
 GPS week: 1279   Day: 0   MJD: 53197                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 cod |   288     0  34594    110    -0.05    -0.35     0.05    15.77
 emr |   288     0   8261      9   816.53    34.37     0.07     8.69
 esa |   288     0  20700   1173   815.76    34.22     0.06    11.04
 gfz |   288     0  31508    299     0.02     0.44     0.03    26.71
 igr |   288     0  32476    103     2.34    -1.37     0.04     0.00
 jpl |   288     0  25176   1116     0.87    -1.21     0.04    18.74
 mit |   288     0  34844   1781    -0.08     0.34     0.04    19.04
 ngs |    96     0   2784      0     0.07     0.07     2.76     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio |
 -----+-------------------------------------------------------+
    1 |   -39  -195    35  -113  -115  -246   502 -3819     - |
    3 |   -36   -83  -141  -160  -223   -58   432 -2661     - |
    4 |   -78   -39   -31    77   -69  -150   139 -2051     - |
    5 |  -240   188   -89   -24  -171  -235   430 -7405     - |
    6 |   -78   -28  -206   -18  -181  -154   374   726     - |
    7 |  -188   -16  -234    70   -89  -183   382 -1214     - |
    8 |  -137    60   -57   -91  -107  -125   365 -5149     - |
    9 |  -143   -57   147   -78  -134  -138   301 -2134     - |
   10 |  -102    -6    24  -220  -231  -140   520   460     - |
   11 |   106   156   136    25    55    53  -324  2511     - |
   13 |   113    39   157   101    53   -56  -289  4121     - |
   14 |   162   -74    96    28   -17    28  -223  4559     - |
   15 |   -80   -51  -122   -12  -154  -239   408 -2914     - |
   16 |   -23   -10    35   -51  -138    36    39  3616     - |
   17 |   -22    21  -138   -72  -111  -229   396 -1797     - |
   18 |    80    22   103    -2    -5    22  -155  4856     - |
   19 |   161   149  -232  -135  -133    93    31  4639     - |
   20 |   106    35   -62   -21   -47    -2   -36  4531     - |
   21 |    16    33    69    17   -24    -7   -85  3470     - |
   22 |   -24    -2   -95   254    29   131  -409 -1445     - |
   23 |   -17    63  -118   158    70     X  -167  1737     - |
   24 |   -89    30  -135   -21  -122  -117   277 -1412     - |
   25 |   -75  -281   123  -128  -194  -172   449  5632     - |
   26 |  -131   -29   149   -38   -74  -179   264 -1077     - |
   27 |     2    44   155   -23    51   -85     X -1451     - |
   28 |    17   201    54    91   107    -4  -261  -738     - |
   29 |  -157   -87  -116    51   -65  -180   344 -2300     - |
   30 |  -174    -7   121   -61  -117  -144   305   381     - |
   31 |  -125   -87    21   -46   -45  -101   295 -3671     - |
 -----+-------------------------------------------------------+
 ALBH |    17     -     -     -    81    39   -52     -     - |
 ALGO |   -81     -     X   -63   157   180   -22     -     - |
 ALIC |    -7     -     -     -     -     -     6     -     - |
 ALRT |    13     -     -    83    81     -  -128     -     - |
 AMC2 |   -57     -     -     -     3   183  -133     -     - |
 ARTU |    29     -   199    28   -29  -103   -77     -     - |
 ASPA |     -     -     -   233     -  -331     -     -     - |
 AUCK |   -71     -     X     -     4    74   -14     -     - |
 BAHR |    49     -     -   -86    52   143   -60     -     - |
 BILI |   128     -     -   -15     3   -44   -41     -     - |
 BJFS |   105     -     -   -36     -   134  -169     -     - |
 BOGT |   110     -  -180    10    22     X     X     -     - |
 BOR1 |    32     -     -     -   -16     -   -26     -     - |
 BRAZ |     -     -     -   -11     -    16     -     -     - |
 BRMU |  -270     -     -   174    26   -22     -     -     - |
 BRUS |   110     -     -     -   121     -   -91     -     - |
 CAS1 |    53     -   -33   -90   -81    45    57     -     - |
 CEDU |   -42     -    91     -    31    72   -89     -     - |
 CHAT |    -4     -     -     4   -36     -    -3     -     - |
 CHUR |    75     -     -     -    16     -   -62     -     - |
 COCO |    65     -   154  -122    86   -43    71     -     - |
 CRO1 |    45     -    35     -   -51    17   -73     -     - |
 DAEJ |  -164     -     -     -   167     -   136     -     - |
 DAV1 |    63     -     -   -58   -50    94   -57     -     - |
 DGAR |   -46     -     -   -42    18    72    27     -     - |
 DRAO |    19     -     -   -79   219     -    96     -     - |
 FAIR |   111     -    73  -107    81   133  -103     -     - |
 FORT |   692     -     -     1   143  -327  -201     -     - |
 GLPS |    47     -     -    89   -13   -14  -150     -     - |
 GODE |   -70     -   143     -   -87     -   -26     -     - |
 GOLD |     4     -    33   -16    34     -     -     -     - |
 GOUG |     -     -     -   111     -  -158     -     -     - |
 HARB |    62     -     -   -37     -     -     -     -     - |
 HERS |    61     -     -     -   492     -   -50     -     - |
 HOB2 |   -32     -     -   -40    58   192  -108     -     - |
 HRAO |   -72     -    75     -    69    81   -63     -     - |
 HYDE |   -22     -     -     -     -    18     -     -     - |
 IISC |     0     -    29    22    28     -   -47     -     - |
 INVK |   -69     -     -    41     -     -     -     -     - |
 IRKT |     -     -     -    43     -    31   -91     -     - |
 ISPA |   -59     -     -   -12   -86    66     -     -     - |
 JAB1 |    41     -   -86     -   -42     -    16     -     - |
 JPLM |     -     -     -    82   125     -  -115     -     - |
 KARR |    -9     -     -     -     -    28   -20     -     - |
 KERG |     -     -  -228    46   -40   135   -65     -     - |
 KIRU |    26     -     -     -   -27     -   -22     -     - |
 KOKB |    27     -     -   -39    41   133   -99     -     - |
 KOSG |   -12     -     -     7    50     -     -     -     - |
 KOUR |     -     -  -161     -   -27   159   -63     -     - |
 KSTU |    52     -   -72    -1     9     -     X     -     - |
 LHAS |    -2     -    42    45     -    92  -177     -     - |
 LPGS |     -     -   402     X  -106     4  -238     -     - |
 MAC1 |    11     -   -30  -193   -95   242    40     -     - |
 MALI |     -     -   -81   -34  -113     -    96     -     - |
 MAS1 |     -     -    36    -5   -34     -   -14     -     - |
 MATE |     -     -   -43    18     5     -     -     -     - |
 MAW1 |   101     -  -374     -    58     -   114     -     - |
 MBAR |   -70     -     -   -61   -46   146     -     -     - |
 MCM4 |     -     -     X   115  -443  -163     X     -     - |
 MDVJ |    -3     -     -     -     -     -     3     -     - |
 METS |    29     -     -    10    72     -   -39     -     - |
 MIZU |     -     -   -71    83   300     -   -75     -     - |
 MKEA |    90     -   -30     -    72     -   -57     -     - |
 NKLG |     -     -     -    -5   -25     7     X     -     - |
 NNOR |     -     -   -62     -  -163     -    36     -     - |
 NOT1 |   195     -     -     -     -    18  -180     -     - |
 NRC1 |   115     -     -   207   163     -  -387     -     - |
 NRIL |    18     -     -    -8   -22   109  -112     -     - |
 NTUS |  -150     -    28    -8    18   160   -40     -     - |
 NYA1 |     -     -     -    29   178     X   -40     -     - |
 OHI2 |    90     -    16   -69   -51     -    14     -     - |
 ONSA |    86     -    71    11   -29   -18  -111     -     - |
 OPMT |     4     -     -    -2     -     -     -     -     - |
 PDEL |  -170     -     -    16     -   120     -     -     - |
 PERT |   -54     -  -304     -    49   150    74     -     - |
 PETP |    19     -     -   -11    45     -     -     -     - |
 PIE1 |     -     -  -182     -   282     -   106     -     - |
 PIMO |   -61     -   188    -1     -   -58     X     -     - |
 POL2 |    33     -   136     -    -3     -  -106     -     - |
 POTS |   -76     -     -    45   -28     -     -     -     - |
 PRDS |    27     -     -     -     -     -   -22     -     - |
 PTBB |   112     -     -     -     -     -   -92     -     - |
 QAQ1 |   125     -     -   -64     -     -   -14     -     - |
 RESO |    16     -     -   -10     -     -     -     -     - |
 REUN |    24     -     -   -14     -     -     -     -     - |
 REYK |   -87     -     -    46    72     7     -     -     - |
 RIOG |   -42     -    61   -81     -    61    55     -     - |
 SANT |   -90     -     X    53    -1     X     X     -     - |
 SCH2 |   -10     -     -     -    83   135  -125     -     - |
 SCUB |     -     -     -     -     -    42   -41     -     - |
 SPT0 |    -8     -     -     -     -     -     7     -     - |
 STJO |   125     -     -  -111    74   142   -88     -     - |
 SUTH |    -1     -     -     4    38     -    -5     -     - |
 SUTM |     -     -     -   108   -21     -  -152     -     - |
 SYOG |     -     -     -  -216     -   -35   360     -     - |
 THTI |     -     -    20   -26   -15     4    21     -     - |
 THU3 |    32     -     -   -19   -59     -     -     -     - |
 TIDB |   -18     -    40     -   -42     -    -8     -     - |
 TIXI |    32     -     -    54     -     -  -102     -     - |
 TOW2 |   -26     -     -   -47   -36   105   -16     -     - |
 TRO1 |  -115     -     -    99    26     -   -44     -     - |
 TSKB |   -87     -     -   105    44    68  -142     -     - |
 UNSA |     -     -    -5    35    60     -   -46     -     - |
 URUM |   -10     -     -     6    34     -     -     -     - |
 USNO |    67     -     -     -    13     -   -55     -     - |
 USUD |     -     -   162   -30   107     -   -52     -     - |
 VILL |    69     -  -117     1    -5     -     9     -     - |
 WES2 |     -     -     -   -97     -     -   136     -     - |
 WHIT |   101     -     -     -   170     -   -84     -     - |
 WSRT |   -17     -     -    10     -     -     -     -     - |
 WTZR |   -19     -   -19    16   -17   112  -106     -     - |
 WUHN |    26     -     -    88    90     -  -146     -     - |
 YAKT |     0     -     -     -   -76    70   -69     -     - |
 YAR2 |   -78     -     -    46    -5     -     -     -     - |
 YELL |     7     -    63   -43    44    67   -48     -     - |
 YKRO |     -     -     -   162     -  -216   -13     -     - |
 YSSK |   -12     -     -   -20     -   154  -113     -     - |
 ZWEN |   -41     -   181    78    42     -  -181     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   igr   jpl   mit   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |    51    50    32    16    49    46    17  3234     - |  288   3.31
    3 |    31    75    56    19    46    36    23  1909     - |  288   1.40
    4 |    59    58    43    24    36    42    38  2324     - |  288   0.89
    5 |    32    47    47    31    19    33    20  4944     - |  288   1.79
    6 |    31    70    26    22    24    35    44   858     - |  288   1.23
    7 |    32    59    53    21    35    29    38  2753     - |  288   0.80
    8 |    73    55    36    22    20    44    65  1789     - |  288   1.37
    9 |    81    45    57    28    53    57    91  4564     - |  287   2.29
   10 |    59    55    61    19    26    39    29  6554     - |  288   2.79
   11 |    58    96    26    25    54    54    16  2214     - |  288   0.26
   13 |    57    54    31    16    31    48    50   489     - |  288   0.23
   14 |    40    76    61    44    25    44    25  1414     - |  288   0.28
   15 |    94    29    69    40    54    87   149  3902     - |  288   3.40
   16 |    16    74    63    42    36    33    22   756     - |  288   0.38
   17 |   113   156   126    89    55   141    65  1472     - |  288   1.10
   18 |    71    66    42    22    23    43    15  1007     - |  288   0.39
   19 |    36    70    72    20    38    40    20   977     - |  288   0.28
   20 |    45    40    27    21    28    35    16   931     - |  288   0.25
   21 |    78    67    41    30    52    47    28   749     - |  288   0.28
   22 |    61    56    33    21    23    39    43  1605     - |  288   0.35
   23 |    48    53    32    18    51     X    19  2588     - |  288   0.74
   24 |    56    60    69    24    50    41    34  2223     - |  288   1.93
   25 |    57    63    96    28    40    28    44  3574     - |  288   3.34
   26 |    52    49    41    17    38    47    22  1294     - |  288   0.58
   27 |    55    54    39    21    34    35     X  1395     - |  288   0.81
   28 |    37    59    49    22    30    45    49  2105     - |  288   0.24
   29 |    58    49    38    19    33    41    17  1523     - |  288   0.70
   30 |    38    53    51    16    20    23    11   840     - |  288   0.77
   31 |    24    56    35    14    15    35    38  6083     - |  288   1.43
 -----+-------------------------------------------------------+--------------
 ALBH |    17     -     -     -    29    19    19     -     - |  288   0.31
 ALGO |    22     -     X    21    14    21    20     -     - |  288   0.05
 ALIC |    11     -     -     -     -     -     9     -     - |  288   8.65
 ALRT |    25     -     -    19    16     -    34     -     - |  288   7.20
 AMC2 |    19     -     -     -    22    11    15     -     - |  288   0.02
 ARTU |    25     -    47    16    17    23    38     -     - |  251  10.52
 ASPA |     -     -     -    15     -    21     -     -     - |  288    >>>
 AUCK |    55     -     X     -    64    15    43     -     - |  264  14.94
 BAHR |    44     -     -    26    14    26    37     -     - |  288   1.85
 BILI |    24     -     -    26    23    18    38     -     - |  287   9.36
 BJFS |    17     -     -    25     -    27    30     -     - |  287  11.32
 BOGT |    30     -    73    34    30     X     X     -     - |  288   9.96
 BOR1 |   122     -     -     -   107     -   101     -     - |  286  18.68
 BRAZ |     -     -     -    13     -    19     -     -     - |  287    >>>
 BRMU |    41     -     -    28    21    45     -     -     - |  276    >>>
 BRUS |    23     -     -     -    33     -    19     -     - |  288   0.03
 CAS1 |    35     -    55    19    26    22    44     -     - |  288   7.68
 CEDU |    20     -    63     -    35    15    18     -     - |  288  19.74
 CHAT |    75     -     -    27    37     -    48     -     - |  287  12.66
 CHUR |    12     -     -     -    23     -    10     -     - |  287  24.97
 COCO |    33     -    72    44    29    28    31     -     - |  288   5.84
 CRO1 |    70     -    94     -    49    62    62     -     - |  277  19.36
 DAEJ |    21     -     -     -    72     -    17     -     - |  287   1.63
 DAV1 |    28     -     -    16    34    31    62     -     - |  288  15.74
 DGAR |    23     -     -    29    26    28    22     -     - |  288  13.89
 DRAO |    28     -     -    19    19     -    24     -     - |  288   0.05
 FAIR |   135     -    66   110    21   197   113     -     - |  288   0.08
 FORT |    47     -     -    43    54    26    36     -     - |  288   0.10
 GLPS |    30     -     -    28    14    22    30     -     - |  288   8.61
 GODE |    21     -    26     -    21     -    18     -     - |  288   0.04
 GOLD |    47     -    62    42    48     -     -     -     - |  284  15.33
 GOUG |     -     -     -    21     -    29     -     -     - |  287    >>>
 HARB |   103     -     -    61     -     -     -     -     - |  286  40.28
 HERS |    21     -     -     -    44     -    18     -     - |  264   8.09
 HOB2 |    41     -     -    15    59    14    34     -     - |  288   0.10
 HRAO |    25     -    39     -    22    18    22     -     - |  288   0.82
 HYDE |    20     -     -     -     -    17     -     -     - |  288  14.31
 IISC |    36     -    40    26    21     -    30     -     - |  288  14.67
 INVK |    30     -     -    18     -     -     -     -     - |  288   9.60
 IRKT |     -     -     -    22     -    24    29     -     - |  288   0.21
 ISPA |    25     -     -    22    24    36     -     -     - |  288  10.62
 JAB1 |    21     -    50     -    19     -    17     -     - |  288  11.06
 JPLM |     -     -     -    18    14     -    25     -     - |  287   3.56
 KARR |    19     -     -     -     -    17    14     -     - |  288   7.25
 KERG |     -     -    52    21    45    22    30     -     - |  288   2.29
 KIRU |    26     -     -     -    50     -    22     -     - |  243  11.49
 KOKB |    15     -     -    23    18    21    26     -     - |  288   0.02
 KOSG |    17     -     -    10    56     -     -     -     - |  288  22.39
 KOUR |     -     -    34     -    24    22    21     -     - |  288   1.49
 KSTU |   120     -    87    79   128     -     X     -     - |  231   9.55
 LHAS |    25     -    47    18     -    23    15     -     - |  288  10.36
 LPGS |     -     -    49     X    24    24    22     -     - |  288 169.87
 MAC1 |   181     -    83    41    42    62    33     -     - |  288  12.41
 MALI |     -     -    42    24    44     -    31     -     - |  288  19.90
 MAS1 |     -     -    61    26    17     -    13     -     - |  285   1.19
 MATE |     -     -    22     9    32     -     -     -     - |   99    >>>
 MAW1 |    82     -    57     -    32     -    91     -     - |  276  36.84
 MBAR |    27     -     -    15    12    19     -     -     - |  288  24.36
 MCM4 |     -     -     X     9    17    13     X     -     - |  287  27.70
 MDVJ |    25     -     -     -     -     -    20     -     - |  131   0.03
 METS |    28     -     -    30    39     -    31     -     - |  287  11.56
 MIZU |     -     -    44    29    21     -    23     -     - |  288   0.34
 MKEA |    37     -    67     -    24     -    39     -     - |  278  23.30
 NKLG |     -     -     -    12    26    17     X     -     - |  123  90.14
 NNOR |     -     -    43     -    28     -    25     -     - |  288  14.87
 NOT1 |    30     -     -     -     -    24    35     -     - |  288   0.06
 NRC1 |    29     -     -    24    19     -    17     -     - |  288   0.02
 NRIL |    37     -     -    45    24    20    53     -     - |  288   9.82
 NTUS |    30     -    64    52    34    25    50     -     - |  288   9.23
 NYA1 |     -     -     -    21    23     X    29     -     - |  287   0.07
 OHI2 |    43     -    82    23    28     -    27     -     - |  288   7.05
 ONSA |    28     -    68    15    45    18    20     -     - |  288   0.02
 OPMT |    16     -     -    10     -     -     -     -     - |  287   0.04
 PDEL |    21     -     -    14     -    17     -     -     - |  288  54.53
 PERT |    43     -    62     -    28    17    17     -     - |  288   2.54
 PETP |    19     -     -    11    25     -     -     -     - |  287   9.16
 PIE1 |     -     -   197     -    23     -   114     -     - |  114 123.60
 PIMO |    61     -    90    42     -    58     X     -     - |  263  16.10
 POL2 |    21     -    22     -    37     -    23     -     - |  288  12.89
 POTS |    23     -     -    14    17     -     -     -     - |  288  17.12
 PRDS |    21     -     -     -     -     -    17     -     - |  288   1.74
 PTBB |    14     -     -     -     -     -    11     -     - |  288   0.29
 QAQ1 |    14     -     -    16     -     -    19     -     - |  288   9.72
 RESO |    16     -     -    10     -     -     -     -     - |  288   7.80
 REUN |    21     -     -    12     -     -     -     -     - |  286  17.10
 REYK |    36     -     -    26    25    19     -     -     - |  288  11.86
 RIOG |    60     -    89    70     -    31    88     -     - |  284  11.33
 SANT |    21     -     X    12    23     X     X     -     - |  234  16.00
 SCH2 |    19     -     -     -    20    23    19     -     - |  288 148.82
 SCUB |     -     -     -     -     -    26    25     -     - |  286  10.17
 SPT0 |    24     -     -     -     -     -    20     -     - |  288   0.03
 STJO |    23     -     -    26    20    23    22     -     - |  288   0.07
 SUTH |    18     -     -    16    39     -    21     -     - |  288   9.81
 SUTM |     -     -     -    15    29     -    21     -     - |  288   1.28
 SYOG |     -     -     -    36     -    36    57     -     - |  281   0.78
 THTI |     -     -    73    20    12    27    34     -     - |  288   5.87
 THU3 |    13     -     -     8    19     -     -     -     - |  288   7.71
 TIDB |    14     -    34     -    13     -    14     -     - |  288   0.06
 TIXI |    27     -     -    27     -     -    35     -     - |  287   9.04
 TOW2 |    20     -     -    28    23    23    22     -     - |  288   9.18
 TRO1 |    19     -     -    20    37     -    29     -     - |  288   7.70
 TSKB |    19     -     -    21    18    15    23     -     - |  288   1.23
 UNSA |     -     -    30    16    25     -    20     -     - |  287  16.92
 URUM |    31     -     -    19    31     -     -     -     - |  288  36.96
 USNO |    28     -     -     -    19     -    23     -     - |  288   0.03
 USUD |     -     -    48    29    23     -    25     -     - |  288  11.98
 VILL |    29     -    54    24    14     -    24     -     - |  288   7.23
 WES2 |     -     -     -    20     -     -    29     -     - |  250   0.05
 WHIT |    24     -     -     -    44     -    20     -     - |  287   8.77
 WSRT |    20     -     -    12     -     -     -     -     - |  288   0.04
 WTZR |    20     -    43    17    35    18    20     -     - |  288   0.03
 WUHN |    30     -     -    18    17     -    28     -     - |  287  14.53
 YAKT |    37     -     -     -    38    44    65     -     - |  288   0.49
 YAR2 |    10     -     -     6    24     -     -     -     - |  288   3.73
 YELL |    27     -    33    25    29    25    27     -     - |  288   0.05
 YKRO |     -     -     -    20     -    15    22     -     - |  288  45.00
 YSSK |    21     -     -    14     -    17    26     -     - |  287  10.80
 ZWEN |    29     -    77    42    40     -    40     -     - |  288  12.57
 -----+-------------------------------------------------------+--------------
 TOT  |    47    65    59    30    36    42    39  2757     - |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288    9.87   | 3.92e-14  1.03e-14  1.58e-15 |
 ALGO |   288     0     0   288    9.43   | 2.73e-14  6.43e-15  2.66e-15 |
 BRUS |   288     0     0   288    7.58   | 4.14e-14  1.18e-14  2.69e-15 |
 WSRT |   288     0     0   288    7.23   | 3.48e-14  9.33e-15  3.44e-15 |
 OPMT |   287     0     0   286    6.56   | 4.37e-14  1.14e-14  3.24e-15 |
 YELL |   288     0     0   288    6.24   | 3.84e-14  1.06e-14  4.14e-15 |
 ONSA |   288     0     0   288    6.12   | 3.73e-14  8.30e-15  2.71e-15 |
 SPT0 |   288     1     0   287    5.21   | 4.36e-14  1.30e-14  1.80e-15 |
 FAIR |   288     0     0   288    4.87   | 5.76e-14  1.49e-14  7.90e-15 |
 USNO |   288     0     0   288    4.78   | 5.21e-14  1.10e-14  3.05e-15 |
 KOKB |   288     0     0   288    4.63   | 4.88e-14  1.12e-14  2.90e-15 |
 WTZR |   288     0     0   288    4.06   | 4.08e-14  1.55e-14  2.63e-15 |
 MDVJ |   131     0     0   131    3.87   | 5.40e-14  1.97e-14         - |
 NOT1 |   288     0     0   288    3.51   | 4.69e-14  1.94e-14  4.30e-15 |
 GODE |   288     0     0   288    2.79   | 5.81e-14  1.16e-14  3.33e-15 |
 NYA1 |   287     1     0   285    2.55   | 2.91e-14  8.88e-15  5.70e-15 |
 STJO |   288     0     0   288    2.02   | 3.85e-14  1.18e-14  5.53e-15 |
 WES2 |   250     0     0   250    1.99   | 4.83e-14  1.78e-14         - |
 NRC1 |   288     1     0   287    1.10   | 3.12e-14  8.94e-15  2.64e-15 |
 FORT |   288     0     0   288    0.87   | 7.48e-14  3.07e-14  6.75e-15 |
 TIDB |   288     0     3   132    0.75   | 1.92e-13  1.95e-14  5.64e-15 |
 DRAO |   288     0     0   288    0.74   | 7.61e-14  1.88e-14  4.03e-15 |
 HOB2 |   288     0     0   288    0.72   | 3.26e-14  7.38e-15  1.05e-14 |
 IRKT |   288     0     0   288    0.49   | 9.20e-14  1.62e-14  1.68e-14 |
 PIE1 |   114     0     0    39    0.48   | 5.22e-14  1.24e-14         - |
 ALBH |   288     0     0   288    0.27   | 3.79e-14  1.80e-14  2.21e-14 |
 PTBB |   288     0     0   288    0.22   | 3.27e-13  7.77e-14  3.03e-14 |
 G16  |   288     0     1   143    0.13   | 4.58e-13  5.13e-14  4.69e-14 |
 G07  |   288     0     0   288    0.12   | 2.72e-13  8.90e-14  6.42e-14 |
 G26  |   288     0     0   288    0.10   | 3.26e-13  1.09e-13  7.06e-14 |
 MIZU |   288     0     0   288    0.09   | 3.34e-13  9.88e-14  3.69e-14 |
 BOR1 |   286     0     0   284    0.08   | 4.66e-13  1.32e-13  7.07e-14 |
 G30  |   288     0     0   288    0.07   | 2.95e-13  1.03e-13  5.43e-14 |
 G29  |   288     0     0   288    0.06   | 3.96e-13  1.20e-13  8.63e-14 |
 YAKT |   288     0     0   288    0.05   | 3.92e-13  1.18e-13  2.71e-14 |
 G27  |   288     0     0   288    0.04   | 3.15e-13  1.22e-13  7.22e-14 |
 G04  |   288     0     0   288    0.03   | 4.62e-13  1.25e-13  1.17e-13 |
 SYOG |   281     0     0   278    0.03   | 6.86e-13  2.46e-13  6.31e-14 |
 G06  |   288     0     1   141    0.03   | 5.79e-13  1.29e-13  8.13e-14 |
 G31  |   288     0     0   288    0.03   | 2.33e-13  1.32e-13  1.38e-13 |
 HRAO |   288     0     0   288    0.02   | 1.47e-13  3.41e-14  8.41e-14 |
 BAHR |   288     0     0   288    0.02   | 3.33e-13  1.09e-13  1.99e-13 |
 G17  |   288     0     0   288    0.02   | 3.92e-13  1.28e-13  1.08e-13 |
 TSKB |   288     0     0   288    0.02   | 9.56e-13  2.68e-13  1.28e-13 |
 KERG |   288     0     0   288    0.01   | 1.18e-12  3.27e-13  1.57e-13 |
 G10  |   288     0     0   288    0.01   | 1.41e-12  4.24e-13  2.56e-13 |
 G05  |   288     0     0   288    0.01   | 1.25e-12  4.54e-13  1.36e-13 |
 G08  |   288     0     0   288    0.01   | 1.41e-12  4.48e-13  7.98e-14 |
 G24  |   288     0     0   288    0.01   | 1.26e-12  4.46e-13  2.46e-13 |
 KOUR |   288     0     0   288    0.01   | 1.47e-12  4.13e-13  1.49e-13 |
 SUTM |   288     0     0   288    0.01   | 7.45e-13  2.74e-13  1.51e-13 |
 G25  |   288     0     0   288    0.01   | 1.41e-12  4.91e-13  2.99e-13 |
 MAS1 |   285     0     0   284    0.00   | 1.85e-12  5.18e-13  9.12e-14 |
 PRDS |   288     0     0   288    0.00   | 1.48e-12  3.95e-13  1.78e-13 |
 DAEJ |   287     0     0   142    0.00   | 1.30e-12  4.48e-13  1.63e-13 |
 PERT |   288     0     0   288    0.00   | 1.82e-12  4.50e-13  1.79e-13 |
 G03  |   288     0     0   149    0.00   | 1.42e-12  4.73e-13  1.09e-13 |
 THTI |   288     0     0   288    0.00   | 3.83e-13  1.77e-13  3.62e-13 |
 GPST |   288     0     0     0    0.00   | 1.71e-14  4.38e-15  1.36e-15 |
 KSTU |   231     0     0     0    0.00   |        -         -         - |
 SANT |   234     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 WHIT |   287     0     0     0    0.00   | 4.46e-13  4.34e-13  9.70e-13 |
 UNSA |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 SCUB |   286     0     0     0    0.00   |        -         -         - |
 RIOG |   284     0     0     0    0.00   |        -         -         - |
 REUN |   286     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   123     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 MCM4 |   287     0     1     0    0.00   | 6.46e-13  3.05e-13  1.56e-12 |
 MATE |    99     0     0     0    0.00   |        -         -         - |
 JPLM |   287     0     0     0    0.00   | 5.60e-13  2.63e-13  3.76e-13 |
 HERS |   264     0     0     0    0.00   |        -         -         - |
 HARB |   286     0     0     0    0.00   |        -         -         - |
 GOUG |   287     0     0     0    0.00   |        -         -         - |
 CHUR |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BRAZ |   287     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     1     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 7.02e-13  8.24e-14  1.68e-14 |
 G23  |   288     0     6     0    0.00   | 5.30e-13  6.02e-14  4.40e-14 |
 G22  |   288     0     5     0    0.00   | 5.89e-13  5.91e-14  2.76e-14 |
 G21  |   288     1     6     0    0.00   | 9.83e-13  1.30e-13  3.78e-14 |
 G20  |   288     0     6     0    0.00   | 6.27e-13  7.71e-14  1.81e-14 |
 G19  |   288     0     6     0    0.00   | 7.15e-13  6.79e-14  3.12e-14 |
 G18  |   288     0     6     0    0.00   | 1.16e-12  1.13e-13  4.27e-14 |
 G15  |   288     0     0     0    0.00   | 1.49e-12  6.05e-13  4.14e-13 |
 G14  |   288     0     6     0    0.00   | 5.61e-13  6.10e-14  2.66e-14 |
 G13  |   288     0     6     0    0.00   | 5.63e-13  7.01e-14  2.45e-14 |
 G11  |   288     0     6     0    0.00   | 7.51e-13  7.26e-14  3.04e-14 |
 G09  |   287     0     0     0    0.00   | 1.29e-12  3.80e-13  2.76e-13 |
 G01  |   288     0     0     0    0.00   | 1.43e-12  7.45e-13  3.40e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 YKRO |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   | 8.83e-13  9.14e-13  2.08e-13 |
 VILL |   288     0     0     0    0.00   | 1.08e-12  6.61e-13  7.13e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     2     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     1     0     0    0.00   |        -         -         - |
 PIMO |   263     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   278     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   276     0     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     2     0    0.00   | 7.18e-13  6.39e-13  1.99e-12 |
 KIRU |   243     2     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     1     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HYDE |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   284     2     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   277     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.56e-13  7.99e-13  7.43e-13 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   276     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   251     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 4.02e-17  4.82e-16  2.90e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      ALGO      AMC2 |
------------------------------------------+------------------------------+
