 -2653   143  3159     -  -143 |
   17 | -5733    50     0   181   -28    67  6926   -77 -4801     -  -111 |
   18 |  2472    78   -66   -96   -23   -14 -2050   134  2739     -    54 |
   20 |  4073    -3   -21   117    38   187   535   142  4445     -  -133 |
   21 |  5714    54   -82   -97    -2    81   792    78  4834     -    22 |
   22 | -2392    27   -35  -186    -1   -34 -1487    77 -2153     -    77 |
   23 |  1606    -6  -125   -93   239    22 -2373     X  1708     -   -88 |
   24 | -2149    30    21   -32   -23    11 -4473   -65 -2136     -    -6 |
   25 | -2907    46   -35    89    -4  -218 -3450   153 -3124     -  -115 |
   26 |  -611    35  -108   181    20   -85 -7615   -57  -852     -   -86 |
   27 |  3476   -39     9   275    61  -124  1491   -51  2352     -  -211 |
   28 |  5846    21   -99  -131    59   137  2853    70  5694     -   106 |
   29 | -2334    12  -138    71   112  -108 -4884   -38 -2633     -   -54 |
   30 | -4170    -8   -24    15   116  -162 -1839   -12 -3692     -  -115 |
   31 | -5753   -21   -71    23    93    99  6690    -3 -5152     -   -25 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -    18     -     -     -     -   -12     -     -    -7 |
 ALGO |     -     -    50  -294     -     -     -    32     -     -   137 |
 AMC2 |     -   -86    97     -     -     -     -  -191     -     -   225 |
 ARTU |     -    21     -   156   -30     -     -  -102     -     -     X |
 ASC1 |     -    71     -     -   -77     -     -     -     -     -     X |
 AUCK |     -   -34     -     X     -     -     -     -     -     -    49 |
 BILI |     -   101     -     -   -76     -     -   -41     -     -     X |
 BOGT |     -     8     -   108   -94     -     -     -     -     -    27 |
 BOR1 |     -   -29    86     -     -     -     -     -     -     -   -60 |
 BRUS |     -    -9    50     -     -     -     -   -21     -     -   -23 |
 CAS1 |     -    73     -   -41   -97     -     -    69     -     -   -22 |
 CEDU |     -  -142     -  -202     -     -     -   277     -     -    56 |
 CHAT |     -    -5     -     -     4     -     -     -     -     -     2 |
 CHUR |     -   -21   114     -     -     -     -     -     -     -  -106 |
 COCO |     -   -48     -    40     -     -     -    16     -     -    21 |
 CRO1 |     -    93    17    12   -72     -     -   -38     -     -   -23 |
 DAV1 |     -    36     -     -   -63     -     -    93     -     -   -75 |
 DGAR |     -   -70     -     -    42     -     -    38     -     -     4 |
 DRAO |     -     -   -97     -     -     -     -   117     -     -   -16 |
 DWH1 |     -   206   157     -     -     -     -  -315     -     -  -135 |
 FAIR |     -   -16    16  -176    12     -     -    32     -     -    93 |
 GLPS |     -    10     -     -    57     -     -   -80     -     -     - |
 GODE |     -   -73    70     6     -     -     -     -     -     -    19 |
 GOL2 |     -     -    14     -     -     -     -     -     -     -   -17 |
 GOLD |     -   -19     -   -90     -     -     -   -88     -     -   201 |
 HERS |     -     -    54     -     -     -     -     -     -     -   -65 |
 HOB2 |     -  -134   161    96     -     -     -     -     -     -   -73 |
 HOFN |     -     -     -     -     0     -     -     0     -     -     - |
 HRAO |     -     -     -     -  -106     -     -   144     -     -   -21 |
 IISC |     -   -14     -  -129    12     -     -     -     -     -   107 |
 ISPA |     -    12     -     -    46     -     -   -34     -     -   -39 |
 JPLM |     -     -    71     -  -139     -     -     -     -     -   102 |
 KERG |     -     -     -     6    44     -     -     -     -     -   -64 |
 KOKB |     -    53   -42     -  -143     -     -    72     -     -    81 |
 KOSG |     -   -63     -     -     -     -     -     -     -     -    93 |
 KOUR |     -    -7     -    59   -28     -     -     -     -     -     - |
 KSTU |     -     -     -    69     -     -     -     -     -     -   -55 |
 LHAS |     -     3     -     -    88     -     -   -62     -     -   -51 |
 LPGS |     -   -74     -   168     -     -     -     -     -     -   -32 |
 MAC1 |     -    43     -   -10  -214     -     -   222     -     -   -21 |
 MADR |     -     -     -     -     -     -     -  -254     -     -   287 |
 MALI |     -    82     -  -149     -     -     -     -     -     -     - |
 MAS1 |     -   -21     -     8     7     -     -     -     -     -    15 |
 MATE |     -   -75     -   131     -     -     -     -     -     -     5 |
 MAW1 |     -   119     -     -   -96     -     -     -     -     -   -45 |
 MBAR |     -   -35     -     -     7     -     -    37     -     -     X |
 MDO1 |     -     -     -     -   -73     -     -     -     -     -    98 |
 MEDI |     -     -    71     -     -     -     -     -     -     -   -85 |
 METS |     -    20     -     -     -     -     -     -     -     -   -30 |
 MIZU |     -     -     -  -500     -     -     -     -     -     -   401 |
 MKEA |     -    87     -    84  -146     -     -     -     -     -     X |
 NKLG |     -   104     -     -  -101     -     -     -     -     -   -14 |
 NLIB |     -     -   -90     -     -     -     -    42     -     -    60 |
 NPLD |     -  -101   103     -     -     -     -     -     -     -    26 |
 NRC1 |     -    43    20     -   -13     -     -   -99     -     -    44 |
 NRIL |     -   -26     -     -     6     -     -    27     -     -     X |
 NSSP |     -    10     -     -     -     -     -   -12     -     -    -1 |
 NTUS |     -  -143     -    84     -     -     -     -     -     -   142 |
 NYA1 |     -  -228     -     -   140     -     -     -     -     -   146 |
 PERT |     -   -77     -  -140   167     -     -     -     -     -     - |
 PETP |     -   -32     -     -    25     -     -    12     -     -     - |
 PIE1 |     -     -     -  -725     -     -     -     -     -     -   581 |
 POTS |     -     9     -     -     6     -     -     -     -     -   -22 |
 PRDS |     -     -     4     -     -     -     -     -     -     -    -5 |
 PTBB |     -   -15    69     -     -     -     -     -     -     -   -61 |
 REYK |     -   -56     -     -     -     -     -     -     -     -    82 |
 RIOG |     -     6    43     -   -90     -     -     -     -     -    60 |
 SANT |     -     0     -  -482   267     -     -     -     -     -     X |
 SCH2 |     -    51    30     -     -     -     -   -94     -     -    -5 |
 SCUB |     -    71     -     -     -     -     -   -92     -     -     - |
 SELE |     -     -     -     -     -     -     -   -25     -     -    28 |
 SFER |     -   -45     2     -     -     -     -     -     -     -    56 |
 SOFI |     -     -     -     -     -     -     -    42     -     -   -48 |
 SPT0 |     -  -116   108     -     -     -     -     -     -     -    42 |
 STJO |     -     -   -19     -     -     -     -   -23     -     -    49 |
 STR1 |     -     -    64     -     -     -     -     -     -     -   -77 |
 SUTH |     -   -14     -     -     -     -     -     -     -     -    21 |
 THTI |     -     -    20   198   -70     -     -     -     -     -   -89 |
 THU3 |     -    41     -     -   121     -     -     -     -     -  -222 |
 TID1 |     -     -     -     -     -     -     -    -6     -     -     7 |
 TIDB |     -    57   -23   -36     -     -     -     -     -     -   -27 |
 TRO1 |     -     -     -     -     8     -     -     -     -     -   -11 |
 ULAB |     -     -     -     -   -39     -     -    47     -     -     - |
 UNSA |     -     -     -   328  -119     -     -   -44     -     -   -55 |
 URUM |     -    37     -     -   -27     -     -     -     -     -   -18 |
 USNO |     -    12     -     -     -     -     -     -     -     -   -18 |
 USUD |     -     -   123  -172     -     -     -    57     -     -   -73 |
 VILL |     -   -21     -    44    -8     -     -     -     -     -     7 |
 WES2 |     -     -   152     -  -122     -     -     -     -     -   -19 |
 WHIT |     -    43     -     -     -     -     -     -     -     -   -63 |
 WILL |     -  -101    21     -     -     -     -     -     -     -   123 |
 WTZR |     -    32     -  -140     -     -     -     -     -     -    65 |
 YAKT |     -   -84     -    45     -     -     -    11     -     -    73 |
 YAR2 |     -   -88   153     -     -     -     -  -140     -     -   104 |
 YELL |     -    20    28   -29   -26     -     -     -     -     -    -6 |
 ZWEN |     -     -     -   -60    51     -     -     -     -     -   -21 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  6102    43    58   105    49    49  3315    55  5089     -    27 |  288   3.78
    3 |  1686    65    38    99    37    43  1836    46  1740     -    35 |  288   1.61
    4 |  1998    69    40    46    30    47  1329    94  1924     -    62 |  288   0.98
    5 |  2533    26    26    34    39    41  5468    28  3293     -    52 |  288   2.16
    6 |  1914    31    34    56    42    45     -    47  2201     -    82 |  288   1.08
    7 |  1460    23    42    35    17    64   589    42  1405     -    45 |  288   0.40
    8 |  2245    81    59    40    80    87  6128    64  2558     -    72 |  288   1.81
    9 |  6062   121   126   169   118   111  4661    65  5529     -    57 |  288   2.82
   10 |  2665    33    52    60    28    78  2870    59  3025     -    64 |  288   1.54
   11 |   814    63    63    39    50    70   949   154   750     -    93 |  288   0.22
   13 |  1357    44    53    64    44    58   672   117  1296     -    49 |  288   0.28
   14 |   560    53    36   112    45    54   492   106   610     -    53 |  288   0.23
   15 |  3975    63    38   108    35    81 11262    59  2902     -    68 |  288   1.74
   16 |   487    25    35   112    34    40   942    69   438     -    76 |  288   0.24
   17 |  1937    88    62   154    70   128  3289    45  1475     -    95 |  288   0.68
   18 |   784    43    28    62    47    72  1162   115   817     -    55 |  288   0.42
   20 |  1083    36    46    58    24   104   764   103  1135     -    30 |  288   0.24
   21 |  1669    59    56    77    53    56   417   106  2119     -    43 |  288   0.29
   22 |  1506    48    44    90    43    56  1487   128  1471     -    64 |  288   1.19
   23 |  1585    54    56    60    39    94  1184     X  1604     -    69 |  288   0.67
   24 |  2349    72    55    62    33    98  1882    75  2468     -   106 |  288   1.85
   25 |  2370    62    39    50    34    65  1691    70  1879     -    63 |  288   1.31
   26 |   988    50    22    53    32    31  3613    33  1361     -    40 |  288   0.35
   27 |  2500   157   169    71   157   174   782   156  2047     -   141 |  288   0.73
   28 |   961    30    44   139    24    51   885   112  1400     -   104 |  288   0.55
   29 |  2591    43    27    40    39    32  3271    36  2843     -    44 |  288   1.14
   30 |   734    19    32    27    49    33  1358    47   826     -    83 |  288   0.84
   31 |  1270    39    43    38    27    40  1762    49  1078     -    33 |  288   1.12
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    39     -     -     -     -    26     -     -    30 |  288   0.26
 ALGO |     -     -   121   252     -     -     -    41     -     -    89 |  288   0.06
 AMC2 |     -    14    31     -     -     -     -    29     -     -    15 |  288   0.08
 ARTU |     -    19     -    59    20     -     -    34     -     -     X |  288  12.87
 ASC1 |     -    23     -     -    25     -     -     -     -     -     X |  287    >>>
 AUCK |     -    35     -     X     -     -     -     -     -     -    52 |  264  12.17
 BILI |     -    21     -     -    15     -     -    17     -     -     X |  287   8.63
 BOGT |     -    89     -    59   109     -     -     -     -     -   235 |  288  12.73
 BOR1 |     -    18    34     -     -     -     -     -     -     -    24 |  288   0.48
 BRUS |     -    19    30     -     -     -     -    43     -     -    46 |  288   0.06
 CAS1 |     -    20     -    50    38     -     -    22     -     -    45 |  288   8.01
 CEDU |     -    62     -   111     -     -     -    66     -     -   161 |  288  19.12
 CHAT |     -    38     -     -    59     -     -     -     -     -    38 |  263  12.86
 CHUR |     -    42    34     -     -     -     -     -     -     -    50 |  288  28.69
 COCO |     -    38     -    34     -     -     -    34     -     -    44 |  288   8.70
 CRO1 |     -    42    37   104    76     -     -    44     -     -    48 |  271  18.19
 DAV1 |     -    20     -     -    30     -     -    30     -     -    64 |  288  18.45
 DGAR |     -    26     -     -    32     -     -    25     -     -    40 |  288  19.54
 DRAO |     -     -    19     -     -     -     -    26     -     -    23 |  288   0.12
 DWH1 |     -    31    64     -     -     -     -    28     -     -    30 |  288   0.74
 FAIR |     -    15    43    23    22     -     -    20     -     -    20 |  288   0.07
 GLPS |     -    23     -     -    38     -     -    49     -     -     - |  260  11.70
 GODE |     -    59    59    38     -     -     -     -     -     -    44 |  288   0.05
 GOL2 |     -     -   193     -     -     -     -     -     -     -   231 |  254   0.35
 GOLD |     -    14     -    30     -     -     -    19     -     -    25 |  288  14.97
 HERS |     -     -    61     -     -     -     -     -     -     -    72 |  239  12.66
 HOB2 |     -    29    31    55     -     -     -     -     -     -    50 |  288   0.14
 HOFN |     -     -     -     -    57     -     -    68     -     -     - |  288    >>>
 HRAO |     -     -     -     -   209     -     -   102     -     -   166 |  288   1.16
 IISC |     -    75     -    56    76     -     -     -     -     -    54 |  284  17.63
 ISPA |     -    67     -     -    27     -     -    47     -     -    44 |  242  11.90
 JPLM |     -     -    51     -    31     -     -     -     -     -    29 |  288   1.09
 KERG |     -     -     -    33    22     -     -     -     -     -    37 |  288   2.03
 KOKB |     -    23    60     -    30     -     -    55     -     -    31 |  288   0.09
 KOSG |     -    19     -     -     -     -     -     -     -     -    28 |  288  19.54
 KOUR |     -    35     -    80    32     -     -     -     -     -     - |  288   1.22
 KSTU |     -     -     -    70     -     -     -     -     -     -    56 |  270  11.60
 LHAS |     -    58     -     -    37     -     -    33     -     -    46 |  276  10.38
 LPGS |     -    50     -    49     -     -     -     -     -     -    74 |  288 193.30
 MAC1 |     -    32     -    46    31     -     -    45     -     -   124 |  288  14.28
 MADR |     -     -     -     -     -     -     -    51     -     -    57 |  238  18.68
 MALI |     -    25     -    45     -     -     -     -     -     -     - |  266    >>>
 MAS1 |     -    30     -    65    22     -     -     -     -     -    74 |  288   1.59
 MATE |     -    68     -    37     -     -     -     -     -     -    88 |  288   0.14
 MAW1 |     -    19     -     -    16     -     -     -     -     -    24 |  288  31.84
 MBAR |     -    22     -     -    21     -     -    32     -     -     X |  288  25.07
 MDO1 |     -     -     -     -    64     -     -     -     -     -    86 |  282  12.68
 MEDI |     -     -    35     -     -     -     -     -     -     -    41 |  286   0.11
 METS |     -    14     -     -     -     -     -     -     -     -    21 |  285  12.83
 MIZU |     -     -     -    32     -     -     -     -     -     -    25 |  286   0.65
 MKEA |     -    23     -    56    25     -     -     -     -     -     X |  288  26.33
 NKLG |     -    54     -     -    54     -     -     -     -     -   128 |  287    >>>
 NLIB |     -     -    99     -     -     -     -   102     -     -    43 |  288   0.26
 NPLD |     -    65    33     -     -     -     -     -     -     -    61 |  287   0.15
 NRC1 |     -    22    31     -    18     -     -    55     -     -    44 |  288   0.08
 NRIL |     -    34     -     -    21     -     -    32     -     -     X |  288   9.67
 NSSP |     -   124     -     -     -     -     -    51     -     -   138 |  288  61.19
 NTUS |     -    26     -    52     -     -     -     -     -     -    65 |  288   8.84
 NYA1 |     -    28     -     -    20     -     -     -     -     -    36 |  288   0.07
 PERT |     -    76     -   107    36     -     -     -     -     -     - |  284   2.26
 PETP |     -    16     -     -    17     -     -    13     -     -     - |  287  10.24
 PIE1 |     -     -     -    55     -     -     -     -     -     -    44 |  172   0.57
 POTS |     -    19     -     -    33     -     -     -     -     -    32 |  288  22.54
 PRDS |     -     -    35     -     -     -     -     -     -     -    41 |  286   2.21
 PTBB |     -    30    25     -     -     -     -     -     -     -    59 |  288   0.43
 REYK |     -    17     -     -     -     -     -     -     -     -    25 |  287   6.98
 RIOG |     -    44    63     -    78     -     -     -     -     -    83 |  216  10.31
 SANT |     -    32     -    41    32     -     -     -     -     -     X |  287   9.02
 SCH2 |     -    20    34     -     -     -     -    35     -     -    29 |  288  35.05
 SCUB |     -    14     -     -     -     -     -    18     -     -     - |  287  13.33
 SELE |     -     -     -     -     -     -     -    15     -     -    17 |  286  31.47
 SFER |     -    69    64     -     -     -     -     -     -     -   100 |  279 500.98
 SOFI |     -     -     -     -     -     -     -    20     -     -    22 |  286  59.81
 SPT0 |     -    25    17     -     -     -     -     -     -     -    33 |  288   0.07
 STJO |     -     -    26     -     -     -     -    29     -     -    15 |  288   0.16
 STR1 |     -     -    40     -     -     -     -     -     -     -    48 |  286   1.20
 SUTH |     -    83     -     -     -     -     -     -     -     -   121 |  288  10.23
 THTI |     -     -    40    92    31     -     -     -     -     -    34 |  288   4.97
 THU3 |     -    16     -     -    16     -     -     -     -     -    21 |  288   7.69
 TID1 |     -     -     -     -     -     -     -    28     -     -    32 |  286   0.06
 TIDB |     -    27    45    54     -     -     -     -     -     -    25 |  288   0.07
 TRO1 |     -     -     -     -    25     -     -     -     -     -    33 |  286   6.93
 ULAB |     -     -     -     -    21     -     -    25     -     -     - |  287  19.53
 UNSA |     -     -     -   124    57     -     -   168     -     -    31 |  288  16.60
 URUM |     -    30     -     -    37     -     -     -     -     -    31 |  288  61.48
 USNO |     -    70     -     -     -     -     -     -     -     -   103 |  202   0.12
 USUD |     -     -    67    52     -     -     -    25     -     -    43 |  288  11.65
 VILL |     -    33     -    39    49     -     -     -     -     -    99 |  288   9.68
 WES2 |     -     -    27     -    20     -     -     -     -     -    19 |  288   0.08
 WHIT |     -    10     -     -     -     -     -     -     -     -    14 |  288  12.74
 WILL |     -    33    40     -     -     -     -     -     -     -    25 |  288  41.94
 WTZR |     -    19     -    59     -     -     -     -     -     -    46 |  288   0.08
 YAKT |     -    49     -    43     -     -     -    27     -     -    50 |  288   0.45
 YAR2 |     -    33    46     -     -     -     -    20     -     -    21 |  288   2.87
 YELL |     -    12    31    27    21     -     -     -     -     -    30 |  288   0.08
 ZWEN |     -     -     -    50    26     -     -     -     -     -    23 |  288  14.89
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2417    49    58    78    52    75  3295    62  2291     -    69 |


 BEST CLOCK FIT: GODE   288   0.05 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288   10.39   | 4.21e-14  8.68e-15  3.43e-15 |
 AMC2 |   288     0     0   288   10.23   | 4.32e-14  1.11e-14  4.63e-15 |
 KOKB |   288     0     0   288    7.12   | 5.14e-14  2.27e-14  5.79e-15 |
 GODE |   288     0     0   288    7.10   | 4.42e-14  8.68e-15  3.52e-15 |
 DRAO |   288     1     0   287    7.05   | 6.29e-14  2.03e-14  8.42e-15 |
 WTZR |   288     0     0   288    6.87   | 3.86e-14  2.44e-14  3.55e-15 |
 NYA1 |   288     1     0   287    6.86   | 3.29e-14  1.10e-14  7.98e-15 |
 SPT0 |   288     0     0   143    5.16   | 4.55e-14  1.04e-14  3.19e-15 |
 NLIB |   288     1     0   287    4.50   | 7.91e-14  2.59e-14  4.27e-15 |
 USNO |   202     0     0   128    4.30   | 3.99e-14  1.14e-14         - |
 HOB2 |   288     0     0   288    4.21   | 9.44e-14  2.68e-14  1.07e-14 |
 GOL2 |   254     2     0   108    3.76   | 4.15e-14  1.52e-14         - |
 ALGO |   288     0     0   143    3.05   | 1.05e-13  3.04e-14  1.18e-14 |
 FAIR |   288     1     0   287    2.79   | 3.78e-14  1.01e-14  2.05e-15 |
 NPLD |   287     1     0   139    2.57   | 4.26e-14  1.16e-14  5.97e-15 |
 MATE |   288     1     0   287    2.33   | 5.33e-14  1.12e-14  9.67e-15 |
 YELL |   288     0     0   143    2.15   | 3.77e-14  6.38e-15  3.42e-15 |
 WES2 |   288     0     0   143    1.49   | 4.45e-14  1.18e-14  5.87e-15 |
 TIDB |   288     0     0   172    1.42   | 1.61e-13  1.56e-14  2.71e-15 |
 MEDI |   286     0     0   141    1.09   | 7.63e-14  2.41e-14  1.70e-14 |
 STJO |   288     1     0   142    0.90   | 4.58e-14  1.25e-14  5.79e-15 |
 NRC1 |   288     0     0   143    0.73   | 3.56e-14  9.22e-15  3.96e-15 |
 G16  |   288     0     2   126    0.72   | 4.56e-13  5.54e-14  1.75e-14 |
 G07  |   288     0     0   288    0.50   | 3.02e-13  8.44e-14  3.41e-14 |
 G26  |   288     0     0   288    0.46   | 3.14e-13  1.04e-13  4.03e-14 |
 PIE1 |   172     0     0    15    0.32   | 6.12e-14  1.53e-14         - |
 TID1 |   286     0     0   141    0.25   | 4.93e-14  7.76e-15  3.47e-15 |
 G06  |   288     0     0   288    0.19   | 4.95e-13  1.24e-13  7.46e-14 |
 G30  |   288     0     0   288    0.16   | 3.46e-13  1.10e-13  5.80e-14 |
 DWH1 |   288     0     0   288    0.13   | 5.02e-13  1.34e-13  6.51e-14 |
 G04  |   288     0     0   288    0.13   | 4.55e-13  1.29e-13  9.21e-14 |
 G17  |   288     0     0   288    0.12   | 3.70e-13  1.07e-13  5.91e-14 |
 G27  |   288     0     0   288    0.12   | 3.57e-13  1.59e-13  7.40e-14 |
 G29  |   288     0     0   288    0.11   | 4.04e-13  1.06e-13  1.25e-13 |
 G23  |   288     0     1   143    0.09   | 4.90e-13  6.06e-14  4.82e-14 |
 YAKT |   288     0     0   288    0.09   | 4.26e-13  1.26e-13  3.73e-14 |
 G31  |   288     0     0   288    0.09   | 2.01e-13  1.24e-13  8.67e-14 |
 ALBH |   288     1     0   142    0.07   | 4.51e-14  1.63e-14  2.06e-14 |
 PTBB |   288     0     0   143    0.07   | 3.31e-13  6.21e-14  4.80e-14 |
 MIZU |   286     0     0   141    0.04   | 3.35e-13  1.09e-13  6.10e-14 |
 BOR1 |   288     0     0   143    0.04   | 4.66e-13  1.33e-13  3.82e-14 |
 HRAO |   288     1     0   287    0.03   | 1.29e-13  4.22e-14  1.24e-13 |
 G22  |   288     0     1   143    0.03   | 5.94e-13  9.44e-14  8.66e-14 |
 G24  |   288     0     0   288    0.02   | 1.28e-12  3.54e-13  2.02e-13 |
 G03  |   288     0     0   288    0.02   | 1.29e-12  4.00e-13  1.65e-13 |
 G15  |   288     0     0   288    0.02   | 1.57e-12  4.11e-13  1.80e-13 |
 KERG |   288     0     0   288    0.02   | 1.27e-12  3.58e-13  2.33e-13 |
 G10  |   288     0     0   288    0.02   | 1.20e-12  4.36e-13  1.37e-13 |
 G25  |   288     0     0   288    0.02   | 1.56e-12  4.89e-13  8.84e-14 |
 KOUR |   288     0     0   288    0.02   | 1.47e-12  3.72e-13  1.33e-13 |
 G08  |   288     0     0   288    0.01   | 1.34e-12  5.31e-13  1.42e-13 |
 PERT |   284     0     0   283    0.01   | 1.83e-12  5.26e-13  2.11e-13 |
 STR1 |   286     0     0   141    0.00   | 6.45e-13  2.24e-13  1.10e-13 |
 PRDS |   286     0     0   141    0.00   | 1.54e-12  3.91e-13  2.04e-13 |
 GPST |   288     0     0     0    0.00   | 4.76e-14  1.41e-14  5.08e-15 |
 MALI |   266     1     0     0    0.00   |        -         -         - |
 LHAS |   276     0     0     0    0.00   |        -         -         - |
 MDO1 |   282     0     1     0    0.00   | 8.32e-13  1.27e-12  8.05e-13 |
 SFER |   279     3     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 METS |   285     0     0     0    0.00   |        -         -         - |
 HERS |   239     0     0     0    0.00   |        -         -         - |
 CHAT |   263     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     4     0    0.00   | 7.15e-13  7.81e-14  4.34e-14 |
 G21  |   288     0     6     0    0.00   | 8.99e-13  1.01e-13  2.05e-14 |
 G20  |   288     0     6     0    0.00   | 5.84e-13  6.83e-14  1.62e-14 |
 G18  |   288     0     6     0    0.00   | 1.26e-12  1.10e-13  4.69e-14 |
 G14  |   288     0     6     0    0.00   | 5.95e-13  5.66e-14  2.19e-14 |
 G13  |   288     0     6     0    0.00   | 5.47e-13  7.55e-14  2.93e-14 |
 G11  |   288     0     5     0    0.00   | 7.56e-13  6.58e-14  2.24e-14 |
 G09  |   288     0     0     0    0.00   | 1.39e-12  4.35e-13  3.14e-13 |
 G05  |   288     0     0     0    0.00   | 1.37e-12  4.17e-13  2.55e-13 |
 G01  |   288     0     0     0    0.00   | 1.44e-12  7.20e-13  2.83e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   | 1.25e-12  1.19e-12  2.09e-13 |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 4.75e-13  4.36e-13  1.08e-12 |
 VILL |   288     0     0     0    0.00   | 1.08e-12  7.56e-13  9.68e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 ULAB |   287     0     0     0    0.00   |        -         -         - |
 TRO1 |   286     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.97e-13  1.77e-13  4.17e-13 |
 SUTH |   288     1     0     0    0.00   |        -         -         - |
 SOFI |   286     0     0     0    0.00   |        -         -         - |
 SELE |   286     0     0     0    0.00   |        -         -         - |
 SCUB |   287     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   287     0     1     0    0.00   | 2.04e-12  8.24e-13  5.91e-13 |
 RIOG |   216     0     0     0    0.00   |        -         -         - |
 REYK |   287     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     3     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.58e-12  5.24e-13  1.19e-13 |
 MADR |   238     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KSTU |   270     0     0     0    0.00   |        -         -         - |
 KOSG |   288     1     0     0    0.00   | 7.05e-13  6.57e-13  1.26e-12 |
 JPLM |   288     0     0     0    0.00   | 6.16e-13  2.14e-13  1.05e-13 |
 ISPA |   242     0     0     0    0.00   |        -         -         - |
 IISC |   284     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   260     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   271     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 3.75e-13  1.16e-12  1.03e-12 |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASC1 |   287     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.31e-17  1.56e-16  8.78e-16 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      YELL      FAIR |
------------------------------------------+------------------------------+
